ISRN MicrobiologyVolume 2011 (2011), Article ID 787290, 5 pagesdoi:10.5402/2011/787290

Research Article

Activity of Ceftaroline against Aerobic Gram-Positive and Gram-Negative Pathogens: Effect of Test Method Variability

Diane M. Citron,¹ Yumi A. Warren,¹ Kerin L. Tyrrell,¹ and Ellie J. C. Goldstein1,2

¹R.M. Alden Research Laboratory, Culver City, CA 90230, USA²Department of Medicine, David Geffen School of Medicine, Los Angeles, CA 90095, USA

Received 23 August 2011; Accepted 28 September 2011

Academic Editor: P. D. Ghiringhelli

Copyright © 2011 Diane M. Citron et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Ceftaroline is a new cephalosporin with bactericidal activity against methicillin-resistant S. aureus (MRSA) as well as gram-negative pathogens. Variations of in vitro test conditions were found to affect ceftaroline activity, with 5% NaCl inhibiting growth and/or reducing the minimum inhibitory concentrations (MICs) for E. coli, K. pneumoniae, M. catarrhalis, H. influenzae, and streptococci, while an inoculum of 10⁶ CFU/mL raised MICs of some E. coli, K. pneumoniae, and M. catarrhalis strains.

1. Introduction

The emergence of MRSA has spurred the development of alternative therapies such as daptomycin, linezolid, and quinupristin-dalfopristin, which are not active against gram-negative pathogens and require combination therapy. Ceftaroline is a new, parenteral, broad-spectrum cephalosporin with bactericidal activity against MRSA, including vancomycin-intermediate (VISA) strains, and multidrug-resistant Streptococcus pneumoniae (MDRSP); it is also active against common gram-negative pathogens and can therefore be used as monotherapy for mixed infections [1–6]. Since alterations of in vitro test conditions can potentially affect susceptibility results, we evaluated the effects of 15 variations to the standard test conditions as specified by the Clinical and Laboratory Standards Institute (CLSI) guidelines [7, 8] on the minimum inhibitory concentrations (MICs) of ceftaroline against 30 isolates representing 10 species of clinically important, commonly encountered organisms.

2. Materials and Methods

2.1. Standard Method

The CLSI reference broth microdilution method (CLSI 2006, 2009) uses cation-adjusted Mueller Hinton broth (CAMHB) (Difco, BD; Sparks, Md, USA), which has a calcium concentration of 25 mg/L, a magnesium concentration of 12.5 mg/L, and a pH of 7.3 + 0.1. The standard inoculum is 5 × 10⁵ colony-forming units (CFUs)/mL for broth microdilution testing and 10⁴ CFU/spot for agar dilution tests.

2.2. Test Variables

Modifications of standard test conditions included adjusting the Ca⁺⁺ content of CAMHB to 50 mg/L Ca, addition of NaCl to 5%, adjusting the broth to pH 6 and pH 8, and using inocula of 10⁴ and 10⁶ colony-forming units (CFUs)/mL. Other variations to the standard medium were the addition of 10% and 50% pooled human serum (Sigma; St. Louis, Mo, USA), the addition of lysed horse blood to 2.5% (LHB) (Hardy Diagnostics, Inc. Santa Maria, Calif, USA), and using Haemophilus test medium (HTM) broth. While MIC panels were incubated at 35°C in ambient conditions, for comparative purposes, additional tests in CAMHB were incubated in the anaerobic chamber or in 5% CO₂.

2.3. MIC Test Panel Preparation

Ninety-six-well panels were prepared with twice the final concentration of ceftaroline (50 μL/well) using the Quick-Spense IIe apparatus (Sandy Springs Instruments; Germantown, Md, USA) and stored at −70°C until used. Addition of 50 μL of the organism inocula to the wells reduced the final ceftaroline concentration to the desired level of 0.008 to 8 μg/mL. Some of the organisms did not achieve a ceftaroline MIC endpoint, and further dilutions were prepared to 0.001 μg/mL for retesting some of those isolates.

2.4. Agar Dilution Test Media

Agar dilution MICs were determined on unsupplemented Mueller Hinton agar (MHA) (Difco), with 5% LHB, and on HTM with 1.5% agar (HTMA). Serial twofold dilutions of ceftaroline were added to molten agar deeps to prepare the plates for use on the same day. Concentrations of ceftaroline ranged from 0.008 to 8 μg/mL. Drug-free growth control plates were included (CLSI, 2006).

2.5. Test Organisms

All 30 strains tested were recent clinical isolates and American Type Culture Collection (ATCC) quality control (QC) strains, which included Escherichia coli ATCC 25922, Staphylococcus aureus ATCC 29213, Enterococcus faecalis ATCC 29212, Streptococcus pneumoniae ATCC 49619, and Haemophilus influenzae ATCC 49247. Details about the clinical isolates are listed in Table 1. Clinical isolates were selected based on previously demonstrated resistance patterns. The isolates were stored in 20% skim milk at −70°C and were taken from frozen stock and transferred twice on blood or chocolate agar (Hardy Diagnostics Inc.) before testing.

Table 1: List of organisms used in the study.

Organism
RMA number
Specimen source
Date isolated
Comments

E. coli

ATCC 25922

19089
Blood
3/7/2007
Ampicillin = 4 μg/mL

19090
Primary infection site
3/28/2007
Ampicillin ≥32 μg/mL

K. pneumoniae
19091
Primary infection site
3/1/2007
Ampicillin = 32 μg/mL

19092
Blood
6/6/2007
Ampicillin = 16 μg/mL

19093
Blood
6/29/2007
Ampicillin = 32 μg/mL

H. influenzae

ATCC 49247

16081
Respiratory
12/31/2003
β-Lactamase-negative

18520
Respiratory-sinus
12/23/2005
β-Lactamase-positive

M. catarrhalis
11940
Respiratory-sinus
6/14/2000

14032
Respiratory-sinus
5/22/2002

18861
Respiratory-sputum
1/31/2007

S. aureus

ATCC 29213

18488
Chest infection site
2/11/2005
Methicillin-S

18401
Blood
8/16/2005
Methicillin-S

18483
Head abscess
10/15/2005
Methicillin-R

18504
Primary infection site
11/18/2005
Methicillin-R

18526
Blood
10/24/2005
Methicillin-R

E. faecalis

ATCC 29212

18284
Foot infection site
3/24/2005

18877
Blood
4/10/2007

S. pyogenes
17018
Diabetic foot infection site
1/22/2003

17019
Diabetic foot infection site
10/22/2002

19047
Abdominal lesion
10/26/2007
Clindamycin-R

S. pneumoniae

ATCC 49619

19094
Ear
10/29/2007
Penicillin-S

19095
Eye
1/9/2007
Penicillin-S

13345
Nasopharynx
11/14/2001
Penicillin = 8 μg/mL

13385
Nasopharynx
12/4/2001
Penicillin = 8 μg/mL

18876
Eye
1/2/2007
Penicillin = 8 μg/mL

RMA: R.M. Alden (culture collection).

ATCC: American Type Culture Collection.

2.6. Inoculum Preparation for Microbroth Dilution Tests

Standard inocula were prepared by suspending colonies from overnight cultures in 0.85% saline to equal the turbidity of the 0.5 McFarland standard and diluting it in CAMHB with the various additives at twice their final concentration, which upon addition of 50 μL of inoculum to the test panel were diluted 1 : 2. The 104 and 10⁶ cfu/mL inocula were prepared by diluting the saline suspension either 10-fold more (for 10⁴ cfu/mL) or 10-fold less (for 10⁶ cfu/mL). The trays were inoculated with 50 μL of cell suspension for a final inoculum of ~5 × 10⁵ CFU/mL which was validated by quantitative subculture from the growth control well. Inoculum preparation and all testing were performed in duplicate.

2.7. Agar Dilution Testing

For agar dilution tests, the cell suspensions prepared as above were diluted 1 : 10 in CAMHB and applied to the agar plates using a Steers replicator device that delivered a final inoculum of 10⁴ CFU/spot.

2.8. MIC Determinations

After overnight incubation, the broth microdilution trays were examined for growth. The MIC was the lowest drug concentration that completely inhibited growth [7]. For agar dilution, the plates were incubated at 35°C overnight. The MIC was the lowest concentration that completely inhibited growth or resulted in a marked reduction of growth as compared with the drug-free control [7].

3. Results

We obtained MICs from duplicate tests under the variations shown in Table 2. In cases of discrepancy, the higher value was recorded. The ceftaroline MICs for the QC isolates (tested with the reference microbroth methods according to CLSI guidelines) were all within their acceptable ranges. Effects of variables in testing were noted where 5% NaCl inhibited growth and/or reduced MICs for E. coli and K. pneumoniae and completely inhibited the growth of M. catarrhalis, H. influenzae, and all streptococci. Using an increased inoculum of 10⁶ cfu/mL increased the MIC 5-fold for 1 of 3 E. coli strains that was also resistant to ampicillin (MIC > 32 μg/mL) and 1 of 3 K. pneumoniae strains that did not appear to have any unusual resistance pattern (ampicillin MIC 32 μg/mL, ceftriaxone 0.25 μg/mL). This K. pneumoniae isolate produced the same result when retested. The higher inoculum also increased MICs 3- to 5-fold for M. catarrhalis. The addition of blood or serum to the medium enhanced M. catarrhalis growth without changing the MICs. Testing on agar, especially HTMA, produced MICs that were 1–3 dilutions higher. All other variables showed minimal effect, and the MICs were generally within one dilution of the reference method.

Table 2: Ceftaroline MICs (μg/mL) in the cation-adjusted Mueller-Hinton broth with test variables and agar dilution MICs.

Ceftaroline MICs (μg/mL) in the cation-adjusted Mueller Hinton broth with test variables

Agar dilution

Ca⁺⁺
% NaCl
pH
Inoculum cfu/mL
% serum

Incubation
MHA
MHA/ LHB
HTMA

Organism
RMA number
REF
50 mg/L
5
6
8
10⁴
10⁶
10
50
LHB
HTM
CO₂
Anaerobic

ATCC

E. coli
25922
0.06
0.06
≤0.008
0.125
0.06
0.06
0.125
0.06
0.125
0.125
0.125
0.125
0.03
0.06
0.25
0.25

19089
0.06
0.125
0.015
0.06
0.06
0.03
0.125
0.06
0.06
0.125
0.06
0.125
0.125
0.125
0.25
0.25

19090
0.03
0.125
≤0.008
0.06
0.03
0.03
2
0.06
0.03
0.125
0.125
0.125
0.125
0.03
0.25
0.25

K. pneumoniae
19091
0.25
0.25
0.015
0.5
0.25
0.25
>8
0.25
0.125
0.25
0.5
0.5
0.25
0.125
0.25
0.5

19092
0.03
0.125
0.015
0.06
0.06
0.03
0.125
0.06
0.06
0.125
0.06
0.125
0.06
0.06
0.125
0.25

19093
0.06
0.125
0.015
0.06
0.06
0.03
0.25
0.03
0.06
0.125
0.06
0.125
0.06
0.06
0.125
0.25

ATCC

H. influenzae
49247
0.015
0.015
ng
ng
0.06
ng
0.06
0.06
0.06
0.06
n/t
0.06
0.03
ng
0.06
0.125

16081
≤0.008
≤0.008
ng
ng
≤0.008
ng
≤0.008
≤0.008
≤0.008
≤0.008
n/t
≤0.008
≤0.008
ng
0.06
0.015

18520
0.015
0.015
ng
ng
0.03
0.015
0.06
0.06
0.03
0.03
n/t
0.015
0.03
ng
0.015
0.06

M. catarrhalis
11940
0.125
0.06
ng
ng
0.125
0.03
2
0.06
0.125
0.125
0.125
0.06
ng
0.06
0.03
n.g.

14032
0.06
0.06
ng
ng
0.25
0.03
1
0.125
0.25
0.125
0.125
0.25
ng
0.06
0.03
0.03

18861
0.03
0.03
ng
0.03
0.06
0.015
2
0.25
0.25
0.125
0.06
0.25
ng
0.03
0.015
0.06

ATCC

S. aureus -MSSA
29213
0.125
0.125
0.125
0.25
0.25
0.125
0.25
0.125
0.125
0.25
0.25
0.125
0.125
0.25
0.25
0.5

18488
0.125
0.125
0.25
0.25
0.25
0.125
0.25
0.125
0.125
0.25
0.25
0.125
0.125
0.25
0.25
0.5

18401
0.125
0.125
0.125
0.25
0.125
0.125
0.25
0.125
0.125
0.25
0.25
0.25
0.125
0.25
0.25
0.5

S.aureus -MRSA
18483
0.25
0.5
0.25
0.5
0.5
0.25
0.5
0.25
0.5
0.5
0.5
0.25
0.25
0.5
0.5
1

18504
0.25
0.5
0.25
0.25
0.5
0.25
0.5
0.25
0.5
0.5
0.25
0.25
0.25
0.5
0.5
1

18526
0.25
0.5
0.25
0.25
0.25
0.25
0.5
0.25
0.5
0.5
0.5
0.25
0.25
0.5
0.5
1

ATCC

E. faecalis
29212
0.5
0.5
1
0.5
1
0.5
1
1
1
0.5
1
0.5
0.5
1
0.5
2

18284
1
1
2
2
2
1
2
1
2
2
2
1
1
2
2
4

18877
1
1
0.06
0.5
2
1
2
2
2
1
2
0.5
0.5
2
0.5
4

S. pyogenes
17018
0.002
0.002
ng
0.002
0.002
0.002
0.004
0.002
0.002
n/t
0.004
0.004
0.004
≤0.008
≤0.008
0.015

17019
0.004
0.004
ng
0.004
0.004
0.004
0.004
0.002
0.002
n/t
0.004
0.004
0.004
≤0.008
≤0.008
0.015

19047
0.004
0.004
ng
0.004
0.004
0.004
0.004
0.004
0.004
n/t
0.008
0.004
0.004
≤0.008
≤0.008
0.015

ATCC

S. pneumoniae
49619
0.015
0.015
ng
0.015
0.008
0.008
0.015
0.015
0.008
n/t
0.015
0.015
0.015
≤0.008
0.015
≤0.008

19094
0.004
0.004
ng
0.004
0.004
0.004
0.004
0.004
0.004
n/t
0.008
0.004
0.004
≤0.008
≤0.008
≤0.008

19095
0.004
0.004
ng
0.004
0.004
0.004
0.004
0.004
0.004
n/t
0.004
0.004
0.004
≤0.008
≤0.008
≤0.008

13345
0.125
0.125
ng
0.125
0.06
0.06
0.125
0.125
0.06
n/t
0.06
0.06
0.125
0.06
0.125
0.125

13385
0.125
0.125
ng
0.125
0.06
0.125
0.125
0.125
0.125
n/t
0.125
0.125
0.125
0.06
0.125
0.125

18876
0.25
0.25
ng
0.125
0.25
0.25
0.25
0.25
0.25
n/t
0.25
0.25
0.125
0.125
0.25
0.25

ATCC: American Type Culture Collection; CFUs: colony-forming units; HTM: Haemophilus test medium; HTMA: HTM with 1.5% agar; LHB: laked horse blood; MHA: Mueller Hinton agar; MIC: minimum inhibitory concentration; MRSA: methicillin-resistant Staphylococcus aureus; MSSA: methicillin-susceptible Staphylococcus aureus; ng: no growth; nt: not tested; REF: reference method; RMA: R.M. Alden (culture collection).

All H. influenzae were tested in HTM; all streptococci were tested with 2.5% LHB supplementation.

4. Discussion

Standardization of test conditions is an important factor in reliably reporting MICs. Yet variations of conditions may occur, and diverse adjustments may be employed by researchers for unusual testing circumstances worldwide. Jones et al. [9] studied the effects of modifying five parameters (11 variations) of in vitro testing of ceftaroline against 15 selected isolates. They found inocula of 5 × 10⁷ raised the MICs from 8 to >32 and 0.5 to >32 μg/mL on P. aeruginosa and E. cloacae, respectively. They also noted that pH 5.0 impaired the growth of 9/12 organisms and consequently lowered their MICs and that increased calcium concentration lowered the MICs of E. faecalis and E. faecium, but that the addition of serum or LHB and variable incubation conditions did not affect ceftaroline MICs. Our study differed from theirs by including a larger number of isolates and adding such variables as 5% NaCl, serum at 10 and 50% concentrations, variations in incubation conditions, and while there was some overlap in species, they did not report on the respiratory pathogens H. influenza and M. catarrhalis, nor did they study S. pyogenes or K. pneumoniae. While some of our test variations were in accord with those of Jones et al., they differed in several respects as well. Jones et al. [9] noted that high inocula did not affect E. coli MICs but did raise E. cloacae and P. aeruginosa MICs, but we found a fourfold increased MIC for one of three E. coli strains tested as well as a fivefold increase with one of three K. pneumonia isolates, suggesting strain variation. Additionally, we found that M. catarrhalis, H. influenza, and S. pyogenes grew poorly with NaCl supplementation and at pH 6.0. An inoculum of 10⁶ CFU/mL also increased the MICs four- to six-fold for all three M. catarrhalis strains tested.

5. Conclusion

The in vitro antibacterial activity of ceftaroline was adversely affected by 5% NaCl which inhibited growth and/or reduced MICs for E. coli, K. pneumoniae, M. catarrhalis, H. influenzae, and streptococci, while an inoculum of 10⁶ CFU/mL raised MICs of some E. coli, K. pneumoniae, and M. catarrhalis strains. The other modifications tested did not adversely affect MIC results. Organisms with special growth requirements can be tested for ceftaroline susceptibility with reasonable assurance that test conditions will not affect the MIC results.

Acknowledgment

This study was supported by a grant from the Forest Laboratories, Inc.

References

C. Jacqueline, J. Caillon, V. Le Mabecque et al., “In vivo efficacy of ceftaroline (PPI-0903), a new broad-spectrum cephalosporin, compared with linezolid and vancomycin against methicillin-resistant and vancomycin-intermediate Staphylococcus aureus in a rabbit endocarditis model,” Antimicrobial Agents and Chemotherapy, vol. 51, no. 9, pp. 3397–3400, 2007.

S. Mushtaq, M. Warner, Y. Ge, K. Kaniga, and D. M. Livermore, “In vitro activity of ceftaroline (PPI-0903M, T-91825) against bacteria with defined resistance mechanisms and phenotypes,” Journal of Antimicrobial Chemotherapy, vol. 60, no. 2, pp. 300–311, 2007.

D. Parish and N. Scheinfeld, “Ceftaroline fosamil, a cephalosporin derivative for the potential treatment of MRSA infection,” Current Opinion in Investigational Drugs, vol. 9, no. 2, pp. 201–209, 2008.

H. S. Sader, T. R. Fritsche, K. Kaniga, Y. Ge, and R. N. Jones, “Antimicrobial activity and spectrum of PPI-0903m (T-91825), a novel cephalosporin, tested against a worldwide collection of clinical strains,” Antimicrobial Agents and Chemotherapy, vol. 49, no. 8, pp. 3501–3512, 2005.

H. S. Sader, T. R. Fritsche, and R. N. Jones, “Antimicrobial activities of ceftaroline and ME1036 tested against clinical strains of community-acquired methicillin-resistant Staphylococcus aureus,” Antimicrobial Agents and Chemotherapy, vol. 52, no. 3, pp. 1153–1155, 2008.

G. H. Talbot, D. Thye, A. Das, and Y. Ge, “Phase 2 study of ceftaroline versus standard therapy in treatment of complicated skin and skin structure infections,” Antimicrobial Agents and Chemotherapy, vol. 51, no. 10, pp. 3612–3616, 2007.

Clinical and Laboratory Standards Institute, “Methods for dilution antimicrobial susceptibility tests for bacteria that grow aerobically; approved standard-sixth edition,” Clinical and Laboratory Standards Institute Document M7-A6, Clinical and Laboratory Standards Institute, Wayne, Pa, USA, 2006.

Clinical and Laboratory Standards Institute, “Performance standards for antimicrobial susceptibility testing; 19th informational supplement,” document M100-S19, Clinical and Laboratory Standards Institute, Wayne, Pa, USA, 2009.

R. N. Jones, T. R. Fritsche, Y. Ge, K. Kaniga, and H. S. Sader, “Evaluation of PPI-0903M (T91825), a novel cephalosporin: bactericidal activity, effects of modifying in vitro testing parameters and optimization of disc diffusion tests,” Journal of Antimicrobial Chemotherapy, vol. 56, no. 6, pp. 1047–1052, 2005.