ISRN PharmaceuticsVolume 2011 (2011), Article ID 208394, 8 pagesdoi:10.5402/2011/208394

Research Article

Formulation and Evaluation of Controlled-Release Tablet of Zolpidem Tartrate by Melt Granulation Technique

Shailesh T. Prajapati, Amit N. Patel, and Chhagan N. Patel

Department of Pharmaceutics, Shri Sarvajanik Pharmacy College, Mehsana, Gujarat 384001, India

Received 1 April 2011; Accepted 2 May 2011

Academic Editors: C. A. Ventura and C. Zacharis

Copyright © 2011 Shailesh T. Prajapati et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The present investigation describes the influence of the concentration of PEG 6000 as a melt binder and ratio of HPMC K4M : PVP on Zolpidem tartrate controlled-release tablet formulations using 3² full factorial design. The ratio of HPMC K4M and PVP K30 () and the concentration of melt binder () were selected as independent variables, and drug release at 1 hr (), 4 hr (), 8 hr (), diffusion coefficient (), and release rate constant () were selected as a dependent variable. Tablets were prepared by melt granulation technique and evaluated for various evaluation parameters. It was observed that concentration of melt binder had significant effect on , , , and Binder concentration 25% w/w was found optimum. Optimized formulation () showed good similarity with theoretical profile of drug. The variable had a significant effect on dependent variables, and the variable had no significant effect on dependent variables.

1. Introduction

Controlled-release (CR) formulations have been introduced into drug therapy with two main purposes: to reduce the number of single doses per day improving patient compliance of treatments and to decrease the fluctuations of plasma levels, in order to obtain better therapeutic efficacy and lower toxicity. There are many controlled-release pharmaceutical systems currently known, ranging from monolithic matrices, membrane reservoirs, erodible polymers, to the more technologically complex and sophisticated pH independent formulations, ion exchange resins, osmotically, and geometrically modified systems. Many of these systems are not produced in a form that is amenable to large-scale manufacturing processes and usually do not exhibit the desirable zero-order release kinetics. In addition, the cost of formulation development, raw materials, and manufacture technology are among the principal factors in CR delivery systems formulation for oral dosing [1]. An interesting approach to develop CR matrix formulations is based on melt granulation, which is a very short and easy one-step technique converting fine powders into granules. The powder agglomeration is promoted by the addition of a low melting point binder, which is solid at room temperature and melts at relatively low temperatures (50–80°C). The interest in melt granulation has increased due to the advantages of this technique over other CR delivery technologies. Since it is a solvent-free process, the drying phase is eliminated, and thus it becomes less consuming in terms of time and energy [2, 3].

Zolpidem is a nonbenzodiazepine analogue of imidazopyridine class. Zolpidem tartrate is a GABA agonist (sedative and hypnotic) used in the treatment of insomnia dosing ranging from 5 to 12.5 mg. The half life of the drug is about 1.9 to 3 hr, and oral bioavailability is 72 ± 7% indicating its promising candidature for the controlled-release formulation [4]. Zolpidem was marketed as the immediate release product in the short-term treatment of insomnia. Zolpidem is effective in reducing the time to sleep onset and increasing total sleep time; however, its effect on sleep maintenance has not been consistently demonstrated. The hypnotic effects of Zolpidem have been reported primarily in the first 3 hours postdose which can lead to subtherapeutic effects on sleep maintenance in the later portion of the night for some patients [5]. So, it is desired to maintain plasma concentration of drug for 8 hr.

Moreover, melt granulation is one of the most widely applied processing techniques in the array of pharmaceutical manufacturing operations due to its simplicity and easy scaleup [6–8]. In recent years, melt granulation has also been successfully employed to improve the dissolution rate of poorly soluble compounds increasing the bioavailability of these kinds of drugs, [9–11] and in the development of CR formulations [12–14] and masking the bitter taste of an active drug [15, 16].

Hence, the purpose of present investigation was to develope controlled-release tablet of Zolpidem tartrate by using polyethylene glycol (PEG 6000) [17] as melt binder, Hydroxypropyl methylcellulose (HPMC K4M) and Polyvinylpyrrolidone (PVP K30) as matrixing agent and filler, respectively, which would release the drug for prolonged period of time in view to maximize therapeutic effect of the drug and in an effort to expand the coverage of sleep complaints and overcome the lack of efficacy in sleep maintenance.

2. Materials and Methods

2.1. Materials

Zolpidem tartrate was procured from Tripada Pharmaceuticals Ltd., Ahmedabad, India. Hydroxypropyl methylcellulose K4M (HPMC K4M) was obtained from Yarrow Chem. Products, Mumbai, India. PEG 6000 and PVP K30 were obtained from S.D. Fine chemicals, Mumbai, India. Lactose, Magnesium stearate, and talc were purchased from Shakti Chemicals, Mehsana, India. All other materials and chemicals used were of either pharmaceutical or analytical grade.

2.2. Methods

2.2.1. Preparation of Zolpidem Controlled-Release Tablets by Melt Granulation

Accurately weigh PEG 6000 was melted in a porcelain dish at 55–60°C on heating metal, and the accurate quantity of Zolpidem was added to the melted mass of PEG. Previously prepared geometric mixture by tumbling method using spatula for 14 minutes of HPMC K4M, PVP, and Lactose was added to the molten Zolpidem-PEG 6000 mixture and stirred well to mix. Then mass was removed from the hot plate and subjected to scrapping until it attained room temperature. The coherent mass was passed through 22 mesh, and the resulting granules were resifted over 44 meshes to separate granules and fines. The % loss of mass during melt granulation was found between 15 and 20% of total weight. The granules were collected and mixed with talc and magnesium stearate. The lubricated blend was compressed using 8 mm round flat punch on 10 station Rimek-I rotary tablet machine (Karnavati Engineering, Kadi, India). Compression was adjusted to obtain tablets with hardness in the range of 3-4 kg/cm².

2.2.2. Physical Characterization

The fabricated tablets were characterized for weight variation (), hardness () Pfizer hardness tester (Janki Instrument Ltd, Ahmedabad, India), thickness using a screw-gauge micrometer (Campbell Electronics, Mumbai, India), and % friability (, Roche friabilator, Electrolab, Mumbai, India).

2.2.3. In Vitro Dissolution Study

The in vitro dissolution study of Zolpidem tablets () was performed as described in Indian Pharmacopoeia 2010 using USP apparatus II (model TDT-08T, Electrolab, Mumbai, India) fitted with paddle (50 rpm) at 37°C ± 0.5°C using simulated gastric fluid (pH 1.2; 900 mL) as a dissolution medium for first 2 hours and followed by phosphate buffer (pH 6.8; 900 mL) for remaining hours. At the predetermined time intervals, 10-mL samples were withdrawn and analyzed at 238 nm using a Shimadzu UV 1800 double-beam spectrophotometer (Shimadzu, Kyoto, Japan). Cumulative percentage drug release was calculated using an equation obtained from a calibration curve which is developed in the range of 2–16 g/mL for 0.1 N HCl and pH-6.8 phosphate buffer (see Figure 1).

Figure 1: In vitro dissolution profile of factorial design batches.

2.2.4. Optimization of Variables Using Full Factorial Design

A 3² randomized full factorial design was employed in the present study. In this design, 2 factors were evaluated, each at 3 levels, and experimental trials were performed for all 9 possible combinations. The ratio of polymer (HPMC K4M : PVP) () and concentration of melt binder (PEG 6000) () were chosen as independent variables in 3²  full factorial design, while , and (% drug release after 1, 4, and 8 hours, resp.), diffusion coefficient (), and release rate constant () were taken as dependent variables. The composition of factorial design batches () is shown in Table 1. The prepared formulations were evaluated for assay, friability, and hardness and in vitro release study. The results of evaluation parameters are shown in Table 2. Statistical treatment was carried out to the factorial design batches using design expert DX8 software.

Table 1: Formulation and evaluation of batches in 3² full factorial design.

Batch code
Variable levels in coded form

−1
−1
81.33
99.67
100
0.084
0.868

−1
0
63.91
91.76
98.29
0.188
0.686

−1
1
78.73
99.6
100
0.097
0.848

0
−1
74.91
99.19
100
0.128
0.802

0
0
73.4
96.61
100
0.134
0.784

0
1
55.58
88.14
100
0.268
0.603

1
−1
43.22
75.26
96.82
0.379
0.44

1
0
53.35
90.83
100
0.288
0.574

1
1
43.9
73.32
93.33
0.356
0.446

Coded values
Actual values

−1
25% : 20%
15%

0
30% : 15%
20%

1
35% : 10%
25%

*All batches contained 12.5 milligrams of Zolpidem, 2.5 mg of talc, and 1.25 mg of magnesium stearate. indicates the ratio of HPMC K4M (%): PVP (%), and is the concentration of melt binder PEG 6000. , and indicate the percentage of drug released after 1, 4, and 8 hours, respectively. and indicate diffusion coefficient and release rate constant, respectively.

Table 2: Results of factorial design batches ().

Parameter

Assay (%)
93.45
97.43
92.50
91.45
94.62
96.08
95.2
92.74
97.6

Friability (%)
0.162
0.198
0.190
0.112
0.105
0.107
0.043
0.067
0.0982

Hardness (Kg/cm²)
3.25
3.5
3.0
2.75
3.75
4
3.75
3.25
3.75

Similarity factor ()
28.69
38.03
29.12
30.67
32.05
40.99
72.22
43.46
70.64

2.2.5. Kinetic Modeling of Dissolution Data

The dissolution profile of all batches was fitted to various models such as zero order, first order, Higuchi [18], Hixon and Crowell [19], and Korsmeyer et al. [20], to ascertain the kinetic of drug release.

2.2.6. Comparison of Dissolution Profiles for Selection of Optimum Batch

The similarity factor () given by SUPAC guidelines for a modified release dosage form was used as a basis to compare dissolution profiles. The dissolution profiles are considered to be similar when is between 50 and 100. The dissolution profile of products was compared using an which is calculated from following formula: where is the dissolution time, and and are the reference (here, this is the theoretical dissolution profile of Zolpidem) and test dissolution value at time [21].

2.2.7. Fourier Transform Infrared Spectroscopy

Fourier transform infrared (FTIR) spectra of Zolpidem tartrate (see Figure 7) and granules of optimized batch were recorded using KBr mixing method on FTIR (FTIR-1700, Shimadzu, Kyoto, Japan) for drug excipients interaction study (see Figure 8).

3. Results and Discussion

3.1. Result of Preliminary Screening

From the in vitro dissolution study, it was found that hydrophobic binder MCC wax and bees wax have more sustaining effect on the release of drug than stearic acid and cetyl alcohol it is due to its hydrophobic nature. Hydrophilic binder PEG-6000 gave good drug release compared to all the other binders, which is due to its hydrophilic nature. HPMC K4M (hydrophilic) was selected as a matrixing agent considering its widespread applicability and excellent gelling activity in controlled-release formulations. PVP was also selected in formulation because it helps in releasing loading dose from the formulation in the 1st hour which is required for the therapeutic effect of formulation.

3.2. Full Factorial Design

A statistical model incorporating interactive and polynominal terms was used to evaluate the responses where is the dependent variable, is the arithmetic mean response of the 9 runs, and is the estimated coefficient for the factor Xi. The main effects ( and ) represent the average result of changing 1 factor at a time from its low to high values. The interaction terms () show how the response changes when two factors are simultaneously changed. The polynomial terms ( and ) are included to investigate nonlinearity. The dissolution profile for 9 batches showed a variation (i.e., initial 1 hr release ranging from 43.22% to 81.33% and drug release after 8 hr ranging from 96.82% to 100%). The fitted equations (full and reduced) relating the responses, , and , diffusion coefficient (), and release rate constant () to the transformed factor are shown in the Table 3. The polynomial equations can be used to draw conclusions after considering the magnitude of coefficient and the mathematical sign it carries (i.e., negative or positive). Table 4 shows the results of analysis of variance (ANOVA), which was performed to identify insignificant factors. Data were analyzed using Design of Expert version 8.

Table 3: Summary of the results of regression analysis.

Response ()

FM
68.16
−3.85
−13.60
0.3525
−0.296
−6.91

RM
63.14
—
−13.91
—
—
—

Response ()

FM
97.27
−2.11
−8.67
−0.367
−3.63
−6.30

RM
90.48
—
−8.60
—
—
—

Response ()

FM
101.06
−0.055
−1.88
−0.0825
−1.59
−2.45

RM
98.715

−1.35

Response ()

FM
0.1704
0.0276
0.103
−0.00098
0.0093
0.049

RM
0.2135
—
0.109
—
—
—

Response ()

FM
0.7362
−0.039
−0.153
0.00095
−0.0098
−0.0823

RM
0.6723

−0.157

FM = full model, RM = reduced model.

Table 4: Calculations for testing the model in portions.

DF
SS
MS
F
R²

Regression

Fcalc. = 0.414

FM
5
1295.88
259.176
2.095
0.7774
Ftable = 5.34

RM
1
1162.04
1162.042
14.11
0.6684
DF(4,3)

Error

FM
3
370.996
123.665

RM
7
576.251
82.322

Regression

Fcalc. = 0.417

FM
5
588.807
117.76
1.48
0.7122
Ftable = 5.34

RM
1
444.104
444.104
8.39
0.5453
DF (4,3)

Error

FM
3
237.936
79.31

RM
7
370.317
52.9

Regression

Fcalc. = 0.197

FM
5
38.474
7.694813
0.9211
0.6055
Ftable = 5.34

RM
1
11.0432
11.0432
2.44
0.2587
DF (4,3)

Error

8.353

FM
3
25.05915
4.5191

RM
7
31.6339

Regression

Fcalc.= 0.571

FM
5
0.07328
0.0146
2.61
0.8135
Ftable=5.34

RM
1
0.07128
0.07128
16.88
0.7069
DF(4,3)

Error

FM
3
0.01679
0.005597

RM
7
0.02955
0.004222

Regression

Fcalc.=0.439

FM
5
0.1639
0.0327
2.21
0.7867
Ftable=5.34

RM
1
0.1478
0.1478
14.7
0.677
DF (4,3)

Error

FM
3
0.0444
0.0148

RM
7
0.0704
0.0101

DF, degree of freedom; SS, sum of squares; MS, mean of squares; , regression coefficient; FM, full model; RM, reduced model.

values for , diffusion coefficient (), and release rate constant () are 0.7774, 0.7122, 0.8135, and 0.7867, respectively, indicating good correlation between dependent and independent variables. The low value, 0.6055 for , indicates poor correlation between dependent and independent variables showing that drug release at 8 hr is less dependent on selected variables. The reduced models were developed for response variables by omitting the insignificant terms with . The terms with were considered statistically significance and retained in the reduced model. The coefficients for full and reduced models for response variables are shown in Table 4. The significance levels of the coefficients in the were found to be insignificant at and, hence, do not contribute significant information to the prediction of .

3.3. Full and Reduced Model for

The significance levels of the coefficients , and were found to be ,  .9722, .4441, and .9534, respectively, so they were omitted from the full model to generate a reduced model [22]. The results of statistical analysis are shown in Table 4. The coefficients and were found to be significant at ; hence, they were retained in the reduced model. The reduced model was tested in proportion to determine whether the coefficients , and contribute significant information to the prediction of . The results of model testing are shown in Table 4. The critical value of for is equal to 5.34 ( = 4,3). Since the calculated value ( = 0.414) is less than the critical value ( = 5.34), it may be concluded that the interaction terms , and do not contribute significantly to the prediction of and can be omitted from the full model to generate the reduced model.

3.4. Full and Reduced Model for

The significance levels of the coefficients , and were found to be =  .6023,  .5762,  .390, and  .9344, respectively, so they were omitted from the full model to generate a reduced model. The results of statistical analysis are shown in Table 4. The coefficients , and were found to be significant at ; hence, they were retained in the reduced model. The reduced model was tested in proportion to determine whether the coefficients , and contribute significant information to the prediction of . The results of model testing are shown in Table 4. The critical value of F for is equal to 5.34 ( = 4,3). Since the calculated value ( = 0.4172) is less than the critical value ( = 5.34), it may be concluded that the interaction terms and do not contribute significantly to the prediction of and can be omitted from the full model to generate the reduced model.

3.5. Full and Reduced Model for Diffusion Coefficient ()

The significance levels of the coefficients , and were found to be =  .4318,  .8711,  .4198,  and  1.000, respectively, so they were omitted from the full model to generate a reduced model. The results of statistical analysis are shown in Table 4. The coefficients and were found to be significant at ; hence, they were retained in the reduced model. The reduced model was tested in proportion to determine whether the coefficients , and contribute significant information to the prediction of diffusion coefficient (). The results of model testing are shown in Table 4. The critical value of for is equal to 5.34 ( = 4,3). Since the calculated value ( = 0.5717) is less than the critical value (), it may be concluded that the interaction terms , and do not contribute significantly to the prediction of diffusion coefficient () and can be omitted from the full model to generate the reduced model.

3.6. Full and Reduced Model for Release Rate Constant ()

The significance levels of the coefficients , and were found to be ,   .9164,   .4095, and   .9882, respectively, so they were omitted from the full model to generate a reduced model. The results of statistical analysis are shown in Table 4. The coefficients and were found to be significant at ; hence, they were retained in the reduced model. The reduced model was tested in proportion to determine whether the coefficients , and contribute significant information to the prediction of release rate constant (). The results of model testing are shown in Table 4. The critical value of for is equal to 5.34 ( = 4,3). Since the calculated value ( = 0.5717) is less than the critical value ( = 5.34), it may be concluded that the interaction terms , and do not contribute significantly to the prediction of release rate constant () and can be omitted from the full model to generate the reduced model. To demonstrate graphically the effect of the ratio of polymer (HPMC K4M: PVP) and concentration of melt binder (PEG 6000), the response surface plots were generated by using Design expert 8.0.2 trial version software for the dependent variables Q₁, Q₄, Q₈ (% drug release after 1, 4, 8 hours, resp.), diffusion coefficient (), release rate constant () and shown in Figures 2, 3, 4, 5, and 6 respectively.

Figure 2: Response surface plot for .

Figure 3: Response surface plot for .

Figure 4: Response surface plot for .

Figure 5: Response surface plot for diffusion coefficient ().

Figure 6: Response surface plot for release rate constant ().

Figure 7: FTIR spectrum of Zolpidem tartrate.

Figure 8: FTIR spectrum of granules of optimized batch.

3.7. Kinetic Modeling of Dissolution Data

The kinetics of the dissolution data were well fitted to zero order, Higuchi model, and Krossmayer-Peppas model as evident from regression coefficients in Table 5. In case of the controlled-release formulations, diffusion, swelling, and erosion are the three most important rate controlling mechanisms. Formulation containing swelling polymers show swelling as well as diffusion mechanism because the kinetic of swelling includes relaxation of polymer chains and imbibitions of water, causing the polymer to swell and changing it from a glassy to rubbery state. The value of diffusion exponent for most factorial formulations is between 0.084 and 0.379 (Table 5) indicating Fickian drug release from the formulations [23, 24].

Table 5: Kinetic treatment of dissolution data.

Zero order

1.7188
3.850
1.9727
2.6722
2.8542
5.42
7.1859
5.7625
6.6357

89.50
71.37
87.95
83.46
81.25
62.96
42.74
59.76
43.639

0.6497
0.8484
0.6567
0.7395
0.7897
0.8932
0.9799
0.9023
0.9775

First order

0.0081
0.0203
0.0095
0.0130
0.0140
0.0296
0.0449
0.0321
0.0338

1.95
1.8528
1.9418
1.9192
1.9083
1.8012
1.6650
1.7806
1.7414

0.6438
0.8206
0.6482
0.7276
0.7699
0.8551
0.9483
0.8664
0.9394

Higuchi

7.6048
16.077
8.710
11.572
69.396
22.35
28.5
23.64
26.37

81.73
55.93
79.075
71.90
12.119
41.81
16.90
37.51
19.75

0.7375
0.9088
0.7429
0.8216
0.8602
0.9439
0.9974
0.9497
0.9962

Hixon Crowell

−0.028
−0.0678
−0.0327
−0.044
−0.0480
−0.0976
−0.141
−0.105
−0.131

0.1726
0.4946
0.1998
0.2764
0.3136
0.6578
1.0844
0.7219
1.069

−0.645
−0.8300
−0.6507
−0.7316
−0.7765
−0.8684
−0.9605
−0.8792
−0.9594

Korsmeyer and Peppas

0.0837
0.187
0.097
0.128
0.133
0.267
0.379
0.288
0.356

−0.0621
−0.163
−0.0711
−0.095
−0.105
−0.219
−0.355
−0.240
−0.350

0.8201
0.9435
0.8229
0.8886
0.9109
0.962
0.998
0.968
0.997

= slope, = intercept, = square of correlation coefficient, and = diffusion exponent.

3.8. Comparison of Dissolution Profiles for Selection of Optimum Batch

The values of similarity factor () for the batch showed maximum 72.22 (Table 2); hence, it was selected as optimum batch.

3.9. Fourier Transform Infrared Spectroscopy

The Zolpidem tartrate exhibits peak due to amide and alkenes group. It was observed that there were no changes in these main peaks in the FTIR spectra of a mixture of drug and polymers (Figure 3); hence, it was concluded that there were no physical or chemical interactions of Zolpidem with PEG 6000, PVP, and HPMC K4M.

4. Conclusion

From the present investigation, it was concluded that the concentrations of PEG 6000 as a melt binder have more pronounced effect than the ratio of HPMC K4M and PVP K30 polymers on drug release from controlled-release tablet formulation and are useful to produced tablet dosage form with desirable drug release pattern.

Acknowledgment

The authors are thankful to Tripada Pharmaceutical Limited for providing a gift sample of Zolpidem tartrate.

References

M. A. Bayomi, S. A. Al-Suwayeh, and A. R. M. El-Helw, “Excipient-excipient interaction in the design of sustained-release theophylline tablets: in vitro and in vivo evaluation,” Drug Development and Industrial Pharmacy, vol. 27, no. 6, pp. 499–506, 2001.

J. Hamdani, A. J. Moes, and K. Amighi, “Development and evaluation of prolonged release pellets obtained by the melt pelletization process,” International Journal of Pharmaceutics, vol. 245, no. 1-2, pp. 167–177, 2002.

R. J. Suryawanshi, U. Shah, and K. Vishnupad, “Alternative granulation technique: melt granulation,” Drug Development and Industrial Pharmacy, vol. 22, no. 9-10, pp. 917–924, 1996.

J. G. Hardman, L. E. Limbrid, A. Goodman, P. B. Molinoff, and R. W. Ruddon, The Pharmacological Basis of Therapeutics, Macgraw-Hill, New York, NY, USA, 10th edition, 2001.

C. Kirkwood, J. Neill, and E. Breden, “Zolpidem modified-release in insomnia,” Neuropsychiatric Disease and Treatment, vol. 3, no. 5, pp. 521–526, 2007.

B. M. Lue, F. S. Nielsen, T. Magnussen, H. M. Schou, K. Kristensen, L. O. Jacobsen, and A. Müllertz, “Using biorelevant dissolution to obtain IVIVC of solid dosage forms containing a poorly-soluble model compound,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 69, no. 2, pp. 648–657, 2008.

J. Goole, P. Deleuze, F. Vanderbist, and K. Amighi, “New levodopa sustained-release floating minitablets coated with insoluble acrylic polymer,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 68, no. 2, pp. 310–318, 2008.

S. Shimpi, B. Chauhan, K. R. Mahadik, and A. Paradkar, “Preparation and evaluation of diltiazem hydrochloride-Gelucire 43/01 floating granules prepared by melt granulation,” AAPS PharmSciTech, vol. 5, no. 3, article 43, 2004.

N. Passerini, B. Albertini, M. L. González-Rodríguez, C. Cavallari, and L. Rodriguez, “Preparation and characterisation of ibuprofen-poloxamer 188 granules obtained by melt granulation,” European Journal of Pharmaceutical Sciences, vol. 15, no. 1, pp. 71–78, 2002.

D. Yang, R. Kulkarni, R. J. Behme, and P. N. Kotiyan, “Effect of the melt granulation technique on the dissolution characteristics of griseofulvin,” International Journal of Pharmaceutics, vol. 329, no. 1-2, pp. 72–80, 2007.

N. Passerini, B. Albertini, B. Perissutti, and L. Rodriguez, “Evaluation of melt granulation and ultrasonic spray congealing as techniques to enhance the dissolution of praziquantel,” International Journal of Pharmaceutics, vol. 318, no. 1-2, pp. 92–102, 2006.

J. Goole, F. Vanderbist, and K. Amighi, “Development and evaluation of new multiple-unit levodopa sustained-release floating dosage forms,” International Journal of Pharmaceutics, vol. 334, no. 1-2, pp. 35–41, 2007.

P. Sharma, P. Chaudhari, H. Bhagat, and N. Varia, “Preparation and characterization of meloxicam-myrj 52 granules obtained by melt granulation,” Pharmaceutical Technology, vol. 31, no. 11, pp. 51–59, 2007.

L. Ochoa, M. Igartua, R. M. Hernández, M. T. Solinís, A. R. Gascón, and J. L. Pedraz, “In vivo evaluation of two new sustained release formulations elaborated by one-step melt granulation: level A in vitro-in vivo correlation,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 75, no. 2, pp. 232–237, 2010.

R. Chokshi and H. Zia, “Hot melt extrusion technique: a review,” Iranian Journal of Pharmaceutical Research, vol. 3, pp. 3–16, 2004.

T. Schafer, P. Holm, and H. G. Kristensen, “Melt granulation in a laboratory scale high shear mixer,” Drug Development and Industrial Pharmacy, vol. 16, no. 8, pp. 1249–1277, 1990.

L. Ochoa, M. Igartua, R. M. Hernández, A. R. Gascón, M. A. Solinis, and J. L. Pedraz, “Novel extended-release formulation of lovastatin by one-step melts granulation: in vitro and in vivo evaluation,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 77, no. 2, pp. 306–312, 2011.

T. Higuchi, “Mechanism of sustained action mediation, theoretical analysis of rate of release of solid drugs dispersed in solid matrices,” Journal of Pharmaceutical Sciences, vol. 52, pp. 1145–1149, 1963.

A. W. Hixon and J. H. Crowell, “Dependence of reaction velocity upon surface and agitation,” Industrial & Engineering Chemistry Research, vol. 23, no. 11, pp. 923–931, 1931.

R. W. Korsmeyer, R. Gurny, E. Doelker, P. Buri, and N. A. Peppas, “Mechanisms of solute release from porous hydrophilic polymers,” International Journal of Pharmaceutics, vol. 15, no. 1, pp. 25–35, 1983.

P. Costa, S. Lobo, and J. Manuel, “Modeling and comparison of dissolution profiles,” European Journal of Pharmaceutical Sciences, vol. 13, no. 2, pp. 123–133, 2001.

W. Mendenhall and T. Sincich, “Multiple regression,” in A second course in Business statasticals, Regression analysis, chapter 4, pp. 141–226, Dellen Publishing, San Francisco, Calif, USA, 3rd edition, 1989.

J. Siepmam and N. A. Peppas, “Modelling of drug release from delivery system based on hydroxylpropyl methylcellulose,” Advanced Drug Delivery Reviews, vol. 48, pp. 139–157, 2001.

P. L. Ritger and N. A. Peppas, “A simple equation for description of solute release from swellable devices,” Journal of Controlled Release, vol. 5, no. 1, pp. 37–42, 1987.