International Journal of Molecular Imaging

Volume 2012 (2012), Article ID 690468, 6 pages

doi:10.1155/2012/690468

Review Article

¹²³I-MIBG Scintigraphy as a Powerful Tool to Plan an Implantable Cardioverter Defibrillator and to Assess Cardiac Resynchronization Therapy in Heart Failure Patients

Antonella Stefanelli, Giorgio Treglia, and Alessandro Giordano

Department of Radiological Sciences, Institute of Nuclear Medicine, Università Cattolica del Sacro Cuore, Largo Agostino Gemelli 8, 00168 Rome, Italy

Received 29 June 2012; Accepted 22 August 2012

Academic Editor: Seigo Kinuya

Copyright © 2012 Antonella Stefanelli et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Iodine-123-metaiodobenzylguanidine (¹²³I-MIBG) scintigraphy is a nuclear medicine technique which describes the functional status of the cardiac sympathetic nervous system. It is well known that an autonomic dysfunction is present in heart failure setting as a neuronal uptake of norepinephrine is impaired in the failing myocardium. Reduction in sympathetic nervous function in the heart, measured by reduced myocardial uptake of ¹²³I-MIBG, is an indicator of poor prognosis for heart failure patients. The aim of this paper was to investigate the role of ¹²³I-MIBG scintigraphy in evaluating the need of implantable cardioverter defibrillator (ICD) and the response to cardiac resynchronization therapy (CRT) in heart failure patients. For this purpose scientific literature data on these topics were reviewed. Based on literature data, ¹²³I-MIBG scintigraphy seems to be a useful tool to assess which patients may benefit most from an ICD implantation to reduce the risk of ventricular arrhythmia or sudden cardiac death. Furthermore, ¹²³I-MIBG scintigraphy seems to predict which patients will response to CRT with an improvement in left ventricular function.

1. Introduction

Heart failure (HF) is characterized by alterations in myocardial sympathetic nerve activity; an increased sympathetic response is initially favorable by serving as compensation for decreased cardiac output, but as HF progresses, this response leads to deleterious neurohormonal and myocardial structural changes that worsen the condition and increase the likelihood of arrhythmias and cardiac death [1].

Myocardial innervation imaging with iodine 123 metaiodobenzylguanidine (¹²³I-MIBG) scintigraphy provides a noninvasive tool for the investigation of cardiac sympathetic innervation; this technique can also demonstrate drug-induced changes in cardiac adrenergic activity [2].

Radiolabeled MIBG is considered an established sympathetic neuron-imaging agent useful to study the organs richly innervated by the sympathetic nervous system. MIBG is an analog of guanethidine and is taken up by the postganglionic presynaptic nerve endings of the adrenergic nervous system [3–6]. After depolarization, MIBG is released into the synaptic cleft like norepinephrine but is not metabolized. Labeling MIBG with ¹²³I allows the visualization of adrenergic innervation in vivo; ¹²³I-MIBG scintigraphy not only displays the presence of noradrenergic innervation but also its functional capability [3–6].

About the scintigraphic procedure, planar images of the thorax are acquired 15 minutes (early image) and 4 hours (delayed image) after radiopharmaceutical injection with the patient lying in the same supine position. Tomographic (SPECT) images are usually performed after early and delayed planar imaging [3].

¹²³I-MIBG uptake is semiquantified by calculating the heart to mediastinum ratio (H/M), after drawing regions of interest (ROI) over the heart and the upper mediastinum in the planar anterior view. Average counts per pixel in the myocardium are divided by average counts per pixel in the mediastinum [3–6]. The myocardial washout rate (WR) from initial to late images is also calculated, and expressed as a percentage, as the rate of decrease in myocardial counts over time between early and late imaging [3–6].

The delayed H/M ratio reflects the relative distribution of sympathetic nerve terminals, offering global information about neuronal function resulting from uptake, storage, and release. The WR reflects the neuronal integrity or sympathetic tone [3]. Impaired sympathetic activity in HF is usually associated with high myocardial WR and low early and delayed H/M at ¹²³I-MIBG scintigraphy [7].

Since semiquantitative analysis of myocardial ¹²³I-MIBG uptake is characterized by a low interindividual and a within-subject variability [8], ¹²³I-MIBG scintigraphy has become a valuable tool to provide information regarding the potential and actual benefit of pharmacological treatment in patients with HF [7].

Implantable cardioverter defibrillators (ICDs) and cardiac resynchronization therapy (CRT) are also useful therapeutic options in patients with HF. ICDs are dedicated to pacing and/or defibrillating lethal cardiac arrhythmias, whereas CRT improves the electrical dyssynchrony found in many patients with HF and thereby can improve mechanical dyssynchrony leading to increased left ventricular function.

The purpose of this paper is to review published scientific data regarding the clinical usefulness of ¹²³I-MIBG scintigraphy in HF patients referred for ICD or CRT.

2. Role of -MIBG Scintigraphy in HF Prognosis

Several studies have shown that the assessment of the cardiac autonomic state with ¹²³I-MIBG scintigraphy can help to estimate the prognosis and to monitor the effects of therapeutic interventions in HF patients [9–14].

First, Merlet et al. [9] demonstrated that impaired cardiac sympathetic innervation, as assessed with ¹²³I-MIBG imaging, was associated with adverse cardiac outcomes in 112 patients with HF and a reduced left ventricular ejection fraction (LVEF). After a mean followup of months, the only independent predictors for mortality were low myocardial ¹²³I-MIBG uptake () and LVEF () [9].

Then, Agostini et al. [10] enrolling 290 HF patients from six centers reported that the mean H/M at ¹²³I-MIBG scintigraphy was in patients who had major cardiac events (MCEs) and in patients without MCEs (). When an optimum H/M was set at 1.75, two-year event-free survival was 62% for H/M under this threshold and 95% for H/M greater than or equal to 1.75 (). Moreover, H/M and LVEF were the only significant predictors of MCEs. The authors confirmed the prognostic value of ¹²³I-MIBG scintigraphy in HF patients, and its potential to identify a quantitative threshold that may help to estimate the risk of cardiac mortality and potentially fatal ventricular arrhythmias [10].

Recently, the ADMIRE-HF study [11] confirmed previous data. The investigators prospectively evaluated ¹²³I-MIBG imaging for identifying symptomatic HF patients (NYHA class II/III and LVEF ≤35%) most likely to experience cardiac events. Among the 961 patients enrolled, 25% experienced events (median follow-up 17 months). The cardiac event risk (primary end point) was significantly lower for subjects with H/M ≥1.60. For H/M <1.60, 2-year probabilities of cardiac death and all-cause mortality were 11.2% and 16.1% versus 1.8% and 3.0% for the group with H/M ≥1.60. Significant contributors to the multivariable model were H/M, LVEF, brain natriuretic peptide (BNP), and NYHA functional class. ¹²³I-MIBG imaging also provided additional discrimination in analyses of interactions between BNP, LVEF, and H/M. Moreover, 9% of the patients experienced either nonfatal arrhythmic events (self-limited ventricular tachycardia, ; resuscitated cardiac arrest, ; appropriate ICD discharges, ) or sudden cardiac death (). These combined “arrhythmic” events were significantly more common in subjects with H/M <1.60. ADMIRE-HF study provided prospective validation of the independent prognostic value of ¹²³I-MIBG scintigraphy in the assessment of patients with HF [11].

Some clinical trials have demonstrated that ¹²³I-MIBG scintigraphy parameters are predictive of sudden cardiac death in patients with mild-to-moderate HF independently of LVEF [12, 13]. Kasama et al. showed that delta WR obtained from serial 123I-MIBG scintigraphic studies was a useful parameter for predicting cardiac death and sudden death in stabilized patients with HF [12]. Moreover, Tamaki et al. found that cardiac MIBG WR, but not signal-averaged electrocardiogram (SAECG), heart rate variability (HRV), or QT dispersion, was a powerful predictor of sudden cardiac death in patients with mild-to-moderate HF, independently of LVEF [13]. Bax et al. [14] examined the relationship between abnormalities of ventricular sympathetic innervation delineated by scintigraphic imaging with ¹²³I-MIBG and inducible ventricular tachyarrhythmias in patients with left ventricular dysfunction and previous myocardial infarction. These authors demonstrated that ¹²³I-MIBG scintigraphy abnormalities are associated with lethal arrhythmias and may guide appropriate ICD implantation in patients affected by HF [14].

3. Cardiac -MIBG Imaging in HF Patients with ICD

One of the first studies performed to explore any role of ¹²³I-MIBG scintigraphy in patients with ICD was designed by Rigden et al. who demonstrated that ICD shocks did not cause any change in sympathetic nerve activity in 11 patients who underwent ¹²³I-MIBG scans before and after ICD implantation [15].

Although the ICD has been shown to abort potentially fatal ventricular arrhythmias, identification of patients who will most benefit from this device remains difficult. Despite widespread use of ICDs, their cost and the fact that only a certain group of patients fully benefits from the devices require appropriate risk stratification of patients. In the last years several studies were designed in order to identify patients who will benefit most from an ICD (Table 1).

Table 1: Studies about the usefulness of ¹²³I-MIBG scintigraphy in planning ICD.

Authors
Country
Number of patients
MIBG parameters evaluated

Rigden et al. [15]
USA
11
MIBG uptake

Arora et al. [16]
Japan
17
Early and late H/M ratio; WR; early and late MIBG defect score

Nagahara et al. [17]
Japan
44
Early and late H/M ratio; WR

Koutelou et al. [18]
Greece
25
Early and late H/M ratio; WR

Nishisato et al. [19]
Japan
60
Early and late H/M ratio; WR

Boogers et al. [20]
Nederland
116
Early and late H/M ratio; WR; early and late MIBG defect score

H/M: heart to mediastinum ratio; WR: washout rate.

Arora et al. [16] undertook a pilot study to evaluate myocardial sympathetic innervation with the use of ¹²³I-MIBG imaging, as well as central autonomic tone with the use of heart rate variability (HRV) analysis, in patients with ICD. Test results were correlated with the occurrence of ICD discharges. Seventeen patients with previously implanted defibrillators were studied. Of these, 10 had at least 1 appropriate device discharge for ventricular tachyarrhythmias, whereas 7 had no discharge. Patients with a discharge had a significantly lower ¹²³I-MIBG H/M, more extensive sympathetic denervation, and significantly reduced values for several HRV parameters [16]. This was the first study to demonstrate that cardiac autonomic assessment using ¹²³I-MIBG imaging may help to select patients who would most benefit from an ICD by identifying those at increased risk for potentially fatal arrhythmias.

Then, Nagahara et al. [17] investigated whether altered cardiac autonomic function is associated with the occurrence of ICD discharge or lethal cardiac events. Fifty-four ICD-treated patients were prospectively followed after assessment of cardiac ¹²³I-MIBG uptake (quantified as H/M), plasma concentration of BNP, and LVEF. Patients were divided into 2 groups based on the presence (group A) or absence (group B) of appropriate ICD discharge and followed up for a 15-month period. Group A had a significantly lower level of cardiac ¹²³I-MIBG uptake and a higher plasma BNP level than did group B. Univariate analysis revealed that plasmatic BNP levels, any medication, and late H/M were predictors of lethal cardiac events, whereas multivariate analysis showed that only late H/M was a significant predictor. Thus, the authors concluded that when combined with plasma BNP concentration or cardiac function, cardiac ¹²³I-MIBG uptake is closely related to lethal cardiac events and can be used to identify patients who would benefit most from an ICD [17].

Koutelou et al. [18] studied 25 patients with a recent ICD and mild HF (NYHA I-II) due to either ischemic () or dilated () cardiomyopathy. One week after ICD implantation they underwent baroreflex sensitivity (BRS) evaluation, 24-h HRV assessment, and ¹²³I-MIBG imaging. The mean patient followup was 32 ± 10 months. The frequency of fast ventricular arrhythmic episodes (FVAE) demonstrated a positive correlation to WR at ¹²³I-MIBG imaging (). WR was also independent predictor of FVAE [18].

Nishisato et al. [19] quantified cardiac ¹²³I-MIBG uptake in 60 patients with ICD who were prospectively followed with endpoints of appropriate ICD shocks or cardiac death. Cardiac ¹²³I-MIBG was quantified as H/M. During a mean 29-month interval, ICD shock was documented in 30 patients (50%); three cardiac deaths were also observed in this group of patients. Patients with ICD shocks had a significantly smaller H/M than did those without ICD shocks [19].

Boogers et al. [20] evaluated whether ¹²³I-MIBG imaging predicts ventricular arrhythmias causing appropriate ICD therapy (primary end point) and the composite of appropriate ICD therapy or cardiac death (secondary end point). One hundred sixteen HF patients referred for ICD therapy underwent ¹²³I-MIBG scintigraphy and myocardial perfusion imaging before ICD implantation. During a mean followup of months, appropriate ICD therapy was documented in 24 (21%) patients and appropriate ICD therapy or cardiac death in 32 (28%) patients. Reduced myocardial ¹²³I-MIBG uptake was an independent predictor for both end points [20].

4. Cardiac -MIBG Imaging in HF Patients Undergoing CRT

Current guidelines recommend CRT in HF patients who remain symptomatic in NYHA classes III-IV despite optimal pharmacological therapy, with LVEF <35%, LV dilatation (LV end diastolic diameter >55 mm) normal synus rhythm and wide QRS complex (≥120 ms) [21].

Since CRT has been shown to reduce mortality due to reverse remodeling (reduction in ventricular volumes and improvement in systolic function), as well as to changes in sympathetic activity, some authors investigated whether CRT affects cardiac sympathetic nerve activity, and whether changes are related to CRT response [22–27] (Table 2).

Table 2: Studies about the usefulness of ¹²³I-MIBG scintigraphy in patients who underwent CRT.

Authors
Country
Number of Patients
MIBG parameters evaluated

Higuchi et al. [22]
Japan
18
Early and late H/M ratio; WR; early and late MIBG defect score

Nishioka et al. [23]
Brazil
30
Early and late H/M ratio; WR

Burri et al. [24]
Nederland
16
Early and late H/M ratio; WR

Cha et al. [25]
USA
45
Late H/M ratio; WR

Tanaka et al. [26]
Japan
50
Early and late H/M ratio; WR

Shinohara et al. [27]
Japan
27
Late H/M ratio

H/M: heart to mediastinum ratio; WR: washout rate.

Higuchi et al. [22] evaluating 18 HF patients observed that those who achieved cardiac resynchronization after biventricular pacing had a significant improvement in cardiac symptoms, exercise capacity, and cardiac sympathetic function, as estimated by the delayed H/M at ¹²³I-MIBG imaging [22].

Nishioka et al. [23] studied 30 patients with HF and classic indications for CRT who were prospectively followed before and at least 3 months after CRT. After CRT, patients were divided into two groups: group 1 (21 patients), responders improving to functional class (FC) I or II, and group 2 (9 patients), nonresponders remaining in FC III or IV. After CRT, only group 1 showed favorable changes in QRS width (), LVEF (), and H/M at ¹²³I-MIBG imaging (). The H/M ratio and WR were associated with CRT response ( and , resp.). Moreover, the H/M was the only independent predictor of CRT response () [23].

A similar trial was performed by Burri et al. [24] who reported that CRT responders showed a significant decrease in WR at ¹²³I-MIBG imaging at followup when compared with baseline () and also had a significantly lower WR at followup when compared with nonresponders () [24].

Cha et al. [25] demonstrated the H/M at ¹²³I-MIBG imaging increased (1.82 versus 1.97; ), whereas the WR was reduced (48% versus 37%; ) in 45 consecutive patients with HF who received CRT. Compared with nonresponders, CRT responders had a higher delayed H/M ratio (2.11 versus 1.48; ) and a lower WR (37% versus 62%; ) at baseline [25].

Moreover, Tanaka et al. [26] found that HF patients with dyssynchrony showed less cardiac sympathetic activity than did those without dyssynchrony even though LVEF was not significantly different (% versus %). Dyssynchrony and H/M at ¹²³I-MIBG imaging ≥1.6 were associated with a high frequency of LV functional improvement with a higher response rate [26].

Lastly Shinohara et al. [27] confirmed previous data as they found that delayed H/M at ¹²³I-MIBG imaging significantly increased in the CRT responders but not in the nonresponders [27].

5. General Remarks

Current indications for ICD implantation in primary prevention are referred to patients “with LV dysfunction due to prior myocardial infarction (MI) who are at least 40 days post MI, have LVEF less than or equal to 30% to 40%, are NYHA functional class II or III, are receiving optimal medical therapy and who have reasonable expectation of survival with a good functional status for more than one year.” Moreover, ICD is recommended for primary prevention in “patients with non-ischemic dilated cardiomyopathy who have a LVEF less than or equal to 30% to 35%, are NYHA functional class II or III, who are receiving chronic optimal therapy and who have reasonable expectation of survival with a good functional status for more than 1 year.” Despite the current criteria, many subjects still die because they were considered low-risk patients [28].

Conversely, many patients with an ICD device implanted after an abortive cardiac arrest or a life threatening ventricular tachycardia never experience appropriate ICD shock, and they are also exposed to unnecessary ICD shocks, device malfunction or infection, and higher risk of anxiety or depression.

Moreover, there are some cardiac diseases without left ventricular dysfunction which are associated with high risk of lethal arrhythmyas (such as arrhythmogenic right ventricular cardiomyopathy, long QT syndrome, and Brugada syndrome). ¹²³I-MIBG scintigraphy compared to other imaging modalities is the only able to evaluate the sympathetic cardiac innervations status in these settings and help to stratify patients who will most benefit from ICD implantation for primary prevention [28].

Heart rate variability is noted as the most sensitive marker of autonomic dysfunction; however, it seems, to be influenced by artifacts, rhythm disturbance, and noncardiac autonomic tone that makes it not reliable for stratifying HF patients.

¹²³I-MIBG scintigraphy is emerging as a powerful tool to assess prognosis in patients with HF and as an effective guide to evaluate appropriate ICD implantation in patients at high risk of sudden cardiac death. Most of the studies evaluated global cardiac ¹²³I-MIBG activity, but regional SPET analysis is possible. However, it is difficult to reconstruct SPET data when global ¹²³I-MIBG uptake is severely reduced; also, it is well known that MIBG uptake is underestimated at inferior and apical wall probably for attenuation or physiologic reason.

Fewer data are available from scientific literature, and further clinical trials are needed to investigate the potential role of ¹²³I-MIBG imaging for better selection of ICD candidates.

It is well known that biventricular pacing reduces ventricular dyssynchrony and improves LVEF. Moreover, several studies demonstrated that CRT improved cardiac sympathetic activity assessed by ¹²³I-MIBG scintigraphy. Available data showed that CRT responders showed a rebalance in cardiac autonomic function as structural reverse remodeling may also be accompanied by reverse modulation of the cardiac sympathetic system, with attenuation of the excessive sympathetic drive—associated with HF—and with rebalance of cardiac autonomic activity. For these reasons, ¹²³I-MIBG scintigraphy may have a potential role in predicting response to biventricular pacing. However, all these cited studies have a small sample size of patients. Further larger clinical trials are needed to understand whether cardiac ¹²³I-MIBG scintigraphy may have a role in selecting HF patients who will better respond to CRT.

Another issue that needs to be further addressed is the heterogeneity of data acquisition and image analyses about ¹²³I-MIBG scintigraphy among different studies. Some efforts have been done to standardize this technique (like the optimal collimator to use) and to contribute to its clinical implementation for prognostication of HF patients undergoing ICD and CRT [29–31].

6. Conclusion

¹²³I-MIBG scintigraphy seems to be a useful tool in cardiac dysfunction to assess which patients may benefit most from an ICD implantation to reduce the risk of ventricular arrhythmia or sudden cardiac death. Moreover, ¹²³I-MIBG scintigraphy seems to predict which HF patients will respond to CRT with an improvement in left ventricular function.

Conflict of Interests

The authors declare that they have no conflict of interests.

References

W. N. Leimbach, B. G. Wallin, and R. G. Victor, “Direct evidence from intraneural recordings for increased central sympathetic outflow in patients with heart failure,” Circulation, vol. 73, no. 5, pp. 913–919, 1986.

P. J. Podrid, T. Fuchs, and R. Candinas, “Role of the sympathetic nervous system in the genesis of ventricular arrhythmia,” Circulation, vol. 82, no. 2, supplement, pp. I-103–I-113, 1990.

A. Flotats, I. Carrió, D. Agostini et al., “Proposal for standardization of ¹²³I-metaiodobenzylguanidine (MIBG) cardiac sympathetic imaging by the EANM Cardiovascular Committee and the European Council of Nuclear Cardiology,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 37, no. 9, pp. 1802–1812, 2010.

G. Treglia, E. Cason, A. Gabellini, A. Giordano, and G. Fagioli, “Recent developments in innervation imaging using iodine-123-metaiodobenzylguanidine scintigraphy in Lewy body diseases,” Neurological Sciences, vol. 31, no. 4, pp. 417–422, 2010.

S. Yamashina and J. I. Yamazaki, “Neuronal imaging using SPECT,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 34, no. 6, pp. 939–950, 2007.

A. Giordano, G. Melina, M. L. Calcagni et al., “Selective Cardiac Neuroadrenergic Abnormalities in Hypertensive Patients with Left Ventricular Hypertrophy,” Archives of Medical Research, vol. 38, no. 5, pp. 512–518, 2007.

D. Agostini, H. J. Verberne, M. Hamon, A. F. Jacobson, and A. Manrique, “Cardiac ¹²³I-MIBG scintigraphy in heart failure,” Quarterly Journal of Nuclear Medicine and Molecular Imaging, vol. 52, no. 4, pp. 369–377, 2008.

G. A. Somsen, H. J. Verberne, E. Fleury, and A. Righetti, “Normal values and within-subject variability of cardiac I-123 MIBG scintigraphy in healthy individuals: implications for clinical studies,” Journal of Nuclear Cardiology, vol. 11, no. 2, pp. 126–133, 2004.

P. Merlet, H. Valette, J. L. Dubois-Rande et al., “Prognostic value of cardiac metaiodobenzylguanidine imaging in patients with heart failure,” Journal of Nuclear Medicine, vol. 33, no. 4, pp. 471–477, 1992.

D. Agostini, H. J. Verberne, W. Burchert et al., “I-123-mIBG myocardial imaging for assessment of risk for a major cardiac event in heart failure patients: insights from a retrospective European multicenter study,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 35, no. 3, pp. 535–546, 2008.

A. F. Jacobson, R. Senior, M. D. Cerqueira et al., “Myocardial Iodine-123 Meta-Iodobenzylguanidine Imaging and Cardiac Events in Heart Failure. Results of the Prospective ADMIRE-HF (AdreView Myocardial Imaging for Risk Evaluation in Heart Failure) Study,” Journal of the American College of Cardiology, vol. 55, no. 20, pp. 2212–2221, 2010.

S. Kasama, T. Toyama, H. Sumino et al., “Prognostic value of serial cardiac ¹²³I-MIBG imaging in patients with stabilized chronic heart failure and reduced left ventricular ejection fraction,” Journal of Nuclear Medicine, vol. 49, no. 6, pp. 907–914, 2008.

S. Tamaki, T. Yamada, Y. Okuyama et al., “Cardiac Iodine-123 Metaiodobenzylguanidine Imaging Predicts Sudden Cardiac Death Independently of Left Ventricular Ejection Fraction in Patients With Chronic Heart Failure and Left Ventricular Systolic Dysfunction. Results From a Comparative Study With Signal-Averaged Electrocardiogram, Heart Rate Variability, and QT Dispersion,” Journal of the American College of Cardiology, vol. 53, no. 5, pp. 426–435, 2009.

J. J. Bax, O. Kraft, A. E. Buxton et al., “123 I-mIBG scintigraphy to predict inducibility of ventricular arrhythmias on cardiac electrophysiology testing: a prospective multicenter pilot study,” Circulation, vol. 1, no. 2, pp. 131–140, 2008.

L. B. Rigden, R. D. Mitrani, H. N. Wellman, L. S. Klein, W. M. Miles, and D. P. Zipes, “Defibrillation shocks over epicardial patches produce sympathetic neural dysfunction in man,” Journal of Cardiovascular Electrophysiology, vol. 7, no. 5, pp. 398–405, 1996.

R. Arora, K. J. Ferrick, T. Nakata et al., “I-123 MIBG imaging and heart rate variability analysis to predict the need for an implantable cardioverter defribillator,” Journal of Nuclear Cardiology, vol. 10, no. 2, pp. 121–131, 2003.

D. Nagahara, T. Nakata, A. Hashimoto et al., “Predicting the need for an implantable cardioverter defibrillator using cardiac metaiodobenzylguanidine activity together with plasma natriuretic peptide concentration or left ventricular function,” Journal of Nuclear Medicine, vol. 49, no. 2, pp. 225–233, 2008.

M. Koutelou, A. Katsikis, P. Flevari et al., “Predictive value of cardiac autonomic indexes and MIBG washout in ICD recipients with mild to moderate heart failure,” Annals of Nuclear Medicine, vol. 23, no. 7, pp. 677–684, 2009.

K. Nishisato, A. Hashimoto, T. Nakata et al., “Impaired cardiac sympathetic innervation and myocardial perfusion are related to lethal arrhythmia: quantification of cardiac tracers in patients with ICDs,” Journal of Nuclear Medicine, vol. 51, no. 8, pp. 1241–1249, 2010.

M. J. Boogers, C. J. W. Borleffs, M. M. Henneman et al., “Cardiac Sympathetic Denervation Assessed With 123-Iodine Metaiodobenzylguanidine Imaging Predicts Ventricular Arrhythmias in Implantable Cardioverter-Defibrillator Patients,” Journal of the American College of Cardiology, vol. 55, no. 24, pp. 2769–2777, 2010.

P. E. Vardas, A. Auricchio, J.-J. Blanc, et al., “Guidelines for cardiac pacing and cardiac resynchronization therapy: the Task Force for Cardiac Pacing and Cardiac Resynchronization Therapy of the European Society of Cardiology. Developed in collaboration with the European Heart Rhythm Association,” European Heart Journal, vol. 28, no. 18, pp. 2256–2295, 2007.

K. Higuchi, T. Toyama, H. Tada, S. Naito, S. Ohshima, and M. Kurabayashi, “Usefulness of biventricular pacing to improve cardiac symptoms, exercise capacity and sympathetic nerve activity in patients with moderate to severe chronic heart failure,” Circulation Journal, vol. 70, no. 6, pp. 703–709, 2006.

S. A. D. Nishioka, M. Martinelli Filho, S. C. S. Brandão et al., “Cardiac sympathetic activity pre and post resynchronization therapy evaluated by ¹²³I-MIBG myocardial scintigraphy,” Journal of Nuclear Cardiology, vol. 14, no. 6, pp. 852–859, 2007.

H. Burri, H. Sunthorn, A. Somsen et al., “Improvement in cardiac sympathetic nerve activity in responders to resynchronization therapy,” Europace, vol. 10, no. 3, pp. 374–378, 2008.

Y. M. Cha, P. Chareonthaitawee, Y. X. Dong et al., “Cardiac sympathetic reserve and response to cardiac resynchronization therapy,” Circulation, vol. 4, no. 3, pp. 339–344, 2011.

H. Tanaka, K. Tatsumi, S. Fujiwara, et al., “Effect of left ventricular dyssynchrony on cardiac sympathetic activity in heart failure patients with wide QRS duration,” Circulation Journal, vol. 76, no. 2, pp. 382–389, 2012.

T. Shinohara, N. Takahashi, S. Saito et al., “Effect of cardiac resynchronization therapy on cardiac sympathetic nervous dysfunction and serum C-reactive protein level,” Pacing and Clinical Electrophysiology, vol. 34, pp. 1225–1230, 2011.

D. P. Zipes, A. J. Camm, M. Borggrefe et al., “ACC/AHA/ESC 2006 Guidelines for Management of Patients With Ventricular Arrhythmias and the Prevention of Sudden Cardiac Death. A Report of the American College of Cardiology/American Heart Association Task Force and the European Society of Cardiology Committee for Practice Guidelines,” Journal of the American College of Cardiology, vol. 48, no. 5, pp. e247–e346, 2006.

K. Nakajima, K. Okuda, S. Matsuo, et al., “Standardization of metaiodobenzylguanidine heartto mediastinum ratio using a calibration phantom: effects of correction on normal databases and a multicentre study,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 39, no. 1, pp. 113–119, 2012.

K. Okuda, K. Nakajima, T. Hosoya et al., “Semi-automated algorithm for calculating heart-to-mediastinum ratio in cardiac Iodine-123 MIBG imaging,” Journal of Nuclear Cardiology, vol. 18, no. 1, pp. 82–89, 2011.

S. Matsuo, K. Nakajima, K. Okuda et al., “Standardization of the heart-to-mediastinum ratio of ¹²³I- labelled-metaiodobenzylguanidine uptake using the dual energy window method: feasibility of correction with different camera-collimator combinations,” European Journal of Nuclear Medicine and Molecular Imaging, vol. 36, no. 4, pp. 560–566, 2009.