Anatomy Research International

Volume 2013 (2013), Article ID 925480, 1 page

http://dx.doi.org/10.1155/2013/925480

Erratum

Erratum to “Adequacy of Semitendinosus Tendon Alone for Anterior Cruciate Ligament Reconstruction Graft and Prediction of Hamstring Graft Size by Evaluating Simple Anthropometric Parameters”

S. G. Papastergiou,¹ G. A. Konstantinidis,¹ K. Natsis,² E. Papathanasiou,² N. Koukoulias,¹ and A. G. Papadopoulos¹

¹Orthopaedic Department of “Saint Paul” General Hospital of Thessaloniki Greece, Ethnikis Antistaseos 161, 55134 Thessaloniki, Greece

²Department of Anatomy, Medical School, Aristotle University of Thessaloniki, University Campus, P.O. Box 300, 54624 Thessaloniki, Greece

Received 24 March 2013; Accepted 24 March 2013

Copyright © 2013 S. G. Papastergiou et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors’ names were incorrectly listed as Papastergiou G. Stergios, Konstantinidis A. Georgios, Natsis Konstantinos, Papathanasiou Efthymia, Koukoulias Nikolaos, and Papadopoulos G. Alexandros; this error is corrected here.