ISRN Corrosion

Volume 2014 (2014), Article ID 979323, 7 pages

http://dx.doi.org/10.1155/2014/979323

Research Article

Development and Performance Evaluation of Corrosion Resistance Self-Healing Coating

Akshya Kumar Guin, Suryakanta Nayak, Manish Kumar Bhadu, Veena Singh, and Tapan Kumar Rout

Research and Development, Tata Steel Ltd., Jamshedpur 831001, India

Received 6 February 2014; Accepted 25 March 2014; Published 23 April 2014

Academic Editors: M. Aparicio and A. Hermann

Copyright © 2014 Akshya Kumar Guin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Polymer based nanocapsule was developed using core-cell approach, where the core material was methyl diphenyl diisocyanate and the cell material was urea-formaldehyde. The synthesized capsules of 100 to 800 nm size were incorporated into sol-gel matrix to prepare a final coating for steel protection. This coating was found protecting the steel at the damage or crack locations in 3.5% NaCl solution. SEM micrographs confirmed healing of the coating at the damage or crack points.

1. Introduction

Having been inspired by nature, coating designers are trying to convert the traditional coating into the “smart or intelligent” coating. Self-healing is one of the examples of smart coating [1]. When coatings get damaged in the form of cracks induced by mechanical, thermal, and chemical means, regardless of the application, the integrity of the structure is significantly compromised. Since the damage deep inside material is difficult to perceive and to repair in particular, the material would be motivating to have ability of self-repairing through various stimuli response based on physical, chemical, mechanical, or thermal means which trigger the healing process. These progresses have now opened an age of new intelligent materials. Continuous efforts are made to mimic natural materials and to integrate self-repairing capability into polymers and polymer composites. Keeping all this in mind, self-healing concept has drawn considerable research interest in the last few years. Like pharmaceutical industry microcapsule technique is being used in corrosion prevention coatings. Healing is achieved by incorporating healing agents and a catalytic chemicals trigger within a polymer matrix. When coating is damaged by mishandling or misuse of the coated structure microcapsules rupture and active healing agent come out from the shell and with the help of catalyst healing the damage area.

In short, self-healing material provides the following advantages over the conventional coating:

(i)automatic repairing process;(ii)barrier protection of underlying substrates;(iii)autopreservation of aesthetics of surface appearance of coatings, plastic, and films;(iv)restoration of mechanical integrity of load bearing materials as in composites [2–4].

Now researchers are focusing on the development of smart coatings, which are new generation functional coatings with mimicking nature. Self-healing coating is one of the examples of smart coating [5–7]. Conventional barrier protective coating when gets damaged during transportation or fabrication process, cracks or pin hole develops on the damaged area and localized corrosion initiates at that area and gradually propagates to other areas. These types of difficulties in repairing damaged area were well taken care of by scientists, by designing intelligent coatings using core-cell approach. The selection of a core material in a nanocapsule is important because this decides which stimuli response is needed to heal the damage. Self-healing concepts have drawn considerable research interest for pharmaceutical industries and in development of corrosion resistance coatings. When coating is damaged by mishandling or misuse of the coated structure, microcapsules rupture and active healing agent come out from the core through the cell. The core material reacts with the catalyst either in the coating matrix or by moisture to heal the damaged area [8–12].

Present research work emphasized on the development of a methyl diphenyl diisocyanate based nanosize capsule and incorporation of nanocapsule and corrosion resistance pigments like nanolamellar zinc flake into a titania based sol-gel coating matrix to generate the self-healing and corrosion resistance coating on steel substrate (see Table 1).

Table 1: Composition of self-healing coating.

Sr. number
Ingredient
Composition by wt %

1
Titania-precursor
60–63

2
Coupling agent—methyl hydrogen silicone
36–39

3
Nano capsule
0.5–2

4
Zn-Al pigment
1

2. Experiment

2.1. Preparation of Nanocapsules

Capsules were prepared by in situ polymerization in an oil-in-water emulsion as reported by White, Jinglei et al. [2], Trask et al. [3], and Blaiszik et al. [4]. At room temperature (20–25°C), 5 mL of 5.0 wt % polyvinyl alcohol (PVA), urea, formaldehyde, and deionised water were mixed in a 250 mL three neck round bottomed flask connected to a reflux condenser and equipped with a mechanical stirrer. After the urea dissolved pH of the solution was adjusted to 3.5 by slow addition of 1 N NaOH and the temperature was kept at 60–70°C for one hour and then urea-formaldehyde prepolymer solution was obtained.

Under agitation, a slow stream of methyl diphenyl diisocyanate was added to the prepared prepolymer solution to form an oil-in-water emulsion. The tapered 3.2 mm tip sonicator horn of a 750 W ultrasonicator was placed in the solution for 3 minutes at 40% intensity with continuous mixing at 2000 rpm in room temperature. This sonication step changes the emulsion from slightly cloudy to opaque white. 12.67 g formalin (37% formaldehyde) was then added to obtain a 1 : 1.9 molar ratio of formaldehyde to urea. The emulsion was covered and heated at a rate of 1°C/m up to 55°C. After 4 h of continuous agitation at 800–2000 rpm the mixture was allowed to cool at ambient temperature. After cooling, the suspension was filtered by vacuum filtration method. The nanocapsules were properly rinsed with deionised water and air-dried for about 48 h.

2.2. Coating Formulation

The titania sol was prepared by mixing Ti-isopropoxide and 2-methoxy glycol as outlined by our previous work [6, 7]. After 24 h of aging, N-phenyl-3-aminopropyl triethoxy silane was added slowly into the titanium sol in 1 : 1(V/V) mixing ratio at room temperature; this solution is treated as base sol-gel solution. Self-healing coating formulation was prepared by incorporating previously synthesized 1% (by W/V) nanocapsules and 0.5% nanozinc-aluminium laminar alloy pigments (4 : 7 zinc to aluminium ratio by weight percentage, density is approximately 1.1 kg/L, and dimension is 20–50 nm dia and 10–15 micron length) and 1% into the above sol-gel polymer matrix. The commercially available dispersing agent like BYK 3441 (1% of total solid) was used for easy dispersion of pigments in sol-gel matrix. The cold rolled and annealed (CRCA) steel sheets were used for present study; these sheets were cleaned to remove oil and grease and subjected to phosphating in tricationic phosphate base solution to obtain a thin coating of <0.5 micron thickness (2-3 gm/m²). The synthesized sol was applied on the substrate by dipping process, where dipping time was 1 min at room temperature (RT), followed by drying at 150°C for 1 hour.

The probable reaction between titania precursor and coupling agent N-phenyl-3-aminopropyl triethoxy silane is given below (Figure 1(a)).

(a)

(b)

(c)

Figure 1: (a) Probable reaction mechanism of Ti-sol and coupling agent. (b) Reaction scheme of the formation of U-F prepolymer and PUF. (c) Reaction scheme of isocyanate derivative with water.

2.3. Chemical Reaction in Nanocapsules Synthesis

Urea-formaldehyde based nanocapsules were synthesized as described in the experimental part. During the process, core chemicals like methyl diphenyl diisocyanate were covered with urea-formaldehyde (UF) resin. This reaction was carried out by in situ polymerization in an oil-in-water emulsion, where PVA is used as an emulsifying agent. The synthesis of nanocapsule in urea and formaldehyde backbone is a two-step process. First step is the methylation where formaldehyde reacts with urea, as shown in Figure 1. In the second step, the condensation reaction between the various methylol species and amines takes place. At low pH, the produced UF resins cure irreversibly to form a cross-linked network and this reaction can be induced by addition of further ammonium chloride. Resorcinol was used to improve the cocondensation reaction products.

The core chemical of nanocapsule contains isocyanate group. During the initiation of any crack, this isocyanate group reacts with water and moisture present in atmosphere and heals the damaged area.

3. Results and Discussion

3.1. Nanocapsule  Characterization

A series of characterisation tests were carried out for capsules to understand the capsules morphology, physical properties, and stability. Cell wall integrity, aggregation, and nanocapsule sizes were observed by scanning electron microscope (SEM).

3.1.1. Capsule Size Analysis

Capsule size analysis was performed by SEM; the capsule’s size fall in a wide range of 20–250 micrometer without the application of ultrasonicator. Microcapsule sizes decrease extensively to an order of 200–800 nm by using ultrasonicator treatment for about 3 min. The reason for this, is that the fluid flows away from the propeller, many large microeddies exist, and in the vicinity of the propeller blades many small microeddies exist, which results in a wide length scale. The capsule size can be controlled by adjusting the agitation rate. In the present study at 2000 rpm with 3 min ultrasonicator, the average diameter of the prepared capsule is found to be 200–800 nm.

3.1.2. Nanocapsule Surface Morphology

Figure 2 shows the SEM morphology of nanocapsule. It was observed that the shape of nanocapsule is spherical and the surface of nanocapsule is rough and shaggy. There is a possibility of uniform distribution of nanocapsules, which covered the substrate fully for better corrosion and self-healing property.

Figure 2: SEM image of microcapsule with 100–200 nm dia.

3.1.3. Thermal Resistance of Nanocapsules

The thermal stability of nanocapsules plays an important role in their application in self-healing composites. Figure 3 shows TGA diagram of nanocapsule with UF wall shell, weight loss near 100°C is mainly due to the removal of entrapped residual water, and the elimination of free formaldehyde. The weight loss at temperature between 200 and 300°C is mainly due to the decomposition of the PUF shell wall [13, 14]. The residue undergoes extensive fragmentation near 400°C and the prepared nanocapsules have a good thermal stability.

Figure 3: TGA-DTA graph of urethane capsule.

3.1.4. Characterization of Nanocapsule by FTIR

It is seen from the FTIR spectra in Figure 4, of urea-formaldehyde coated nanocapsule, core chemical, and nanocapsule rupture with water, that all are matching at characteristic peaks of a N–H vibration at 1571 cm⁻¹ a C=O stretching vibration at 1650 cm⁻¹ and a C–H vibration at 1460 cm⁻¹. C–N stretching vibrations are shown at 1286 and 1142 cm⁻¹. This spectrum confirms that the cell material is made of urea-formaldehyde polymer.

Figure 4: FTIR spectra of broken capsule in water.

When the broken capsules are allowed to react with water it shows sharp absorption peaks at 1694 and 1562 cm⁻¹, as shown in Figure 4, which represents the presence of urethane linkage only, which means that core materials are active enough and are reacting with water to form a urethane linkage.

3.2. Self-Healing Ability

After successful preparation, the nanocapsule was embedded in a titania based polymer matrix for achieving self-healing ability. In the present study, 1% of prepared nanocapsules along with 0.5% zinc-aluminium laminar alloy pigments was incorporated in sol-gel matrix and the final coating solution was applied on steel surface. After seven days of aging at room temperature, coated panels were punctured and investigated for self-healing ability. Under this investigation, the punctured coated steel substrates were exposed in 3.5% NaCl solution to check the propagation or healing of punctured area. SEM-EDX techniques were used for evaluation of self-healing property of coating. It was observed from the SEM-EDX analysis, as shown in Figure 5, that self-healing ability was observed within 8 h of damage. Incorporation of nanozinc-aluminium lamellar pigment and nanocapsule enhanced the self-healing property of coated steel. SEM-EDX analysis confirmed the healing ability of coated sample by synergic effect of nanocapsule and zinc-aluminium alloy based sol-gel coating. This self-healing ability can be occurred by two ways; firstly, by the capillary flow of core chemical from the capsule rupture and subsequent interaction with moisture (as shown in Figure 1); secondly by the interaction of zinc-aluminium pigment with moisture, which leads to the formation of zinc and aluminium oxide on the scratch surface (as shown in SEM-EDX, Figure 5).

(a)

(b)

Figure 5: (a) SEM-EDX of initial cut sample. (b) SEM-EDX of self-healing coating after 8 h of cut.

3.3. Corrosion Resistance Study by ASTM B 117 Salt Spray

Salt spray test was conducted to check the coating delamination and blister formation across the inscribed area of coated sample with 6–10 micron dry film thickness and the result is shown in Table 2. It was observed that, due to strong adhesion of self-healing coating with steel surface, there was no trace of osmotic blister formation on coating surface, even after 100 h of exposed in salt spray chamber. After 120 h of exposure, coated panel developed medium size blister which was converted to dance blister after 150 h. The coating showed good barrier and corrosion resistance properties as against uncoated steel sheet which corrode after 2 h of exposure in ASTM B 117 test chamber and 100 h for sol-gel coating without having any self-healing ingredients. The reasonable salt spray resistance of the developed coating might be due to the formation of bonds between polymer molecule and metallic surface and due to presence of laminar structure of Zn-aluminum nanopigment, diffusion of water, and other corrosive ingredients through polymer coating which was delayed. So penetrable damaging efficiency of localized corrosion was reduced by self-healing mechanism.

Table 2: Salt spray test result.

Uncoated steel
Self healing coating
Sol-gel coating (with out self healing ingredient)

2 h
120 h
100 h

3.4. EIS Study

EIS is an excellent tool to study the mechanism and kinetics of the corrosion reaction. The change in impedance spectrum due to immersion in the corrosion environment helps to understand the protective ability of the developed coatings. The resistance obtained at low frequency region is crucial to explain the corrosion resistance performance and intactness of the coatings. In the present study, EIS study of coated samples was carried out between 100 kHz and 0.01 Hz at the Ecorr. Figures 6(a)–6(e) show the EIS graph of coated samples at different intervals of time. The physical values were fitted with the VERSATEC software through appropriate equivalent circuit as shown in Figure 7. The system is assumed to consist of three interfaces with different resistance and capacitance characteristics. The first interface is between sol-gel coating and NaCl electrolyte. Second is the coating and metal substrate and the third is the metal surface where corrosion activity encounters. The spectra revelled three time constants, Rcoat-Qcoat, Rox-Qox, and Rct-Qdl, corresponding to resistance and capacitance of the sol-gel film, intermediate oxide layer, and double layer, respectively. Gradual reduction in Rcoat value with time indicated the attack of coating surface by chloride ions.

(a)

(b)

(c)

(d)

(e)

Figure 6: (a) Initial EIS result of self-healing coated sample. (b) EIS result after 48 h of exposure of self-healing coated sample in 3.5% NaCl solution. (c) EIS result after 96 h of exposure of self-healing coated sample in 3.5% NaCl solution. (d) Initial EIS result of sol-gel coated sample (without any capsule). (e) EIS result after 96 h of exposure of sol-gel coated sample (without any capsule) in 3.5% NaCl solution.

Figure 7: Curve fitting circuit of EIS diagram.

From the EIS graph, as shown in Figures 6(a)–6(e), it has been observed that sample coated with sol-gel based self-healing coating provides good barrier and corrosion resistance property than sample coated with only sol-gel solution (without self-healing capsule) in saline environment. This may be due to strong adhesion of coating with steel and uniform dispersion and coverage of nanocapsules in sol-gel coating. After 48 h of immersion, coating resistance decreased from 43625 ohm/cm² to 24875 ohm/cm², whereas corrosion resistance value dropped below 1000 ohm/cm² for sample coated with only sol-gel solution containing no self-healing capsules. More interestingly there is no additional time constant observed even after 96 h immersion in 3.5% NaCl solution and coating resistance was around 10823 ohm/cm²; this indicates that sample coated provides a good barrier protection and improves corrosion resistance of steel substrate.

4. Conclusions

Methyl diphenyl diisocyanate as core material containing nanosize capsules was prepared using an in situ UF encapsulation by sonication technique. The capsule was found active and remained thermally stable, till 200°C. The nanocapsules and nanozinc-aluminium alloy pigments were successfully incorporated in sol-gel matrix, which provided uniformly coated self-healing coating. Healing effect observed within 8 h of damage was initiated using optical and SEM techniques. This nanocapsule and zinc-aluminium pigments embedded self-healing coating and enhanced corrosion resistance of coated steel.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

The authors would like to thank the Management of Tata Steel Limited for the permission to publish and encouragement to carry out this work.

References

S. K. Ghosh, T. Jana, R. Kumar, and B. Ray, “Self-healing—coating’s perspective & recent advances,” Paints India, vol. 4, p. 85, 2010.

Y. Jinglei, M. W. Keller, J. S. Moore, S. R. White, and N. R. Sottos, “Microencapsulation of isocyanates for self-healing polymers,” Macromolecules, vol. 41, no. 24, pp. 9650–9655, 2008.

R. S. Trask, G. J. Williams, and I. P. Bond, “Bioinspired self-healing of advanced composite structures using hollow glass fibres,” Journal of the Royal Society Interface, vol. 4, no. 13, pp. 362–371, 2007.

B. J. Blaiszik, N. R. Sottos, and S. R. White, “Nanocapsules for self-healing materials,” Composites Science and Technology, vol. 68, no. 3-4, pp. 978–986, 2008.

V. Sauvant-Moynot, S. Gonzalez, and J. Kittel, “Self-healing coatings: an alternative route for anticorrosion protection,” Progress in Organic Coatings, vol. 63, no. 3, pp. 307–315, 2008.

A. K. Guin, S. Nayak, T. K. Rout, N. Bandyopadhyay, and D. K. Sengupta, “Corrosion resistance nano-hybrid sol-gel coating on steel sheet,” ISIJ International, vol. 51, no. 3, pp. 435–440, 2011.

A. Guin, S. K. Nayak, T. K. Rout, et al., “Corrosion behavior of nanohybrid titania—silica composite coating on phosphated steel sheet,” Journal of Coatings Technology and Research, vol. 9, no. 1, pp. 97–106, 2012.

A. Kumar, L. D. Stephenson, and J. N. Murray, “Self-healing coatings for steel,” Progress in Organic Coatings, vol. 55, no. 3, pp. 244–253, 2008.

S. R. White, N. R. Sottos, P. H. Geubelle et al., “Autonomic healing of polymer composites,” Nature, vol. 409, no. 6822, pp. 794–797, 2001.

J. M. Kamphaus, J. D. Rule, J. S. Moore, N. R. Sottos, and S. R. White, “A new self-healing epoxy with tungsten (VI) chloride catalyst,” Journal of the Royal Society Interface, vol. 5, no. 18, pp. 95–103, 2008.

J. M. Kamphaus, J. D. Rule, J. S. Moore, N. R. Sottos, and S. R. White, “A new self-healing epoxy with tungsten (VI) chloride catalyst,” Journal of the Royal Society Interface, vol. 5, no. 18, pp. 95–103, 2008.

S. H. Cho, H. M. Anderson, S. R. White, N. R. Sottos, and P. V. Braun, “Polydimethylsiloxane-based self-healing materials,” Advanced Materials, vol. 18, pp. 997–1000, 2006.

X. He and X. Shi, “Self-repairing coating for corrosion protection of aluminum alloys,” Progress in Organic Coatings, vol. 65, no. 1, pp. 37–43, 2009.

S. V. Lamaka, M. L. Zheludkevich, K. A. Yasakau, R. Serra, S. K. Poznyak, and M. G. S. Ferreira, “Nanoporous titania interlayer as reservoir of corrosion inhibitors for coatings with self-healing ability,” Progress in Organic Coatings, vol. 58, no. 2-3, pp. 127–135, 2007.