International Scholarly Research Notices
Volume 2014 (2014), Article ID 275194, 6 pages
http://dx.doi.org/10.1155/2014/275194

Research Article

The Usefulness of Endothelial Cell Adhesion Molecules and Anti-C1q Antibody in Monitoring Systemic Lupus Erythematosus Disease Activity

Hasni Mahayidin,¹ Nurul Khaiza Yahya,² Wan Syamimee Wan Ghazali,³ Asmahan Mohd Ismail,⁴ and Wan Zuraida Wan Ab Hamid²

¹Department of Pathology, Faculty of Medicine and Health Sciences, Universiti Putra Malaysia (UPM), 43400 Serdang, Selangor, Malaysia
²Department of Immunology, School of Medical Sciences, Universiti Sains Malaysia, Health Campus, 16150 Kubang Kerian, Kelantan, Malaysia
³Department of Medicine, Hospital Universiti Sains Malaysia, 16150 Kubang Kerian, Kelantan, Malaysia
⁴Department of Medicine, Hospital Raja Perempuan Zainab II, 15000 Kota Bharu, Kelantan, Malaysia

Received 30 April 2014; Revised 4 August 2014; Accepted 4 August 2014; Published 29 October 2014

Academic Editor: Hironobu Ihn

Copyright © 2014 Hasni Mahayidin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objectives. The study was conducted to determine the correlation of ICAM-1, VCAM-1, and anti-C1q antibody levels with SLE disease activity index (SLEDAI) and standard SLE disease activity immunological markers (anti-dsDNA and sera C3 and C4). Study Design. This was a cross-sectional study. Materials and Methods. Blood samples were obtained from 95 SLE patients (45 active SLE and 50 nonactive SLE) and 50 controls. The subjects were assessed using SLEDAI and score of more than five is determined as having active SLE. The sera were tested for serum ICAM-1, VCAM-1, and anti-C1q (ELISA), anti-dsDNA (CLIFT), serum C3, and serum C4 (immunonephelometry). Results. Anti-dsDNA and anti-C1q antibody showed good positive correlations with SLEDAI (, and , , resp.). VCAM-1 and sera C3 and C4 showed fair correlation with SLEDAI (, ; , ; and , , resp.). ICAM-1 level showed no significant correlation with SLEDAI (). There were significant correlations of VCAM-1 and anti-C1q antibody with anti-dsDNA (, and , , resp.). VCAM-1 showed poor inverse correlation with serum C3 (, ) and fair inverse correlation with serum C4 (, ). Anti-C1q antibody demonstrated fair inverse correlation with both sera C3 and C4 (, and , , resp.). However, ICAM-1 showed no significant correlation with anti-dsDNA and sera C3 and C4 (, and , resp.). Conclusions. The serum levels of anti-C1q antibody in SLE patients showed the best correlation with the SLEDAI and standard immunological tests for SLE disease activity. These data support that anti-C1q antibody is a useful marker for monitoring SLE global disease activity. The potential of VCAM-1 needs further confirmation.

1. Introduction

SLE is a systemic autoimmune disorder characterized by presence of autoantibodies against self-nuclear components that resulted in chronic inflammation of various tissues and organs [1]. The disease activity monitoring is important for SLE management and it may be difficult to distinguish flares from permanent changes that have occurred due to chronic irreversible damage. Scoring systems which comprise a variety of clinical and laboratory parameters have been created to assess SLE disease activity including BILAG, SLEDAI, SLAM, LAI, and ECLAM [2, 3].

Currently, anti-dsDNA is widely used in assessing SLE disease activity apart from serum C3, serum C4, and C-reactive protein (CRP) levels [4]. Anti-dsDNA, serum C3, and serum C4 levels are among the laboratory parameters which are included in the SLEDAI. However, there is substantial percentage of patients who are persistently negative for anti-dsDNA, thus halting proper monitoring of the disease activity. Depending on studies, the percentage of SLE with negative anti-dsDNA can be as high as 20% [5]. Apart from that, studies on associations of various autoantibodies particularly anti-dsDNA and complement proteins with disease activity in SLE have shown inconsistent results. Such findings have led to revisiting of the value of the conventional biomarkers which are widely used in disease activity indices [6].

ICAM-1 and VCAM-1 are immunoglobulin superfamily of endothelial cell adhesion molecules which are important for leukocyte transmigration from within blood vessel into extravascular site of inflammatory process. ICAM-1 is lowly expressed on the surface of endothelial cells and antigen presenting cells. However, the expression is greatly increased by cytokines stimulation, that is, IL-1, IFN-γ, and TNF-α, especially during inflammatory responses [7, 8]. VCAM-1 is not expressed by naïve endothelial cell culture, but exposure to inflammatory cytokines IL-1, TNF-α, and IFN-γ results in its rapid upregulation. It is involved in extravasation of chemokine-recruited lymphocytes and monocytes from circulation into the inflammatory tissue sites by binding to integrin α4β1, or very late activation molecule 4 (VLA-4) whose expression is increased during conversion of antigen-naïve T cells to effector T cells [8]. VCAM-1 levels sustained high level in two to three hours and gradually diminished over several days [9]. ICAM-1 has been studied in various conditions including autoimmune and inflammatory conditions including SLE. However, it has shown inconsistent results where there were studies that found that ICAM-1 is useful for SLE disease activity assessment and prediction [10, 11], while other studies have shown contrary results [12, 13]. VCAM-1 levels have been found to be elevated in SLE and associated with the disease activity. Some studies have shown that it is statistically significant in some organ-specific SLE such as lupus nephritis, vasculitis, and haematological involvements [11, 12, 14].

C1q is the first component of the classical pathway that is activated by the immune complexes. Presence of anti-C1q antibody results in delay of immune complexes clearance in some conditions including SLE [15]. The anti-C1q antibody is strongly associated with lupus nephritis, which is one of the most serious complications of SLE [16–18]. However, some studies have shown that anti-C1q antibody is associated with SLE global activity but not specifically with active lupus nephritis [19, 20].

The aim of this study is to determine the correlation of ICAM-1, VCAM-1, and anti-C1q antibody levels with SLE disease activity index (SLEDAI) and standard SLE disease activity immunological markers (anti-dsDNA and sera C3 and C4). The data obtained from this study is useful to verify the reliability of ICAM-1 and VCAM-1 as SLE disease monitoring and flare predictor tools and the potential of anti-C1q antibody as SLE global activity biomarker [19].

2. Methodology

This was a cross-sectional study involving SLE patients in two medical centres in Kelantan, that is, Hospital Universiti Sains (USM), Kubang Kerian, and Hospital Raja Perempuan Zainab II (HRPZ II), Kota Bharu, between the period of June 2012 and September 2013. 95 (45 active and 50 nonactive) SLE patients who fulfilled the ACR classification criteria for SLE were included in this study. The nonactive SLE cases from outpatient clinics were selected by simple random sampling method. Due to the difficulty in getting the active SLE cases, universal sampling method was applied where every consented patient that fulfilled the criteria was included. In addition, 50 apparently healthy individuals were included as controls. All participants were informed about the study and gave written consent.

The disease activities were evaluated according to the SLEDAI (SELENA modification) and patients with score above five are defined as having active disease [21, 22]. Patients who aged less than 13 years old and were HIV positive, pregnant, and having acute infections and chronic illnesses, for example, diabetes mellitus, malignancies, and tuberculosis, were excluded.

The patients’ demographic and relevant clinical data including status of lupus nephritis were obtained from the medical records. The peripheral blood samples were obtained and allowed to clot prior to centrifugation. The sera were aliquot and stored at −80°C until respective analysis was carried out. Serum ICAM-1 and VCAM-1 levels were measured by using precoated ELISA kit (Cusabio, China) that employed the sandwich enzyme immunoassay technique for quantitative measurement of human ICAM-1 and VCAM-1 concentrations. The anti-C1q antibody levels were measured using precoated ELISA kit (Orgentec, Germany) that quantitatively measures the IgG subclass of antibodies against C1q in human serum or plasma. Analyses were carried out according to manufacturers’ protocols. Anti-dsDNA was measured semiquantitatively using Fluoro nDNA test (MBL, Japan) that employed Crithidia luciliae indirect immunofluorescent test (CLIFT) method. Anti-dsDNA with titer 1 : 10 was considered positive and the results were reported in titer from 1 : 10 to 1 : 160. Sera C3 and C4 levels analysis was done using quantitative determination by immunonephelometry (BN-ProSpec, Siemens, USA). Sera C3 and C4 levels were taken as low at the level of less than 0.66 g/L and 0.20 g/L, respectively.

3. Statistical Analysis

Data analysis were done using SPSS version 20. The mean with standard deviation (SD) and median with interquartile range (IQR) were determined depending on data distribution. Shapiro-Wilk’s test was used to evaluate the distribution. The mean or median differences of serum markers in active SLE patients, nonactive SLE patients, and healthy controls were performed using one-way ANOVA and Kruskal-Wallis test, respectively. Post hoc test Scheffe’s procedure or Mann-Whitney test with Bonferroni correction was used to compare the variables values. The correlations tests were carried out using Pearson’s correlation coefficient or Spearman’s rank correlation coefficient. Comparisons and correlations were considered significant when .

4. Result

4.1. Demographic Data

95 subjects were enrolled in this study, which consists of 45 active SLE patients and 50 nonactive SLE patients. The demographic data of the subjects is shown in Table 1. Out of 95 SLE patients, 55 (57.9%) patients had lupus nephritis while the other 40 (42.1%) patients did not.

Table 1: Demographic data of active SLE, nonactive SLE, and controls.

Characteristics
Active SLE

(%)
Nonactive SLE

(%)
Controls

(%)
value

Age (years)
26.00 (8.57)a
31.32 (8.63)a
31.44 (8.86)a
0.003 b

    <20
12 (26.7)
6 (12.0)
0 (0.0)

    20–35
26 (57.8)
27 (54.0)
37 (74.0)

    >35
7 (15.5)
17 (34.0)
13 (26.0)

Sex

    Female
42 (93.3)
49 (98)
42 (84.0)
—

    Male
3 (6.7)
1 (2)
8 (16.0)

Race

    Malay
44 (97.8)
46 (92.0)
42 (84.0)
—

    Chinese
0 (0.0)
3 (6.0)
5 (10.0)

    Indians
0 (0.0)
0 (0.0)
3 (6.0)

    Others
1 (2.2)
1 (2.0)
0 (0.0)

Disease duration (years)
1.00 (2.75)c
6.50 (7.50)c
—
<0.001 d

SLEDAI score
12.00 (14.00)c
2.00 (2.00)c
—
<0.001 e

Mean (SD).

bOne-way ANOVA. Post hoc test Scheffe’s procedure: active SLE versus nonactive SLE , active SLE versus control , and nonactive SLE versus control .

cMedian (IQR).

dMann-Whitney test, statistic = −5.69.

eMann-Whitney test, statistic = −8.46.

Level of significance is set at .

4.2. Prevalence of Standard Disease Activity Immunological Markers

Anti-dsDNA was positive in 29 (64.4%) of active SLE patients and 12 (24.0%) of nonactive SLE patients. Twenty-six (57.8%) of active SLE patients had low serum C3 levels. Only 6 (12%) of nonactive SLE patients and 1 (2%) of controls had low serum C3 levels. Low serum C4 levels in active SLE and nonactive SLE patients were 33 (73.3%) and 24 (48%), respectively. Thirteen (26%) of controls had low serum C4 levels.

4.3. Comparison between Levels of Serum Markers in Active SLE, Nonactive SLE, and Control Groups

There were statistically significant difference of VCAM-1 and anti-C1q antibody levels among active SLE, nonactive SLE, and control groups with . However, there was no significant difference of ICAM-1 level between the three groups () (Table 2).

Table 2: Summary of comparison between levels of serum markers in active SLE, nonactive SLE, and control groups.

Variables
Active SLE

Median (IQR)
Nonactive SLE

Median (IQR)
Control

Median (IQR)
statistic (df)
valuea

ICAM-1
(ng/mL)
194.41
(330.48)
146.62
(88.11)
109.68
(190.30)
4.46
(2)
0.107

VCAM-1
(ng/mL)
34.53a 
(25.83)
27.75a 
(20.76)
14.09a 
(25.12)
36.88
(2)
<0.001

Anti-C1q
(U/mL)
19.67a 
(43.59)
2.75a 
(5.69)
1.47a 
(2.64)
42.47
(2)
<0.001

Statistically significant difference between pairs at by post hoc test Bonferroni’s procedure.

4.4. Correlation between Levels of Serum Markers and SLEDAI Score in SLE Patients

Anti-dsDNA and anti-C1q antibody showed good positive correlation with SLEDAI with Spearman’s rho of 0.529 () and 0.559 (), respectively. VCAM-1 only showed fair positive correlation with SLEDAI score. Both sera C3 and C4 demonstrated fair inverse correlation while ICAM-1 level showed no significant correlation with SLEDAI score (Table 3).

Table 3: Correlation between levels of serum markers and SLEDAI score in SLE patients.

Variables
SLEDAI (score),

value

Anti-dsDNA (titer)
0.529a
<0.001

Serum C3 (g/L)
−0.312b
0.002

Serum C4 (g/L)
−0.382a
<0.001

ICAM-1 (ng/mL)
0.192a
0.062

VCAM-1 (ng/mL)
0.294a
0.004

Anti-C1q (U/mL)
0.559a
<0.001

Spearman’s rank correlation coefficient, level of significance is .

bPearson’s correlation coefficient, level of significance is .

4.5. Correlation between Levels of ICAM-1, VCAM-1, and Anti-C1q Antibody with Standard SLE Disease Activity Immunological Markers

ICAM-1 showed no significant correlation with anti-dsDNA level, serum C3 level, and serum C4 level. Both VCAM-1 and anti-C1q antibody showed significant correlation with anti-dsDNA, serum C3, and serum C4 levels (Table 4).

Table 4: Correlations of ICAM-1, VCAM-1, and anti-C1q antibody with standard SLE disease activity immunological markers.

Variables
Anti-dsDNA

Serum C3

Serum C4

value

value

value

ICAM-1
0.094
0.259
−0.041
0.626
0.080
0.338

VCAM-1
0.226
0.006
−0.183
0.028
−0.251
0.002

Anti-C1q
0.511
<0.001
−0.420
<0.001
−0.398
<0.001

Spearman’s rank correlation coefficient, level of significance is .

bPearson’s correlation coefficient, level of significance is .

5. Discussion

Anti-dsDNA, serum C3, and serum C4 levels are widely acceptable standard immunological markers in evaluating disease activity in SLE. Anti-dsDNA using CLIFT method, due to its semiquantitative test, is less sensitive for disease monitoring compared to ELISA method. However, many clinical laboratories still opt for CLIFT method due to its high specificity for confirmation of SLE diagnosis. Positive anti-dsDNA in SLE patients ranged from 36 to 69% [23]. Negative anti-dsDNA levels could be due to nonactive (stable) state of SLE although it was documented that around 20% of SLE patients were persistently negative for anti-dsDNA [5]. In this study, the anti-dsDNA levels were positive in 41 (43.16%) of SLE patients and the percentage was higher in active SLE than in nonactive SLE. Anti-dsDNA gave no false positive result in this study and this finding agreed with previous studies using CLIFT method. The use of ELISA for anti-dsDNA might give better sensitivity but with reduced specificity in SLE [24].

More than half of active SLE patients had low sera C3 and C4 levels with higher percentage seen in serum C4 (73.3%) than in serum C3 (57.8%). However, almost half of nonactive SLE patients also had low serum C4 levels and this finding showed that serum C4 levels were not that useful in determining SLE disease activity status. Serum C3 was better in reflecting SLE disease activity status as only 12.0% of nonactive SLE patients and 2.0% of controls had low serum C3.

In this study, the correlation of anti-dsDNA with SLEDAI score was better than serum C3, serum C4, ICAM-1, and VCAM-1. However, its correlation was weaker than correlation of anti-C1q, even though both anti-dsDNA and anti-C1q demonstrated good positive correlation with SLEDAI score. These similar findings were also shown in other studies [11, 20, 25].

Both serum C3 and serum C4 levels showed fair inverse correlation with SLE disease activity. This reflected complement activation in SLE pathogenesis and at the same time supported the use of anti-C1q antibody as a useful marker for SLE disease monitoring. Complement system is important for clearing up the antigen-antibody complexes, whose formation was increased in SLE flares. The presence of autoantibody against C1q would impair the classical pathway of the complement cascade which is crucial for immune complexes clearance. If comparison between sera C3 and C4 levels was to be evaluated, serum C4 levels showed better correlation with SLEDAI score. However, according to this study, the serum C3 and serum C4 correlation with SLEDAI score were weaker than anti-C1q antibody.

VCAM-1 showed fair correlation with SLEDAI score. Even though the correlation was significant, it was weaker than anti-C1q antibody, anti-dsDNA, serum C3, and serum C4. ICAM-1 level, on the other hand, did not correlate significantly with SLE disease activity. Many studies agreed that ICAM-1 did not reflect the disease activity in SLE patients [12, 13, 26].

In this study, the ICAM-1 levels did not correlate significantly with anti-dsDNA, serum C3, and serum C4 levels. These findings were expected as ICAM-1 level also showed no significant correlation with SLEDAI score. A study in Cairo with similar method had found that there was no correlation between ICAM-1 and anti-dsDNA and serum C3 in SLE patients [11]. That particular study demonstrated similar findings for VCAM-1 as well. That was in contrast to our recent findings where VCAM-1 showed significant positive correlation with anti-dsDNA and significant negative correlation with serum C3 and serum C4. Better correlation was seen between VCAM-1 and serum C4 compared to serum C3 levels. This was expected in view that serum C4 levels demonstrated better correlation with SLEDAI score than serum C3 in this study.

One of the earlier studies on adhesion molecules showed similar findings to this current study; that is, VCAM-1 levels were correlated with SLE disease activity and anti-dsDNA and inversely correlated with serum C3. These findings were consistent with the theory that immune complex formation and upregulation of adhesion molecules are involved in SLE pathogenesis [12]. An in vitro study has demonstrated that anti-dsDNA was able to enhance the expression of endothelial cell adhesion molecules in SLE [27].

In this study, anti-C1q antibody levels were significantly different between the three groups of active SLE, nonactive SLE, and controls (Table 2). According to the cut-off value given by the manufacturer (10 U/mL), it was found that 64.4% of active SLE patients had high anti-C1q antibody levels compared to only 18% of nonactive SLE and 10.0% of controls. These findings were similar to other studies that had found higher prevalence of anti-C1 antibody in SLE than in healthy controls [19, 28, 29]. The prevalence of anti-C1q antibody in this study was 40.0% and this was in accordance with studies done in Brazil (39.5%) and India (58.3%). The discrepancies found might be due to differences in population studied, as well as in variations of the ELISA kits used [22]. Anti-C1q antibody was also found in healthy population and the prevalence ranges between 2.0 and 8.0% [30]. In this study, the prevalence of anti-C1q antibody in controls was slightly higher (10.0%).

Anti-C1q antibody showed good correlation with anti-dsDNA and it was better correlated than VCAM-1. Anti-C1q antibody also showed significant moderate correlation with serum C3 and serum C4 levels. Interestingly, better correlation was seen between anti-C1q antibody and serum C3 compared to serum C4, as demonstrated by VCAM-1. This discrepancy between findings of sera C3 and C4 cannot be clearly explained. Other studies had also yielded conflicting results regarding relation of SLE disease activity with levels of sera C3 and C4. Some studies have found that serum C3 was superior in SLE disease monitoring, while some demonstrated the same for serum C4 [31–33].

Many of previous studies have found that anti-C1q antibody was a useful marker for lupus nephritis [16–18]. However, there were also studies that proved anti-C1q antibody did not significantly associate with lupus nephritis [19, 20, 29]. This current study showed that there was no significant difference between anti-C1q antibody levels in lupus nephritis and non-lupus nephritis patients (, ).

6. Summary

The serum levels anti-C1q antibody showed the best correlation with SLEDAI score, comparable to anti-dsDNA. Anti-C1q antibody also showed significant correlation with standard immunological tests for SLE disease activity (anti-dsDNA and sera C3 and C4). These results supported the fact that anti-C1q antibody may serve as a useful marker for monitoring SLE global disease activity. The potential of serum VCAM-1 needs to be confirmed with longitudinal studies in the future.

7. Recommendation

Majority of the SLE patients were on immunosuppressant and each patient was on different type of medications and dosage. It was impossible to standardize this issue and it cannot be ruled out that these medications might have different effects on the markers of interest. Future study which can address this issue would very much contribute to elucidate this matter.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This study was supported by the Universiti Sains Malaysia, Short Term Grant 304/PPSP/661312079. Special thanks are due to the staffs of the Department of Immunology, School of Medical Sciences, Universiti Sains Malaysia, as well as the staffs of the Medical Specialist Clinic of HUSM and HRPZ II.

References

J. M. Ahearn, E. L. Erickson, D. Hawkins, and S. M. Manzi, “Method for diagnosis and monitoring of disease activity and response to treatment in systemic lupus erythematosus (SLE) and other autoimmune diseases,” United States Patent Application 20100233752, 2010

M. M. A. Fernando and D. A. Isenberg, “How to monitor SLE in routine clinical practice,” Annals of the Rheumatic Diseases, vol. 64, no. 4, pp. 524–527, 2005.

G. K. W. Lam and M. Petri, “Assessment of systemic lupus erythematosus,” Clinical and Experimental Rheumatology, vol. 23, no. 5, pp. S120–S132, 2005.

J. M. Ahearn, C. C. Liu, A. H. Kao, and S. Manzi, “Biomarkers for systemic lupus erythematosus,” Translational Research, vol. 159, no. 4, pp. 326–342, 2012.

D.-J. Min, S.-J. Kim, S.-H. Park et al., “Anti-nucleosome antibody: significance in lupus patients lacking anti-double-stranded DNA antibody,” Clinical and Experimental Rheumatology, vol. 20, no. 1, pp. 13–18, 2002.

C. Liu and J. M. Ahearn, “The search for lupus biomarkers,” Best Practice and Research: Clinical Rheumatology, vol. 23, no. 4, pp. 507–523, 2009.

C. Lawson and S. Wolf, “ICAM-1 signaling in endothelial cells,” Pharmacological Reports, vol. 61, no. 1, pp. 22–32, 2009.

K. D. Elgert, Immunology Understanding the Immune System, John Wiley & Sons, Hobeken, NJ, USA, 2009.

T. Collins, M. A. Read, A. S. Neish, M. Z. Whitley, D. Thanos, and T. Maniatis, “Transcriptional regulation of endothelial cell adhesion molecules: NF-κB and cytokine-inducible enhancers,” The FASEB Journal, vol. 9, no. 10, pp. 899–909, 1995.

K. Egerer, E. Feist, U. Rohr, A. Pruss, G. R. Burmester, and T. Dorner, “Increased serum soluble CD14, ICAM-1 and E-selectin correlate with disease activity and prognosis in systemic lupus erythematosus,” Lupus, vol. 9, no. 8, pp. 614–621, 2000.

M. A. Elwy, Z. A. Galal, and H. E. Hasan, “Immunoinflammatory markers and disease activity in systemic lupus erythematosus: something old, something new,” Eastern Mediterranean Health Journal, vol. 16, no. 8, pp. 893–900, 2010.

P. E. Spronk, H. Bootsma, M. G. Huitema, P. C. Limburg, and C. G. M. Kallenberg, “Levels of soluble VCAM-1, soluble ICAM-1, and soluble E-selectin during disease exacerbations in patients with systemic lupus erythematosus (SLE); a long term prospective study,” Clinical and Experimental Immunology, vol. 97, no. 3, pp. 439–444, 1994.

H. G. Sieberth, “Detection of circulating adhesion molecules ICAM-1, VCAM-1 and E-Selectin in Wegener's granulomatosis, systemic lupus erythematosus and chronic renal failure,” Clinical Nephrology, vol. 43, no. 5, pp. 288–296, 1995.

S. Pizarro, J. Monárrez Espino, A. Ruiz, L. J. Jara, A. Nava, and C. Riebeling-Navarro, “Soluble vascular cell adhesion molecule-1 indicates SLE disease activity and specific organ involvement.,” Revista Alergia Mexico, vol. 54, no. 6, pp. 189–195, 2007.

E. Potlukova and P. Kralikova, “Complement component C1q and anti-C1q antibodies in theory and in clinical practice,” Scandinavian Journal of Immunology, vol. 67, no. 5, pp. 423–430, 2008.

P. Horak, Z. Hermanova, J. Zadrazil et al., “C1q complement component and -antibodies reflect SLE activity and kidney involvement,” Clinical Rheumatology, vol. 25, pp. 532–536, 2006.

M. Trendelenburg, M. Lopez-Trascasa, E. Potlukova et al., “High prevalence of anti-C1q antibodies in biopsy-proven active lupus nephritis,” Nephrology Dialysis Transplantation, vol. 21, no. 11, pp. 3115–3121, 2006.

A. Tsirogianni, E. Pipi, and K. Soufleros, “Relevance of anti-C1q autoantibodies to lupus nephritis,” Annals of the New York Academy of Sciences, vol. 1173, pp. 243–251, 2009.

Y. Katsumata, K. Miyake, Y. Kawaguchi et al., “Anti-C1q antibodies are associated with systemic lupus erythematosus global activity but not specifically with nephritis: a controlled study of 126 consecutive patients,” Arthritis and Rheumatism, vol. 63, no. 8, pp. 2436–2444, 2011.

C. Zhang, L. Ren, F. Gao, F. Mu, Y. You, and Y. Liu, “Anti-C1q antibodies are associated with systemic lupus erythematosus disease activity and lupus nephritis in northeast of China,” Clinical Rheumatology, vol. 30, no. 7, pp. 967–973, 2011.

S. Suleiman, D. Kamaliah, A. Nadeem, N. N. Naing, and C. H. Che Maraina, “Anti-nucleosome antibodies as a disease activity marker in patients with systemic lupus erythematosus,” International Journal of Rheumatic Diseases, vol. 12, no. 2, pp. 100–106, 2009.

V. D. Pradhan, M. M. Patwardhan, and K. Ghosh, “Anti-nucleosome antibodies as a disease marker in systemic lupus erythematosus and its correlation with disease activity and other autoantibodies,” Indian Journal of Dermatology, Venereology and Leprology, vol. 76, no. 2, pp. 145–149, 2010.

H. Julkunen, S. Ekblom-Kullberg, and A. Miettinen, “Nonrenal and renal activity of systemic lupus erythematosus: a comparison of two anti-C1q and five anti-dsDNA assays and complement C3 and C4,” Rheumatology International, vol. 32, no. 8, pp. 2445–2451, 2012.

P. Žigon, K. Lakota, S. Čučnik et al., “Comparison and evaluation of different methodologies and tests for detection of antidsdna antibodies on 889 Slovenian patients ' and blood donors' sera,” Croatian Medical Journal, vol. 52, no. 6, pp. 694–702, 2011.

E. Akhter, R. W. Burlingame, A. L. Seaman, L. Magder, and M. Petri, “Anti-C1q antibodies have higher correlation with flares of lupus nephritis than other serum markers,” Lupus, vol. 20, no. 12, pp. 1267–1274, 2011.

B. A. Janssen, R. A. Luqmani, C. Gordon et al., “Correlation of blood levels of soluble vascular cell adhesion molecule-1 with disease activity in systemic lupus erythematosus and vasculitis,” British Journal of Rheumatology, vol. 33, no. 12, pp. 1112–1116, 1994.

K. N. Lai, J. C. K. Leung, K. B. Lai, K. C. Wong, and C. K. W. Lai, “Upregulation of adhesion molecule expression on endothelial cells by anti-DNA autoantibodies in systemic lupus erythematosus,” Clinical Immunology and Immunopathology, vol. 81, no. 3, pp. 229–238, 1996.

C. G. Moura, I. Lima, L. Barbosa et al., “Anti-C1q antibodies: association with nephritis and disease activity in systemic lupus erythematosus,” Journal of Clinical Laboratory Analysis, vol. 23, no. 1, pp. 19–23, 2009.

B. Trad, H. Ben Hassine, M. Khalifa et al., “Anti-C1q antibodies and systemic lupus erythematosus in the Tunisian population,” Pathologie Biologie, vol. 61, no. 3, pp. 113–116, 2013.

M. Mahler, R. A. van Schaarenburg, and L. A. Trouw, “Anti-C1q autoantibodies, novel tests, and clinical consequences,” Frontiers in Immunology, vol. 4, article 117, 2013.

D. M. Ricker, L. A. Hebert, R. Rohde, D. D. Sedmak, E. J. Lewis, and J. D. Clough, “Serum C3 levels are diagnostically more sensitive and specific for systemic lupus erythematosus activity than are serum C4 levels,” The American Journal of Kidney Diseases, vol. 18, no. 6, pp. 678–685, 1991.

D. J. Birmingham, F. Irshaid, H. N. Nagaraja et al., “The complex nature of serum C3 and C4 as biomarkers of lupus renal flare,” Lupus, vol. 19, no. 11, pp. 1272–1280, 2010.

S. M. Shaldoum, Y. R. A. Mohammed, N. M. El Wakeel, and A. S. Gawish, “Evaluation of serum complement C3 and C4 leves as biomarkers for systemic lupus erythematosus,” The Egyptian Journal of Hospital Medicine, vol. 49, p. 16, 2012.