International Journal of OceanographyVolume 2011 (2011), Article ID 950838, 4 pagesdoi:10.1155/2011/950838

Research Article

Noise Model Analysis and Estimation of Effect due to Wind Driven Ambient Noise in Shallow Water

S. Sakthivel Murugan,¹ V. Natarajan,² and R. Rajesh Kumar¹

¹Department of ECE, SSN College of Engineering, Tamilnadu, Chennai 603110, India²Department of Instrumentation Engineering, MIT Campus, Anna University, Chennai 600044, India

Received 1 June 2011; Revised 27 September 2011; Accepted 28 September 2011

Academic Editor: Robert Frouin

Copyright © 2011 S. Sakthivel Murugan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Signal transmission in ocean using water as a channel is a challenging process due to attenuation, spreading, reverberation, absorption, and so forth, apart from the contribution of acoustic signals due to ambient noises. Ambient noises in sea are of two types: manmade (shipping, aircraft over the sea, motor on boat, etc.) and natural (rain, wind, seismic, etc.), apart from marine mammals and phytoplanktons. Since wind exists in all places and at all time: its effect plays a major role. Hence, in this paper, we concentrate on estimating the effects of wind. Seven sets of data with various wind speeds ranging from 2.11 m/s to 6.57 m/s were used. The analysis is performed for frequencies ranging from 100 Hz to 8 kHz. It is found that a linear relationship between noise spectrum and wind speed exists for the entire frequency range. Further, we developed a noise model for analyzing the noise level. The results of the empirical data are found to fit with results obtained with the aid of noise model.

1. Introduction

Ocean ambient noise is an inherent characteristic of the medium having no specific point source. It is the residual noise background in the absence of individual identifiable sources that may be considered as the natural noise environment for hydrophone sensors. It comprises of number of components that contribute to the noise level (NL) in varying degrees depending on the location of measurements [1]. The sources include geological disturbances, nonlinear wave interaction, turbulent wind stress on the sea surface, shipping, distant storms, seismic prospecting, marine animals, breaking waves, spray, rain, hail impacts, and turbulence [2]. In general, over a broad frequency range, the ambient noise spectrum characteristic varies depending on the sources and conditions prevailing at the measurement location.

A direct connection between wind force and the level of ambient noise is observed for a frequency range of 500 Hz to 25 kHz. Noise level spectrum is summarized in [3]. Knudsen spectra [4], show the strong dependence of spectral power level with wind speed and sea states.

The work on spectra and sources of ambient noise in the ocean observed a decrease in wind/sea state dependency of underwater ambient noise below 500 Hz. Further, it was shown that there was no dependency below 100 Hz, and the wind-generated noise measurement shows self-similar spectra between 100 Hz to 10 kHz [3, 4].

It is inferred that the effect of wind speed is dominant in the frequency band of 22 Hz to 5 kHz by experimenting at 40 different locations [5]. Further high frequency noise is said to be highly correlated to wind speed from 4–15 m/sec. The optimal frequency range for estimating wind is from 2–6 kHz [6].

Ambient noise is the sustained unwanted background noise prevailing at any location. This masks the signals from underwater acoustic instruments. So the detection of background noise is essential to enhance the signal-to-Noise ratio (SNR) of acoustic-based underwater instruments. Hence, measurement and characterization of ambient noise forms a significant part in any underwater activity. The interest in ambient noise characterization has grown and presently is of much interest to engineers working in the fields of active and passive sonars, underwater sensors, and signal processing.

2. Data Collection and Algorithm

2.1. Data Collection

Noise measurements were made using two calibrated omnidirectional hydrophones mounted in a vertical array at 5 m and 15 m depths. The hydrophones were suspended from the measurement platform using the rope and mounting arrangement that links to the rope. The hydrophones have a receiving sensitivity of −170 dB over a frequency range between 0.1 Hz and 120 kHz. The data were acquired at a rate of 50 kHz and 500 kHz, filtered and digitized with portable data acquisition system with 12-bit resolution. During the period of data collection, all machinery on the boat/ship was switched off and the recording system was powered by battery. The wind speed was simultaneously measured during each sampling. The measurement consists of 7 sets of data. The wind speeds of collected data range from 2.11 m/s to 6.57 m/s. Measurements showing the evidence of noise from non-wind-dependent sources such as rain, dolphin, and ship were not included in the analysis.

2.2. Algorithm

Theoretically the relationship between the noise levels is assumed to be linear to the logarithm of the wind speed [7], and this can be expressed as where and stand for noise level and wind speed, respectively. The constants and were determined by fitting the experimental data to the model at different frequencies. is obtained from 1/20th slope of regression line and the ordinate intercept of the line gives for each empirical fit. The spectral analysis was carried out in MATLAB using Welch method of averaging periodogram. The frequency range of interest for the current study was from 500 Hz to 8 kHz where the best correlation between the wind speed and the noise level has been observed.

3. Results and Discussion

Analysis has been carried out to study wind-dependent ambient noise spectrum level in the frequency range between 500 Hz and 8 kHz. Noise spectrum for seven different wind speeds [2.11, 3.32, 5.92, 6.03, 6.06, 6.16, and 6.57 m/s] is shown in Figure 1. It is observed that the noise level increases with increase in wind speed.

Figure 1: Noise spectrum at different wind speeds.

Figure 2 is also known as regression plot. It is observed from Figure 2 that there is a steep increase in the slope and noise level as wind speed increases. Table 1 shows the values of and obtained from regression plots. The value of slope is maximum at 500 Hz and decreases as frequency increases. The value of and obtained from the empirical fitting is used for validation with measured noise level.

Table 1: Values of and from regression plots.

Frequency (Hz)

Frequency (Hz)

500
67.14
0.13
4500
63.19
0.01

1000
66.57
0.08
5000
63.56
0.03

1500
68.16
0.05
5500
61.04
0.08

2000
65.98
0.06
6000
62.5
0.02

2500
64.28
0.05
6500
64.06
0.003

3000
66.93
0.02
7000
62.56
0.01

3500
62.29
0.04
7500
63.41
0.02

4000
65.04
0.04
8000
63.04
0.006

Figure 2: Noise level at different frequencies for varying wind speeds.

Figures 3, 4, 5, and 6 show the comparison of predicted and measured noise levels for wind speed of 2.11 m/s, 3.32 m/s, 5.92 m/s, and 6.57 m/s, respectively. It is seen that the predicted noise level is in good agreement with the measured noise levels. As the wind speed increases, the predicted noise model deviates from the measured noise level.

Figure 3: Comparison of predicted and real time noise for wind speed of 2.11 m/s.

Figure 4: Comparison of predicted and real time noise for wind speed of 3.32 m/s.

Figure 5: Comparison of predicted and real time noise for wind speed of 5.92 m/s.

Figure 6: Comparison of predicted and real time noise for wind speed of 6.57 m/s.

4. Conclusion

In this paper, an estimation of power spectral density of ambient noise due to wind at various speeds ranging from 2.11 m/s to 6.59 m/s is analysed and observed that the effect of wind is dominating at lower frequencies from 100 Hz to 5 KHz. A noise model for estimation of effect of wind at different wind speeds for various frequencies was developed and found that it best suits with the practical data. The analysis shows that noise level increases as wind speed increases. There was good correlation between wind speed and noise level in the frequency range between 500 Hz to 8000 Hz.

Acknowledgments

The data for the above analysis is provided by National Institute of Ocean Technology, Chennai. The authors wish to acknowledge the valuable support given by Dr. G. Latha, Project Director, Ocean Observation and Acoustic System, NIOT for the excellent contribution of the relevant data for processing. The authors also wish to thank Dr. S. Radha HOD, ECE Department for her support.

References

R. J. Urick, Principles of Underwater Sound, McGraw-Hill, New York, NY, USA, 3rd edition, 1983.

R. A. Wagstaff, “An ambient noise model for the northeast pacific ocean basin,” IEEE Journal of Oceanic Engineering, vol. 30, no. 2, pp. 286–294, 2005.

G. M. Wenz, “Acoustic ambient noise in the ocean: spectra and sources,” Journal of Acoustic Society of America, vol. 30, pp. 1936–1956, 1962.

V. O. Knudsen, R. S. Alford, and J. W Emling, “Underwater ambient noise,” Journal of Marine Research, vol. 7, pp. 410–429, 1948.

D. H. Cato, “Ambient sea noise in water near Australia,” Journal of the Acoustical Society of America, vol. 60, no. 2, pp. 320–328, 1976.

L. Zedel, L. Gordon, and S. Osterhus, “Ocean Ambient Sound Instrument System: acoustic estimation of wind speed and direction from a subsurface package,” Journal of Atmospheric and Oceanic Technology, vol. 16, no. 8, pp. 1118–1126, 1999.

C. L. Piggott, “Ambient Sea noise at low frequencies in shallow water of the Scotian Shelf,” Journal of Acoustic Society of America, vol. 36, pp. 2152–2163, 1964.