International Journal of Nuclear Energy

Volume 2014 (2014), Article ID 751070, 9 pages

http://dx.doi.org/10.1155/2014/751070

Research Article

Development of Thermal Models and Analysis of UO₂-BeO Fuel during a Loss of Coolant Accident

Deepthi Chandramouli¹ and Shripad T. Revankar1,2

¹School of Nuclear Engineering, Purdue University, West Lafayette, IN 47907, USA

²Division of Advanced Nuclear Engineering, POSTECH, Pohang, Gyeongbuk 784-790, Republic of Korea

Received 29 June 2014; Revised 22 July 2014; Accepted 5 August 2014; Published 26 August 2014

Academic Editor: Adem Acir

Copyright © 2014 Deepthi Chandramouli and Shripad T. Revankar. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Small fraction of high conductivity BeO in UO₂ fuel significantly improves thermal conductivity and also affects the overall performance of the fuel during steady state operation and during transients. In this study, performance of UO₂-BeO composite under transient conditions such as loss of coolant accident (LOCA), using FRAPTRAN (fuel rod analysis program transient), was carried out. The subroutines in FRAPTRAN code that calculate key thermophysical properties such as thermal conductivity, specific heat capacity, and specific enthalpy were modified to account for the presence of the BeO in UO₂. The fuel performance parameters like gas gap pressure, energy stored in fuel, and temperature profiles were studied. The simulation results showed reductions in fuel centerline temperatures and lower temperature drop across fuel rod cross-section under normal fuel operations. It was observed that there was reduction in gas gap pressure and energy stored in fuel. Transient conditions involving cladding rupture were investigated and important performance parameters such as cladding strain were studied. During these transients, the addition of BeO to UO₂ fuel seems beneficiary.

1. Introduction

Commercial nuclear reactors use uranium oxide, UO2, as a nuclear fuel. It is being used as a common nuclear fuel due to ease in its fabrication and good performance. However, it has a low thermal conductivity in the range of 2–8 W-m/K for temperature range from room temperature to 1000°C with decreasing value at high temperatures. There are efforts to increase its thermal conductivity by addition of compounds like BeO [1] and SiC. UO₂-BeO composite has better temperature stability when compared to UO₂-SiC. Many studies have been taken up to study the performance UO₂-BeO fuel. The BeO is chosen as high thermal conductivity material in UO₂ because in the nuclear fuel materials the BeO has been found to be most compatible for the UO₂ fuel as an additive to enhance the thermal conductivity. BeO has one of the highest thermal conductivity ceramics and can withstand the radiation environment and does not react with UO₂ up to 2200°C. This study focuses on studying the performance of UO₂-BeO using FRAPTRAN (fuel rod analysis program transient).

FRAPTRAN is a fuel performance code used to calculate the response of single fuel rods to operational transients and hypothetical accidents at burnup levels up to 62 gigawatt-days per metric ton of uranium (GWd/MTU) [2, 3]. This code is typically used for analyzing fuel rod response to transients and accidents like reactivity induced accident (RIA) and loss of coolant accident (LOCA) for pressurized water reactor (PWR) and boiling water reactor (BWR).

Studies pertaining to UO₂-BeO fuel started early, right from the 1960s. Irradiation behavior of UO₂-BeO fuel as a function of fuel-particle size was studied by Johnson and Mills [4] in a program undertaken at General Atomic as a part of Experimental Beryllium Oxide Reactor Program to study the relative high temperature performance of BeO-UO₂ containing 30% vol UO₂ present in the form of fine and coarse particles. It was observed that greater quantity of Kr was released from fuel pellets containing coarser particles than finer ones. In a study by Titus and Saling [5] on the performance of two particular compositions of UO₂-BeO composite, namely, 70% and 80% wt UO₂, it was found that cladding of the one with 80% suffered severe swelling due to rupture. Performance of 70 wt% UO₂-BeO was considered to be suitable for use in ML-1 reactor.

In a study taken up by Freed et al. [6] on development of UO₂-BeO fuels, experiments were run with different compositions of UO₂-BeO fuel in the range 30–60% vol UO₂. They reported test results like cladding swelling and fission gas release for the composite fuel at different ranges of burnup. In the studies mentioned, it can be noted that the composition of BeO is higher than what is being taken up in the current work (~10 vol % BeO in UO₂). There has been significant research on UO₂-BeO fuel in this composition range too. Ishimoto et al. [7] studied the thermal conductivity of UO₂-BeO pellet (0.3, 0.6, 0.9, 1.2 and 13.6 wt% BeO) and they concluded that there is a significant enhancement of thermal conductivity with BeO addition and that it was more for continuous type than the dispersed phase.

Latta et al. [8] focused on modeling and measurement of thermal properties of ceramic composite fuel for light water reactors. They used a finite element analysis computer program, ANSYS, to simulate thermal modeling of fuel composites consisting of BeO and SiC as secondary phases (0–15% wt) dispersed in UO₂ matrix. The results from thermal modeling were also verified with experimental results. McCoy and Mays [9] studied the fuel performance and neutronics of enhanced thermal conductivity nuclear fuel with BeO. They took up two compositions of the composite (4% and 9.6% vol BeO) along with pure UO₂. COPERNIC fuel rod performance code was used for their simulations and they observed reduced temperatures, internal rod pressures, and fission gas release, even with modest (5–10%) increases in thermal conductivity. Here, the performance of UO₂-BeO composite is studied under transient conditions, using FRAPTRAN. Revankar and Zhou [10] performed thermal analysis of the UO₂-BeO composite fuel using analytical models, CFD calculations, and RELAP5 code analysis. The fuel considered for this was developed using method developed by Sarma et al. [11] using green granules method.

2. FRAPTRAN Code and Validation

2.1. FRAPTRAN Code

FRAPTRAN [2, 3] is a transient single rod code that can calculate thermal quantities such as radial temperature profile and fission gas release to the gap and mechanical quantities such as creep deformation and irradiation growth. The range of models and correlations included in these codes is quite similar to that for the steady state codes like FRAPCON. The major difference is that, being a transient analysis code, it does not include long-term phenomena like creep. Also, it does not have models correlations and properties for cladding plastic stress-strain behavior at elevated temperatures, effects of annealing, behavior of oxides and hydrides during temperature ramps, phase changes, and large cladding deformations such as ballooning. The mechanical description of the cladding is two-dimensional ideally, but one-dimensional models are used as well.

Many phenomenological models are required to calculate performance of fuel rods, under transients especially. Models that are a part of FRAPTRAN are as follows:

(i)heat conduction;(ii)cladding stress and strain;(iii)rod internal gas pressure.

Aforesaid models are more general and they consist of several specific models. Order of these general models is shown in Figure 1. Interaction of these models is in an iterative manner and a variable that is calculated in one of the models is considered an independent variable by the other models; for example, fuel-cladding gap size which is calculated by deformation model is treated as an independent variable by thermal model. This implies that the value of fuel-cladding gap size assumed by thermal model on the first iteration of a new time step is equal to the value calculated by deformation model in the previous time step. For every new iteration, value of fuel-cladding gap size assumed by thermal model will be that calculated by deformation model in the ()th iteration.

Figure 1: Flowchart illustrating order of general models in FRAPTRAN.

FRAPTRAN uses the standard material properties package MATPRO, same as that used by FRAPCON or RELAP. Simulating the performance of UO₂-BeO was done by modifying a few subroutines that calculate thermophysical properties in FRAPTRAN.

2.2. Thermal Conductivity

Thermal conductivity plays an important role in determining temperature distributions. This property, along with closely associated models for the effect of fuel cracking on temperature distributions within the fuel, is critical to accurate predictions of fuel rod behavior in both steady state operation and offnormal transients because fuel rod behavior is strongly dependent on temperature. In FRAPTRAN, thermal conductivity of the fuel is calculated in a subroutine called fthcon.f. This subroutine returns the value for fuel thermal conductivity calculated as a function of fuel temperature, density composition, and fuel burnup [12]. Consider

where k = thermal conductivity, W/m-K, T = temperature in K, Bu = burnup in GWd/MTU, = effect of fission products in crystal matrix (solution) = 0.00187 × Bu, = effect of irradiation defects = 0.038·Bu0.28, = temperature dependence of annealing on irradiation defects = 1/(1 + 396 exp(−Q/T)), Q = temperature dependence parameter = 6380 K, A = 0.0452 m-K/W, B =  m-K/W/K, E = 3.5e9 W-K/m, and F = 16361 K.

The MATPRO package lists an expression for thermal conductivity for Gadolinia additions. A similar expression is being used here for thermal conductivity for UO₂-BeO composite. This correlation was verified with FEM thermal modeling results which were verified with experimental results by Ishimoto et al. [7]. The modified correlation for UO₂-BeO thermal conductivity is as follows [12]:

In the above expression, V stands for percentage of volume addition of BeO. In Figure 2, thermal conductivities of UO₂, BeO, and eutectic mixture of UO₂ and 13.6 wt% of BeO are shown for comparison.

Figure 2: Thermal conductivities of UO₂ BeO and the eutectic mixture of UO₂ with 13.6 wt% of BeO.

2.3. Thermal Expansion

Thermal expansion of the fuel is calculated in the subroutine “fthexp.f.” Thermal expansion can be defined as dimensional changes in unirradiated fuel pellets caused by changes in temperature. These dimensional changes are critical as they affect the pellet to cladding gap size, which is a major factor in determining gap heat transfer and thus stored energy, an important parameter for safety analysis.

MATPRO calculates this property for mixed oxide fuel (MOX) by combining the contribution from each constituent, that is, urania and plutonia in proportion to its weight fraction. The material properties package uses a mass weighting of properties for MOX which is a combination of UO₂ and plutonium oxides. Hence, in our case, where the fuel is a combination of UO₂-BeO, the same technique is used. The composition of fuel used here is UO2 with 10% vol BeO. So, in order to express this as a mass percentage of BeO, we do the following [12]:

where ’s are the volume fractions and ’s are the mass fractions of the two components. Since density is itself a function of temperature, we find that the mass fractions also vary a little with temperature.

Thus, we have thermal expansion of urania as a function of fuel temperature given by

Thermal expansion of Beryllia is obtained from Freed et al. [6]. Data was available for a temperature range of 700–1800 K. For temperatures below 700 K, a constant value of thermal expansion at 700 K is used and similarly, for temperatures above 1800 K, a constant value of that at 1800 K is used. Calculations were done for a temperature range of 300–3000 K.

As a result of mass weighting, for 10% volume addition of BeO, it is found that

In Figure 3, the thermal expansion for UO₂, BeO, and 10% volume BeO-UO₂ composite is shown as function of temperature.

Figure 3: Plot of thermal expansion as a function of temperature for pure urania, Beryllia, and that of composite UO₂ with 10 Vol% BeO.

2.4. Specific Heat

Specific heat capacity of a material can be defined as the heat required raising the temperature of unit mass of a given substance by one degree. Specific heat capacity of nuclear fuel is required for time dependent temperature calculations. Specific heat of the fuel is calculated in a subroutine called fcp.f. It is calculated as a function of temperature mainly, according to the following relation [12],

where FCP = specific heat capacity (J/kg K), T = temperature (K), Y = oxygen-to-metal ratio, R = universal gas constant = 8.3143 (J/mol K), θ = the Einstein temperature (K) = 535.285 K, ED = activation energy for Frenkel defects (J/mol) = 1.577 × 10⁵ J/mol. The constants ’s have the following values for UO₂—, K ₁ = 296.7, K ₂ = 2.43 × 10⁻², and K ₃ = 8.745 × 10⁷.

Specific heat of BeO is given as [12–14]

Using mass weighting of the properties, an expression for specific heat of the composite fuel UO₂ with 10 vol % BeO was formulated as follows [12, 14]:

In Figure 4, the specific heat for UO₂, BeO, and 10% volume BeO-UO₂ composite is shown as function of temperature.

Figure 4: Specific heat as a function of temperature for pure urania and Beryllia along with that of the composite of composite UO₂ with 10 Vol% BeO.

2.5. Specific Enthalpy

The other property that was modified in FRAPTRAN was specific enthalpy. The subroutine “fenthl.f” calculates specific enthalpy of the fuel in FRAPTRAN. Expression used in “fenthl” comes from MATPRO and is as follows [12]:

In the above expression, all quantities have the same definition as in “fcp.f” subroutine. The specific enthalpy of BeO is given by [14]

For UO₂-BeO composite, enthalpy was calculated as per mass weighting, similar to specific heat. The following expression was derived [12]:

In Figure 5, the specific enthalpy for UO₂, BeO, and 10% volume UO₂-BeO composite is shown as function of temperature.

Figure 5: Specific enthalpy as a function of temperature for pure urania and Beryllia along with that of the composite of composite UO₂ with 10 Vol% BeO.

2.6. Code Model Validation

Validation of the code was carried out with material test case -4. This case consists of 12 full-length PWR rods subjected to adiabatic heatup followed by reflood. A preconditioning phase for the nonirradiated test rods was conducted for this test with water cooling at a pressure of 8.27 MPa and a flow rate of 16.3 kg/s. Two short runs to full power were made under these conditions to permit the fuel pellets to crack and relocate. Three transients were run prior to the actual test for MT-4 (designated MT-4.04). These transients were for reflood calibration and were assuring that the correct powers were used to obtain the desired cladding heatup rate of ~8.3 K/s. In the desired transient (MT-4.04), there was a short heatup phase of approximately 1.5 minutes and a longer phase at temperature that lasted approximately 20 minutes. Reflood was initiated 57 seconds after steam flow was shut off. The axial power input is in the form of a chopped cosine curve.

Results obtained from this simulation were compared to those discussed in FRAPTRAN assessment. They are also compared to the experimental results obtained. Table 1 illustrates this. In the table, we find that the results obtained are almost identical to the FRAPTRAN results reported in FRAPTRAN assessment.

Table 1: Comparison of results.

Parameter

Value

Rupture time (s)
Measured
55 (52–58)

FRAPTRAN assessment
42.5

Current simulation
30

Rupture location (m)
Measured
2.68

FRAPTRAN assessment
~2

Current simulation
2.286 m

Rupture hoop strain %
Measured
72

FRAPTRAN assessment
22 at node 7

Current simulation
19.5

Materials test-1 was conducted in the National Research Universal (NRU) reactor by the US Nuclear Regulatory Commission (NRC) with an objective to perform simulated LOCA. In this case, first the existing steam in the core is discharged. After some time interval reflood water enters the core. However due to overheating of the rods occurs while steam is discharged and increase in rod internal pressure occurs leading to fuel rod rupture with leakage of fission gases. With this as the primary case whose input deck was available in the user manual of FRAPTRAN, input decks for three other cases were created, each having different input coolant conditions. The dimensions of the fuel rod and the heat input profile were all retained, however.

3. Description of Test Cases

Four different case studies were performed with two different fuels: UO₂ and UO₂-BeO (10% vol) fuel rods. The three test cases, Case 1, Case 2, and Case , are steady state cases. The materials test-1 (MT-1) was transient case which was conducted in the National Research Universal (NRU) reactor by the US Nuclear Regulatory Commission (NRC) with an objective to perform simulated LOCA.

With MT-1 as the primary case whose input deck was available in the user manual of FRAPTRAN, input decks for three other cases were created, each having different input coolant conditions. The dimensions of the fuel rod and the heat input profile were all retained, however. Descriptions of these cases are briefly given below. Fuel rod specifications for MT-1 case are shown in Table 2.

Table 2: Fuel rod specifications for MT-1.

Parameter
Value

Pellet outer diameter
8.26 × 10⁻³ m

Cladding

    Inner diameter
8.41 × 10⁻³ m

    Outer diameter
9.63 × 10⁻³ m

Total stack length

(Active length was 2.74 m as 0.92 m was out of the NRU Core)
3.66 m

The fuel rod was divided into twelve nodes in the axial direction each node at a distance of 1 ft. In the axial direction, linear heat input is given in form of a cosine curve. In the radial direction, the heat input was given uniformly.

Case 1. In this case, the coolant is given at inlet in the liquid state. The following parameters define test conditions:

 heat rate was taken as 15.5 kW/m = 5.256 kW/ft; coolant flow rate = 2.67e6 lb/ft2-hr; system pressure = 2250 psi; coolant inlet temperature = 565 F corresponding inlet enthalpy of 566 BTU/lb was given; coolant outlet is also in the liquid state, that is, below saturation (in a single phase).

Case 2. In this case, with the same conditions as in Case 1, except that the inlet is two-phase coolant, the inlet temperature is at saturation (~618 K). Corresponding fuel enthalpy is calculated and given in the input deck. For this case, the coolant temperature is always a constant and quality alone increases.

Case 2(a). As an extension to the previous case, mass flux from the previous case alone is lowered and kept as low as possible to avoid cladding elastic strain rates becoming high. This was done so that the coolant gets heated up quickly forming steam somewhere at the midheight of the fuel rod.

MT-1. Ambient pressure in this case is very less, about 40 psi. Initially, there is steam at very high enthalpy (1273 BTU/lb). Flow of steam is also less, 9.72e4 lb/ft²-hr. The initial steam coolant empties after 10 seconds and reflooding occurs 32 seconds later. Reflood water has a temperature as shown in Figure 10. Flow rate of the reflood water is constant at 2 in/s.

4. Discussion of Results

4.1. Radial Temperature Profiles

Radial temperature profiles (temperature as a function of radial distance) at three nodes (node 1, node 6, and node 12) are shown for the cases, Case 2 and Case in Figures 6 and 7. Since the linear heat rate has a cosine form, temperatures at the lower most and upper most nodes are not too high. From these graphs, it can be clearly seen that the effect of BeO addition to the fuel causes a decrease in the temperatures attained. The drop in temperature with BeO addition is higher as the axial height of the nodes is increased till about the mid height where temperature hits maximum (nodes 6-7). Reason for this is that the linear heat rate peaks at the mid height of the rod.

Figure 6: Comparison of radial temperature profile For Case 2, UO2, and UO₂-BeO fuels.

Figure 7: Comparison of radial temperature profile For Case , UO2, and UO₂-BeO fuels.

As far as the MT-1 case is concerned, since this is not a steady state case, the radial temperature distribution is not the same at all instants. The cladding temperatures at different time instants are shown in the Figure 8.

Figure 8: Cladding temperature For MT-1 Case.

With data from the graph above, the radial temperature profile at the time instant where maximum transfer of heat occurs is obtained. For example, for node 1, it is at the 40th second and around at 60 seconds for the second node.

Figure 9 shows the comparison of the radial profiles for UO₂ and UO₂-BeO fuel for MT-1 case.

Figure 9: Comparison of radial temperature profile for the first node at 40 s for MT-1 case.

Figure 10: Comparison of cladding axial strain at node 4 for MT-1. The dashed line shows case with coolant flux of 1 × 10⁻⁵ kg/m²s.

We find that the reduction in temperature is not significant for this case. Also, a steep drop in temperature occurs in the gas gap. This occurs because of greater quantities of gases due to rod burst.

4.2. Cladding Strain

Cladding axial strains do not vary in case of steady state. In these cases (Case 1, Case 2, and Case ), cladding remains intact. However, in the case of MT-1, the fuel rod ruptures and significant reductions in cladding strains were observed. Examples of cladding axial strains at two nodes (fuel rod locations) are shown as a function of time in Figures 10 and 11. There is sharp drop in strain for UO₂ fuel case at 30 seconds which corresponds to the cold water injection.

Figure 11: Comparison of cladding axial strain at node 7 for MT-1. The dashed line shows case with coolant flux of 1 × 10⁻⁵ kg/m²s.

The difference in cladding strains upon using BeO fuel can clearly be observed in these plots. While looking at these plots, it can be seen that the maximum value of cladding strain occurs at different time instants for different nodes. The time instants for different nodes are mentioned in Table 3.

Table 3: Time taken to attain maximum strain for MT-1.

Node
Time at which maximum strain was observed (s)

4
62.5

5
80

6
92.5

7
127.5

8
97.5

9
67.5

The cladding strain depends on axial power profile and cooling due to reflood. Node 7 has the highest heat input and, given that the coolant (reflood water) is fed into the core at the bottom, it takes longer time for the coolant to reach node 7. The combined effect of both these factors could be a reason for node 7 taking maximum time for maximum cladding strain to occur.

To conclude, it is observed that BeO addition fuel causes a significant drop in the cladding strain values when failure of the fuel rod occurs.

4.3. Gas Gap Pressure

Table 4 summarizes the results of gas gap pressure for MT-1 case. With the use of BeO fuel, a small drop in gas gap pressures is observed from FRAPTRAN simulations, for the cases in which the core remained intact.

Table 4: Comparison of gas gap pressure for MT-1.

Case
Gas gap pressure (MPa)
Reduction %

UO₂ fuel
UO₂-BeO fuel

Case 1
4.2242
4.0742
3.55%

Case 2
4.3528
4.196
3.60%

Case 2(a)
2.8204
2.8204
—

Even though rupture did not occur in Case , there was no significant change in the gas gap pressure as the temperatures reach very high values and cladding strains are also excessive in this case. The reduction in gas pressures in the MT-1 case is also almost nil due to a gas breach. It can be concluded, hence, that the gas gap pressure is reduced when the cladding remains intact, that is, when there is enough cooling so that cladding strains are not too large.

4.4. Energy in Fuel Rod

Energy in the fuel was compared between UO₂ fuel and UO₂-BeO fuel. It was found that there is a drop in this value and the percentage reduction is highest at the mid height of the rod where peaking of cosine curve occurs. Plot of this parameter as a function of axial height is shown in the Figure 12. It can thus be concluded that there is a small drop in energy in fuel upon using BeO fuel and the extent of drop depends on the temperature/heat input at that particular node. A similar trend was observed for the other cases also.

Figure 12: Comparison of energy stored in fuel rods for Case 1.

5. Conclusions

The aim of this study, to model and study the performance of a composite fuel UO₂-BeO using a fuel performance code, FRAPTRAN was accomplished. Subroutines that calculate thermal conductivity, specific heat, and specific enthalpy of the fuel were modified for the new fuel. For thermal conductivity, an expression similar to that used for calculation of thermal conductivity of the oxide fuel was used. This expression agreed with thermal modeling results which were in accordance with experimental results. For specific heat and specific enthalpy, mass weighting technique was used. Using FRAPTRAN, performance of this composite was studied under a series of conditions ranging from normal operation to a rupture scenario. For this purpose, four different cases were run with input decks created accordingly. Key conclusions include the following.

A significant reduction in fuel centerline temperatures was observed in the cases that ran for normal operation scenario, as reported in the literature by Latta et al. [8]. This was, however, not so significant under a rupture scenario. Gas gap pressure was found to reduce with the addition of BeO to UO₂. A reduction of about 3.6% in values of gap pressure was observed in the cases of normal operation.

Energy in fuel was also found to reduce with addition of BeO to nuclear fuel. It was observed that reduction in energy in fuel was highest where the heat input reached its maximum value.

Another important parameter, cladding axial strain, was found to reduce with the use of BeO. This also, like energy in fuel, depends on the heat input given and also on the cooling present.

With these results obtained, it can be concluded that addition of BeO to nuclear fuel gives rise to other advantages like reduction in gas gap pressure, energy in fuel, and cladding strain under conditions of failure or rupture apart from the reduction in fuel centerline temperature and that addition of BeO to nuclear fuel will turn out to be advantageous. It should be noted that the MT-1 case test was carried out with zero burnup fuel. And the properties used here for UO₂-BeO fuel are for zero burnup fuel. Hence, it can be said that the present results apply to the fresh fuel scenario.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This work was supported by IBC Advanced Alloys Corp.

References

A. C. Victor and T. B. Douglas, “Thermodynamic properties of magnesium oxide and beryllium oxide from 298 to 1200 K,” Journal of Research of the National Bureau of Standards A: Physics and Chemistry, vol. 67, no. 4, pp. 325–329, 1963.

K. J. Geelhood, W. G. Luscher, C. E. Beyer, and J. M. Cuta, FRAPTRAN 1.4: A Computer Code for the Transient Analysis of Oxide Fuel Rods, vol. 1, Pacific Northwest National Laboratory, NUREG/CR-7023, PNNL-19400, 2011.

K. J. Geelhood, W. G. Luscher, C. E. Beyer, and J. M. Cuta, “FRAPTRAN 1.4: integral assessment,” Pacific Northwest National Laboratory Report NUREG/CR-7023, Vol. 2, PNNL-19400, 2011.

D. E. Johnson and R. G. Mills, “Irradiation behavior of BeO-UO₂ fuel as a function of fuel-particle size,” Tech. Rep. GA-4138, General Atomic Division, General Dynamics Corporation, 1963.

G. W. Titus and J. H. Saling, “Army gas-cooled reactor systems program—high temperature irradiation of UO₂-BeO bodies,” AEC Research And Development Report IDO-28600, Aerjet-general Nucleonics, Stanford, Calif , USA, 1963.

M. S. Freed, M. A. DeCrescente, and R. N. Kuhns, “Development of UO₂-BeO fuels,” Tech. Rep. PWAC-436, AEC Research and Development Report, Pratt and Whitney Aircraft, 1965.

S. Ishimoto, M. Hirai, K. Ito, and Y. Korei, “Thermal conductivity of UO₂-BeO pellet,” Journal of Nuclear Science and Technology, vol. 33, no. 2, pp. 134–140, 1996.

R. Latta, S. T. Revankar, and A. A. Solomon, “Modeling and measurement of thermal properties of ceramic composite fuel for light water reactors,” Heat Transfer Engineering, vol. 29, no. 4, pp. 357–365, 2008.

K. McCoy and C. Mays, “Enhanced thermal conductivity oxide nuclear fuels by co-sintering with BeO: II. Fuel performance and neutronics,” Journal of Nuclear Materials, vol. 375, no. 2, pp. 157–167, 2008.

S. T. Revankar and W. Zhou, “Development and thermal characterization of enhanced thermal conductivity BeOeUO2 fuel,” Tech. Rep. PU/NE-09/1, Purdue University School of Nuclear Engineering, 2009.

K. H. Sarma, J. Fourcade, S.-G. Lee, and A. A. Solomon, “New processing methods to produce silicon carbide and beryllium oxide inert matrix and enhanced thermal conductivity oxide fuels,” Journal of Nuclear Materials, vol. 352, no. 1–3, pp. 324–333, 2006.

D. Chandramouli and S. T. Revankar, “Study of performances of UO₂-BeO composted fuel using FRAPTRAN,” Purdue University School of Nuclear Engineering Report PU/NE-12-16, Purdue University School of Nuclear Engineering, 2012.

IAEA, Thermophysical Properties of Materials for Nuclear Engineering: A Tutorial and Collection of Data, IAEA-THPH, Vienna, Austria, November 2008.

A. C. Douglas, “Thermodynamic properties of magnesium oxide and beryllium oxide from 298 to 1200 K,” Journal of Research of the National Bureau of Standards—A. Physics and Chemistry, vol. 67A, no. 4, pp. 325–329, 1963.