ISRN Corrosion

Volume 2013 (2013), Article ID 184787, 6 pages

http://dx.doi.org/10.1155/2013/184787

Research Article

Synergistic Effect of Iodide Ion and 4-Hydroxy Coumarin on the Corrosion Inhibition of Mild Steel in Hydrochloric Acid

Shyamala R. Krishnamurthy and Meenakshi H. N. Parameswaran

Department of Chemistry, Avinashilingam Institute for Home Science and Higher Education for Women, Coimbatore, Tamil Nadu 641043, India

Received 21 May 2013; Accepted 10 June 2013

Academic Editors: C. Gervasi and H. Miao

Copyright © 2013 Shyamala R. Krishnamurthy and Meenakshi H. N. Parameswaran. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

No discussion of the use of inhibitors in acid solution is complete without mentioning the phenomenon of synergism. Synergism also operates in corrosion protection where an enhanced inhibition may be related to interaction between inhibitor compounds. This effect has been observed since the earlier days of inhibitor technology and continues to be a potent tool in the development of acid inhibitors for specialized uses. Hence, in this paper, the corrosion inhibition behavior of mild steel (MS) in 1 M hydrochloric acid in the presence of 4-hydroxy coumarin (4HC) and potassium iodide (KI) has been investigated using the mass loss method and electrochemical techniques. The inhibitive performance of 4HC is considerably enhanced by the addition of KI. The addition of KI to different concentrations of 4HC has intensified its efficiency through considerable reduction in the mass loss, corrosion current density , double layer capacitance , and increase in charge transfer resistance . The calculated synergism parameter “” is greater than unity, thereby proving the fact that the improvement in inhibition efficiency of 4HC, generated by the addition of KI, is due to synergism.

1. Introduction

Synergism literally means joint action of different processes in producing an effect greater than the sum of their individual effects. This effect has been observed since the earlier days of inhibitor technology and continues to be a potent tool in the development of acid inhibitors for specialized uses. In fact, the inhibitive nature of most of the extracts of common plants used to combat corrosion of metals is known to be fortified through synergism of many organic constituents present. In modern practice, inhibitors are rarely used in the form of single compounds. A formulation of two or more organic compounds and/or inorganic compounds is usually employed. The synergistic action of anions on the inhibition of mild steel corrosion in acid solution containing organic compound has been reported by several authors [1–4]. In view of this, the enhancement of protection efficiency of the chosen coumarin inhibitor by iodide ions against mild steel corrosion in 1 M hydrochloric acid has been studied.

2. Experimental Parts

2.1. Synthesis of 4-Hydroxy Coumarin

The microwave assisted synthesis of 4-hydroxy coumarin (4HC) was carried out in an ordinary domestic microwave oven by the von Pechmann reaction of phenol, malonic acid fused ZnCl₂, and a few drops of POCl₃ for 60–40 seconds at 450 W. The mechanism of the reaction is shown in Scheme 1 [5].

Scheme 1: Synthesis of 4-hydroxy coumarin.

2.2. Preparation of the Sample

MS specimens of area 5 × 1 cm² having composition C = 0.049%, Mn = 0.346%, Si = 0.026%, P = 0.038%, S = 0.020%, Cr = 0.050%, Mo = 0.019%, Ni = 0.019%, and the reminder Fe were used for the entire study. MS specimens with an exposed area of 1 cm² were used for polarization and impedance studies. The specimens were degreased, cleaned with fine quality emery sheet, washed with distilled water, and stored in desiccators before they are used for the investigation.

2.3. Weight Loss Method

MS specimens were accurately weighed and fully immersed in 100 mL of 1 M HCl in the absence and presence of the inhibitors, of various concentrations, removed after a particular period of immersion, dipped in sodium bicarbonate solution, (for neutralizing the remaining acid on the specimen), washed, dried, and reweighed. The loss in weight was determined in triplicate and the results were averaged. The experiment was performed for investigating the parameters such as inhibitor concentration (0.001 to 0.01 M), immersion (1 h, 3 h, 6 h, and 12 h), and synergism (presence of 10⁻³ M KI). The rates of corrosion and inhibition efficiency were calculated by the following formulae [6]:

2.4. Polarization Technique

A frequency response analyzer 1280B (Solartron) and an IBM personal computer were used for the polarization study. The cell for the polarization studies was a glass beaker containing the aerated unstirred test solution with a platinum electrode as the counter electrode, a saturated calomel electrode as the reference electrode, and the mild steel electrode as the working electrode. 100 mL of 1 M HCl with and without different concentrations of inhibitors was taken in an electrochemical cell. The polished electrode was then introduced. The electrode was placed at −1 mV cathodic to its open circuit potential. Thus, the potential was scanned at −0.1 mV/sec towards the anodic direction in Tafel extrapolation. Applied potential versus current was plotted and on extrapolation of linear portion to the corrosion potential gives the corrosion current. In anodic and cathodic plots, the slope of the linear portion gave Tafel constants “” and “” respectively. Inhibition efficiency was calculated by the following formula [7, 8]:

2.5. AC Impedance Method

The electrochemical impedance measurements were carried out using mild steel in acid medium with and without an inhibitor using the same potentiostat. A plot of real part of impedance () and imaginary part of impedance () was made, and from this, the charge transfer resistance (), double layer capacitance (), and inhibition efficiency were calculated using ZView software. The inhibitor efficiency was obtained from the electrochemical parameters as below [9–11]

where and are Polarization resistance and charge transfer resistance in the absence of the inhibitor, respectively, and and are Polarization resistance and charge transfer resistance in the presence of the inhibitor, respectively.

3. Results and Discussion

3.1. Mass Loss Method

The values of IE for the specific concentrations of 4HC and in combination with 10−3 M KI are given in Table 1. The interesting feature of the investigation is that the compound gave better inhibitive performance in the presence of M potassium iodide. This enhancement in the IE on the addition of KI occurs due to synergistic effect.

Table 1: %IE in presence of 10⁻³ M KI and synergism parameter.

[Inh]
10⁻³ M KI
0.001
0.003
0.005
0.007
0.009
0.01

1 h

0.1778
0.0500
0.1537
0.2583
0.3718
0.4329
0.5586

—
0.3472
0.4966
0.6200
0.6687
0.7122
0.7920

—
1.1970
1.3820
1.6650
1.5590
1.6200
1.7450

3 h

0.0915
0.0996
0.2727
0.3402
0.4373
0.4460
0.5678

—
0.2610
0.4537
0.4959
0.5820
0.6474
0.7537

—
1.1070
1.2100
1.1890
1.2230
1.4270
1.5940

6 h

0.2799
0.2665
0.3949
0.4164
0.4897
0.5742
0.6252

—
0.5339
0.5814
0.6189
0.6699
0.7307
0.7589

—
1.1330
1.0410
1.1030
1.1130
1.1390
1.1200

12 h

0.1139
0.1483
0.3011
0.3731
0.4592
0.4611
0.4759

—
0.1907
0.3495
0.4346
0.4795
0.5619
0.6764

—
0.9330
0.9520
0.9830
0.9210
1.0900
1.4350

The interaction of inhibitor molecules can be described by the introduction of synergism parameter; was evaluated using the relationship given by Aramaki and Hackerman and reported elsewhere [12, 13]

is the calculated inhibition effect supposing additivity (no interaction between the inhibitor compounds exists). can be expressed as , is the measured inhibition effect of  M KI, is the measured inhibition effect of 4HC, and is the measured inhibition effect for the combination of 4HC and M KI. The values of “,” the synergism parameter, for different concentrations of 4HC in 1 M HCl in combination with iodide ions are higher than unity suggesting the synergistic effect.

3.2. Polarization Measurements

Figures 1 and 2 represent the anodic and cathodic polarization curves of mild steel in 1 M HCl devoid of and containing different concentrations of 4HC and in the presence of  M KI. The electrochemical parameters of mild steel corrosion in free and inhibited 1 M HCl solutions were given in Table 2. It can be seen from the table that as the concentration of the coumarins is increased, there is little change in the corrosion potential. Moreover, the corrosion current () decreases markedly in the presence of the inhibitor, and the magnitude of such an effect increases with increasing inhibitor concentration. These results showed the inhibitive action of the coumarin to corrosion of mild steel in the acidic medium. Also, it can be seen from the table, that the addition of  M KI further reduces the values exhibiting synergism.

Table 2: Electrode kinetic parameters for corrosion of mild steel in 1 M HCl with various concentrations of 4-hydroxy coumarin in the presence and absence of 10⁻³ M KI.

[Inh] M
[KI] M
− mV
mA/cm²
mV/dec
mV/dec
%IE

Blank
—
506
11.12
206
166
—
—

—
10⁻³
503
8.39
199
162
24.55
—

0.001
—
509
10.04
230
180
9.73
1.126

—
10⁻³
496
6.72
152
130
39.52

0.007
—
483
6.54
199
143
41.19
1.197

—
10⁻³
516
4.12
149
152
62.94

0.009
—
492
6.40
180
143
43.17
1.167

—
10⁻³
496
4.08
163
129
63.27

0.010
—
495
4.41
174
154
60.81
1.128

—
10⁻³
509
2.96
126
111
73.39

Figure 1: Tafel plot for corrosion of mild steel in 1 M HCl containing different concentrations of 4-hydroxy coumarin.

Figure 2: Tafel plot for corrosion of mild steel in 1 M HCl containing different concentrations of 4-hydroxy coumarin in the presence of   KI.

The values of inhibition efficiency increase with the increase in coumarin concentrations, reaching the maximum values of 60.81% at 0.01 M. The addition of KI has enhanced the percentage efficiency, which could be attributed to synergistic effect. The presence of synergism has been established by calculating the synergism parameter “” which is recorded in Table 2. Almost all values are greater than unity, thereby proving the fact that the improvement in inhibition efficiency of 4HC generated by the addition of KI is due to synergism.

3.3. Electrochemical Impedance Spectroscopy

Figure 3 represents the Nyquist plot obtained for MS in 1 M HCl in absence and presence of various concentrations of the inhibitor. Impedance responses of acid solution containing various concentrations of the inhibitor in combination with  M KI solution are depicted in Figure 4.

Figure 3: Complex-plane impedance of mild steel in 1 M HCl with different concentrations of 4-hydroxy coumarin.

Figure 4: Complex-plane impedance of mild steel in 1 M HCl with different concentrations of 4-hydroxy coumarin in the presence of  M KI.

The inhibition efficiency was calculated from values applying the following formula:

where is the double layer capacitance value in the presence of the inhibitor and is the double layer capacitance value in the absence of the inhibitor.

The calculated inhibition efficiencies from the values of obtained from the impedance spectra was given in Table 3. The protecting capacity of 4HC was found to be increasing with the increase in its concentration. Due to synergism, the addition of KI has caused an enhancement in the protecting ability.

Table 3: Impedance parameters for corrosion of mild steel in 1 M HCl for different concentration of 4-hydroxy coumarin in the presence and absence of 10⁻³ M KI.

[Inh] M
[KI] M
   cm²
%IE
  μF/cm²
%IE

Blank
—
15.65
—
425
—

—
10⁻³
22.00
28.86
328
22.82

0.001
—
18.03
13.20
385
9.41

—
10⁻³
23.04
32.07
344
19.06

0.003
—
19.71
20.60
376
11.53

—
10⁻³
23.96
34.68
318
25.18

0.007
—
30.12
48.04
280
34.12

—
10⁻³
41.94
62.68
124
70.82

0.009
—
31.44
50.22
278
34.59

—
10⁻³
44.31
64.68
121
71.53

0.010
—
37.48
58.24
149
64.94

—
10⁻³
51.58
69.60
111
73.88

In order to correlate impedance and polarization methods, values were obtained from the Nyquist plots for different concentration of the inhibitor in the absence and presence of  M KI using the Stern-Geary equation [14]:

The obtained and %IE values with different concentrations of 4HC in the absence and presence of KI are given in Table 4.

Table 4: Values of and %IE for corrosion of mild steel in 1 M HCl with different concentrations of 4-hydroxy coumarin in absence and presence of 10⁻³ M KI obtained by Stern-Geary equation.

[Inh] M
[KI] M
mA/cm²
%IE

Blank
—
2.55
—

—
10⁻³
1.76
30.98

0.001
—
2.43
4.71

—
10⁻³
1.01
60.39

0.007
—
1.20
52.94

—
10⁻³
0.78
69.41

0.009
—
1.15
54.90

—
10⁻³
0.71
72.16

0.010
—
0.95
62.75

—
10⁻³
0.50
80.39

The enhanced inhibition efficiency can be explained as due to joint adsorption of iodide ions and inhibitor cations or molecules. When irreversible chemisorption of iodide ions takes place and stable metal-iodide covalent bonds are formed, the iodide ions enter the metallic part of the double layer and the charge of the metal surface, which in turn attracts the positively charged inhibitor cations rendering the adsorption more effective.

Synergism can also happen according to a molecular mechanism. The coumarin cations created as a result of protonation exist only in the solution. On entering the double layer, they become discharged. The molecules produced are adsorbed at the expense of the unpaired electrons of the heteroatom.

4. Conclusions

(1)The inhibition efficiency of the inhibitor increased with the increase in its concentration at all immersion times.(2)The presence of  M KI boosted the inhibitive efficiency of the coumarin.(3)The synergism parameter obtained by the Aramaki and Hackerman equation was found to be greater than unity. This suggests that the enhanced inhibition efficiency caused by the addition of iodide ion is due only to synergistic effect.(4)The concentration dependence of the inhibition efficiency calculated from electrochemical studies has the same trend as that obtained from weight loss measurements.(5)4-Hydroxy coumarin covers both the anodic and cathodic regions through general adsorption. The adsorption occurs through the activated nonbonded electrons on the lactone oxygen, and the electrons of the aromatic rings can adsorb onto the metal surface. Further, the −OH group at the 4th position shifts the electron flow towards the pyranone ring due to +M effect. Also, the oxonium ion formed in the acidic solution can be adsorbed on the metal surface through columbic interaction.

Acknowledgment

The authors would like to thank the authorities of the Avinashilingam Institute for Home Science and Higher Education for Women for providing necessary facilities to carry out this study.

References

K. S. Sudhish, K. S. Ashish, C. M. Lutendo, M. K. Mwadham, and E. E. Eno, “Inhibitive effect of azorubine dye on the corrosion of mild steel in hydrochloric acid medium and synergistic iodide additive,” International Journal of Electrochemical Science, vol. 7, pp. 5057–5068, 2012.

M. Ajmal, A. S. Mideen, and M. A. Quraishi, “2-hydrazino-6-methyl-benzothiazole as an effective inhibitor for the corrosion of mild steel in acidic solutions,” Corrosion Science, vol. 36, no. 1, pp. 79–84, 1994.

A. Y. Musa, A. B. Mohamad, A. A. H. Kadhum, M. S. Takriff, and L. T. Tien, “Synergistic effect of potassium iodide with phthalazone on the corrosion inhibition of mild steel in 1.0M HCl,” Corrosion Science, vol. 53, no. 11, pp. 3672–3677, 2011.

E. E. Ebenso, A. Hailemichael, S. A. Umoren, and I. B. Obot, “Inhibition of mild steel corrosion in sulphuric acid using Alizarin yellow GG dye and synergistic iodide additive,” International Journal of Electrochemical Science, vol. 3, pp. 1325–1339, 2008.

V. K. Ahluwalia and R. Aggarwal, Comprehensive Practical Organic Chemistry, Preparation and Quantitative Analysis, Universities Press, Hyderabad, India, 2000.

R. Saratha, M. Saranya Devi, H. N. Meenakshi, and R. Shyamala, “Enhanced corrosion resistance of Tecoma stans extract on mild steel in 0. 5M H₂SO₄ solution,” International Journal of Current Research, vol. 2, pp. 92–96, 2011.

H. Baeza, M. Guzmán, P. Ortega, and L. Vera, “Corrosion inhibition of copper in 0.5 M hydrochloric acid by 1,3,4-thiadiazole-2,5-dithiol,” Journal of the Chilean Chemical Society, vol. 48, no. 3, pp. 23–26, 2003.

W. A. W. E. Amira, A. A. Rahim, H. Osman, K. Awang, and P. B. Raja, “Corrosion inhibition of mild steel in 1 M HCl solution by Xylopia ferruginea leaves from different extract and partitions,” International Journal of Electrochemical Science, vol. 6, no. 7, pp. 2998–3016, 2011.

S. Ambrish, S. Ashish Kumar, and M. A. Quraishi, “Dapsone: a novel corrosion inhibitor for mild steel in acid media,” The Open Electrochemistry Journal, vol. 2, pp. 43–51, 2010.

M. Z. A. Rafiquee, S. Khan, N. Saxena, and M. A. Quraishi, “Influence of some thiadiazole derivatives on corrosion inhibition of mild steel in formic and acetic acid media,” Portugaliae Electrochimica Acta, vol. 25, pp. 419–434, 2007.

J.-Q. Xue, M. Wu, J.-X. Li, C.-B. Tang, and C.-X. Yin, “Inhibition behavior of a novel acidification inhibitor for steels at high temperature,” Materials Science Forum, vol. 686, pp. 574–578, 2011.

S. A. Umoren and E. E. Ebenso, “The synergistic effect of polyacrylamide and iodide ions on the corrosion inhibition of mild steel in H₂SO₄,” Materials Chemistry and Physics, vol. 106, no. 2-3, pp. 387–393, 2007.

S. A. Umoren, E. E. Ebenso, P. C. Okafor, U. J. Ekpe, and O. Ogbobe, “Effect of halide ions on the corrosion inhibition of aluminium in alkaline medium using polyvinyl alcohol,” Journal of Applied Polymer Science, vol. 103, no. 5, pp. 2810–2816, 2007.

L. Larabi, Y. Harek, M. Traisnel, and A. Mansri, “Synergistic influence of poly(4-vinylpyridine) and potassium iodide on inhibition of corrosion of mild steel in 1M HCl,” Journal of Applied Electrochemistry, vol. 34, no. 8, pp. 833–839, 2004.