International Journal of Molecular Imaging

Volume 2012 (2012), Article ID 379807, 11 pages

doi:10.1155/2012/379807

Research Article

⁶⁴Cu-NODAGA-c(RGDyK) Is a Promising New Angiogenesis PET Tracer: Correlation between Tumor Uptake and Integrin Expression in Human Neuroendocrine Tumor Xenografts

Jytte Oxboel, Christina Schjoeth-Eskesen, Henrik H. El-Ali, Jacob Madsen, and Andreas Kjaer

Department of Clinical Physiology, Nuclear Medicine & PET, Rigshospitalet and Cluster for Molecular Imaging, Faculty of Health Sciences, University of Copenhagen, Copenhagen, Denmark

Received 9 July 2012; Revised 24 August 2012; Accepted 26 August 2012

Academic Editor: Xiaoyuan Chen

Copyright © 2012 Jytte Oxboel et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. The purpose of this paper is to evaluate a new PET tracer ⁶⁴Cu-NODAGA-c(RGDyK) for imaging of tumor angiogenesis using gene expression of angiogenesis markers as reference and to estimate radiation dosimetry for humans. Procedures. Nude mice with human neuroendocrine tumor xenografts (H727) were administered ⁶⁴Cu-NODAGA-c(RGDyK) i.v. for study of biodistribution as well as for dynamic PET. Gene expression of angiogenesis markers integrin , integrin , and VEGF-A were analyzed using QPCR and correlated to the tracer uptake in the tumors (%ID/g). From biodistribution data human radiation-absorbed doses were estimated using OLINDA/EXM. Results. Tumor uptake was 1.2%ID/g with strong correlations between gene expression and tracer uptake, for integrin  , integrin   and VEGF-A (all ). The whole body effective dose for humans was estimated to be 0.038 and 0.029 mSv/MBq for females and males, respectively, with highest absorbed dose in bladder wall. Conclusion. ⁶⁴Cu-NODAGA-c(RGDyK) is a promising new angiogenesis PET tracer with potential for human use.

1. Introduction

Angiogenesis, the formation of new blood vessels, plays an important role in tumor growth, local invasiveness, and metastatic progression. Many preclinical studies and clinical trials confirm the importance of integrin α Vβ ₃ in the process of tumor angiogenesis and metastasis [1, 2]. Integrin α Vβ ₃ is a cell adhesion molecule and is highly expressed on activated endothelial cells and tumor cells but is not expressed on resting endothelial cells and therefore specific for neoangiogenesis [3]. Several extracellular matrix (ECM) proteins like vitronectin, fibrinogen, and fibronectin interact with integrin α Vβ ₃ via the amino acid sequence Arg-Gly-Asp (RGD) [4, 5]. Vascular endothelial growth factor (VEGF-A) also plays an important role in both normal vascular tissue development and tumor neovascularization and is highly expressed in various human tumors [6, 7].

In the last few years metal PET isotopes such as ⁶⁸Ga and ⁶⁴Cu have gained increased interest for labeling of peptides. Both ⁶⁸Ga and ⁶⁴Cu are excellent alternatives to ¹⁸F. ⁶⁸Ga can be obtained from an in-house commercially available ⁶⁸Ge/⁶⁸Ga generator. The advantage of using cyclotron produced ⁶⁴Cu for PET imaging and radiotherapy is the longer half-life allowing imaging at late time points acquiring additional information [8]. A longer half-life also allows more nonspecific activity to be washed out. ⁶⁴Cu can now be produced in high yield and at high specific activity on a small biomedical cyclotron.

Radiolabeled RGD peptides for positron emission tomography (PET) imaging, targeting integrin α Vβ ₃ in tumors, have been described in several studies with mainly ¹⁸F ( min; (97%) keV), ⁶⁸Ga ( min; (89%) keV), and ⁶⁴Cu ( h; (18%) keV) [9–17]. For ⁶⁸Ga and ⁶⁴Cu different chelating systems have been used. Some of the latest described tracers have used the chelator 1,4,7-triazacyclononane-1-glutaric acid-4,7-diacetic acid (NODAGA) combined with c(RGD) labeled with ⁶⁸Ga [9, 12, 15, 18] or ⁶⁴Cu [12, 18].

Neuroendocrine tumors (NET) express integrin α Vβ ₃ at variable levels [19]. NET is one of the tumor types where antiangiogenesis treatment of patients seems promising [20] but patients need to be selected individually. To select the patients, PET scans with a tracer targeting tumor-angiogenesis may be extremely relevant. Therefore using a human NET xenograft model for preclinical studies to evaluate new PET tracers targeting tumor-angiogenesis is relevant.

The aim of the present study was therefore, as the first, to use and evaluate the PET tracer ⁶⁴Cu-NODAGA-c(RGDyK) using a human NET xenograft model. Biodistribution, PET/CT scans, correlation between gene expression of angiogenesis markers and tracer uptake, and radiation dosimetry extrapolation for humans were performed. Since investigation of tumor-angiogenesis using human xenografts in mice is challenged by the fact that the formation of new vessels in the tumors might be of either human or mice (host) origin, we designed QPCR assays to quantify both mice and human genes of Integrin α V, Integrin , and VEGF-A.

2. Materials and Methods

2.1. ⁶⁴Cu-NODAGA-c(RGDyK) Synthesis

2.1.1. General

NODAGA-c(RGDyK) was purchased from ABX GmbH (advanced biochemical compounds, Radeberg, Germany). Ammonium acetate and TraceSELECT water were purchased from Sigma-Aldrich. ⁶⁴CuCl₂ was produced at Risoe Technical University of Denmark, Roskilde, Denmark. For high-performance liquid chromatography (HPLC) analysis a Dionex P580 pump with a PDA-100 detector and an in-line Scansys radioactivity detector was used.

2.1.2. Radiochemistry

NODAGA-c(RGDyK) (2 nmol) dissolved in 450 μL ammonium acetate (0.1 M, pH 8.47) was mixed with 50 μL of ⁶⁴CuCl₂ (50–60 MBq) for 15 min at room temperature. The product (Figure 1) was used without further purification. HPLC analysis was performed with a Jupiter column, 4u Proteo 90A,  mm (Phenomenex, Torrance, CA, USA) and flow 1.5 mL/min. The HPLC mobile phase was solvent A, 0.1% trifluoroacetic acid in water, and solvent B, 0.1% trifluoroacetic acid in acetonitrile. Gradient: 0–2 min 15% B, 2–7 min 15–40% B, and 7–10 min 40–15% B. The retention time of ⁶⁴Cu-NODAGA-c(RGDyK) was 5.9 min.

Figure 1: The chemical structure of NODAGA-c(RGDyK).

2.1.3. Stability Studies

The stability of ⁶⁴Cu-NODAGA-c(RGDyK) was investigated in either buffer or plasma from nude mice. For buffer stability, 160 MBq ⁶⁴Cu-NODAGA-c(RGDyK) was incubated for 1, 2, 18, and 24 hours at room temperature in 450 μL ammonium acetate buffer. For the stability in plasma, 10 MBq ⁶⁴Cu-NODAGA-c(RGDyK) was incubated for 1, 2, 18, and 24 hours in 500 μL plasma. Plasma was mixed with equal amounts of acetonitrile after incubation. The resulting mixture was centrifugated and the supernatant was collected and filtered. The stability of ⁶⁴Cu-NODAGA-c(RGDyK) in plasma and buffer was analyzed and determined by the previously described HPLC conditions.

2.2. Cell Line and Animal Model

Human lung bronchus carcinoid, NCI-H727 obtained from ATCC (American Type Culture Collection, Manassas, VA, USA), was used. Before taken into experiments, the cell line was tested free of Mycoplasma at Statens Serum Institute, Copenhagen, Denmark. Cells were cultured in RPMI (Roswell Park Memorial Institute) Medium 1640 with GlutaMAX (Gibco, Life Technologies, NY, USA) containing 10% fetal calf serum (Biological Industries (BI), Kibbutz Beit-Haemek, Israel), and 1% penicillin-streptomycin (Gibco, Life Technologies) in 5% CO₂ at 37°C.

Female NMRI (Naval Medical Research Institute) nude mice (6 weeks upon arrival) were acquired from Taconic Europe, Lille Skensved, Denmark. The mice were acclimated one week in the animal facilities before taken into experiments. At the age of 8 weeks (weight:  g) the mice had H727 cells (5– cells in 100 L medium mixed with 100 L Matrigel Basement Membrane Matrix (BD Sciences, San José, CA, USA) inoculated subcutaneously on the left and right flank during anesthesia with 1 : 1 V/V HypnormR (Janssen Pharmaceutica NV, Beerse, Belgium)/DormicumR  (Roche, Basel, Switzerland). Tumors were then grown for 3-4 weeks (average tumor volume 210 mm³). Animal care and experimental procedures were performed under the approval of the Danish Animal Welfare Council (2006/561-1124).

2.3. Biodistribution Studies

Tumor bearing mice were anesthetized with 3% sevoflurane (Abbott Scandinavia AB, Solna, Sweden) mixed with 35% O₂ in N₂. Mice were tail-vein injected with MBq ⁶⁴Cu-NODAGA-c(RGDyK). Biodistribution of ⁶⁴Cu-NODAGA-c(RGDyK) was obtained at 1, 2, and 18 hours after injection ( mice in each group). Mice were sacrificed by neck drawing and tumors, organs (liver, kidneys, lung, spleen, heart, intestine, and muscle) and blood were collected, weighted, and radioactivity measured in a gamma counter (2480 Wizard², Perkin Elmer, MA, USA). Tumors were immediately placed in tubes containing RNAlaterR (Ambion Inc., TX, USA), stored overnight at 4°C, RNAlaterR then removed, and tumors stored at −80°C until total RNA extraction and further QPCR experiments were performed.

2.4. Dosimetry Extrapolation for Humans

For estimation of the human radiation dose using ⁶⁴Cu-NODAGA-c(RGDyK) the mouse biodistribution data were used. Assuming similar pharmacokinetics in mice and humans, the activity in organs at 1, 2, and 18 hours post injection (p.i.) was used to calculate single exponential effective half-lives and residence times for each organ. These data were then used for extrapolation to human dosimetry estimates using standard female (58 kg) and male (70 kg) human phantoms and the Organ Level INternal Dose Assessment/EXponential Modeling software (OLINDA/EXM; Vanderbilt University, Nashville, TN, USA) [21]. To ensure a conservative estimate, the urinary elimination fraction was set to 75% with voiding intervals of 5 hours. The effective dose for both adult male and female were then calculated using OLINDA/EXM.

2.5. Small Animal PET and CT

2.5.1. Imaging Experiments

A longitudinal dynamic study was performed scanning a mouse at 1, 2, and 18 hours after intravenous injection of 1.6 MBq ⁶⁴Cu-NODAGA-c(RGDyK), allowing dynamic information of the tracer biodistribution in tumors as well as in the other organs of interest. The PET scans were performed using a small animal PET scanner (MicroPET Focus 120, Siemens Medical Solutions, Knoxville, TN, USA). The energy window for the emission PET scans was set to 350–650 keV and the time resolution was 6 ns. Scan time was 10 min.

The acquired data for emission scan was stored in list-mode format and postprocessed to obtain 2 bytes sinograms. Finally, the emission sinograms were reconstructed using MAP Algorithms and resulted into 4-byte image sets with a zoom factor of 1.443 and a voxel size of  mm³. Furthermore, the emission sinograms were corrected for dead time and decay time. Scatter and attenuation corrections were not applied to the emission data. The system was calibrated to provide activity concentrations as Bq/cc.

The small animal CT scans of the mouse parallel with the PET scans were acquired using a small animal computed tomography (microCAT II, Siemens Medical Solutions). The acquisition time of each CT scan was 6.5 minutes generating 360 projections at 360° arc. The X-ray source settings were 75 kVp, 500 μA, and 270 ms for the voltage, the current, and the exposure time, respectively. The CT projections on the CCD crystal were binned by 4 to increase sensitivity and reduce the dataset size. The projections were reconstructed by real-time reconstruction algorithm (the COBRA toolbox) using Shepp-Logan filter into matrix with a voxel size of  mm³.

2.5.2. Image Analysis

The fusion of the PET and CT images was performed manually using the ASIPro Toolbox (Siemens Medical Solutions). Also the analyses of PET images were performed in the ASIPro toolbox.

The measurement of the activity uptake in the tumors and the organs were estimated by manually outlining on CT images. The outlining of the organs on CT images in every slice resulted in 3D region of interest (ROI). The 3D ROIs of the organs were then applied on the corresponding PET images. The results of these ROIs acquired the concentration of the tracer in the organs expressed in percentage of the injected dose per gram tissue (%ID/g).

2.6. Quantitative Real-Time QPCR

2.6.1. RNA Extraction and Reverse Transcription

The whole tumors were lysed and homogenized in PrecellysR-24 (Bertin Technologies, Montigny, France) in tubes containing ceramic beads. Total RNA was isolated using NucleoSpin RNA L kit (MACHEREY-NAGEL GmbH & Co. KG, Düren, Germany). RNA concentration was determined by NanoDrop 1000 (Thermo Fisher Scientific, DE, USA). RNA quality expressed as RNA Integrity Number (RIN) was measured on a 2100 Bioanalyzer (Agilent Technologies, CA, USA). 0.3 μg total RNA was reverse transcribed using AffinityScript QPCR cDNA Synthesis Kit (Stratagene, CA, USA).

2.6.2. Quantitative Real-Time PCR

Gene expression was quantified on the Mx3005P real-time PCR system from Stratagene. Human ITGAV, human ITGB3 and human VEGFA were tested in a triplex-, mice ITGAV and mice ITGB3 in a duplex, and mice VEGFA in a simplex-QPCR assay. The three human housekeeping genes HPRT, UBC, and RPLP were also measured in a triplex. The Brilliant QPCR Core Reagent Kit (Stratagene; cat# 600530) was used for all the multiplex assays. Assay optimization resulted in a 50% and 100% increase of Taq polymerase and dNTP in duplex and triplex assays, respectively. An MgCl₂ concentration of 5.5 mM was optimal in all designs. The Brilliant III Ultra-Fast QPCR Master Mix (Stratagene, Cat no. 600880) was used for simplex assay. NO-RT (no reverse transcription) for all the samples was tested using the housekeeping gene-triplex. The thermal profile for QPCR Core Reagent was: denaturation at 95°C for 10 minutes, followed by 40 cycles with denaturation at 95°C for 30 seconds and annealing/elongation at 60°C for 1 minute. The thermal profile for Brilliant III Reagent was: denaturation at 95°C for 3 minutes, followed by 40 cycles with denaturation at 95°C for 20 seconds and annealing/elongation at 60°C for 20 seconds.

The samples were run in triplicates using 1 μL of cDNA in a total volume of 25 and 20 μL, respectively.

The optimal housekeeping genes for the H727 tumors were found by testing 12 human reference genes from TATAA Biocenter (Goteborg, SE) in 12 different H727 tumors from NMRI nude mice. With geNorm software [22] the genes and the number of genes giving the most stable endogenous normalization were found. The most stable housekeeping genes were HPRT, UBC, and RPLP. Normalization to these three housekeeping genes was executed for all assays.

2.6.3. Primers and TaqMan Dual-Labeled Probes

The six genes of interest m-ITGAV (NM_008402), m-ITB3 (NM_016780), m-VEGFA (NM_001025250), h-ITGAV (NM_002210), h-ITGB3 (NM_000212), and h-VEGFA (NM_001025366), along with the housekeeping genes h-HPRT (NM_000194), h-UBC (NM_021009) and h-RPLP (NM_001002) were designed using Beacon Designer (Premier BioSoft, CA, USA). Before designing, all genes were tested for cross homology against the human or the mouse genome and checked for secondary structures. For the optimized conditions of all primers and probes see Table 1. All primers and probes were purchased from Sigma-Aldrich (St. Louis, MO, USA). Final QPCR designs are listed in Table 2.

Table 1: Optimized primer- and TaqMan probe concentrations for all genes investigated using quantitative real-time PCR.

Gene

NM no

Forward primer
Reverse primer
TaqMan probe

Final conc., nmol/L
Final conc., nmol/L
Final conc., nmol/L

h-ITGAV
NM_002210
300
600
300

h-ITGB3
NM_000212
300
300
300

h-VEGFA
NM_001025366
300
600
300

m-ITGAV
NM_008402
600
600
300

m-ITGB3
NM_016780
300
300
300

m-VEGFA
NM_001025250
300
300
250

h-HPRT
NM_000194
300
300
200

h-UBC
NM_021009
300
300
200

h-RPLP
NM_001002
300
300
150

Table 2: Final QPCR designs for human and mice genes of interest and for housekeeping genes.

Gene
NM no
Forward primer, 5′-3′
Reverse primer, 5′-3′
5′-Flourophore
TaqMan probe, 5′-3′
3′-Quencher
Amplicon length (bp)

Humane

h-ITGAV
NM_002210
GGGTCAAGATCAGTGAGAAATCTTTAC
ATTCCTGTAACATCATGCTATTGCTAG
FAM
AGGAACCTGGACCCCTTACCCCAACTTT
BHQ-1
139

h-ITGB3
NM_000212
CTCCTGTCCCTCATCCATAGC
CAGCCAAGAGGTAGAAGGTAAATAC
CY5
ACAGCACACCAAGGCACAGGGC
BHQ-2
103

h-VEGFA
NM_001025366
GTGTGAGTGGTTGACCTTCCTC
CCGTATATAAAACACTTTCTCTTTTCTCTG
HEX
CCTGGTCCTTCCCTTCCCTTCCCGA
BHQ-1
125

Mice

m-ITGAV
NM_008402
ACGTTACATAGCATAGTACCTCTTC
TACTGATGGTCTAAATTTGAACTGC
FAM
TGCCCTAACGTAACGTCGAAGAGAGAAACC
BHQ-1
121

m-ITGB3
NM_016780
TCAACATCCTAAGATGCCGAGAG
CTGCTTGTTCTACTACTGGTCAAC
CY5
ACGGTATCAAGCCTGCGGTCCAGATTC
BHQ-2
104

m-VEGFA
NM_001025250
GGGACCCCTTCGTCCTCTC
GTCTCCTGGGGACAGAATTAGTG
HEX
ATCACACAAGGTCCTCCTGGGCTGT
BHQ-1
100

Housekeeping genes

h-HPRT
NM_000194
AAGCCTAAGATGAGAGTTCAA
GCTCTACTAAGCAGATGGC
FAM
AACATCTGGAGTCCTATTGACATCGC
BHQ-1
108

h-UBC
NM_021009
CTGGAAGATGGTCGTACC
GTCAGGGTCTTCACGAAG
HEX
CACCTCTGAGACGGAGCACC
BHQ-1
107

h-RPLP
NM_001002
TGTGCAGCTGATCAAGAC
AGCACTTCAGGGTTGTAG
CY5
CTGCCATTGTCGAACACCTGC
BHQ-2
141

Table 2 shows the primers and probe sequences, the flourophores and quenchers used on the TaqMan probes and the amplicon length of the product for each gene.

QBasePlus software [23] based on the comparative method () [24] for relative quantification was used including normalization to three housekeeping genes. Furthermore an inter-run calibrator for correction between PCR runs within the same gene and an arbitrary overall calibrator for comparison of the gene levels in between mice and human genes were taking into account.

2.7. Statistics

As shown in earlier studies [19] the PCR data were found not to be normal distributed when tested by a One-sample Kolmogorov-Smirnov test. All QPCR data were therefore log₁₀ transformed to obtain normal distribution and the log-transformed data were used for all the subsequent statistical analyses.

T-Test (two tailed) was used for comparison of mRNA levels of each gene—human versus mice—at the three different sample collecting times. Correlation between genes and %ID/g were evaluated using linear regression.

Data are presented as . All statistical analyses were performed using SPSS 17.0 statistical software (SPSS Inc., Chicago, Illinois, USA). was considered significant.

3. Results

3.1. Radiochemistry

NODAGA-c(RGDyK) was labelled with ⁶⁴Cu in 15 minutes at room temperature with a radiochemical purity of 92.5–96.6% and a specific activity of 25.1–25.7 MBq/nmol. The purity of ⁶⁴Cu-NODAGA-c(RGDyK) in buffer was more than 93% at 1, 2, 18, and 24 hours after incubation. The purity was also more than 93% after 24 hours when 4.5 mL of saline was added to 500 μL of ⁶⁴Cu-NODAGA-c(RGDyK) solution. In plasma, the purity of ⁶⁴Cu-NODAGA-c(RGDyK) was 88% after 24 hours of incubation.

3.2. Gene Expression of Integrins and VEGFA versus PET Tracer Uptake

3.2.1. RNA

Total RNA concentration in tumors was 0.3 to 1.0 μg/μL. RIN (RNA integrity numbers) were measured to be between 6.8 and 9.9, verifying fine RNA quality with limited degradation. NO-RT for each sample was checked in QPCR, finding no Ct values, indicating that genomic DNA is not present and therefore not disturbing the gene expression values.

3.2.2. QPCR Data

In H727 tumors (removed 2 hours after tracer injection) integrin α V of both human and mice origin was expressed at the same level, whereas gene expression of h-VEGF-A was significantly higher than m-VEGF-A . Integrin of both human and mice origin was expressed on a very low level (Figure 2).

Figure 2: Relative gene expression of human (h) and mouse (m) Integrin α V (ITGAV), Integrin β 3 (ITGB3), and VEGFA in H727 tumors in nude mice 2 hours after injection of ⁶⁴Cu-NODAGA-c(RGDyK). Gene expression level for h-VEGFA is significantly higher than the gene expression level for m-VEGFA (). No significant difference in gene level was found for the integrins. Please note that the -axis of the graph is in logarithmic scale.

Regression analyses for ⁶⁴Cu-NODAGA-c(RGDyK) tracer uptake, %ID/g (calculated from the biodistribution data) versus quantitative mRNA in the H727 tumors showed significant correlation at 2 h p.i. with mice Integrin (, ), mice Integrin (, ), and mice VEGF-A (, ), also for human Integrin α V at 2 h p.i. (, ) (Figure 3).

Figure 3: Univariate regression of mouse (m) or human (h) gene expression relative to %ID/g. (a) m-ITGAV, (b) h-ITGAV, (c) m-ITGB3 and (d) m-VEGFA, all versus %ID/g at 2 h after injection of ⁶⁴Cu-NODAGA-c(RGDyK). All relative gene expression results plotted are transformed. The 95% confidence interval is indicated by the dotted lines.

3.2.3. Biodistribution Data

Liver, kidneys, lung, spleen, heart, intestine, muscle, and blood were collected from 10 mice at the following time points: 1, 2, and 18 hours post injection. All tissues were -counted 120 sec. and %ID/g was calculated from the measured counts by taking counting efficiency of the -counter (), half-life time for ⁶⁴Cu, decay from injection to counting time, and tissue weight into account. We found the highest %ID/g () at 1 h p.i. for the kidneys, intestines, liver and spleen (, , , and ) decreasing already at 2 h p.i. (, , , and ) and decreasing further at 18 h p.i. (, , , and ).

Mean %ID/g for H727 tumors at 1 h p.i. were , at 2 h p.i. , and at 18 h p.i. . Tumor-to-muscle ratio was calculated to be . Tumor-to-blood ratio was 12.7, 37.2, and 20.2, respectively at the 3 collecting times. Biodistribution data and tumor-to-organ ratios are shown in Figure 4.

Figure 4: Biodistribution data for ⁶⁴Cu-NODAGA-c(RGDyK) in human H727 xenograft tumor mice at 1, 2 and 18 hour post injection. Results are shown as %ID/g SEM.

3.2.4. Radiation Dosimetry

Residence times based on biodistribution data are shown in Table 3 and were used for calculating estimates of human radiation-absorbed doses using OLINDA/EXM. Table 4 shows the OLINDA/EXM estimates for human adult females and males for each organ and the total effective dose. The highest radiation-absorbed doses were found to be the urinary bladder wall (0.014 and 0.010 mGy/MBq for females and males, resp.). However, this estimate is a worst-case scenario since we used a conservative model with a urinary elimination fraction of 75% with voiding intervals of 5 hours. The whole body effective dose was 0.038 and 0.029 mSv/MBq for females and males, respectively. Accordingly, an administered dose of 200 MBq ⁶⁴Cu-NODAGA-c(RGDyK) to humans would lead to a radiation burden of less than 8 mSv.

Table 3: Residence times (Bq * h/Bq) in the main target organs.

Target organ
Residence time [Bq * h/Bq]

Liver

Kidneys

Lungs

Spleen

Heart

Small intestine

Remainder body

Data based on average biodistribution in organs at 1, 2, and 18 hours after injection obtained in human neuroendocrine xenograft tumor mice.

Table 4: OLINDA estimated radiation-absorbed doses for human adults after injection of  ⁶⁴Cu-NODAGA-c(RGDyK).

Target organ
Organ doses (mGy/MBq)

Adult female
Adult male

Adrenals

Brain

Breasts

Gallbladder wall

Lower large intestine wall

Small intestine

Stomach wall

Upper large intestine wall

Heart wall

Kidneys

Liver

Lungs

Muscle

Ovaries/testicles

Pancreas

Red marrow

Osteogenic cells

Skin

Spleen

Thymus

Thyroid

Urinary bladder wall

Uterus

Total body

Effective dose (mSv/MBq)

Estimated doses based on average biodistribution in organs at 1, 2, and 18 hours post injection obtained in human neuroendocrine xenograft tumor mice.

3.2.5. PET Scanning Data

The tumors were clearly visible after injection of ⁶⁴Cu-NODAGA-c(RGDyK) at all measured time points: 1, 2 and 18 h pi (Figure 5). ⁶⁴Cu-NODAGA-c(RGDyK) showed relatively high uptake in H727 tumors; mean %ID/g of right and left tumors were 1.15, 0.99, and 0.76 respectively, at 1, 2, and 18 h pi. Tumor-to-muscle (T/M) ratios were . Both %ID/g and T/M ratios were similar to the values found in the biodistribution study using the -counter. Tracer activity in organs did not disturb the tumor to background contrast from 2 h pi where most of the nonspecific uptake had been cleared.

Figure 5: (a)–(c) PET scans showing ⁶⁴Cu-NODAGA-c(RGDyK) uptake in human H727 neuroendocrine tumors in nude mice bearing tumors subcutaneously on the flanks. (a) 1 h post injection of 1.6 MBq ⁶⁴Cu-NODAGA-c(RGDyK) (b) 2 h post injection and (c) 18 h post injection. (d) Time activity curve for ⁶⁴Cu-NODAGA-c(RGDyK) in the H727 tumors calculated as a mean of tracer uptake in left and right tumor at each scan time. Images are 2.5 mm thick slices at the tumor levels; tumors are shown encircled. Scan time: 10 minutes.

4. Discussion

To the best of our knowledge this is the first study of the PET tracer ⁶⁴Cu-NODAGA-c(RGDyK). The major finding was a close correlation between tumor uptake of ⁶⁴Cu-NODAGA-c(RGDyK) and the target Integrin α Vβ ₃ validating its ability to image neo-angiogenesis.

The cyclic RGD peptides c(RGDfK) and c(RDGyK) have frequently been used for radiolabeling. c(RGDfK), cyclo [Arg-Gly-Asp-D-Phe-Lys] only differs from c(RGDyK), cyclo [Arg-Gly-Asp-D-Tyr-Lys], in one amino acid, D-Phenylalanine (D-Phe) instead of D-tyrosine (D-Tyr). D-Tyr is more hydrophilic than D-Phe and c(RGDyK) has therefore been reported as preferable due to faster renal excretion [10]. In our study we found a faster decrease of radioactivity in kidneys, intestine, and liver from 1 to 18 h (2.2 to 0.5, 1.6 to 0.4, and 1.1 to 0.4%ID/g) than that reported for ⁶⁴Cu-NODAGA-c(RGDfK) in the same time intervals (2.2 to 1.6, 2.1 to 1.3, and 1.7 to 1.0%ID/g) [12]. Taking together c(RGDyK) therefore seems superior to c(RGDfK).

c(RGDyK), the peptide used in the present investigation, has previously been chelated to 1,4,7,10-tetraazacyclododecane-N,N′,N′′,N′′′-tetraacetic acid (DOTA) or 1,4,7-triazacyclononane-1,4,7-triacetic acid (NOTA) and labeled with ⁶⁴Cu [11–13, 25] or ⁶⁸Ga [14]. ⁶⁴Cu-DOTA-c(RGDyK) was first described in 2004 by Chen and coworkers [25]. The ⁶⁴Cu-DOTA complex seemed more unstable than ⁶⁴Cu-NOTA or ⁶⁴Cu-NODAGA, because Cu²⁺ was transferred to copper-binding proteins, leading to relatively high blood and liver uptake [26]. NODAGA is, compared to the chelators DOTA and NOTA [8, 11, 27–29], particularly useful due to high hydrophilicity leading to rapid renal excretion avoiding radioactivity accumulation in the gastrointestinal tract [30] and in the kidneys. Therefore, we chose NODAGA as chelator.

NODAGA-c(RGDy/fK) has been labeled with ⁶⁸Ga [9, 12, 15, 18] and NODAGA-c(RGDfK) also with ⁶⁴Cu [12]. One paper compared ⁶⁸Ga- and ⁶⁴Cu-NODAGA-c(RGDfK) and found the highest tracer uptake using ⁶⁸Ga-NODAGA-c(RGDfK) compared to ⁶⁴Cu-NODAGA-c(RGDfK) (5.2 versus 3.8%ID/g, 1 h p.i. in highly angiogenic U87MG xenograft tumors) but also 3 times higher tumor-to-blood ratio [12]. We found similar T/B ratio (12.7) after 1 hour using ⁶⁴Cu-NODAGA-c(RGDyK) as they did with ⁶⁴Cu-NODAGA-c(RGDfK). The advantage of ⁶⁴Cu labeling is the possibility of delayed imaging up to 12 or 18 h post injection with expected improved image contrast, and therefore improved visualization of low expressing Integrin α Vβ ₃ tumors. Indeed, we found that delayed images after 2 and 18 hours showed higher tumor-to-background ratios compared to 1 hour images. This confirms the value of delayed images, possible with ⁶⁴Cu. In addition ⁶⁴Cu has a much better image quality than ⁶⁸Ga due to the shorter positron range. A comparison to ¹⁸F-labeled RGD shows that tumor-to-liver and tumor-to-kidney ratios are similar [11].

For the neuroendocrine H727 xenograft tumors we found moderate levels of tracer uptake (1.2%ID/g 1 h p.i. as the highest) explained by the fact that neo angiogenic activity in H727 tumors, reflecting low aggressiveness in general of NET tumors, is known to be lower than, for example, in glioblastoma U87MG xenograft tumors showing high expression of integrins [15].

We investigated the target specificity of the PET tracer by analyzing mRNA levels of both Integrin α V and Integrin using quantitative QPCR. Our results strongly support that ⁶⁴Cu-NODAGA-c(RGDyK) has high affinity to Integrin α Vβ ₃ reflecting neo angiogenesis.

A challenge in preclinical studies using human xenografts in mice is, that the formation of new vessels in the tumors might be of both human and mouse origin. The interaction between mouse host stroma and human tumor cells and the role they play in the tumor-angiogenesis and tumor growth are of great importance in antiangiogenesis treatment. Therefore in preclinical studies using antiangiogenic drugs for treatment, it is of great importance to take into consideration species specificity. Accordingly, the antibody Bevacizumab only binds to human VEGF-A and not to murine VEGF-A [31], whereas the peptide Cilengitide is blocking Integrin α Vβ ₃ of both human and mouse origin [32]. In the present study we therefore quantified both the gene expression level of mice and human Integrin α V, Integrin , and VEGF-A in our human H727 xenograft model. We found that Integrin α V and Integrin , of both mouse and human origin, are present at comparable levels. In contrast, VEGF-A is mainly of human origin. In general this seems to be true throughout tumor development as we previously (unpublished data) found dual origin from 1–3 weeks of tumor growth with a confirmed higher level of VEGF-A of human origin. Species specificity of our PCR designs were verified targeting human or mice gene sequences during blast tests, and as a further control QPCR primers targeting mice genes were tested in cDNA from a NET patient finding no gene expression.

The finding of correlation between tracer uptake of ⁶⁴Cu-NODAGA-c(RGDyK) and mRNA levels of mouse Integrin α V, Integrin , and VEGF-A two hours post injection indicates that ⁶⁴Cu-NODAGA-c(RGDyK) is indeed targeting the tumor-angiogenesis and therefore is a promising radiotracer for PET imaging and quantification of angiogenesis.

Taken together ⁶⁴Cu-NODAGA-c(RGDyK) seems promising for future use in humans. We therefore performed experiments to estimate dosimetry in humans based on projections from animal data. Here we found a favorable estimate of less than 8 mSv for a realistic clinical dose of 200 MBq. It should be noted that this estimate is conservative. Compared to recent dosimetry estimates for ⁶⁸Ga-NODAGA-c(RGDyK) [9] on a per MBq basis the radiation burden is comparable especially taking into consideration the more conservative urinary elimination model used in our calculations. In both studies the organ receiving the highest radiation-absorbed dose was the urinary bladder wall.

5. Conclusion

We, as the first, have described the use of ⁶⁴Cu-NODAGA-c(RGDyK) as a PET tracer targeting angiogenesis. We found an excellent tumor-to-background ratio due to rapid elimination from nontumor tissue. Also an excellent image quality was obtained using ⁶⁴Cu. In addition, our compound seems stable as indicated by the low liver uptake. Using gene expression analyses we found a close correlation with key angiogenesis markers validating the target of the tracer. Finally the tracer had a favorable dosimetry. We therefore suggest that ⁶⁴Cu-NODAGA-c(RGDyK) should be further studied as a promising candidate for human angiogenesis PET.

Acknowledgments

This work was supported by the National Advances Technology Foundation, Danish Cancer Society, The Lundbeck Foundation, Novo Nordic Foundation, The Danish Medical Research Council, and A.P. Moeller Foundation.

References

M. Millard, S. Odde, and N. Neamati, “Integrin targeted therapeutics,” Theranostics, vol. 1, pp. 154–188, 2011.

Z. Liu, F. Wang, and X. Chen, “Integrin alpha(v)beta(3)-targeted cancer therapy,” Drug Development Research, vol. 69, no. 6, pp. 329–339, 2008.

W. Guo and F. G. Giancotti, “Integrin signalling during tumour progression,” Nature Reviews Molecular Cell Biology, vol. 5, no. 10, pp. 816–826, 2004.

E. Ruoslahti, “RGD and other recognition sequences for integrins,” Annual Review of Cell and Developmental Biology, vol. 12, pp. 697–715, 1996.

I. Dijkgraaf, A. J. Beer, and H. J. Wester, “Application of RGD-containing peptides as imaging probes for alphavbeta3 expression,” Frontiers in Bioscience, vol. 14, no. 3, pp. 887–899, 2009.

N. Ferrara, H. P. Gerber, and J. LeCouter, “The biology of VEGF and its receptors,” Nature Medicine, vol. 9, no. 6, pp. 669–676, 2003.

I. S. Moreira, P. A. Fernandes, and M. J. Ramos, “Vascular endothelial growth factor (VEGF) inhibition—a critical review,” Anti-Cancer Agents in Medicinal Chemistry, vol. 7, no. 2, pp. 223–245, 2007.

Z. Liu, Z. B. Li, Q. Cao, S. Liu, F. Wang, and X. Chen, “Small-animal PET of tumors with ⁶⁴Cu-labeled RGD-bombesin heterodimer,” Journal of Nuclear Medicine, vol. 50, no. 7, pp. 1168–1177, 2009.

F. Buchegger, D. Viertl, S. Baechler, et al., “⁶⁸Ga-NODAGA-RGDyK for alphavbeta3 integrin PET imaging. Preclinical investigation and dosimetry,” Nuklearmedizin, vol. 50, no. 6, pp. 225–233, 2011.

X. Chen, S. Liu, Y. Hou et al., “MicroPET imaging of breast cancer αv-integrin expression with ⁶⁴Cu-labeled dimeric RGD peptides,” Molecular Imaging and Biology, vol. 6, no. 5, pp. 350–359, 2004.

C. Decristoforo, G. I. Hernandez, J. Carlsen et al., “⁶⁸Ga- and ¹¹¹in-labelled DOTA-RGD peptides for imaging of αvβ3 integrin expression,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 8, pp. 1507–1515, 2008.

R. A. Dumont, F. Deininger, R. Haubner, et al., “Novel (64)Cu- and (68)Ga-labeled RGD conjugates show improved PET imaging of alpha(nu)beta(3) integrin expression and facile radiosynthesis,” Journal of Nuclear Medicine, vol. 52, pp. 1276–1284, 2011.

G. Z. Ferl, R. A. Dumont, I. J. Hildebrandt et al., “Derivation of a compartmental model for quantifying ⁶⁴Cu-DOTA-RGD kinetics in tumor-bearing mice,” Journal of Nuclear Medicine, vol. 50, no. 2, pp. 250–258, 2009.

M. J. Jae, K. H. Mee, S. C. Young et al., “Preparation of a promising angiogenesis PET imaging agent: ⁶⁸Ga-labeled c(RGDyK)-isothiocyanatobenzyl-1,4,7-triazacyclononane-1, 4,7-triacetic acid and feasibility studies in mice,” Journal of Nuclear Medicine, vol. 49, no. 5, pp. 830–836, 2008.

P. A. Knetsch, M. Petrik, C. M. Griessinger et al., “[⁶⁸Ga]NODAGA-RGD for imaging αvβ3 integrin expression,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 38, no. 7, pp. 1303–1312, 2011.

S. Liu, “Radiolabeled multimeric cyclic RGD peptides as integrin αvβ3 targeted radiotracers for tumor imaging,” Molecular Pharmaceutics, vol. 3, no. 5, pp. 472–487, 2006.

Y. Wu, X. Zhang, Z. Xiong et al., “MicroPET imaging of glioma integrin αvβ3 expression using ⁶⁴Cu-labeled tetrameric RGD peptide,” Journal of Nuclear Medicine, vol. 46, no. 10, pp. 1707–1718, 2005.

K. Pohle, J. Notni, J. Bussemer, et al., “(68)Ga-NODAGA-RGD is a suitable substitute for (18)F-Galacto-RGD and can be produced with high specific activity in a cGMP/GRP compliant automated process,” Nuclear Medicine and Biology, vol. 39, no. 6, pp. 777–784, 2012.

J. Oxboel, T. Binderup, U. Knigge, and A. Kjaer, “Quantitative gene-expression of the tumor angiogenesis markers vascular endothelial growth factor, integrin αV and integrin β3 in human neuroendocrine tumors,” Oncology Reports, vol. 21, no. 3, pp. 769–775, 2009.

M. H. Kulke, L. L. Siu, J. E. Tepper et al., “Future directions in the treatment of neuroendocrine tumors: consensus report of the National Cancer Institute Neuroendocrine Tumor clinical trials planning meeting,” Journal of Clinical Oncology, vol. 29, no. 7, pp. 934–943, 2011.

M. G. Stabin, R. B. Sparks, and E. Crowe, “OLINDA/EXM: the second-generation personal computer software for internal dose assessment in nuclear medicine,” Journal of Nuclear Medicine, vol. 46, no. 6, pp. 1023–1027, 2005.

J. Vandesompele, K. De Preter, F. Pattyn et al., “Accurate normalization of real-time quantitative RT-PCR data by geometric averaging of multiple internal control genes,” Genome Biology, vol. 3, no. 7, article RESEARCH0034, 2002.

J. Hellemans, G. Mortier, A. De Paepe, F. Speleman, and J. Vandesompele, “qBase relative quantification framework and software for management and automated analysis of real-time quantitative PCR data,” Genome Biology, vol. 8, no. 2, article R19, 2007.

K. J. Livak and T. D. Schmittgen, “Analysis of relative gene expression data using real-time quantitative PCR and the 2-ΔΔCT method,” Methods, vol. 25, no. 4, pp. 402–408, 2001.

X. Chen, R. Park, M. Tohme, A. H. Shahinian, J. R. Bading, and P. S. Conti, “MicroPET and autoradiographic imaging of breast cancer α v-integrin expression using ¹⁸F- and ⁶⁴Cu-labeled RGD peptide,” Bioconjugate Chemistry, vol. 15, no. 1, pp. 41–49, 2004.

T. J. Wadas, E. H. Wong, G. R. Weisman, and C. J. Anderson, “Copper chelation chemistry and its role in copper radiopharmaceuticals,” Current Pharmaceutical Design, vol. 13, no. 1, pp. 3–16, 2007.

X. Chen, E. Sievers, Y. Hou et al., “Integrin αvβ3-targeted imaging of lung cancer,” Neoplasia, vol. 7, no. 3, pp. 271–279, 2005.

Z. B. Li, W. Cai, Q. Cao et al., “⁶⁴Cu-labeled tetrameric and octameric RGD peptides for small-animal PET of tumor αvβ3 integrin expression,” Journal of Nuclear Medicine, vol. 48, no. 7, pp. 1162–1171, 2007.

Z. B. Li, K. Chen, and X. Chen, “⁶⁸Ga-labeled multimeric RGD peptides for microPET imaging of integrin αvβ3 expression,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 6, pp. 1100–1108, 2008.

S. Liu, “Radiolabeled cyclic RGD peptides as integrin -targeted radiotracers: maximizing binding affinity via bivalency,” Bioconjugate Chemistry, vol. 20, no. 12, pp. 2199–2213, 2009.

L. S. Rosen, “Clinical experience with angiogenesis signaling inhibitors: focus on vascular endothelial growth factor (VEGF) blockers,” Cancer Control, vol. 9, no. 2, pp. 36–44, 2002.

P. A. Burke, S. J. DeNardo, L. A. Miers, K. R. Lamborn, S. Matzku, and G. L. DeNardo, “Cilengitide targeting of αvβ3 integrin receptor synergizes with radioimmunotherapy to increase efficacy and apoptosis in breast cancer xenografts,” Cancer Research, vol. 62, no. 15, pp. 4263–4272, 2002.