ISRN Obstetrics and Gynecology

Volume 2014 (2014), Article ID 314617, 5 pages

http://dx.doi.org/10.1155/2014/314617

Research Article

Fetal Head Position during the First Stage of Labor: Comparison between Vaginal Examination and Transabdominal Ultrasound

Jyothi Shetty,1,2 Vinod Aahir,¹ Deeksha Pandey,¹ Prashanth Adiga,¹ and Asha Kamath³

¹Department of OBG, KMC, Manipal University, Manipal 576104, India

²Department of OBG, Women and Child Block (WCB), Manipal, Karnataka 576104, India

³Department of Community Medicine, KMC, Manipal University, Manipal 576104, India

Received 21 January 2014; Accepted 6 March 2014; Published 27 March 2014

Academic Editors: D. Ayres-de-Campos, S. N. Chow, N. A. Ginsberg, and E. Porcu

Copyright © 2014 Jyothi Shetty et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Introduction. Recent evidence indicates that clinical examination, for determination of fetal head position, is subjective and inaccurate. Present study was aimed to compare transabdominal ultrasound for fetal head position with vaginal examination during first stage of labor. Material and Methods. This prospective study was performed at a tertiary center during a two-year period. Before or after clinically indicated vaginal examinations, transverse suprapubic transabdominal real-time ultrasound fetal head position assessment was done. Frequencies of various ultrasound depicted fetal head positions were compared with position determined at vaginal examination. Results. In only 31.5% of patients, fetal head position determinations by vaginal examinations were consistent with those obtained by ultrasound. Cohen’s Kappa test of concordance indicated a poor concordance of 0.15. Accuracy of vaginal examination increased to 66% when fetal head position at vaginal examination was recorded correct if reported within +45° of the ultrasound assessment. Rate of agreement between the two assessment methods for consultants versus residents was 36% and 26%, respectively (). Conclusion. We found that vaginal examination was associated with a high error rate in fetal head position determination. Data supports the idea that intrapartum transabdominal ultrasound enhances correct determination of fetal head position during first stage of labor.

1. Introduction

Digital vaginal examination has been the accepted standard to monitor labor. However, recently evidence is indicating that clinical examination (abdominal and vaginal) for the determination of fetal head position is subjective and inaccurate [1]. Furthermore, repeated vaginal examinations can be uncomfortable and associated with risk of introducing infections. Ultrasonography is noninvasive and has been found to be more accurate for assessing position of the fetal head, during labor [2, 3]. Recent studies by Sherer et al. [4], Chou et al. [5], Dupuis et al. [6], and Zahalka et al. [7] have shown that ultrasound scanning is a quick and efficient way of increasing the accuracy of the assessment of fetal head position during the second stage of labor. We would also like to highlight that ultrasound determination of fetal head may allow safe instrumental delivery if required in second stage.

In the present study we aimed to compare ultrasound assessment of fetal head position with vaginal examination during first stage of labor in our setup.

2. Material and Methods

This prospective study was carried out in the labor ward at a tertiary care center during a two-year period. The study protocol was approved by institutional ethics committee. All enrolled women provided written informed consent for participation. A total of 165 women with normal singleton, cephalic-presenting fetuses between 35 and 41 weeks’ period of gestation with cervical dilatation ≥3 cm were recruited for the study.

The gestational age was determined on the basis of the last menstrual period and a reliable menstrual history, and/or an ultrasound examination before 16 weeks of gestation. Both intact and ruptured membranes were included in this study. Women with multiple pregnancy and women attempting vaginal birth after cesarean delivery were excluded from the study.

Clinically indicated vaginal examinations were performed by attending resident doctor or consultant randomly. The classic method of palpation of the sagittal suture and fontanelles and their location in relation to the maternal pelvis was used to determine fetal head position. Head position was classified as occiput anterior (OA), occiput posterior (OP), left or right occiput transverse (LOT or ROT), left or right occiput anterior (LOA or ROA), or left or right occiput posterior (LOP or ROP).

Before or after this vaginal examination, transverse suprapubic transabdominal real-time ultrasound fetal head position assessment was performed by a senior consultant, utilizing an ultrasound unit (Toshiba). During this procedure the ultrasound transducer was first placed transversely in the suprapubic region of the maternal abdomen. Next the fetal spine was demonstrated in its sagittal plane and traced from the fetal thorax to the occiput. Ultrasound depiction of fetal head position was performed utilizing midline intracranial structures (cavum septum pellucidum, falxcerebri, thalami, and cerebellar hemispheres) and anterior and posterior cranial structures (orbit, nasal bridge, and cervical spine). Fetal head position was classified to one of the above-mentioned eight positions (similar to vaginal examination) (Figures 1(a) and 1(b)). The landmarks depicting fetal position were the fetal orbits for occipitoposterior position, the midline cerebral echo for occipitotransverse position, and cerebellum or occiput for occipitoanterior position. While doing an ultrasound assessment, the examiner was blinded off the vaginal examination findings and vice versa.

(a)

(b)

Figure 1: Transverse suprapubic transabdominal real-time ultrasound fetal head position assessment: (a) right occipitotransverse and (b) left occipitoanterior position.

Frequencies of the various ultrasound depicted fetal head positions were noted. These ultrasound depicted positions were compared with position determined at vaginal examination. With progressive descent of fetal head, internal rotation occurs. Keeping this in mind further analysis of data was done. In this analysis, vaginal fetal head position determination occurring within arc of the respective ultrasound assessment was designated as correct.

Statistical analysis: the degree of agreement between the two examination methods was analyzed by using Cohen’s Kappa test. Kappa value < 0.2 was considered to have poor concordance.

3. Results

A total of 165 women were found to be eligible to participate in the study. Demographic characteristics of the population studied are depicted in Table 1 and Figure 2. Mean maternal age was years with a mean gestational age of weeks. Around two-thirds (65.5%) of these women were primigravida and 34.5% were multigravida. Among these, 31.5% had spontaneous onset of labor while 68.5% were induced for obstetric indications.

Table 1: Demographic characteristics of study population.

Characteristics
Mean ± SD
Range

Maternal age (years)

18–38

Height (cm)

143–169

Weight (kgs)

40.50–97.22

BMI (kg/m²)

18.49–38.94

Gestational age (weeks)

36–41

Birth weight (g)

1880–4160

Figure 2: Parity, labor, and delivery details of the population studied.

Vaginal examinations were carried out by consultants in 47% of women () or by junior residents with two years () and senior residents with 3 years of experience in obstetrics and gynecology (). As mentioned earlier before or after this vaginal examination, transverse suprapubic transabdominal real-time ultrasound fetal head position assessment was performed by a consultant. All ultrasound assessments were successful and yielded interpretable fetal head position determinations. Frequencies of the various ultrasound depicted fetal head positions compared with vaginal examinations are presented in Table 2. In only 31.5% of patients (), fetal head position determinations by vaginal examinations were consistent with those obtained by transabdominal ultrasound. Cohen’s Kappa test of concordance indicated a poor concordance of 0.15. Vaginal examinations differed by 180° in comparison with the respective ultrasound examinations in 7.8% () of cases.

Table 2: Comparison of the fetal head position by ultrasound and vaginal examination.

Fetal head position
Actual number diagnosed by ultrasound (%)
Agreement in vaginal examination (%)
Other findings in vaginal examination (%)

LOT
61 (37.0)
20 (32.8)
LOA: 27 (44.3), DOA: 02 (2.2), ROA: 05 (8.2), ROT: 05 (8.2), LOP: 02 (3.3)

ROT
38 (23)
10 (26.3)
ROA: 14 (36.8), LOA: 07 (18.4), LOT: 03 (7.9), ROP: 03 (7.9), DOA: 01 (2.6)

LOA
26 (15.8)
12 (46.2)
LOT: 08 (30.8), ROT: 03 (11.5), ROA: 02 (7.7), ROP: 01 (3.8)

ROA
18 (10.9)
03 (16.7)
ROT: 09 (50.0), LOA: 05 (27.8), LOT: 01 (5.6)

LOP
11 (06.7)
01 (09.1)
LOT: 05 (45.5), ROA: 03 (27.3), LOA: 01 (9.1), ROT: 01 (9.1)

ROP
10 (06.1)
10 (06.1)
LOA: 02 (20.0), ROT: 01 (10.0), ROA: 01 (10.0)

DOA
01 (00.6)
00 (00.0)
LOA: 01 (100)

Total
165 (100)
52 (31.51)

With progressing descent of the fetal head, internal rotation occurs and the fetal head which was in LOT may become either in LOA or DOA during vaginal examination. Vaginal fetal head position determinations occurring within arc of the ultrasound assessments of LOT were designated as correct. Twenty-seven patients were in LOA by vaginal examination. This increased the accuracy of vaginal examination in LOT position to 77% (). Cohen’s Kappa test of concordance in this comparison modality was 0.59 (moderate concordance). Fetal head which was in ROT as the labor progresses may become either in ROA or DOA during vaginal examination. Vaginal fetal head position determinations occurring within arc of the ultrasound assessments of ROT were designated as correct. Fourteen patients were in ROA by vaginal examination. This increased the accuracy of vaginal examination to 63% (). Cohen’s Kappa test of concordance in this comparison modality was 0.53.

Comparison of vaginal examination findings performed by consultants and residents with ultrasound position is shown Tables 3, 4 and 5. Rates of agreement between the two methods for consultants versus residents were not significantly different ().

Table 3: Comparison of the fetal head position by ultrasound and vaginal examination done by consultant ().

Fetal head position
Actual number diagnosed by ultrasound (%)
Agreement in vaginal examination (%)
Other findings in vaginal examination (%)

LOT
21 (26.6)
08 (38.1)
LOA: 07 (33.3), ROA: 03 (14.3), LOP: 02 (9.5), ROT: 01 (4.8)

ROT
24 (30.4)
02 (18.2)
ROA: 07 (29.2), LOA: 04 (16.7), LOT: 01 (4.2), ROP: 03 (12.5), DOA: 01 (4.2)

LOA
05 (06.3)
01 (20.0)
LOT: 05 (35.7), ROT: 1 (7.1), ROA: 1 (7.1), ROP: 1 (7.1)

ROA
11 (13.9)
02 (18.2)
ROT: 07 (63.6), LOA: 02 (18.2)

LOP
05 (06.3)
01 (20.0)
LOT: 02 (40), ROA: 02 (40)

ROP
04 (5.1)
04 (100)
—

Total
79 (100)
29 (36.7 )

Table 4: Comparison of the fetal head position by ultrasound and vaginal examination done by senior residents.

Fetal head position
Actual number diagnosed by ultrasound (%)
Agreement in vaginal examination (%)
Other findings in vaginal examination (%)

LOT
28 (50.9)
09 (32.1)
LOA: 14 (50.0), DOA: 01 (3.6), ROA: 01 (3.6), ROT: 03 (10.7)

ROT
09 (16.4)
01 (11.1)
ROA: 05 (55.6), LOT: 01 (11.1), LOA: 02 (22.2)

LOA
04 (07.3)
02 (50.0)
LOT: 01 (25.0), ROA: 01 (25.00)

ROA
05 (9.1)
00 (00.0)
ROT: 02 (40.0), LOA: 02 (40.0), LOT: 01 (20.0)

LOP
05 (9.1)
00 (00.0)
LOT: 02 (40.0), ROA: 01 (20.0), ROT: 01 (20.0), LOA: 01 (20)

ROP
03 (5.5)
01 (33.3)
LOA: 01 (33.3), ROA: 01 (33.3)

DOA
01 (1.8)
00 (00.0)
LOA: 01 (100)

Total
55 (100%)
13 (23.63)

Table 5: Comparison of the fetal head position by ultrasound and vaginal examination done by junior residents.

Fetal head position
Actual number diagnosed by ultrasound (%)
Agreement in vaginal examination (%)
Other findings in vaginal examination (%)

LOT
12 (38.7)
03 (25.0)
LOA: 06 (50.0), DOA: 01 (8.3), ROT: 01 (8.3), ROA: 01 (8.3)

ROT
05 (16.1)
01 (20.0)
ROA: 02 (40.0), LOA: 01 (20.0), LOT: 01 (20.0)

LOA
08 (25.8)
04 (50.0)
LOT: 02 (25.0), ROT: 02 (25.0)

ROA
02 (6.5)
01 (50.0)
LOA: 01 (50.0)

LOP
01 (3.2)
00 (00.0)
LOT: 01 (100)

ROP
03 (9.7)
01 (33.3)
LOA: 01 (33.3), ROT: 01 (33.3)

Total
31 (100)
10 (32.25)

4. Discussion

Accurate intrapartum determination of fetal head position is considered important for the management of both normal and abnormal labor. Few studies have reported on the use of ultrasound scanning for the evaluation of fetal occiput position in first stage of labor. Studies [1–3] found an error rate of 50% to 76% with vaginal examination when ultrasound examination findings were used as the gold standard. Our results indicate that vaginal examination was inaccurate in defining the fetal position during first stage of labor in up to 69% of cases. When vaginal examination findings within of the ultrasound assessment were assigned as correct, the rate of error decreased to 34%, which is still a considerably high error rate. In 7.8% () of cases vaginal examinations differed by from the sonographically depicted fetal head position. This demonstrates the examiners correct identification of the sagittal suture, yet incorrect designation of the anterior and posterior fontanels. The reason for this error may be failure to examine the patient abdominally before doing a vaginal examination. If the fetal back is correctly identified during abdominal examination and correlated with vaginal examination, the accuracy of vaginal examination can be improved.

Results related to the experience of the obstetrician in determining the position of the fetal head are conflicting. We did not see a significant difference between consultant’s and resident doctor’s ability to determine position by vaginal examination, whereas Zahalka et al. [7] found that, with the analysis modality, vaginal examinations performed by consultants were significantly more consistent with ultrasound than were vaginal examinations performed by senior residents (58% versus 33%, resp., ).

In our cohort, 60% of the fetal heads were in occiput transverse location. Of note, occipitoposterior position was observed in 12% of women in first stage of labor. This was in accordance with other studies [8]. We believe that persistent occiput posterior forms a special risk group for operative delivery. Therefore, early diagnosis could help obstetricians to provide woman with additional information about the need for operative delivery. Specifically accurate assessment of fetal head position is the most important determinant of successful and safe instrumental delivery. Studies performed by Akmal et al. [9] and Wong et al. [10] were able to demonstrate that ultrasound scanning of the fetal head position should be performed routinely before instrumental delivery. In conclusion, we found that vaginal examination was associated with an overall high rate of error in fetal head position determination. These data support the idea that intrapartum application of transabdominal ultrasound significantly enhances correct determination of fetal head position during first stage of labor.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

S. Akmal, E. Tsoi, N. Kametas, R. Howard, and K. H. Nicolaides, “Intrapartum sonography to determine fetal head position,” Journal of Maternal-Fetal and Neonatal Medicine, vol. 12, no. 3, pp. 172–177, 2002.

D. M. Sherer, M. Miodovnik, K. S. Bradley, and O. Langer, “Intrapartum fetal head position I: comparison between transvaginal digital examination and transabdominal ultrasound assessment during the active stage of labor,” Ultrasound in Obstetrics and Gynecology, vol. 19, no. 3, pp. 258–263, 2002.

S. Akmal, E. Tsoi, and K. H. Nicolaides, “Intrapartum sonography to determine fetal occipital position: Interobserver agreement,” Ultrasound in Obstetrics and Gynecology, vol. 24, no. 4, pp. 421–424, 2004.

D. M. Sherer, M. Miodovnik, K. S. Bradley, and O. Langer, “Intrapartum fetal head position II: comparison between transvaginal digital examination and transabdominal ultrasound assessment during the second stage of labor,” Ultrasound in Obstetrics and Gynecology, vol. 19, no. 3, pp. 264–268, 2002.

M. R. Chou, D. Kreiser, M. M. Taslimi, M. L. Druzin, and Y. Y. El-Sayed, “Vaginal versus ultrasound examination of fetal occiput position during the second stage of labor,” American Journal of Obstetrics and Gynecology, vol. 191, no. 2, pp. 521–524, 2004.

O. Dupuis, S. Ruimark, D. Corinne, T. Simone, D. André, and R. René-Charles, “Fetal head position during the second stage of labor: comparison of digital vaginal examination and transabdominal ultrasonographic examination,” European Journal of Obstetrics Gynecology and Reproductive Biology, vol. 123, no. 2, pp. 193–197, 2005.

N. Zahalka, O. Sadan, G. Malinger et al., “Comparison of transvaginal sonography with digital examination and transabdominal sonography for the determination of fetal head position in the second stage of labor,” American Journal of Obstetrics and Gynecology, vol. 193, no. 2, pp. 381–386, 2005.

M. Gardberg, E. Laakkonen, and M. Sälevaara, “Intrapartum sonography and persistent occiput posterior position: a study of 408 deliveries,” Obstetrics and Gynecology, vol. 91, no. 5 I, pp. 746–749, 1998.

S. Akmal, N. Kametas, E. Tsoi, C. Hargreaves, and K. H. Nicolaides, “Comparison of transvaginal digital examination with intrapartum sonography to determine fetal head position before instrumental delivery,” Ultrasound in Obstetrics and Gynecology, vol. 21, no. 5, pp. 437–440, 2003.

G. Y. Wong, Y. M. Mok, and S. F. Wong, “Transabdominal ultrasound assessment of the fetal head and the accuracy of vacuum cup application,” International Journal of Gynecology and Obstetrics, vol. 98, no. 2, pp. 120–123, 2007.