International Journal of Spectroscopy

Volume 2013 (2013), Article ID 502310, 6 pages

http://dx.doi.org/10.1155/2013/502310

Research Article

Development and Validation of First-Order Derivative Spectrophotometry for Simultaneous Determination of Levocetirizine Dihydrochloride and Phenylephrine Hydrochloride in Pharmaceutical Dosage Form

Kaminee Parmar,¹ Sunil Baldania,¹ Dimal Shah,¹ Usmangani Chhalotiya,¹ and Naimin Parmar²

¹Department of Pharmaceutical Analysis, Indukaka Ipcowala College of Pharmacy, Beyond GIDC Phase IV, P.O. Box 53, Vithal Udyog Nagar, New Vallabh Vidyanagar 388 121, Gujarat, India

²Department of Pharmaceutics, Parul Institute of Pharmacy and Research, Limda, Ta. Waghodia, Vadodara 391 760, Gujarat, India

Received 28 February 2013; Revised 17 May 2013; Accepted 8 June 2013

Academic Editor: L. J. Ming

Copyright © 2013 Kaminee Parmar et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A simple, precise, accurate, and economical spectrophotometric method has been developed for simultaneous estimation of levocetirizine dihydrochloride (LCT) and phenylephrine hydrochloride (PHE) by employing first-order derivative spectrophotometric method. The first-order derivative absorption at 240 nm (zero crossing point of PHE) was used for quantification of LCT and 283.2 nm (zero crossing point of LCT) for quantification of PHE. The linearity was established over the concentration range of 4–24 μg/mL and 8–48 μg/mL for LCT and PHE with correlation coefficients () 0.9964 and 0.9972, respectively. The mean % recoveries were found to be in the range of 99.14%–100.43% for LCT and 98.73%–100.83% for PHE. The proposed method has been validated as per ICH guideline and successfully applied for the simultaneous estimation of LCT and PHE in combined tablet dosage form.

1. Introduction

The chemical name of levocetirizine dihydrochloride (LCT) is [2-[4-[(R)-(4-Chlorophenyl)phenylmethyl]-1-piperazinyl]ethoxy]-acetic acid dihydrochloride [1]. The structure of LCT is given in Figure 1. LCT is a third generation nonsedative antihistamine, developed from the second generation antihistamine cetirizine. Chemically, LCT is the active L-enantiomer of cetirizine racemate. It works by blocking H₁ histamine receptors. It is used in the treatment of the allergic rhinitis and conjunctivitis, hay fever, pollinosis—control sneezing, runny but not blocked nose, and red, watering, and itchy eyes [2].

Figure 1: Chemical structure of LCT.

The chemical name of phenylephrine hydrochloride (PHE) is (R)-3-Hydroxy-alpha [(methylamino)methyl]benzenemethanol hydrochloride [3]. The structure of PHE is given in Figure 2. PHE is a direct acting sympathomimetic agent. It is a selective adrenoceptor agonist and has negligible action. It is also a vasoconstrictor, because it has little cardiac action. It is mainly used as a nasal decongestant and for producing mydriasis when cycloplegia is not required. It tends to reduce intraocular tension by constricting ciliary body blood vessels [2].

Figure 2: Chemical structure of PHE.

LCT and PHE in combined dosage form are used as a nasal decongestant.

The review of the literature revealed that various analytical methods involving spectrophotometry, HPLC, HPTLC, and LC-MS have been reported for LCT alone and in combination with other drugs [4–14]. Several analytical methods have been reported for PHE alone and in combination with other drugs including spectrophotometry, HPLC, HPTLC, LC-MS/MS, and electrophoresis [15–23]. However, to the best of our knowledge, no spectrophotometric method is published for the simultaneous determination of LCT and PHE in tablet dosage form. The present work describes the development of a simple, precise, accurate, and reproducible spectrophotometric method for the simultaneous estimation of LCT and PHE in combined dosage forms. The developed method was validated in accordance with ICH guideline and successfully employed for the assay of LCT and PHE in combined tablet dosage form.

2. Materials and Methods

2.1. Chemicals and Reagents

Analytically, pure LCT and PHE were provided as gratis samples by Baroque Pharmaceuticals, Khambhat, Gujarat, India. Tablet of LCT and PHE, levocet-D⁺ manufactured by Hetero Healthcare Ltd., Hyderabad, India, and rinostat-L manufactured by RPG Life Sciences Ltd., Maharashtra, India, were purchased from a local pharmacy.

2.2. Instruments

A Shimadzu UV-Visible 1700 PharmaSpec double beam spectrophotometer with a wavelength accuracy (0.3 nm), 1 cm matched quartz cells, and UV probe 2.34 software was used. Calibrated analytical balance Shimadzu BP211D (Sartorius Gottingen AG, Germany) was used for weighing purpose. All statistical calculations were carried out using Microsoft Excel 2007 analytical tool.

2.3. Preparation of Standard Stock Solutions

Accurately weighed 25 mg of LCT and PHE standards was transferred to a separate 25 mL volumetric flask and dissolved in 10 mL distilled water. The flasks were shaken and volume was made up to the mark with distilled water. These solutions are 1000 µg/mL LCT and 1000 µg/mL PHE respectively.

2.4. Selection of Analytical Wavelength

Working standard solutions of 4–24 μg/mL of LCT and 8–48 μg/mL of PHE were prepared in distilled water by appropriate dilution, and the spectrum was recorded between 200 and 400 nm, and all zero-order spectrums (D⁰) were converted to first derivative spectrums (D¹) using delta lambda 2 and scaling factor 7. The overlain first derivative spectrums of LCT and PHE at different concentrations were recorded. The zero crossing point (ZCP) of LCT was found to be 283.2 nm, and ZCP of PHE was found to be 240 nm.

2.5. Method Validation [24]

The proposed method was validated in terms of linearity, accuracy, precision, limits of detection (LOD) and quantification (LOQ), and reproducibility. The accuracy was expressed in terms of percent recovery of the known amount of the standard drugs added to the known amount of the pharmaceutical dosage forms. The precision (% relative standard deviation—% RSD) was expressed with respect to the repeatability, intraday, and interday variation in the expected drug concentrations. After validation, the developed methods have been applied to pharmaceutical dosage form.

2.6. Linearity

Appropriate volume of aliquot from LCT and PHE standard stock solution was transferred to volumetric flask of 10 mL capacity. The volume was adjusted to the mark with distilled water to give working standard solutions containing 4–24 μg/mL for LCT and 8–48 μg/mL for PHE respectively. All D¹ spectra were recorded using the above spectrophotometric condition. D¹ absorbance at 240 nm and 283.2 nm was recorded for LCT and PHE, respectively, . Calibration curves were constructed by plotting average absorbance versus concentrations for both drugs. Straight line equations were obtained from these calibration curves.

2.7. Accuracy

Accuracy was assessed by the determination of the recovery of the method by addition of standard drug to the prequantified sample preparation at 3 different concentration levels 80, 100, and 120%, taking into consideration percentage purity of added bulk drug samples. Each concentration was analyzed 3 times, and average recoveries were measured.

2.8. Precision

The repeatability was evaluated by assaying 6 times the sample solution prepared for assay determination. The intraday and interday precision study of LCT and PHE was carried out by estimating different concentrations of LCT (12, 16, and 20 μg/mL) and PHE (24, 32, and 40 μg/mL), 3 times on the same day and on 3 different days (first, second, third) and the results are reported in terms of % RSD.

2.9. Detection Limit and Quantitation Limit

ICH guideline describes several approaches to determine the detection and quantitation limits. These include visual evaluation, signal-to-noise ratio, and the use of standard deviation of the response and the slope of the calibration curve. In the present study, the LOD and LOQ were based on the third approach and were calculated according to the 3.3 /S and 10 /S criterions, respectively, where is the standard deviation of the -intercepts of the regression lines and is the slope of the calibration curve.

2.10. Reproducibility

The absorbance readings were measured at a different laboratory for sample solution using another spectrophotometer by another analyst, and the values obtained were evaluated using t-test to verify their reproducibility.

2.11. Determination of LCT and PHE in Their Combined Tablet Dosage Form

Twenty tablets were weighed accurately. A powder quantity equivalent to 10 mg PHE and 5 mg LCT was accurately weighed and transferred to volumetric flask of 100 mL capacity. 50 mL of distilled water was transferred to this volumetric flask and sonicated for 15 min. The flask was shaken, and the solution was filtered through Whatman filter paper (0.45 μ). Then, the volume was made up to the mark with distilled water. From this solution, the 2.4 mL was transfer to 10 mL volumetric flask. The volume was adjusted to the mark with the distilled water to give a solution containing 12 μg/mL of LCT and 24 μg/mL of PHE. The resulting solution was analyzed by the proposed method. The quantitation was carried out by keeping these values to the straight line equation of the calibration curve.

3. Results and Discussion

First-order derivative spectrophotometric method was developed for determination of LCT and PHE.

The overlain first-order derivative spectrum of LCT and PHE at different concentrations revealed that at 283.2 nm a different concentration of LCT possesses zero D¹ absorbance, whereas PHE possesses significant D¹ absorbance (Figure 3). In a similar manner, at 240 nm different concentrations of PHE possess zero D¹ absorbance, whereas LCT possesses significant D¹ absorbance (Figure 4). Considering the above facts, wavelengths 283.2 nm and 240 nm were selected for the estimation of PHE and LCT, respectively. Figure 5 shows overlain D¹ spectra of LCT and PHE at different concentrations.

Figure 3: Overlain D¹ spectra of LCT in distilled water.

Figure 4: Overlain D¹ spectra of PHE in distilled water.

Figure 5: Overlain D¹ spectra of LCT and PHE in distilled water.

The proposed method has been extensively validated as per ICH guidelines. Summary of validation parameters for the proposed method is given in Table 1.

Table 1: Summary of validation parameters.

Parameters
LCT
PHE

% Recovery
99.14%–100.43%
98.73%–100.83%

Precision (% RSD)

    Repeatability ()

    Intraday ()
0.53–0.66
0.79–1.11

    Interday ()
0.87–1.10
1.01–1.60

Limit of detection (μg/mL)

Limit of quantification (μg/mL)

Solution stability
Stable for 24 hrs.
Stable for 24 hrs.

Linearity was assessed for LCT and PHE by plotting calibration curves of the D¹ absorbance versus the concentration over the concentration range 4–24 μg/mL and 8–48 μg/mL, respectively. The correlation coefficients for LCT and PHE were found to be 0.9964 and 0.9972, respectively (Table 2). The following equations for straight line were obtained for LCT and PHE:

Table 2: Statistical data of LCT and PHE.

Parameters
LCT at 240 nm
PHE at 283.2 nm

Linear range
4–24 μg/mL
8–48 μg/mL

Slope

Intercept

Standard deviation of intercept

Regression coefficient ()

The % recoveries were found to be 99.14%–100.43% for LCT and 98.73%–100.83% for PHE (Table 3). Precision was determined by repeatability, intraday, and interday variation for both drugs and was expressed as % RSD (Tables 4 and 5).

Table 3: Accuracy data.

Drug
Level
Amount taken (total) (μg/mL)
Amount added

(μg/mL)
Amount

recovered

(μg/mL)
% Recovery ± SD

LCT
80%

100%

120%

PHE
80%

100%

120%

Table 4: Precision data at 240 nm for LCT.

Conc.

(μg/mL)
Intraday

Mean ± S.D. ()
% RSD
Interday

Mean ± S.D. ()
% RSD

Table 5: Precision data at 283.2 nm for PHE.

Conc.

(μg/mL)
Intraday

Mean ± S.D. ()
% RSD
Interday

Mean ± S.D. ()
% RSD

The proposed spectrophotometric method was successfully applied to LCT and PHE in combined tablet dosage form as shown in Figures 6 and 7 (Table 6).

Table 6: Assay results of marketed formulations.

Formulation
Drug
Labeled

claim

(mg)
Amount found per tablet

(mg)
% Label

Claim ± S.D.

Levocet-D⁺
LCT

PHE

Rinostat-L
LCT

PHE

Figure 6: D¹ spectrum of marketed formulation 1.

Figure 7: D¹ spectrum of marketed formulation 2.

4. Conclusion

The proposed first-order derivative method provides simple, specific, precise, and accurate quantitative analysis for simultaneous determination of LCT and PHE in combined tablet dosage form. The method was validated as per ICH guidelines in terms of linearity, accuracy, precision, limits of detection (LOD) and quantification (LOQ), and reproducibility. The proposed method can be used for routine analysis and quality control assay of LCT and PHE in combined dosage form.

Acknowledgments

The authors are thankful to Baroque Pharmaceuticals (Khambhat, India) for providing gratis sample of both drugs. The authors are also heartily thankful to Indukaka Ipcowala College of Pharmacy (New Vallabh Vidyanagar) for funding the entire project and providing the necessary facilities for the research work.

References

Indian Pharmacopoeia and Government of India, “The Indian pharmacopoeia commission,” Ghaziabad, India, Ministry of Health & Family Welfare, vol.2, pp. 672–673, vol.3, pp. 936–937, 2007

K. D. Tripathi, Essentials of Medical Pharmacology, Brothers Limited, 6th edition, 2008.

The Merck Index, Merck Research Lab., Division of Merck & Co, 13th edition, 1370.

P. Shende, V. Shah, D. Ghodke, R. Shah, S. Patil, and D. Chougule, “Validation of UV Spectrophotometric method for estimation of Levocetirizine Dihydrochloride in bulk and pharmaceutical formulation,” Journal of Pharmacy Research, vol. 3, no. 10, pp. 2386–2387, 2010.

S. Chauhan, D. Dasadiya, and S. Patel, “Method development and validation of levocetirizine bulk powder and pharmaceutical formulation with UV spectrophotometric analysis,” International Research Journal of Pharmacy, vol. 3, no. 5, pp. 338–341, 2012.

N. K. Patel and S. S. Pancholi, “Spectrophotometric determination of Montelukast sodium and Levocetirizine dihydrochloride in tablet dosage form by AUC curve method,” Der Pharma Chemica, vol. 3, no. 5, pp. 135–140, 2011.

S. S. Merukar, P. S. Mhaskar, S. R. Bavaskar, K. B. Burade, and P. N. Dhabale, “Simultaneous spectrophotometric methods for estimation of levocetirizine and pseudoephedrine in pharmaceutical tablet dosage form,” Journal of Pharmaceutical Sciences and Research, vol. 1, no. 2, pp. 38–42, 2009.

S. L. Prabu, A. Shirwaikar, A. Shirwaikar, C. Kumar, and G. Kumar, “Simultaneous UV spectrophotometric estimation of ambroxol hydrochloride and levocetirizine dihydrochloride,” Indian Journal of Pharmaceutical Sciences, vol. 70, no. 2, pp. 236–238, 2008.

Z. U. Siddiqui and S. Arif Kazmi, “A new reverse phase HPLC method for analysis of levocetirizine dihydrochloride in raw materials and tablets,” Karachi University Journal of Science, vol. 39, no. 1-2, pp. 32–36, 2011.

S. R. Dhaneshwar, J. V. Salunkhe, and V. K. Bhusari, “Validated HPLC method for simultaneous quantitation of levocetirizine hydrochloride and nimesulide in bulk drug and formulation,” International Journal of Comprehensive Pharmacy, vol. 2, no. 2, pp. 1–4, 2011.

S. K. Kamarapu, Vaijayanthi, Z. E. A. Bahlul, and R. K. Venisetty, “Development of RP-HPLC method for the analysis of levocetirizine. 2HCl and ambroxol. HCl in combination and its application,” International Journal of Pharmaceutical Sciences and Nanotechnology, vol. 3, no. 1, pp. 893–896, 2010.

J. M. Reddy, M. R. Jeyaprakash, K. Madhuri, S. N. Meyyanathan, and K. Elango, “A sensitive RP-HPLC method for simultaneous estimation of diethylcarbamazine and levocetirizine in tablet formulation,” Indian Journal of Pharmaceutical Sciences, vol. 73, no. 3, pp. 320–323, 2011.

S. Ramalingam, R. Manavalan, and V. Kannappan, “HPLC method for the simultaneous determination of Levocetirizine, Ambroxol and Montelukast in human Plasma employing response Surface Methodology,” International Journal of Drug Development and Research, vol. 4, no. 3, pp. 173–185, 2012.

S. R. Dhaneshwar, K. S. Rasal, V. K. Bhusari, J. V. Salunkhe, and A. L. Suryan, “Validated HPTLC method for simultaneous estimation of levocetirizine hydrochloride and nimesulide in formulation,” Der Pharmacia Sinica, vol. 2, no. 4, pp. 117–124, 2011.

I. Savić, G. Nikolić, and V. Banković, “Development and validation of spectrophotometric method for phenylephrine hydrochloride estimation in nasal drops formulations,” Macedonian Journal of Chemistry and Chemical Engineering, vol. 27, no. 2, pp. 149–156, 2008.

L. K. Soni, T. Narsinghani, and C. Saxena, “UV-Spectrophotometric estimation of Ebastine and Phenylephrine Hydrochloride in tablet dosage form using absorption ratio method,” Der Pharmacia Sinica, vol. 2, no. 6, p. 11, 2011.

R. S. Wagh, R. A. Hajare, A. Tated, and A. V. Chandewar, “Absorption correction method and simultaneous equation method for the simultaneous estimation of ebastine and phenylephrine hydrochloride in bulk and in combined tablet dosage form,” International Journal of Research in Pharmacy and Chemistry, vol. 1, no. 4, pp. 812–819, 2011.

R. Sawant, R. Joshi, P. Lanke, and L. Bhangale, “Simultaneous estimation & validation of paracetamol, phenylephrine hydrochloride and chlorpheniramine maleate in tablets by spectrophotometric method,” Journal of Pharmaceutical Research and Health Care, vol. 3, no. 2, pp. 23–28, 2011.

R. S. Wagh, R. A. Hajare, A. G. Tated, P. A. Gadbail, F. A. Khan, and S. D. Kayal, “Method development and validation for simultaneous determination of ebastine and phenylephrine hydrochloride in tablet formulation by RP-HPLC,” Journal of Pharmaceutical Research and Development, vol. 3, no. 7, pp. 214–220, 2011.

M. Maithani, R. Raturi, G. Vertika, A. Chaudhary, G. Anand, and R. Singh, “Development and validation of a RP-HPLC method for the determination of chlorpheniramine maleate and phenylephrine in pharmaceutical dosage form,” International Journal of Comprehensive Pharmacy, vol. 5, no. 5, pp. 1–5, 2010.

E. C. Demiralay, E. C. Demiralay, M. Gümüştaş, and H. Canbay, “Validation of method for simultaneous determination of paracetamol and phenylephrine in pharmaceutical formulation by reverse phase liquid chromatography,” International Journal of Comprehensive Pharmacy, vol. 2, no. 6, pp. 11–15, 2011.

A. Marín, E. García, A. García, and C. Barbas, “Validation of a HPLC quantification of acetaminophen, phenylephrine and chlorpheniramine in pharmaceutical formulations: capsules and sachets,” Journal of Pharmaceutical and Biomedical Analysis, vol. 29, no. 4, pp. 701–714, 2002.

P. V. Devarajan, M. H. Adani, and A. S. Gandhi, “Simultaneous determination of lignocaine hydrochloride and phenylephrine hydrochloride by HPTLC,” Journal of Pharmaceutical and Biomedical Analysis, vol. 22, no. 4, pp. 685–690, 2000.

ICH Harmonized Tripartite Guidelines, Validation of Analytical Procedures: Text and Methodology, Q2(R1), Geneva, Switzerland, 2005.