ISRN Materials ScienceVolume 2011 (2011), Article ID 808560, 6 pagesdoi:10.5402/2011/808560

Research Article

Effect of γ-Irradiation on the Dielectric and Conductivity Properties of Nano-Wollastonite

Sandhya Kulkarni,¹ B. M. Nagabhushana,² Narsimha Parvatikar,³ C. Shivakumara,⁴ and R. Damle¹

¹Department of Physics, Bangalore University, Bangalore 560 056, India²Department of Chemistry, MS Ramaiah Institute of Technology, Bangalore 560 054, India³Department of Physics, APS College of Engineering, Bangalore 560 082, India⁴ Solid State and Structural Chemistry Unit, Indian Institute of Science, Bangalore 560 012, India

Received 23 April 2011; Accepted 18 May 2011

Academic Editor: Y. C. Lu

Copyright © 2011 Sandhya Kulkarni et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Nanocrystalline porous CaSiO₃ ceramic powders have been synthesized by a novel low-temperature initiated self-propagating, gas-producing solution combustion method. Single phase β-CaSiO₃ (Wollastonite) is formed by calcination at 900°C for 3 h. The crystallization and phase formation temperatures in this method are found to be lower compared to the powder obtained via solid state reaction method. The powder is characterized by powder XRD (X-Ray Diffraction), and crystallite sizes are evaluated using Scherrer's formula as well as from TEM (Transmission Electron Microscopy). The Wollastonite powder is exposed to ⁶⁰Co γ-radiation to accumulated doses of 1, 3, and 5 KGy and low-frequency (10²–10⁶ Hz) dielectric measurements are carried out before and after irradiation. The dielectric conductivity is estimated from the dielectric constant and loss tangent. Exposure to γ-radiation results in substantial modification in the properties of the ceramic powder due to changes in the porosity of the material. The correlation between dielectric and conductivity properties is discussed in relation to porosity effect.

1. Introduction

Materials with porous architecture and high surface area are known to have numerous potential applications in nanotechnology. Several attempts are being made to develop these materials for specific applications such as catalysis and separation science, molecular sieves, zeolites, hybrid optics, bioceramics and many more. Ceramic materials with porous structure like silicates of calcium can combine the advantages of both porous materials and ceramics as they have a combination of thermal, electrical, and dielectric properties which make them useful for technological applications. CaSiO₃ is one such material that can be used for the production of special radio ceramics, sanitary components, porcelain materials, lining bricks, glaze, and flux [1]. CaSiO₃ ceramics are also used as a biomaterial in medical industry [2]. CaSiO₃ in different phases have been synthesized by different routes and characterized earlier [3]. However, a complete understanding of the dielectric and electrical properties of these materials has not yet emerged. An understanding of the dielectric and electrical properties is important from the point of applications. Many times these materials are used for applications in radiation rich environments such as space, nuclear reactors and nuclear waste containers. Exposure to radiation can bring in modification in their physical properties due to structural changes. Thus, it is important to understand the effect of ionizing radiation on the properties of these materials.

Enhanced dielectric properties of CaSiO₃ ceramics at microwave frequency range have been reported earlier by Cai et al., Wang et al., and Sun et al. [4–6]. Cai et al. [4] have reported that CaSiO3   ceramics possess excellent dielectric properties with relative dielectric constant = 7.0–9.0 and loss tangent = (1.0–5.0) × 10⁻⁴. Wang et al. [5] have showed that, at the sintering temperature of 1320°C, the CaSiO₃ nanopowders prepared by sol-gel method exhibit excellent dielectric properties with = 6.69 and quality factor Qf = 25398 GHz. Sun et al. [6] have investigated a low-permittivity microwave dielectric ceramic system (Ca1−x Mgx) SiO₃. Substitution in the A-site occurred in the composition range of 0.1 ≤ x ≤ 0.9. When x = 0.1, the specimen sintered at 1290°C for 2 h exhibits excellent dielectric properties with = 6.49 and Qf = 62420 GHz. Although dielectric properties of CaSiO₃ at microwave frequencies have been investigated earlier, there appears to be hardly any studies on low-frequency dielectric and conductivity properties of CaSiO₃ ceramics and their structural modification upon exposure to ionizing radiation. The present investigation was carried out in an attempt to understand the effect of ionizing radiation (γ-radiation) on the structural and low-frequency (10²–10⁶ Hz) dielectric and conductivity properties. To the best of our knowledge, this is the first ever attempt made to study the γ-irradiation effects on dielectric and conductivity properties of porous nano-β-CaSiO₃ at low frequencies (audio-radio frequencies).

2. Experimental

The CaSiO3   ceramic powder is prepared by dissolving stoichiometric quantities of Analar grade calcium nitrate (Ca(NO₃)₂·4H₂O), fumed silica (SiO₂ of 99.9% purity and surface area of 200 m²/gm), and citric acid (C₆H₈O₇, which acts as a fuel for redox reaction) in a minimum quantity of water and dispersed well using magnetic stirrer for half an hour. The stoichiometry of the redox mixture used for combustion process was calculated using total oxidizing and reducing valencies of the ingredients which serve as numerical coefficients for the stoichiometric balance so that the equivalence ratio is unity and the energy released by the combustion is maximum [7]. The heterogeneous redox mixture was rapidly heated in a muffle furnace maintained at 500 ± 10°C. The redox mixture when heated at 500°C boils and thermally dehydrates forming a honeycomb-like gel, which ignites to yield voluminous CaSiO₃ powder. Assuming complete combustion of the mixture used, the synthesis of CaSiO₃ may be represented by reaction equation X-ray powder diffractometer (Phillips X’pert) using CuKα radiation with a Ni-filter was used to record diffractograms of the ceramic powders. The surface morphology, size distribution of the grains were examined by Scanning Electron Microscopy (SEM) and Transmission Electron Microscopy (TEM). SEM photographs were taken with a Philips (XL30-ESEM) instrument. A JEM 2000 Ex instrument was used to take TEM photographs. The combustion product of “as formed” CaSiO₃ is ground well to form a fine powder. The calcined powder (at 900°C, where it has attained the single phase of β-CaSiO₃) is ground well, and it is pressed into pellets of 2 mm thickness and 5 mm diameter. The ceramic samples were irradiated at room temperature by γ-radiation using ⁶⁰Co γ-irradiator (Blood Irradiator-2000) to three different accumulated doses of 1, 3, and 5 KGy. The dielectric measurements were carried out using Hioki impedance analyzer 3532-50 (Japan) in the frequency range 10²–10⁶ Hz at room temperature. AC conductivity as a function of frequency is estimated from the dielectric measurement data.

3. Results and Discussion

3.1. Powder XRD Studies

The XRD patterns of “as formed”, sintered (at 900°C for 3 hours), and γ-irradiated CaSiO₃  powders are shown in Figure 1. The XRD patterns reveal that “as formed” CaSiO₃ powder exhibits amorphous phase. The powder gives rise to a single β-CaSiO₃  phase when calcined at 900°C for 3 h. The peak positions of β-CaSiO3   phase and their hkl values are in good agreement with JCPDS file no. 84-0655. It is found that the crystal system of single phase β-CaSiO₃ is monoclinic with space group P2₁/a. The particle size of the ceramic powders is calculated from the full width at half maximum (FWHM) of the diffraction peaks and line broadening Scherrer’s formula , where is the wavelength of X-ray, is the Bragg angle, and is the constant which depends on the grain shape (0.89 Å for circular grains). It was found that the average particle size of the single phase β-CaSiO3 powder is in the range of 20–30 nm. After γ-irradiation to an accumulated dose of 1 KGy, extra peaks are observed in the diffractogram. Further, for higher dose of 5 KGy, still more peaks are observed. This observation appears to be unusual. It is normally believed that exposure of ceramic powders to ionizing radiation would result in decrease in crystallinity and increase in amorphous content as a result of disorder introduced due to generation of defects. In the present case, additional peaks are observed after γ-irradiation. This may be attributed to the sample going into a mixed phase (α- and β-CaSiO₃) after irradiation.

Figure 1: XRD patterns of CaSiO₃ (i) as formed, (ii) calcined at 900°C (β-CaSiO₃), (iii) exposed to γ-radiation to an accumulated dose of 1 KGy, and (iv) exposed to 5 KGy.

3.2. Transmission Electron Microscopy

Figure 2 shows the TEM image of β-CaSiO₃. It can be seen that the particles are agglomerated. The mean particle size is observed to be about 30 nm in agreement with the estimation from XRD measurements. The SAED (Selected Area Electron Diffraction) pattern showed in the inset displays bright spots. This shows single crystal nature of β-CaSiO₃.

Figure 2: TEM image of β-CaSiO₃ calcined at 900°C with SAED inset.

3.3. Scanning Electron Microscopy

The morphology and size distribution of calcined β-CaSiO₃ before γ-irradiation and β-CaSiO₃ exposed to 5 KGy dose were examined using SEM images and are shown in Figure 3. The image shows that the sintered sample before irradiation is porous. On the other hand, the irradiated sample exhibits sheet morphology consisting of regularly arranged nanorods due to chain like structure of (SiO₄)⁻⁴ ions increasing the porosity [8]. Similar type of sheet morphology in SEM image of CaSiO₃ has been reported earlier by Zhou and Yan [9].

(a)

(b)

Figure 3: SEM photographs of β-CaSiO3  (a) before γ-irradiation and (b) after γ-irradiation to an accumulated dose of 5 KGy.

3.4. Dielectric Measurements

Ceramic materials possess high values for static dielectric constant () and are widely used in technological applications. When used for making electronic components, the value of determines the degree of miniaturization of electronic circuits. The dielectric constant of a material is related to the polarizability α, in particular to the dipole polarizability, which arises from structures with a permanent electric dipole that can change orientation in an applied electric field. In metals, the electronic charge is delocalized and . In insulators, the charge is localized and . Materials with a dielectric constant greater than that of silicon nitride () are classified as high dielectric constant materials [10]. In general, polarization of a dielectric in the presence of an electric field comprises two factors: relaxation polarization and resonance polarization. The former plays a major role at lower frequencies and responds to the message of the sample structure. The latter plays an important part at higher frequencies. Microstructure difference, morphotropic phase boundary, pores, defects, and so forth are the main sources of the relaxation polarization, but they do not work at higher frequencies [11].

The static dielectric constant is taken as , where the frequency dependent complex dielectric function is , where and are the real and imaginary parts, respectively. The dissipation factor is referred to as the loss tangent , where the angle is the phase difference between the applied electric field and the induced current. The dielectric loss is a measure of the imaginary part () of the complex dielectric function [12].

Figure 4 shows the variation of relative or static dielectric constant with frequency for β-CaSiO₃ powders before and after γ-irradiation. Dielectric measurements (in the frequency range 10²–10⁶ Hz) before irradiation of β-CaSiO₃ reveal that the dielectric constant decreases sharply in the KHz region and more slowly in the MHz region with increasing frequency. This suggests that at low frequencies the electronic, ionic, dipolar, and space charge (surface charge) polarizations contribute to the dielectric constant. However, in the MHz frequency range, the contribution from the space charge polarization is minimized and the dielectric constant almost remain constant. This feature is similar to those observed in some dielectric oxides, such as Ba₄LaMNb₃O15  (M = Ti and Sn) [13]. For an accumulated dose of 1 KGy, the dielectric constant increases, while for higher doses, it decreases. The variation of loss tangent with frequency shown in Figure 5 also behaves similar to dielectric constant. Increase in dielectric constant and loss tangent after exposure to a dose of 1 KGy γ-radiation may be attributed to atomic displacements. The γ-radiation is known to interact with atoms of the solids by first generating secondary electrons which in turn produce atomic displacements. Atomic displacements produce various types of lattice defects. The defects influence macroscopic physical properties. In the present case, the off-centre displacement of Ca and Si ions from normal sites would lead to distortion of the structure. This may result in increase in polarization and hence increase in dielectric constant and loss tangent. Similar effects have been observed previousely by Darwish et al. in crystalline Co-Zn ferrites [14]. However, the decrease in dielectric constant and loss tangent after exposure to higher doses appears to be due to a different mechanism. Higher doses of γ-radiation may cause rearrangement of atoms and primary defects. The rearrangement would produce stable defects due to redistribution of γ-radiation energy over the sample. This would suppress the polarization properties and migration of defects. Such effects are more pronounced in binary (such as CaSiO₃) and ternary ceramic materials as proposed by Mektieva [15]. However, the γ-radiation effects on the dielectric properties of ceramics would depend strongly not only on the γ-dose but also on the prior history of the material.

Figure 4: Variation of dielectric constant with frequency for β-CaSiO₃.

Figure 5: Variation of loss tangent with frequency for β-CaSiO₃.

3.5. Electrical Conductivity Measurements

Electrical conductivity should be low for dielectrics to show a good response. In general, the defect centers and impurities that could contribute to the conductivity are randomly distributed in dielectrics. Conduction is basically due to a hopping of electrons in the dielectric materials. In the case of ionic solid such as CaSiO₃, the excess electrons in a narrow conduction band (or excess holes in a narrow valence band) due to their interaction with lattice ions can distort the surroundings in such a way that a potential well generated is deep enough to introduce localization leading to the conductivity. Although conduction does occur in dielectrics, it is rather low. The dielectric conductivity () can be obtained from the dielectric constant and loss tangent using the relation [16] where “ ” is the dielectric constant of free space, and is the angular velocity. Figure 6 shows the variation of conductivity as a function of frequency for β-CaSiO₃ before and after γ-irradiation. Both unirradiated and irradiated samples exhibit the same behavior, that is, high frequency dispersion and flat frequency insensitive conductivities at low frequencies. The nature of conductivity behavior can be explained using Almond-West type power law using single exponent [17] where (0) is the DC conductivity which is the frequency independent part of versus plot, is a constant, and “” is the power law exponent. The data were computer-fitted to the above equation. The value of exponent lies in the range 0.7 to 0.9. Figure 6 shows the fit of the conductivity data to power law. The DC conductivity (frequency independent plateau in the low frequency region) evaluated from the fit for the unirradiated sample is of the order of 10⁻⁹ mho cm⁻¹. The frequency dependent conductivity can be explained as follows: in a hopping model, it is possible to distinguish different characteristic regions of frequency. In the low frequency region where the conductivity almost remains constant, the transport would take place on infinite paths. In the region of frequencies where the conductivity increases with frequency, the transport is dominated by contributions from hopping of infinite clusters [18]. The DC conductivity increases by a factor of 3 after exposure to 1 KGy, while for higher doses of exposure, the conductivity decreases. Since the dielectric constant and dielectric conductivity are directly related, both exhibit similar variation after exposure to γ-radiation. Similarly, the decrease in dielectric constant and hence dielectric conductivity at higher dose may be attributed to the porosity of the CaSiO₃ powder. However, the effect of porosity on the dielectric conductivity needs further investigation. In semiconducting SrTiO₃ doped with Y₂O₃, it is reported that increase in porosity has resulted in decrease in conductivity [19]. However, in polycrystalline NaNbO₃ ceramic, porous counterpart is known to exhibit higher bulk conductivity than dense ones [20]. In any case, exposure of ceramic powders to γ-radiation has resulted in modifications in the dielectric and electrical properties of nano-β-CaSiO₃. The investigation thus reveals the possibility of employing γ-radiation in controlling the properties of ceramic powders for specific technological applications.

Figure 6: Variation of conductivity with frequency for β-CaSiO₃. The solid lines are fit to power law equation.

4. Conclusion

Crystalline CaSiO₃ ceramic powder synthesized by solution combustion route exhibits a single β-phase when calcined at 900°C in the nanoregime with a particle size of the order of 20–30 nm. The powder exhibits a quite high dielectric constant as well as dielectric conductivity at low frequency. Exposure of the nanopowder to γ-radiation results in substantial changes in the dielectric and conductivity perhaps due to increase in porosity of the material. However, detailed investigation would be required to ascertain the effect of porosity on the properties of the material. The investigation reveals the possibility of employing the ionizing radiation to tailor the dielectric and electrical properties of the Wollastonite.

Acknowledgment

S. Kulkarni thanks the University Grants Commission (UGC), Government of India, for the award of UGC-FIP fellowship to carry out this work.

References

G. T. Adylov, G. V. Voronov, S. A. Gornostaeva, N. A. Kulagina, E. P. Mansurova, and M. K. Rumi, “Use of wollastonite from the Koitashskoe deposit in the production of ceramics and refractory materials,” Refractories and Industrial Ceramics, vol. 43, no. 11-12, pp. 359–361, 2002.

P. N. De Aza, F. Guitian, and S. De Aza, “Bioactivity of wollastonite ceramics: in vitro evaluation,” Scripta Metallurgica et Materiala, vol. 31, no. 8, pp. 1001–1005, 1994.

R. P. S. Chakradhar, B. M. Nagabhushana, G. T. Chandrappa, K. P. Ramesh, and J. L. Rao, “Solution combustion derived nanocrystalline macroporous wollastonite ceramics,” Materials Chemistry and Physics, vol. 95, no. 1, pp. 169–175, 2006.

W. Cai, T. Jiang, X. Q. Tan, Q. Wei, and Y. Li, “Development of low dielectric constant calcium silicate fired at low temperature,” Electronic Components and Materials, vol. 21, pp. 16–18, 2002.

H. Wang, Q. Zhang, H. Yang, and H. Sun, “Synthesis and microwave dielectric properties of CaSiO₃ nanopowder by the sol-gel process,” Ceramics International, vol. 34, no. 6, pp. 1405–1408, 2008.

H. Sun, Q. Zhang, H. Yang, and J. Zou, “(Ca1-xMgx)SiO₃: a low-permittivity microwave dielectric ceramic system,” Materials Science and Engineering B, vol. 138, no. 1, pp. 46–50, 2007.

J. J. Kingsley and K. C. Patil, “A novel combustion process for the synthesis of fine particle α-alumina and related oxide materials,” Materials Letters, vol. 6, no. 11-12, pp. 427–432, 1988.

R. P. S. Chakradhar, B. M. Nagabhushana, G. T. Chandrappa, J. L. Rao, and K. P. Ramesh, “EPR study of Fe³⁺- and Ni²⁺-doped macroporous CaSiO₃ ceramics,” Applied Magnetic Resonance, vol. 33, no. 1-2, pp. 137–152, 2008.

L. Zhou and B. Yan, “Sol-gel synthesis and photoluminescence of CaSiO₃:Eu ³⁺ nanophosphors using novel silicate sources,” Journal of Physics and Chemistry of Solids, vol. 69, no. 11, pp. 2877–2882, 2008.

C. C. Homes, T. Vogt, S. M. Shapiro, S. Wakimoto, and A. P. Ramirez, “Optical response of high-dielectric-constant perovskite-related oxide,” Science, vol. 293, no. 5530, pp. 673–676, 2001.

X. J. Lu, Q. Li, and D. P. Yang, “Dielectric properties and sintering characteristics of CaTiO₃-(Li1/2Nd1/2)TiO₃ ceramics,” Journal of Electroceramics, vol. 14, no. 1, pp. 59–65, 2005.

V. V. Daniel, Dielectric Relaxation, Academic Press, New York, NY, USA, 1967.

L. Fang, H. Zhang, T. H. Huang, R. Z. Yuan, and R. Dronskowski, “Preparation, structure and dielectric properties of Ba₄LaMNb₃O₁₅ (M = Ti, Sn ) ceramics,” Materials Research Bulletin, vol. 39, no. 11, pp. 1649–1654, 2004.

N. Z. Darwish, O. M. Hemeda, and M. I. Abdel-Ati, “Effect of ⁶⁰Co γ-radiation damage on the structural and dielectric properties of Co-Zn ferrite,” Applied Radiation and Isotopes, vol. 45, no. 4, pp. 445–448, 1994.

R. Z. Mekhtieva, “Effect of gamma irradiation on the piezoelectric properties of K₂Sr₄Nb₁₀O₃₀-K₆Li₄Nb₁₀O₃₀ solid solutions,” Inorganic Materials, vol. 38, no. 8, pp. 831–833, 2002.

D. Kaur, S. B. Narang, and K. S. Thind, “Processing, dielectric behavior and conductivity of some complex tungsten-bronze dielectric ceramics,” Journal of Ceramic Processing Research, vol. 7, no. 1, pp. 31–36, 2006.

D. P. Almond and A. R. West, “The activation entropy for transport in ionic conductors,” Solid State Ionics, vol. 23, no. 1-2, pp. 27–35, 1987.

A. Dutta, C. Bharti, and T. P. Sinha, “Dielectric relaxation and ac conductivity study in SrMg 1/3Nb2/3O₃,” Indian Journal of Engineering and Materials Sciences, vol. 15, no. 2, pp. 181–186, 2008.

D. S. Krueger and S. J. Lombardo, “The effect of processing conditions and porosity on the electrical properties of Y₂O₃-doped SrTiO₃ internal boundary layer capacitors,” Journal of Ceramic Processing Research, vol. 8, no. 1, pp. 31–37, 2007.

S. Lanfredi, L. Dessemond, and A. C. M. Rodrigues, “Effect of porosity on the electrical properties of polycrystalline sodium niobate: I, electrical conductivity,” Journal of the American Ceramic Society, vol. 86, no. 2, pp. 291–298, 2003.