ISRN Electronics

Volume 2013 (2013), Article ID 478213, 5 pages

http://dx.doi.org/10.1155/2013/478213

Research Article

A New MISO-Type Voltage-Mode Universal Biquad Using Single VD-DIBA

K. L. Pushkar,¹ D. R. Bhaskar,² and Dinesh Prasad²

¹Department of Electronics and Communication Engineering, Maharaja Agrasen Institute of Technology, Rohini, New Delhi 110086, India

²Department of Electronics and Communication Engineering, F/O Engineering and Technology, Jamia Millia Islamia, Jamia Nagar, New Delhi 110025, India

Received 23 January 2013; Accepted 19 February 2013

Academic Editors: M. Hopkinson and G. Maruccio

Copyright © 2013 K. L. Pushkar et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A new multiple-input single-output-(MISO-)-type multifunction voltage-mode universal biquadratic filter employing single voltage differencing differential input buffered amplifier (VD-DIBA), two capacitors, and one resistor are proposed. The proposed structure can realize second-order low pass, high pass, band pass, band stop, and all pass filter responses without altering the circuit topology. The proposed new filter configuration also provides the following advantageous features, not available simultaneously in any of the single active device /element-based universal biquad in realizing all the five filter functions known earlier so far: (i) no requirement of any passive component(s) matching condition or inversion of input signal(s), (ii) independent electronic control of angular frequency () and bandwidth (BW), and (iii) low active and passive sensitivities. SPICE simulation results have been included using 0.35 µm TSMC technology to confirm the validity of the proposed new universal biquadratic filter configuration.

1. Introduction

Several multiple-input single-output (MISO) or single-input multiple-output (SIMO) type current-mode (CM) or voltage-mode (VM) universal active filters have been described in the literature because of their flexibility and versatility for practical applications. Among these, MISO-type filters are particularly attractive because the same filter structure can be used for different filter functions. Recently, considerable attention has been devoted for the realization of VM or CM filter structures using different types of single active building block/device [1–9]. However, these filter configurations have the drawback of passive component-matching requirement(s) or inversion of input signal(s). Although the MISO-type filter configuration presented in [10] can realize all filter functions without component(s) matching or inversion of input signal(s), it employs no device (only MOSFETs, two capacitors, and two resistors). VD-DIBA is one of the new active building blocks proposed in [11] and has been used in the realization of (i) first-order all-pass filter [12], (ii) simulated inductance circuits [13], and (iii) electronically controllable sinusoidal oscillator [14].

The purpose of this paper is, therefore, to propose a new MISO-type VM universal biquad employing a single VD-DIBA, two capacitors, and a resistor to realize (by appropriate selection of input signal voltage(s)) all the five standard filter functions, namely, low pass (LP), high pass (HP), band pass (BP), band stop (BS), and all pass (AP) without any passive component-matching requirement(s) or inversion of input signal(s) from the same circuit topology. The presented filter configuration also provides (i) independent electronic control of angular frequency () and bandwidth (BW) and (ii) low active and passive sensitivities. The validity of the proposed biquad has been confirmed by SPICE simulations using 0.35 μm TSMC technology.

2. New Filter Configuration

The symbolic notation and behavioral model of the VD-DIBA (−) are shown in Figures 1(a) and 1(b), respectively. The model uses two controlled sources: the current source, controlled by differential voltage , with the transconductance , and the voltage source, controlled by differential voltage , with the unity voltage gain. The VD-DIBA [12] can be described by the following set of equations:

(a)

(b)

Figure 1: (a) Symbolic notation, (b) behavioral model of VD-DIBA [12].

The proposed MISO-type voltage-mode universal biquadratic filter using single VD-DIBA, two capacitors, and a resistor are shown in Figure 2.

Figure 2: The proposed MISO-type voltage-mode universal biquad.

A routine circuit analysis (assuming ideal VD-DIBA) of Figure 2 gives the following expression for the output voltage in terms of input voltages:

From (2), various filter responses can be realized as

(i)If (grounded) and , a low pass filter can be realized as follows.(ii)If and , a high pass filter can be realized.(iii)If and , an inverting band pass filter can be realized.(iv)If and , a band stop filter can be realized.(v)If , an all-pass filter can be realized.

The expressions for natural frequency () and band width (BW) are given by

From (3), it can be observed that after adjusting BW, can independently be controlled electronically through the transconductance . Furthermore, it is seen that no passive component(s) matching or inversion of input signal(s) is required in any of the five filter realizations.

3. Nonideal Analysis and Sensitivity Performance

Considering the nonidealities of the VD-DIBA, let and denote the parasitic resistance and parasitic capacitance of the -terminal and , where , , and , denote the voltage tracking errors, respectively, then the output voltage in terms of inputs is given by

Its active and passive sensitivities can be found as

From (5), it is clearly observed that all passive and active sensitivities are no more than one half in magnitudes for the proposed MISO-type VM universal biquad.

4. Simulation Results

To confirm workability of the proposed biquad filter, the circuit was simulated using CMOS VD-DIBA (as shown in Figure 3). For this purpose, the passive elements were selected as  nF,  KΩ. The transconductance of VD-DIBA was controlled by bias voltage . The SPICE simulated frequency responses of the proposed biquad are shown in Figure 4. Figures 5 and 6 represent the phase and magnitude plots of APF, respectively. Thus, these simulation results confirm the validity of the proposed biquad filter. A comparison with other previously known single active element/device-based MISO-type VM universal biquads has been presented in Table 2.

Figure 3: Proposed CMOS implementation of VD-DIBA, , , , , and .

Figure 4: Frequency response.

Figure 5: Phase plot of APF.

Figure 6: Frequency response of APF.

The CMOS VD-DIBA is implemented using 0.35 μm TSMC real transistors models which are listed in Box 1. Aspect ratios of transistors used in Figure 3 are given in Table 1.

Table 1

Transistor
W/L (µm)

M₁–M₆
14/1

M₇–M₉
14/0.35

M₁₀–M₁₈
4/1

M₁₉–M₂₂
7/0.35

Table 2

Reference
Number of active elements/devices
Number of capacitors
Number of resistors
Is the realization free from matching condition(s)?
Number of standard filters realized

[1]
1
2
2
NO
Five

[2]
1
2
3
NO
Five

[3]
1
2
2
NO
Five

[4]
1
4
4
NO
Five

[5]
1
2
4
NO
Five

[6]
1
2
3
NO
Five

[7]
1
2
2
NO
Five

[8]
1
2
3
NO
Five

[9]
1
2
1
NO
Five

Proposed
1
2
1
YES
Five

.MODEL N NMOS (LEVEL = 3 TOX =  NSUB =  GAMMA = 0.5827871 PHI = 0.7

VTO = 0.5445549 DELTA = 0 UO = 436.256147 ETA = 0 THETA = 0.1749684 KP =

VMAX =  KAPPA = 0.2574081 RSH = 0.0559398 NFS =  TPG = 1 XJ =

LD =  WD =  CGDO =  CGSO =  

CGBO =  CJ =  PB = 0.9758533 MJ = 0.3448504 CJSW =  

MJSW = 0.3508721)

.MODEL P PMOS (LEVEL = 3 TOX =  NSUB =  GAMMA = 0.4083894 PHI = 0.7

VTO = −0.7140674 DELTA = 0 UO = 212.2319801 ETA =  THETA = 0.2020774

KP =  VMAX =  KAPPA = 1.5 RSH = 30.0712458 NFS =  TPG = −1

XJ =  LD =  WD =  CGDO =  CGSO =  

CGBO =  CJ =  PB = 0.8152753 MJ = 0.5 CJSW =

MJSW = 0.5)

Box 1

5. Conclusions

A new second-order voltage-mode MISO-type universal biquad filter has been presented. The proposed configuration employs single VD-DIBA, two capacitors, and one resistor. The presented biquad (by proper selection of input voltages) can yield second-order low pass, high pass, band pass, notch and all pass-filter responses without altering the circuit topology. The proposed filter configuration also provides the following advantages which are not available simultaneously in any of the single active device/element-based universal MISO-type VM biquads realizing all the five filter functions: (i) no requirement of any passive component(s) matching condition or inversion of input signal(s), (ii) independent electronic control of angular frequency () and bandwidth (BW), and (iii) low active and passive sensitivities. Simulation results using 0.35 μm TSMC technology have been included to confirm the feasibility of the new proposed biquad filter.

References

J. Sirirat, W. Tangsrirat, and W. Surakampontorn, “Voltage-mode electronically tunable universal filter employing single CFTA,” in Proceedings of the 7th Annual International Conference on Electrical Engineering/Electronics, Computer, Telecommunications and Information Technology (ECTI-CON '10), pp. 759–763, May 2010.

D. Prasad, D. R. Bhaskar, and A. K. Singh, “Multi-function biquad using single current differencing transconductance amplifier,” Analog Integrated Circuits and Signal Processing, vol. 61, no. 3, pp. 309–313, 2009.

J. W. Horng, “Voltage/current-mode universal biquadratic filter using single CCII+,” Indian Journal of Pure & Applied Physics, vol. 48, no. 10, pp. 749–756, 2010.

A. Ü. Keskin, “Multi-function biquad using single CDBA,” Electrical Engineering, vol. 88, no. 5, pp. 353–356, 2006.

S. A. Bashir and N. A. Shah, “Voltage mode universal filter using current differencing buffered amplifier as an active device,” Circuits and Systems, vol. 3, pp. 1–4, 2012.

N. Herencsar, J. Koton, K. Vrba, and O. Cicekoglu, “Single UCC-N1B 0520 device as a modified CFOA and its application to voltage- and current-mode universal filters,” Applied Electronics, vol. AE2009, pp. 127–130.

N. A. Shah, M. F. Rather, and S. Z. Iqbal, “A novel voltage-mode universal filter using a single CFA,” Active and Passive Electronic Devices, vol. 1, pp. 183–188, 2005.

J. W. Horng, C. K. Chang, and J. M. Chu, “Voltage-mode universal biquadratic filter using single current-feedback amplifier,” IEICE Transactions on Fundamentals of Electronics, Communications and Computer Sciences, vol. E85-A, no. 8, pp. 1970–1973, 2002.

K. L. Pushkar, D. R. Bhaskar, and D. Prasad, “Voltage-mode universal biquad filter employing single voltage differencing differential input buffered amplifier,” Circuits and Systems, vol. 4, no. 1, pp. 44–48, 2012.

I. Myderrizi, S. Minaei, and E. Yuce, “An electronically fine-tunable multi-inputsingle-output universal filter,” IEEE Transactions on Circuits and Systems II, vol. 58, no. 6, pp. 356–360, 2011.

D. Biolek, R. Senani, V. Biolkova, and Z. Kolka, “Active elements for analog signal processing: classification, review, and new proposals,” Radioengineering, vol. 17, no. 4, pp. 15–32, 2008.

D. Biolek and V. Biolkova, “First-order voltage-mode all-pass filter employing one active element and one grounded capacitor,” Analog Integrated Circuits and Signal Processing, vol. 65, no. 1, pp. 123–129, 2010.

D. Prasad, D. R. Bhaskar, and K. L. Pushkar, “Realization of new electronically controllable grounded and floating simulated inductance circuits using voltage differencing differential input buffered amplifiers,” Active and Passive Electronic Components, vol. 2011, Article ID 101432, 8 pages, 2011.

D. Prasad, D. R. Bhaskar, and K. L. Pushkar, “Electronically controllable sinusoidal oscillator employing CMOS VD-DIBAs,” ISRN Electronics, vol. 2013, Article ID 823630, 6 pages, 2013.