Indian Journal of Materials Science

Volume 2014 (2014), Article ID 909506, 5 pages

http://dx.doi.org/10.1155/2014/909506

Research Article

Influence of Al and Ti Additions on Microstructure and Mechanical Properties of Leaded Brass Alloys

Rajab Mohammed Hussein¹ and Osama Ibrahim Abd²

¹Mechanical Engineering Department, University of Al-Anbar, Ramadi, Iraq

²Renewable Energy Research Center, University of Al-Anbar, Ramadi, Iraq

Received 13 April 2014; Revised 1 June 2014; Accepted 5 June 2014; Published 16 July 2014

Academic Editor: Debdulal Das

Copyright © 2014 Rajab Mohammed Hussein and Osama Ibrahim Abd. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Brass has an attractive combination of properties, namely, good corrosion resistance, good wear properties, and high thermal and electrical conductivity. In this study, influence of selected alloy additions (Al and Ti) on performance of leaded brass alloys (CuZn39pb3) was investigated. The observation of microstructures, compression tests, and hardness tests were performed. The results of metallographic and mechanical tests indicate some influence of small amount additives of Al and Ti. Optical emission spectrometer (OES), light optical microscope (LOM), micro-Vickers hardness tester, and compression testing machine were used in this investigation. Consequently, Al had a significant effect on microstructure and mechanical properties of CuZn39Pb3 alloy. A larger compression strength at 0.31% wt of Al was obtained, as compared with the other alloys. Adding of Al and Ti led to the modification of the microstructure; thus, the compression strength was increased.

1. Introduction

Cu-Zn alloy is widely used as an industrial material because of its excellent characteristics such as high corrosion resistance, nonmagnetism, and good machinability. In particular, machinable brass is obtained by adding lead [1]. High copper contents (larger than 60%) are needed to produce products by cold working in order to have a good enough formability. When a good machining behaviour is required, lead is added (until 3%). The benefits conferred by the presence of lead have been appreciated for many years to facilitate chip fracture, reduce cutting forces, increase the machining rate and productivity, reduce tool wear, and enhance surface finish [2].

Major improvements in performance occur when the structure changes from all-beta to alpha + beta [duplex] and from duplex to all-alpha phase. Alloys containing less than 15% Zn are rarely dezincified. Some alloying additions have a large effect on the structure of brass, by altering the proportion of alpha, beta, or gamma phase present [3]. Alloying elements are added as solid solution strengtheners like Al, Mn, and Fe; these additives lead to the increase of the area fraction of hard -phase. However, when these strengtheners are added with large amounts, the coarser and brittle intermetallic compounds form the matrix, and the drastic decrease occurs. Hence, brass alloys require to be strengthened by small amounts of additives to decrease the content of intermetallic compounds (IMCs) and disperse fine in the matrix [4].

Grain refiners are materials added to alloys to aid in nucleation and lead to the production of fine and uniform grain sizes [5]. Grain size has a measurable effect on most mechanical properties. For example, at room temperature, hardness, yield strength, tensile strength, fatigue strength, and impact strength all increase with decreasing grain size [6]. From the earlier work with various alloys and grain refiners, it is well known that boron refines the yellow brass, boron or zirconium refines Enviro Brass III depending on the tin content, and zirconium (added as sponge zirconium) refines the copper alloys containing silicon [7].

In this investigation, those experiments were conducted using brass alloys with very low levels of Aluminum and Titanium. Hence, it will be interesting to evaluate the effect of Aluminum on grain refinement of microstructure and mechanical properties of CuZn39Pb3 brass alloy.

2. Experimental Work

2.1. Alloy Preparation

About 0.5 kg of CuZn39Pb3 brass alloy was prepared using high purity copper (99.99%). For each experiment, copper was added in a clay-graphite crucible of 1 kg capacity and melted using a gas furnace. Both of Zinc and Lead were warped by aluminum foils and added into the melt. About 5% of Zn and 5% of Pb were added to compensate their loss, due to vaporization at temperatures relatively close to the melting point [8]. The melt was subjected to fluxing and degassing using commercially available fluxes and degassing tablets, respectively. The melt was stirred by using graphite rod to achieve the melt homogeneity. After stirring, the melt was held in the furnace for sufficient time. Then, the melt was poured at 980°C in steel mold that was preheated at 500°C in order to avoid sticking of molten alloy and to facilitate a trouble-free melt flow. Cylindrical samples with the diameter of 18 mm and the height of 200 mm were produced. Additional amounts of Al and Ti were added during the melting to study their effect on microstructure of the alloy.

2.2. Microstructural Tests

For microstructural study, the cast samples were cut into disc shape 18 mm in diameter and 5 mm thick from a bar of different alloys prepared. All of the specimens were ground through 220, 320, 500, 800, and 1000 grit silicon carbide papers. Then, they were polished up to 1 μm diamond paste and cleaned with alcohol and etched by solution of 25 mL of HCl, 25 g of FeCl₃, and 100 mL of water. The microstructural images of the specimens were observed by using an optical microscope (XJP-6A), equipped with CANON digital camera. The test was done at 500x magnification. Then, the J-Image software was used to analyze the microstructural images.

2.3. Mechanical Tests

Compression test was carried out using cylindrical specimens with the diameter of 18 mm and the height of 15 mm, machined coaxially to the long bar direction. 200 KN load capacity, 9–500 mm/mint speed rate, wdw-200e universal testing machine was used. Furthermore, micro-Vickers hardness tests were also performed on the cross-section of the specimens using a Qualitest/model QV-1000 testing machine. At least three readings were taken for each sample to obtain the average value. The used load was 100 gf for dwell time of 15 seconds.

3. Results and Discussion

Various types of brass alloys were prepared for different experiments. The chemical composition of these prepared alloys is included in Table 1. Chemical composition analysis was performed by optical emission spectrometer (OES).

Table 1: Chemical composition of brass alloys.

Alloy code
Chemical composition wt%

Cu
Zn
Pb
Al
Bi
Fe
Sn
Cd
Ni
Si
Sb
Mg
Mn
Ti

0
60.07
Rem.
3.03
0.024
0.01
0.12
0.005
0.001
0.31
0.00
0.017
0.001
0.003
—

1
63.34
Rem.
2.75
0.28
0.006
0.06
0.000
0.000
0.04
0.00
0.007
0.001
0.005
—

2
61.8
Rem.
5.24
0.31
0.006
0.08
0.006
0.000
0.21
0.00
0.005
0.000
0.002
—

3
57.41
Rem.
4.36
0.5
0.009
0.08
0.000
0.000
0.035
0.006
0.02
0.000
0.005
—

4
60.34
Rem.
3.27
0.54
0.01
0.12
0.02
0.001
0.49
0.00
0.01
0.000
0.00
—

5
58.8
Rem.
2.7
0.96
0.01
0.21
0.13
0.003
0.068
0.13
0.02
0.001
0.00
—

6
59.96
Rem.
4.09
0.28
0.00
0.09
0.02
0.002
0.31
0.00
0.013
0.000
0.000
0.93

3.1. Microstructural Observation

The effect of various alloying additions on the microstructure of CuZn39Pb3 is not well understood. Also the interaction between the grain refiner and minor alloying additions such as Al and Ti should be evaluated. The results including the analysis of the prepared brass alloys to study the effect of alloying elements on the microstructure of CuZn39Pb3 are shown in Table 1. The microstructure of the base CuZn39Pb3 alloy is presented in Figure 1.

Figure 1: The microstructure of base CuZn39Pb3 alloy (Code 0) at 500x.

The base CuZn39Pb3 alloy has a coarse grain and dendritic structure, contains primary dendrites with some -phase in the interdendritic and grain boundaries. Every other element added to this alloy modifies the structure in both constituents and size.

In this work, the CuZn39Pb3 alloy after addition of 0.28% Al and 0.31% Al still has a coarse and dendritic structure as shown in Figures 2 and 3, respectively. But the dendrites are larger and well distinct. The grain size (Table 2), in these cases, is also larger as compared with base alloy (Code 0). García et al. confirmed that the Al has a significant effect on grain size, when 0.25% Al was added to Cu-Zn-Sn brass alloy (free of boron), and the grain size rating increased from 2 to 4.5 [2].

Table 2: The mechanical properties of the studied alloys.

Alloy code
Al

% wt
Max. compression load (KN)
Deformation (mm)
Hardness (HV)
Grain size (µm)

0
0.024
100.64
4.1887
47.9
9.57

1
0.28
96.56
4.7875
45.82
10

2
0.31
103.92
4.79
44.93
13.35

3
0.5
94.52
3.5975
52.06
8.88

4
0.54
95.32
4.0763
54.10
8.38

5
0.96
97.52
3.1962
53.90
8.7

6
0.28 + 0.93% Ti
101.28
4.3962
49.26
9.51

Figure 2: The microstructure of CuZn39Pb3 alloy after addition of 0.28% Al (Code 1) at 500x.

Figure 3: The microstructure of CuZn39Pb3 alloy after addition of 0.31% Al (Code 2) at 500x.

After an addition of 0.5% Al and 0.54% Al, the microstructure shows a marginal decrease in grain size (Table 2), while clear needles are observed in Figures 4 and 5, respectively. The grains are columnar and have matrix containing mainly -phase with needles dispersed within the matrix.

Figure 4: The microstructure of CuZn39Pb3 alloy after addition of 0.5% Al (Code 3) at 500x.

Figure 5: The microstructure of CuZn39Pb3 alloy after addition of 0.54% Al (Code 4) at 500x.

The grain size of the alloy after 0.96% Al adding seems to be reduced as shown in Figure 6 and Table 2. The grain size in this case is very fine compared to the base CuZn39Pb3 alloy. However, a ring of columnar grains could be still observed in the outer surface indicating lack of grain refinement in this alloy. The microstructure is also very fine.

Figure 6: The microstructure of CuZn39Pb3 alloy after addition of 0.96% Al (Code 5) at 500x.

The microstructure of samples from the experiments, after addition of 0.28% Al and 0.93% Ti, is presented in Figure 7. After adding both of these alloying elements Al and Ti, the grain size is marginally reduced and more uniform, but the structure remains dendritic, as compared with base CuZn39Pb3 structure (Code 0) and alloy (Code 1).

Figure 7: The microstructure of CuZn39Pb3 alloy after addition of 0.28% Al and 0.93% Ti (Code 6) at 500x.

Appon et al. show that Aluminum is known as a promoter of -phase in Cu-Zn alloys and is considered at least 6 times effective than Zn. In other words, 1% Al addition is as effective as 6% of Zn addition [7].

3.2. Mechanical Tests Evaluation

3.2.1. Compression Tests

Compression tests were carried out on various prepared brass alloys. The compression results are shown in Table 2 and Figure 8. Brass alloy with 0.31% Al addition (Code 2) has a larger compression strength than other cast alloys. The grain size of this alloy, after adding of 0.31% Al, is larger as compared with both alloys. But the structure turns to be equiaxed containing mainly with needles dispersed within the matrix. So, because of larger -phase volume fraction, alloy (Code 2) is acquired a higher compression strength.

Figure 8: The results of compression tests for the studied brass alloys.

Figure 9 shows the difference of the compression results between alloy (Code 1) with 0.28% Al and alloy (Code 6) with 0.28% Al + 0.93% Ti additions. The results show that, after the addition of Ti into the alloy, the compression strength increased more than that in the other one, where maximum compression load is about 101.28 KN with deformation of 4.3962 mm, as compared with 96.56 KN and 4.7875 mm for alloy (Code 1) containing 0.28% Al. This confirms the increment in the compression strength after Ti adding.

Figure 9: The results of compression tests for the studied brass alloys 1 and 6.

Figure 10 shows the relationship between compression strength, hardness, and grain size of -phase for the studied brass alloys. From this figure, generally, both of compression strength and Vickers hardness increase with decreasing of the grain size. As a result, increasing of the weight percentage of Al led to the decrease of the grain size; thus, the gain in mechanical properties of brass alloys was acquired. Higher compression strength was for alloy (Code 2); this is due to the increase of the fraction of -phase in alloy containing 0.31% wt of Aluminum.

Figure 10: The compression strength, Vickers hardness, and grain size for the studied brass alloys.

3.2.2. Microhardness Tests

The microhardness tests results are shown in Table 2. Also, any important difference was found in hardness. The difference of the mechanical properties between both alloys can be explained because of the grain refinement of -phase, characterized by higher hardness [8] observed in alloys (Codes 3, 4, and 5), as shown in Figure 10. It is obvious that the addition of Ti into alloy (Code 1) containing 0.28% Al led to the increase of the hardness value and compression strength of alloy (Code 6), as observed in Table 2.

4. Conclusions

The experimental results including the analysis of the prepared brass alloys to study and evaluate the effect of Al and Ti alloying elements on microstructure and mechanical properties of CuZn39Pb3 alloy show the following.

(i)Aluminum has a significant effect on microstructure; grain size and morphology and mechanical properties; compression strength and hardness of CuZn39Pb3 alloy.(ii)The microstructure of CuZn39Pb3 alloy is extensively modified by the addition of Al and Ti.(iii)Adding of 0.31% Al has a larger compression strength as compared with the other alloys.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

H. Imai, Y. Kosaka, A. Kojima et al., “Characteristics and machinability of lead-free P/M Cu60-Zn40 brass alloys dispersed with graphite,” Powder Technology, vol. 198, no. 3, pp. 417–421, 2010.

P. García, S. Rivera, M. Palacios, and J. Belzunce, “Comparative study of the parameters influencing the machinability of leaded brasses,” Engineering Failure Analysis, vol. 17, no. 4, pp. 771–776, 2010.

D. D. Davies, A Note on the Dezincification of Brass and the Inhibiting Effect of Elemental Additions, Copper Development Association, New York, NY, USA, 1993.

A. Haruiko, I. Hisashi, L. Shufeng, et al., “The effect of solid solutionizing Ti element on microstructural and mechanical properties of extruded Cu-40Zn-Ti ternary alloy,” Transactions of JWRI, vol. 40, no. 1, 2011.

R. Cook, “Grain refinement of aluminum-silicon foundry alloys,” in Metallurgy Aluminum, pp. 9–12, London & Scandinavian Metallurgical Co, London, UK, 1998.

D. H. Herring, “Grain Size and its influence on Materials Properties,” The Heat Treat Doctor, dherring@heat.treat.doctor.com

M. Sadayappan, F. A. Fasoyinu, D. Cousineau et al., “Permanent mold casting of copper base alloys,” ICA Project No. TPT-0452-96, Final Report Phase VI MTL 97-1 (TR-R), 1997.

ASM Handbook: Volume 15: Casting, American Society for Metals, Metals Pack, Ohio, USA, 1988.