Chromatography Research International

Volume 2013 (2013), Article ID 676501, 9 pages

http://dx.doi.org/10.1155/2013/676501

Research Article

Implementation of QbD Approach to the Analytical Method Development and Validation for the Estimation of Propafenone Hydrochloride in Tablet Dosage Form

Monika L. Jadhav and Santosh R. Tambe

Pharmaceutical Chemistry Department, M.G.V’s Pharmacy College, Panchavati, Nashik 422003, India

Received 9 January 2013; Accepted 26 February 2013

Academic Editor: Irene Panderi

Copyright © 2013 Monika L. Jadhav and Santosh R. Tambe. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Chromatographic and spectrophotometric methods were developed according to Quality by Design (QbD) approach as per ICH Q8(R2) guidelines for estimation of propafenone hydrochloride in tablet dosage form. QbD approach was carried out by varying various parameters and these variable parameters were designed into Ishikawa diagram. The critical parameters were determined by using principal component analysis as well as by observation. Estimated critical parameters in HPTLC method include solvent methanol, mode of detection absorbance, precoated aluminium backed TLC plate (10 cm 10 cm), wavelength: 250 nm, saturation time: 20 min, band length: 8 mm, solvent front: 70 mm, volume of mobile phase: 5 mL, type of chamber: 10 cm 10 cm, scanning time: 10 min, and mobile phase methanol : ethyl acetate : triethylamine (1.5 : 3.5 : 0.4 v/v/v). Estimated critical parameters in zero order spectrophotometric method were solvent methanol, sample preparation tablet, wavelength: 247.4 nm, slit width: 1.0, scan speed medium, and sampling interval: 0.2, and for first order derivative spectrophotometric method it was scaling factor: 5 and delta lambda 4. The above methods were validated according to ICH Q2(R1) guidelines. Proposed methods can be used for routine analysis of propafenone hydrochloride in tablet dosage form as they were found to be robust and specific.

1. Introduction

Quality by Design approach suggests looking into the quality of analytical process during the development stage itself. It says that quality should be built into the process design rather than testing into final results of analytical process [1]. QbD is defined as “a systematic approach to development that begins with predefined objectives and emphasizes product and process understanding based on sound science and quality risk management” [2]. In alignment with the approach proposed in the draft FDA guidance for process validation, a three-stage approach [3] can be applied to method validation.

Stage 1. Method Design. Define method requirements and conditions and identify critical controls.

Stage 2. Method Qualification. Confirm that the method is capable of meeting its design intent.

Stage 3. Continued Method Verification. Gain ongoing assurance to ensure that the method remains in a state of control during routine use.

A critical function of Stage 1 is the design of an Analytical Target Profile (ATP) for the method. To design the ATP, it is necessary to determine the characteristics that will be indicators of method performance for its intended use. These are selected from the performance characteristics described in ICH Q2 as per the traditional approach [4]. Instead of being applied in a tick box manner, they are investigated by a risk assessment exercise as described in ICH Q9 [5] in combination with carefully designed development studies to identify the critical method and sources of variation [6]. Variables are then investigated by robustness and ruggedness experiments to understand the functional relationship between method input variables and each of the method performance characteristics and the results are compared to the desired outcome defined in the ATP. From this, one can identify a set of operational method controls. Also, having evaluated the critical method parameters and gained a better understanding of the method through structured experimentation, a control strategy can be built into the method to ensure a consistent performance throughout its life cycle [7]. A key advantage of the QbD approach for all of the above situations is the flexibility to perform a qualification against the specific ATP defined for the intended use of the method [8].

Propafenone hydrochloride (PFH) (Figure 1) is Class 1C antiarrhythmic drug with local anesthetic effects and a direct stabilizing action on myocardial membranes [9]. Literature survey revealed that few chromatographic methods including enantiomeric separation using chiral stationary phases [10, 11] and liquid chromatography mass spectrometry [12] have been reported for determination of PFH from pharmaceutical formulation and biological fluids. Reported methods included use of chiral columns such as chiral AGP chiral pack AD [13] and involves various sophisticated techniques such as selected reaction monitoring mode via electrospray ionization [14]. Hence, it was planned to develop simple, economical, and less time consuming methods including High Performance Thin Layer Chromatographic method (method 1), zero order spectrophotometric method (method 2), and first order spectrophotometric method (method 3) for estimation of PFH using QbD approach. Applying the principles of QbD to analytical methods could result in more robust methods which produce consistent, reliable, and quality data throughout the life cycle and in turn will lead to less method incidents when used in the routine environment. This would mean less time spent on investigations and ultimately save time and money.

Figure 1: Chemical structure of propafenone hydrochloride.

2. Implementation of QbD Approach

According to ICH Q8 (R2) guidelines, an experimental work was planned and QbD approach was implemented as follows.

2.1. Method Design

The method design stage includes establishing the method performance requirements, developing a method that will meet these requirements and then performing appropriate studies to understand the critical method variables that must be controlled to assure the method is robust and rugged.

2.2. Method Performance Requirements

Utilizing a QbD approach, it is essential at this stage that sufficient thought be given to the intended use of the method and that the objectives or performance requirements of the method be fully documented. This represents the Analytical Target Profile (ATP) [15] for the method.

ATP is the estimation of propafenone hydrochloride in tablet dosage form using spectrophotometric and chromatographic methods.

2.3. Method Development

Once the ATP has been defined, an appropriate technique and method conditions must be selected in order to meet the requirements of the ATP.

2.3.1. Method Understanding

Based on an assessment of risk (i.e., the method complexity and the potential for robustness and ruggedness issues) one can perform an exercise focused on understanding the method to better understand what impact key input variables might have on the method’s performance characteristics. From this, one can identify a set of operational method controls.

2.3.2. Risk Assessment

Experiments can be run to understand the functional relationship between method input variables and each of the method performance characteristics. Knowledge accumulated during the development and initial use of the method provides input into a risk assessment (using tools such as the Fishbone diagram and FMEA) which may be used to determine which variables need studying and which require controls.

2.3.3. Design of Experiments

Robustness experiments are typically performed on parametric variables using Design of Experiments (DoE) to ensure that maximum understanding is gained while minimizing the total number of experiments. Depending on the type of method, surrogate measures of characteristics such as accuracy or precision may be evaluated.

2.4. Method Design Output

A set of method conditions will have been developed and defined which are expected to meet the ATP. Those conditions will have been optimized based on understanding of their impact on method performance.

QbD-based treatment of the robustness of an analytical method requires the assessment of all parameters (factors) which most strongly influence selectivity (results) alone and in combination. The experimental verification of many factors simultaneously is impractical and associated with extreme technical difficulties and expense. Some authors, have employed statistical studies, such as Plackett-Burman or fractional factorial designs and risk-based approaches [16–20] to overcome the challenge and reduce the experimental workload. Other procedures include running automated robustness experiments [21–24]. The present paper, however, employs statistical analysis that is principal component analysis which exhibits factor extraction of variable parameters to evaluate robustness.

3. Materials and Methods

3.1. Chemicals and Reagents

PFH was procured from Procos and RLD Ltd., India. All chemicals and reagents used were of analytical grade and purchased from Merck chemicals, India. As the marketed formulation was not available, the internal formulation was prepared as tablet dosage form.

3.2. Instrumentation

Chromatographic measurements were carried out using Camag HPTLC, Wincats 1.4.2 software, Linomat 5 applicator, twin trough chamber, 100 μL syringe, and TLC scanner 3. Spectrophotometric measurements were carried out using a double beam UV visible spectrophotometer of Shimadzu UV-2450 PC (Japan), UV Probe 2.21 software, and 10 mm path length with 1 cm quartz cells.

3.3. Chromatographic Conditions

Standard stock solution (400 ng–2400 ng) and internal standard paracetamol (200 μg/mL) were applied in the form of bandwidth 8 mm on precoated silica gel 60 F₂₅₄ (10 cm ×  10 cm ×  0.2 mm thickness) plates using Camag Linomat 5 applicator. A constant application rate 120 nL/sec was employed and space between two bands was 14.0 mm. The mobile phase methanol : ethyl acetate :  triethylamine (1.5 : 3.5 : 0.4 v/v) was used. Linear ascending development was carried out in twin trough glass chamber of dimension 10 cm × 10 cm, saturated with mobile phase for 20 min at room temperature (25 ± 2°C). The length of chromatogram run was 70 mm. Subsequent to the development, TLC plates were dried in current of air. Densitometric scanning was performed using Camag TLC scanner 3 in the absorbance mode at wavelength 250 nm (Figure 2).

Figure 2: Densitogram of PFH and paracetamol (internal standard) for method 1.

3.4. Spectrophotometric Conditions

For the selection of analytical wavelength, standard solution of PFH was scanned in the spectrum mode from 400 nm to 200 nm. From the spectrum, λ max of PFH, 247.4 nm (Figure 3) was selected for method 2. Then it was transformed to its first derivative spectrum. It was found that PFH showed maximum amplitude at 219.2 nm (Figure 4) which was selected for method 3.

Figure 3: Spectrum of PFH in Methanol for method 2.

Figure 4: Linearity spectra of PFH in Methanol for method 3.

3.5. Preparation of Stock Standard and Working Solution

For both chromatographic and spectrophotometric methods, methanol was used as a solvent. Stock solution was prepared by dissolving 10 mg of PFH in 10 mL volumetric flask and dissolved in methanol to obtain 1000 μg/mL concentration. Working solution (50 μg/mL) was used for initial spectral scan in spectrophotometric method and further dilutions for linearity were prepared from stock solution.

3.6. Linearity Studies

Method 1. From the stock standard solution (1000 μg/mL) 0.4, 0.8, 1.2, 1.6, 2.0, and 2.4 μL was applied on HPTLC plate to obtain the concentration of 400 to 2400 ng per band and 0.2 μL of internal standard (paracetamol 100 μg/mL) was over spotted on each band. The plate was developed and scanned as per the optimized chromatographic conditions. values and peak area were recorded for each concentration of drug. The calibration curve was plotted as drug concentration versus relative peak area. Regression equation, correlation coefficient, slope, and -intercept are reported.

Method 2. Aliquot portions of about 0.1, 0.2, 0.3, 0.4, and 0.5 mL of standard stock solution (1000 μg/mL) were transferred to five different 10 mL volumetric flask and volume was made up to the mark with methanol (10–50 μg/mL). Absorbances were recorded for each concentration at 247.4 nm. Calibration graph was constructed by plotting absorbances versus concentrations in μg/mL. The regression equation and correlation coefficient are computed.

Method 3. A working standard of 100 μg/mL was prepared from standard stock solution. From this, aliquot portions of about 0.5, 1.0, 1.5, 2.0, 2.5, and 3.0 mL were transferred to six different 10 mL volumetric flask and volume was made to the mark with methanol (5–30 μg/mL). These solutions were scanned in the spectrum mode from 400 nm to 200 nm. Then it was transformed to its first derivative spectrum and amplitudes were noted at 219.2 nm. Calibration graph was constructed by plotting amplitudes versus concentrations in μg/mL. The regression equation and correlation coefficient were calculated.

3.7. Estimation of PFH in Standard Mixture and Tablet Dosage Form

PFH was estimated by preparing standard mixture of label claim 150 mg and it was diluted to make 15 μg/mL for methods 2 and 3. For method 1, the concentration of 1500 ng was applied on plate and then percentage amount was calculated (Table 1).

Table 1: Estimation of PFH in standard mixture.

Method
Amount taken ()
Amount found (%)
% RSD

1
1500 ng
101.3
0.93

2
15 µg/mL
100.5
0.67

3
15 µg/mL
101.4
1.04

For the estimation in tablet dosage form, the internal formulation (tablet) containing PFH equivalent to 150 mg was used. Twenty tablets were weighed and average weight was noted. Then the tablets were triturated and powder equivalent to average weight was weighed and transferred to 10 mL volumetric flask and diluted with 6 mL methanol. It was shaken for five minutes and this solution was filtered immediately through Whatman filter paper No. 41. Volume was adjusted up to the mark with methanol to obtain concentration 15000 μg/mL. From this solution, dilutions were made according to respective method and percentage amount was calculated (Table 2).

Table 2: Estimation of PFH in tablet.

Method
Amount taken ()
Amount found (%)
% RSD

1
1500 ng
98.83
0.84

2
15 µg/mL
99.05
1.24

3
15 µg/mL
99.49
0.97

3.8. Determination of Variable Parameters for Method 1

Variable parameters for method 1 were designed as Ishikawa diagram (Figure 5). For all the variable parameters plates were developed according to optimized method except changing particular variable parameter. Plates were scanned for each variable parameter and relative values and peak area were noted. Saturation time for the plate development was varied at various time intervals such as 0 min, 10 min, 15 min, 20 min, 25 min, 30 min, 45 min, and 60 min. Band lengths were varied as 2 mm, 4 mm, 6 mm, 8 mm, 10 mm, and 12 mm. Also, development of chromatographic plate was performed by varying solvent front position of mobile phase. Various solvent fronts selected include 50 mm, 60 mm, 70 mm, 80 mm, and 90 mm. Mobile phase volume was varied as 5 mL, 10 mL, and 15 mL. Development of plates was performed in three different types of twin trough chamber that are 10 cm  ×  10 cm, 20 cm  ×  10 cm, and 20 cm  ×  20 cm. Duration of scanning after the development of plate was varied. Scanning time was altered in portions of time intervals that are 5 min, 10 min, 20 min, 30 min, 45 min, 60 min, 2 hour, 5 hour, 1 day, 2 days, and 3 days. After the development of plate, scanning wavelength was also varied. The plate was scanned at 247 nm, 250 nm, and 254 nm. The composition of mobile phase was modified slightly and the variation in relative values and peak area was observed. Four mobile phase compositions were used as listed in the following.

 Mobile phase 1: methanol : ethyl acetate : triethylamine (1.5 : 3.5 : 0.1 v/v). Mobile phase 2: methanol : ethyl acetate : triethylamine (1.5 : 3.5 : 0.2 v/v). Mobile phase 3: methanol : ethyl acetate : triethylamine (2 : 3 : 0.4 v/v). Mobile phase 4: methanol : ethyl acetate : triethylamine (2.5 : 2.5 : 0.4 v/v).

Figure 5: Ishikawa diagram for method 1.

Different detection mode at the stage of detection was selected. Detection was done in absorbance mode, reflectance mode, and fluorescent mode. Plate used for the development was not prewashed with methanol and plate development was carried out as such. Plate for the development was not activated in oven. Such plate was developed and results were recorded as relative values and peak area. Glass plate was used for development by maintaining all the standard conditions and results were observed.

3.9. Determination of Variable Parameters for Methods 2 and 3

According to QbD approach, the first step is to determine the variable parameters for the respective method. Thus, the variable parameters for both the spectrophotometric methods were designed as Ishikawa diagram (Figures 6 and 7).

Figure 6: Ishikawa diagram for method 2.

Figure 7: Ishikawa diagram for method 3.

For all the variable parameters as stated in Ishikawa diagram, the absorbances were recorded over the concentration range according to respective method. Working solution (50 μg/mL) was scanned from 400 to 200 nm and three peaks were observed at wavelengths 210.8 nm, 247.4 nm, and 301.4 nm. These three wavelengths were used as variable parameters. Also, the solubility was studied in various solvents including distilled water, 0.1 N NaOH, 0.1 N HCl, and methanol. The sharpness of spectra was compared for selection of critical parameter. Scan speed was varied as fast, medium, slow, and very slow over the range 400–200 nm, while slit width and sampling interval were varied in particular ranges of 0.1, 0.2, 0.5, 1.0, 2.0, and 5.0 nm and 0.05, 0.1, 0.2, 0.5, 1.0, and 2.0 nm, respectively.

For the estimation of PFH, two types of sample preparations were selected and evaluated. Tablets were formulated as per the master formula and were used in method development. Average weight of tablets was noted and tablets were triturated. Tablet powder equivalent to average weight was taken for study. Matrix containing excipients like lactose monohydrate, microcrystalline cellulose, and corn starch was mixed with PFH and evaluated for the method development. Recovery study was carried out at three levels 80%, 100%, and 120%. For the optimization of first order derivative method, scaling factor and delta lambda were varied as 2, 3, 4, and 5 and 2, 4, 8, and 16, respectively. Amplitudes of linear concentrations were noted and evaluated.

3.10. Extraction of Critical Parameters

From the evaluated variable parameters, critical parameters were extracted by two ways, observation and principal component analysis using SPSS software. By comparing the spectral shape, sharpness, and absorbances of linearity and range, few parameters were selected as critical parameters. In principal component analysis, all these parameters were entered in variable entry window of SPSS software. Simultaneously, all the values of variable parameters were arranged in a datasheet. This datasheet was then substituted in the data entry window of SPSS software. Then the program was run to get principal components (critical parameters).

3.11. Validation

Validation was performed according to ICH Q2 (R1) guidelines. The parameters studied were linearity, precision, accuracy, specificity, LOD, LOQ, and robustness.

3.11.1. Precision

The reproducibility of all these three methods was determined by repeating the above methods at different time intervals (morning, afternoon, and evening) on the same day (Intraday precision) and on three consecutive days (interday precision). The intraday and interday variation for the estimation of PFH was carried out at three different concentration levels of 800, 1200, and 1600 ng/band for method 1, then 20, 30, and 40 μg/mL for method 2, and 10, 15, and 20 μg/mL for method 3 (Table 3).

Table 3: Precision data.

Method
Concentration
Intraday (% RSD)

()
Interday (% RSD)

()

800 ng
0.11
0.60

1
1200 ng
0.10
0.38

1600 ng
0.10
0.32

Mean
0.10
0.41

20 µg/mL
0.15
0.10

2
30 µg/mL
0.10
0.07

40 µg/mL
0.08
0.06

Mean
0.11
0.08

10 µg/mL
0.55
1.15

3
15 µg/mL
0.59
1.19

20 µg/mL
0.48
1.08

Mean
0.54
1.14

3.11.2. Accuracy

The accuracy of the method was performed by calculating % recovery of PFH by the standard addition method. Known amounts of standard solutions of PFH were added at 80%, 100% and 120% levels to prequantified sample solutions of PFH (15 μg/mL). At each level of the amount three determinations were performed. The amount of PFH was estimated by applying obtained values to regression equation. In method 1, the known amount of standard stock solution of PFH was added to preanalyzed sample (750 ng/band). From the sample solution of tablet (150 μg/mL), 5 μL was applied and from the working standard solution (100 μg/mL), 6 μL, 7.5 μL, and 9 μL was over spotted for 80%, 100% and 120% levels, respectively. The plate was developed and analyzed by the proposed method (Table 4).

Table 4: Accuracy data.

Method
Level
Concentration
% Recovery
Mean

Tablet
Standard

1
80%
750
600
99.9
100.2

100%
750
750
100.2

120%
750
900
100.6

2
80%
15
12
100.1
100.1

100%
15
15
99.9

120%
15
18
100.3

3
80%
15
12
99.9
100.4

100%
15
15
100.8

120%
15
18
100.6

3.11.3. Specificity

The interference of other excipients was evaluated by adding 20 μg/mL of microcrystalline cellulose (MCC), corn starch, and lactose monohydrate to the 15 μg/mL of sample solution separately and absorbance was recorded. In method 1, from the working standard solution (1000 μg/mL), 1 μL was applied (1000 ng) and 1 μL (1000 ng) of each excipients was over spotted. The percentage of concentration was calculated.

3.11.4. Sensitivity

The limit of detection (LOD) and limit of quantification (LOQ) were calculated by using (1):

where is the standard deviation of intercept and is the slope of the calibration curve.

3.11.5. Robustness

Robustness of the method was assessed by making variations in solvent (ethanol) and wavelength (248 nm) for spectrophotometric methods. Linear concentration range was subjected to analysis and results were evaluated. In method 1, mobile phases having different compositions like methanol : ethyl acetate : triethylamine (2 : 3 : 0.4 v/v) and methanol : ethyl acetate : triethylamine (2.5 : 2.5 : 0.4 v/v) were tried and chromatograms were run. The duration of chamber saturation time was also varied as 20 min, 25 min, and 30 min.

4. Results and Discussion

Implementation of QbD approach was carried out by studying variable parameters in the analytical method development. Critical parameters were extracted by observation of results as well as performing principal component analysis. Also, each method was validated according to ICH Q2 (R1) guidelines.

4.1. Method 1

Method 1 has been developed and validated for the determination of PFH in pharmaceutical formulation. QbD approach was carried out by varying 46 parameters and critical parameters were extracted by using principal component analysis and by observation. The extracted critical parameters are summarized in Table 5.

Table 5: Critical parameters extracted for method 1.

Critical parameters extracted

By observation
By principal component analysis

Parameter
Extracted result
Parameter
Extracted result

Solvent
Methanol
Wavelength
250 nm

Saturation time
20 min

Band length
8 mm

Mode of detection
Absorbance
Solvent front
70 mm

Volume of mobile phase
5 mL

Type of chamber
10 cm × 10 cm

Plate
Precoated plate
Scanning time
10 min

Mobile phase composition
Methanol : ethyl acetate : triethylamine (1.5 : 3.5 : 0.4 v/v)

PFH obeyed linearity in concentration range of 400–2400 ng/band. The for PFH was found to be and paracetamol was used as an internal standard with value . The proposed method was applied for pharmaceutical formulation and percentage label claim for PFH was found to be 98.83%. The amount of drug estimated by proposed method was in good agreement with the label claim. The method was validated for accuracy, precision, specificity, LOD, LOQ, and robustness. Accuracy of the method was checked by recovery study at three different levels, that is, 80%, 100%, and 120%. The % recovery of PFH was found to be 100.2%. The method was found to be precise as indicated by the interday and intraday analysis showing % RSD less than 2. There was no any interference of excipients showing that method was specific. Limit of detection and limit of quantitation were 35.4 and 107.4 ng/band, respectively. The result did not show any statistical difference between different solvents and different wavelengths suggesting that the method developed was robust. The statistical data of validation is summarized in Table 8.

4.2. Method 2

A zero order spectrophotometric method has been developed and validated for the determination of PFH in pharmaceutical formulation. QbD approach was carried out by varying 19 parameters and critical parameters were extracted by using principal component analysis and by observation. The extracted critical parameters are summarized in Table 6.

Table 6: Critical parameters extracted for method 2.

Critical parameters extracted

By observation
By principal component analysis

Parameter
Extracted result
Parameter
Extracted result

Solvent
Methanol
Wavelength
247.4 nm

Scan speed
Medium

Sample preparation
Tablet
Slit width
1.0

Sampling interval
0.2

PFH followed linearity in the concentration range of 10–50 μg/mL. The proposed method was applied for pharmaceutical formulation and percentage label claim was found to be 99.05%. The amount of drug estimated by proposed method was in good agreement with the label claim. The % recovery for PFH was found to be 100.1%. The method was found to be precise as indicated by the inter-day and intra-day analysis showing % RSD less than 2. There was no any interference of excipients showing that the method was specific. Limit of detection and limit of quantitation were 0.09 and 0.27 μg/mL, respectively. The result did not show any statistical difference between different solvents and different wavelengths suggesting that the method developed was robust. The statistical data of validation is summarized in Table 8.

4.3. Method 3

A first order derivative spectrophotometric method has been developed and validated for the determination of PFH in pharmaceutical formulation. QbD approach was carried out by varying 27 parameters and extracted critical parameters by using principal component analysis and by observation. The extracted critical parameters are summarized in Table 7.

Table 7: Critical parameters extracted for method 3.

Critical parameters extracted

By observation
By principal component analysis

Parameter
Extracted result
Parameter
Extracted result

Solvent
Methanol
Wavelength
219.2 nm

Scan speed
Medium

Scaling factor
5

Sample preparation
Tablet
Slit width
1.0

Sampling interval
0.2

Delta lambda
4

Table 8: Statistical data of Validation.

Parameters
Method 1
Method 2
Method 3

250
247.4 nm
219.2 nm

Linearity range
400–2400 ng
10–50 µg/mL
5–30 µg/mL

Regression equation

Correlation coefficient ()
0.99
0.99
0.99

% Recovery ( = 3)
100.2
100.07
100.4

LOD
35.4 ng
0.09 µg/mL
0.48 µg/mL

LOQ
107.4 ng
0.27 µg/mL
1.44 µg/mL

Molar absorptivity (lit/mole/cm)
—
6537.84
13793.72

Sandell’s sensitivity (µg/sqcm/0.001)
—
0.058
0.027

Precision (% R.S.D.)

    Intra-day ( = 3)
0.10
0.11
0.54

    Inter-day ( = 3)
0.41
0.08
1.14

Standard error
0.168 × 10⁻³
2.65 × 10⁻⁴
2.38 × 10⁻³

Specificity (% R.S.D.)
0.55
0.57
0.28

Robustness (% R.S.D.)
0.19
0.84
0.57

PFH followed linearity in the concentration range of 5–30 μg/mL. The proposed method was applied for pharmaceutical formulation and percentage label claim was found to be 99.49%. The amount of drug estimated by proposed method was in good agreement with the label claim. The % recovery for PFH was found to be 100.4%. The method was found to be precise as indicated by the inter-day and intra-day analysis showing % RSD less than 2. There was no any interference of excipients and no statistical difference between different conditions showing that the method was specific and robust. Limit of detection and limit of quantitation were 0.48 and 1.44 μg/mL, respectively. The statistical data of validation is summarized in Table 8.

5. Conclusion

By comparing all three methods, it can be concluded that spectrophotometric method was found to be simple and rapid. First order spectrophotometric method was found to be more accurate as compared to zero order spectrophotometric method. Chromatographic method was found to be more accurate, precise, robust, and more sensitive as compared to both spectrophotometric methods. Statistical analyses prove that all the developed methods can be used for routine analysis of PFH in the tablet dosage form. Implementation of QbD approach resulted in more robust methods which can produce consistent, reliable, and quality data throughout the process and also save time and money.

Acknowledgments

The authors are thankful to the management, Principal Dr. R. S. Bhambar, and the staff of M.G.V’s Pharmacy College, Panchavati, Nashik, for their kind help and support.

References

ICH Topic Q8 (R2), “ICH harmonised tripartite guideline,” in Proceedings of the International Conference on Harmonisation of Technical Requirements for Registration of Pharmaceuticals for Human Use (ICH '09), Pharmaceutical Development, 2009.

A. B. Godfrey and R. S. Kenett, “Joseph M. Juran, a perspective on past contributions and future impact,” Quality and Reliability Engineering International, vol. 23, no. 6, pp. 653–663, 2007.

P. Nethercote, P. Borman, T. Bennett, et al., QbD for Better Method Validation & Transfer, Pharmaceutical Manufacturing, 2010.

ICH Topic Q2 (R1), “ICH harmonised tripartite guideline,” in Proceedings of the International Conference on Harmonisation of Technical Requirements for Registration of Pharmaceuticals for Human Use (ICH '94), Validation of Analytical Procedures, 1994.

ICH Topic Q9, “ICH harmonised tripartite guideline,” in Proceedings of the International Conference on Harmonisation of Technical Requirements for Registration of Pharmaceuticals for Human Use (ICH '94), Quality Risk Management, 2005.

P. Borman, P. Nethercote, M. Chatfield, et al., The Application of Quality by Design to Analytical Methods, PharmTech, 2007.

L. X. Yu, “Pharmaceutical quality by design: product and process development, understanding, and control,” Pharmaceutical Research, vol. 25, no. 4, pp. 781–791, 2008.

M. Pohl, M. Schweitzer, G. Hansen et al., “Implications and opportunities of applying the principles of QbD to analytical measurements,” Pharmaceutical Technology Europe, vol. 22, no. 2, pp. 29–36, 2010.

The United States Pharmacopoeia 27, the National Formulary 22, Asian Edition, United States Pharmacopoeial Convection, 2004.

C. M. de Gaitani, V. L. Lanchote, and P. S. Bonato, “Enantioselective analysis of propafenone in plasma using a polysaccharide-based chiral stationary phase under reversed-phase conditions,” Journal of Chromatography B, vol. 708, no. 1-2, pp. 177–183, 1998.

Y. Wu, M. Ma, and S. Zeng, “Enantioselective assay of S(+)- and R(-)-propafenone in human urine by using RP-HPLC with pre-column chiral derivatization,” Journals of Zhejiang University-Science A, vol. 5, no. 2, pp. 226–229, 2004.

D. Zhong and X. Chen, “Enantioselective determination of propafenone and its metabolites in human plasma by liquid chromatography-mass spectrometry,” Journal of Chromatography B, vol. 721, no. 1, pp. 67–75, 1999.

L. R. P. de Abreu, V. L. Lanchote, C. Bertucci, E. J. Cesarino, and P. S. Bonato, “Simultaneous determination of propafenone and 5-hydroxypropafenone enantiomers in plasma by chromatography on an amylose derived chiral stationary phase,” Journal of Pharmaceutical and Biomedical Analysis, vol. 20, no. 1-2, pp. 209–216, 1999.

U. Hofmann, M. Pecia, G. Heinkele, K. Dilger, H. K. Kroemer, and M. Eichelbaum, “Determination of propafenone and its phase I and phase II metabolites in plasma and urine by high-performance liquid chromatography-electrospray ionization mass spectrometry,” Journal of Chromatography B, vol. 748, no. 1, pp. 113–123, 2000.

M. Schweitzer, M. Pohl, M. Hanna-Brown, et al., “Implications and opportunities of applying QbD principles to analytical measurements,” Pharmaceutical Technology, vol. 34, no. 2, pp. 52–59, 2010.

R. M. Bianchini, P. M. Castellano, and T. S. Kaufman, “Development and validation of an HPLC method for the determination of process-related impurities in pridinol mesylate, employing experimental designs,” Analytica Chimica Acta, vol. 654, no. 2, pp. 141–147, 2009.

K. Monks, I. Molnar, H. J. Rieger, B. Bogati, and E. Szabo, “Quality by design: multidimensional exploration of the design space in high performance liquid chromatography method development for better robustness before validation,” Journal of Chromatography A, vol. 1232, pp. 218–230, 2012.

G. Srinubabu, C. A. I. Raju, N. Sarath, P. K. Kumar, and J. V. L. N. S. Rao, “Development and validation of a HPLC method for the determination of voriconazole in pharmaceutical formulation using an experimental design,” Talanta, vol. 71, no. 3, pp. 1424–1429, 2007.

S. M. Khamanga and R. B. Walker, “The use of experimental design in the development of an HPLC-ECD method for the analysis of captopril,” Talanta, vol. 83, no. 3, pp. 1037–1049, 2011.

E. M. Sheldon and J. B. Downar, “Development and validation of a single robust HPLC method for the characterization of a pharmaceutical starting material and impurities from three suppliers using three separate synthetic routes,” Journal of Pharmaceutical and Biomedical Analysis, vol. 23, no. 2-3, pp. 561–572, 2000.

P. F. Gavin and B. A. Olsen, “A quality by design approach to impurity method development for atomoxetine hydrochloride (LY139603),” Journal of Pharmaceutical and Biomedical Analysis, vol. 46, no. 3, pp. 431–441, 2008.

B. Dejaegher and Y. vander Heyden, “Experimental designs and their recent advances in set-up, data interpretation, and analytical applications,” Journal of Pharmaceutical and Biomedical Analysis, vol. 56, no. 2, pp. 141–158, 2011.

D. Awotwe-Otooa, C. Agarabia, P. J. Faustinoa et al., “Application of quality by design elements for the development and optimization of an analytical method for protamine sulfate,” Journal of Pharmaceutical and Biomedical Analysis, vol. 62, pp. 61–67, 2012.

B. Vasselle, G. Gousset, and J. P. Bounine, “Development and validation of a high-performance liquid chromatographic stability-indicating method for the analysis of Synercid in quality control, stability and compatibility studies,” Journal of Pharmaceutical and Biomedical Analysis, vol. 19, no. 5, pp. 641–657, 1999.