Thrombosis
Volume 2015 (2015), Article ID 849142, 6 pages
http://dx.doi.org/10.1155/2015/849142

Research Article

Comparison of Chemical and Mechanical Prophylaxis of Venous Thromboembolism in Nonsurgical Mechanically Ventilated Patients

Dany Gaspard,¹ Karen Vito,² Christa Schorr,² Krystal Hunter,² and David Gerber³

¹Division of Pulmonary and Critical Care Medicine, Cooper University Hospital, Camden, NJ 08103, USA
²Cooper Research Institute, Cooper University Hospital, Camden, NJ 08103, USA
³Division of Critical Care Medicine, Cooper University Hospital, Camden, NJ 08103, USA

Received 31 August 2015; Revised 2 November 2015; Accepted 4 November 2015

Academic Editor: Giovanni de Gaetano

Copyright © 2015 Dany Gaspard et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Thromboembolic events are major causes of morbidity, and prevention is important. We aimed to compare chemical prophylaxis (CP) and mechanical prophylaxis (MP) as methods of prevention in nonsurgical patients on mechanical ventilation. Methods. We performed a retrospective study of adult patients admitted to the Cooper University Hospital ICU between 2002 and 2010. Patients on one modality of prophylaxis throughout their stay were included. The CP group comprised 329 patients and the MP group 419 patients. The primary outcome was incidence of thromboembolic events. Results. Acuity measured by APACHE II score was comparable between the two groups (). Univariate analysis showed 1 DVT/no PEs in the CP group and 12 DVTs/1 PE in the MP group (). Overall mortality was 34.3% and 50.6%, respectively. ICU LOS was similar. Hospital LOS was shorter in the MP group. Multivariate analysis showed a significantly higher incidence of events in the MP prophylaxis group (odds ratio 9.9). After excluding patients admitted for bleeding in both groups, repeat analysis showed again increased events in the MP group (odds ratio 2.9) but this result did not reach statistical significance. Conclusion. Chemical methods for DVT/PE prophylaxis seem superior to mechanical prophylaxis in nonsurgical patients on mechanical ventilation and should be used when possible.

1. Introduction

Venous thromboembolic events (VTE), mainly deep vein thrombosis (DVT) and pulmonary embolism (PE), are significant medical problems and major causes of morbidity and mortality. They are among the most preventable complications in hospitalized patients, resulting in tens of billions of dollars yearly in healthcare costs [1].

Several techniques for prevention of VTE are clinically utilized including mechanical prophylaxis (MP) (Graduated Compression Stockings (GCS) and Intermittent Pneumatic Compression (IPC) devices) and chemical prophylaxis (CP), the most commonly used regimens being subcutaneous unfractionated heparin (UFH) and low molecular weight heparin (LMWH).

Although various methods of VTE prophylaxis have been compared in a number of patient populations, to the best of our knowledge there have been no studies to date directly comparing the efficacy of mechanical and chemical prophylaxis in preventing these events in nonsurgical patients. For this reason, we chose to evaluate the efficacy of these 2 methods in mechanically ventilated, critically ill patients.

2. Material and Methods

We performed a retrospective review of data collected on critically ill, nonsurgical patients admitted to the 30-bed multidisciplinary intensive care unit (ICU) at Cooper University Hospital in Camden, New Jersey. Data was obtained from medical records and from the Project Impact database, which contains demographic, acuity, diagnostic, laboratory, pharmacologic, and clinical data on all patients admitted to the ICU. Information was reviewed and analyzed on patients admitted from October 2002 through August 2010. Institutional Review Board approval was obtained; informed consent was waived. The primary endpoint of the study was the development of deep venous thrombosis or pulmonary embolism.

Data collected included the following baseline demographic and clinical data: age, gender, race, and comorbid conditions (active malignancy, history of DVT/PE, hypertension (HTN), chronic obstructive pulmonary disease (COPD), congestive heart failure (CHF), coronary artery disease (CAD), chronic kidney disease (CKD), and history of cerebrovascular accident (CVA)), as well as acuity (APACHE II score).

Outcome data included ICU length of stay (LOS), hospital LOS, overall mortality, number of days on mechanical ventilation, need for packed red blood cell (PRBC) transfusion, and number of units of PRBC transfused.

Inclusion Criteria. Inclusion criteria include medical patients 18 years of age or greater who remained mechanically ventilated in the ICU for more than 48 hours and who received VTE prophylaxis with one of the following modalities: subcutaneous low molecular weight heparin (LMWH), subcutaneous unfractionated heparin (UFH), or Intermittent Pneumatic Compression (IPC) devices.

Exclusion Criteria. Exclusion criteria include patients younger than 18 years of age, patients not mechanically ventilated or taken off mechanical ventilation within less than 48 hours, patients admitted to the ICU after surgery, patients who were treated with two or more of the above-mentioned therapies during the same ICU admission, patients treated with therapeutic anticoagulation on admission or before reaching the primary endpoint, patients with a known hypercoagulable state, or patients on chronic warfarin therapy.

Treatment Groups. Patients were categorized as falling into 2 treatment groups for the purposes of statistical analysis. Group 1 included patients who had received chemical prophylaxis (i.e., either subcutaneous UFH or LMWH, the available form of the latter used at our institution being enoxaparin). Group 2 included patients who received mechanical prophylaxis (IPC at our institution).

Secondary Evaluation. Admission diagnoses were obtained for all patients. Admission ICD-9 codes were used to divide patients into 2 categories: bleeding (patients admitted for any bleeding disorders) versus nonbleeding (all other patients). Prevalence of bleeding was compared between the 2 groups. Then patients admitted for bleeding were removed and statistical comparison of nonbleeders in both groups was done. APACHE II scores were compared between patients admitted for bleeding and all other patients.

3. Statistical Analysis

Initial results were compared by univariate analysis of the 2 groups. Normally distributed continuous variables were compared by independent -test. The Mann-Whitney test was used to compare the means of continuous variables that were without normal distributions. The Pearson’s chi square test was used to compare the proportions of dichotomous or categorical variables.

Subsequently, a logistic regression multivariate analysis of the results was performed with correction for demographics, comorbid conditions, presence of a central venous catheter, and use of PRBC transfusion, with DVT and/or PE as the dependent variable.

The analysis was performed using SPSS 15.0.1 software.

4. Results

Review of the database identified 11,686 admissions to the ICU from October 1, 2002, through August 31, 2010. Of these, 7696 were admitted for medical/nonsurgical indications; a total of 1998 of these patients were mechanically ventilated for 48 hours or more.

After analysis, 748 patients met the inclusion criteria. 329 were treated with chemoprophylaxis: 267 received subcutaneous UFH and 62 had received subcutaneous LMWH. The remaining 419 were treated with IPC devices. Of the subjects excluded, 3 were removed because of preexisting hypercoagulable states (2 patients with Factor V Leiden, 1 patient for history of antiphospholipid syndrome), 126 for being on Coumadin, 28 for being on Argatroban, 391 for being on a continuous heparin infusion, 49 for not being on any prophylaxis method, and 653 for being on multiple prophylactic methods during their hospital stay.

A total of 14 patients experienced a VTE during their ICU stay, 1 in the CP group and 13 in the MP group.

4.1. Univariate Analysis

Overall the two groups were similar in terms of demographics and acuity (Tables 1 and 2). Patients receiving CP were more likely to have a higher number of comorbidities than those receiving MP, specifically previous history of DVT/PE, CHF, COPD, and diabetes (Table 2).

Table 1: General characteristics of the study population.

Overall

Age (mean/SD)
748
58.31
16.51

Gender (/%)
748

    Male

420
56.15%

    Female

328
43.85%

Race (/%)
743

    American Indian

3
0.40%

    Asian/Pacific Islander

12
1.62%

    Black

262
35.26%

    Latin/Hispanic

96
12.92%

    White

367
49.39%

    Other

3
0.40%

APACHE II point sum (mean/SD)
657
20.21
7.48

HTN (/%)
748
447
59.8%

CAD (/%)
748
115
15.4%

CHF (/%)
748
95
12.7%

CVA (/%)
748
92
12.3%

COPD (/%)
748
106
14.2%

DM (/%)
748
224
29.9%

Table 2: Baseline characteristics and comparison of the 2 groups.

Chemical prophylaxis
Mechanical prophylaxis
value

Age (mean/SD)
329
57.45
16.67
419
58.99
16.37
0.206

Gender (/%)
329

419

    Male

182
55.32%

238
56.80%

    Female

147
44.68%

181
43.20%
0.685

Race (/%)
327

416

    American Indian

2
0.61%

1
0.24%

    Asian/Pacific Islander

4
1.22%

8
1.92%

    Black

132
40.37%

130
31.25%

    Latin/Hispanic

44
13.46%

52
12.50%

    White

144
44.04%

223
53.61%

    Other

1
0.31%

2
0.48%
0.103

APACHE II point sum (mean/SD)
288
19.8
7.78
369
20.53
7.24
0.215

Active cancer
329
33
10%
419
53
12.6%
0.265

History of DVT/PE
329
18
5.5%
419
11
2.6%
0.045

HTN (/%)
329
208
63.2%
419
239
57.0%
0.087

CAD (/%)
329
52
15.8%
419
63
15.0%
0.772

CHF (/%)
329
51
15.5%
419
44
10.5%
0.041

CVA (/%)
329
38
11.6%
419
54
12.9%
0.580

COPD (/%)
329
63
19.1%
419
43
10.3%
0.001

DM (/%)
329
112
34.0%
419
112
26.7%
0.030

Patients receiving chemical prophylaxis had significantly fewer VTE than those receiving mechanical prophylaxis. They also had lower mortality and transfusion requirements, but longer hospital LOS (Table 2).

4.2. Multivariate Analysis

When the multivariate regression was performed, accounting for age, hypertension, active malignancy, history of DVT/PE, COPD, DM, CVA, presence of central venous catheter, and PRBC transfusion, individuals receiving MP were more likely to develop a thromboembolic event (odds ratio: 9.9, ) compared to those receiving CP. Primary endpoint and other study endpoints of the 2 groups are shown in Table 3.

Table 3: Primary endpoint and other study endpoints of the 2 groups.

Chemical prophylaxis
Mechanical prophylaxis
value

Events

Events

DVTonly (/%)
329
1
0.3%
419
12
2.9%
0.008

PE event (/%)
329
0
0.0%
419
1
0.2%
0.375

DVT/PE (/%)
329
1
0.3%
419
13
3.1%
0.005

ICU LOS in days (median/IQR)
329
7.33
4.93–11.86
419
6.85
4.52–11.81
0.380

Hospital LOS in days (median/IQR)
329
15
9.5–24
419
13
8–23
0.007

MV days (Median/IQR)
329
5.2
3.1–9.98
419
5.21
3.03–9.35
0.908

PRBC transfusion (/%)
329
79
24.0%
419
155
37.0%
0.000

PRBC units (median/IQR)
329
2
1–3
155
4
2–6
0.000

Mortality (/%)
329
113
34.3%
419
212
50.6%
0.000

4.3. Secondary Analysis

There was a significantly higher proportion of patients admitted to the ICU for bleeding in the MP group (2 patients (0.61%) in the CP group VS 150 patients (35.80%) in the MP group; ).

Multivariate analysis was repeated after these patients were excluded from both groups (with 327 remaining in the CP group and 269 in the MP group). Results favored an increased number of events in the MP group (odds ratio 2.9) but this result did not meet statistical significance ().

APACHE II scores of the 152 patients admitted with bleeding were compared to scores of all other patients; there was no significant difference ().

5. Discussion

Thromboembolic events in hospitalized patients have historically been relatively common but are also a largely preventable morbid condition. The incidence of thromboembolic events is estimated to be around 1 to 2 million cases every year in the United States, with half to two-thirds of these cases being hospital-acquired. Annual healthcare costs associated with the diagnosis and treatment of these conditions, as well as loss of productivity attributable to them, are substantial although widely disparate, estimated at 2.5–19 billion dollars a year, with some estimates going as high as 55 billion dollars [1]. It has been estimated that half or more of these could have been prevented [2], indicating the importance of raising awareness of this problem and the need to institute more rigorous protocols for their prevention.

Thromboembolic events in the ICU are a common occurrence. In 1995, Hirsch et al. found that 33% of ICU patients developed DVT during or after their ICU stay [3]. In a study by Crowther et al. where patients were screened for the presence of clinically silent DVT and PE, the incidence was approximately 15% [4]. Sud et al. demonstrated that increasing adherence to DVT prophylactic methods resulted in decreased events and was more cost-effective than a routine screening program [5].

It is known that surgery increases the propensity for thromboembolic events largely by inducing a proinflammatory state, and mechanical methods have shown a substantial benefit when used by themselves or as an adjunct to chemical prophylaxis in the postsurgical setting [6, 7]. In contrast, while many nonsurgical patients also have proinflammatory physiology during the course of their illnesses, no studies have compared mechanical and chemical prophylactic methods in these patients, as is noted in the 2012 American College of Chest Physicians guidelines for DVT prophylaxis [8]. Conclusions and recommendations regarding prevention of VTE made by the ACCP have come from extrapolation of surgical data. For this reason we elected to study only nonsurgical patients, in an attempt to determine whether one method of prophylaxis was superior to the other in that population.

Some authors have suggested that one of the shortcomings of mechanical prophylaxis including GCS and IPC is a lack of compliance of patients with these methods. Patients have a tendency to remove them because of discomfort. However, since we have only included mechanically ventilated patients in the ICU, who likely would be receiving some form of sedation and/or analgesia, we believe that this is not a major consideration in our project. Furthermore, a meta-analysis looking at the difference in efficacy between GCS and IPC concluded that there is weak evidence of superiority of IPC over GCS [9]. Since our institution primarily uses IPC devices, the end-result of better efficacy with chemical prophylaxis can be extrapolated to GCS as well.

More recent data suggests that there may be some benefit from adjusting DVT prophylaxis methods depending on the patient’s risk of embolic events [10]. Estimating an individual’s risk of bleeding is a complex undertaking, and generalization of data for a large population is difficult. At our institution during the study period, no specific protocol was instituted for DVT prophylaxis upon admission, and decisions were left to the admitting physician’s clinical acumen. Risk factors accounted for in the regression analysis included age, active malignancy, history of DVT/PE, diabetes mellitus, essential hypertension, stroke, and COPD, as well as presence of a central venous catheter. These factors include all conditions that have either a strong or moderate association with development of DVT/PE (except for use of contraceptive and hormonal therapy) [11]. Some conditions with weak association (such as BMI/obesity, pregnancy and varicose veins) were not available, but we do not believe this is a major impediment to the conclusions of this study.

Patients who received both chemical and mechanical prophylaxis represent an interesting population. Unfortunately when we tried to analyze their results, we found that some had received mechanical and chemical prophylaxis simultaneously, while others received them sequentially, with different durations, causing this population to be very heterogeneous and making it impossible to adjust for those variables. Thus we excluded patients who had gotten more than one modality of prophylaxis to avoid the confounding effect on the interpretation of the outcomes studied.

Basic demographics of the two groups were comparable. Medical acuity, as measured by the APACHE II score, was comparable between the two groups. There were some differences in comorbid conditions between the two groups, namely, a higher percentage of patients with history of DVT/PE, DM, CHF, and COPD in the chemical prophylaxis arm. In our final analysis, we corrected for these variables in the regression model.

Analysis of the primary endpoint shows a 0.3% incidence of DVT/PE in the chemical prophylaxis arm and 3.1% incidence in the mechanical prophylaxis arm. After adjusting for all other variables, we found that patients who had received mechanical prophylaxis were less likely to develop thromboembolic events (odds ratio = 9.9).

A major concern of this study related to its retrospective nature is the potential for selection bias, given the much higher incidence of patients admitted for bleeding in the MP group, raising the concern that the 2 groups compared may not be similar. As an attempt to correct for this shortcoming, a secondary analysis was undertaken where patients admitted for bleeding were removed from both groups. Result of the multivariate analysis in this setting again showed an increased risk in the MP group, but results did not meet statistical significance. Since the APACHE II score of patients admitted with bleeding was not different from other patients, we cannot fully explain the change in results when these patients were excluded. While it may just be the decreased number of patients, the difference seems to suggest that patients admitted with bleeding are at increased risk of thrombosis regardless of the overall acuity of their condition.

It is notable that patients in the mechanical prophylaxis group had a significantly higher mortality rate than those in the chemical prophylaxis group, despite comparable overall acuity. While the increased number of VTE events may have contributed to this, a direct causal relationship between these factors cannot be established based on the retrospective nature of the data presented.

We also analyzed PRBC transfusion and how this relates to our results. A greater percentage of patients in the mechanical prophylaxis arm received PRBC transfusions, and the number of units transfused per patient per ICU stay was also significantly higher. This is related to the higher number of patients admitted for bleeding in the MP group. Several studies show increased risks associated with blood transfusions. They increase inflammatory markers, increase propensity to infection, and decrease the host’s intrinsic defense mechanisms. It is possible that these factors contributed to the increased mortality seen with the mechanical prophylaxis group. In addition to that, studies have also shown that PRBC transfusions increase the risk of thromboembolic events. In a large recent study from May 2012 done on 22000 patients undergoing resection for colorectal surgery, PRBC transfusion was shown to increase the risk of DVT and PE [12]. In our study, the fact that patients in the mechanical prophylaxis arm have received significantly more transfusions may have contributed to the increased numbers of thromboembolic phenomena.

The main limitation of the study lies in the fact that it is retrospective. This precludes from having a specific protocol to test for presence of thromboembolic disease.

DVTs and PEs in this situation were looked for specifically because of some level of clinical suspicion; as a consequence our findings are most likely relevant to VTE significant enough to induce clinical signs and/or symptoms. It has been shown, however, that these events are underrecognized in the intensive care setting in particular [13]. Nonetheless, there is no evidence that treating nonclinically significant embolic events improves mortality or other outcomes. In addition, as mentioned previously, protocols aimed at improving compliance with DVT prophylaxis methods seem more cost-effective than methods aimed at screening every patient for the presence of these events.

We believe our selected population of mechanically ventilated nonsurgical patients represents a unique group and should be further analyzed and studied. Randomized controlled trials comparing different methods of prophylaxis in this group of individuals are warranted and would help overcome the shortcomings of our study. Baseline evaluation of individual risk of thromboses and bleeding would be possible in such studies, unlike retrospective analyses.

We would also suggest an evaluation of combination prophylaxis, comparing it to single prophylaxis. Surgical data suggests that it may offer some benefit, but again no studies are available on nonsurgical populations.

6. Conclusion

Chemical methods of DVT prophylaxis seem to be superior to mechanical methods in mechanically ventilated nonsurgical patients and should be used whenever possible in this population.

Abbreviations

CAD: | Coronary artery disease
CHF: | Congestive heart failure
CKD: | Chronic kidney disease
COPD: | Chronic obstructive pulmonary disease
CP: | Chemical prophylaxis
CVA: | Cerebrovascular accident
DVT: | Deep vein thrombosis
GCS: | Graduated Compression Stockings
HTN: | Hypertension
ICU: | Intensive care unit
IPC: | Intermittent Pneumatic Compression device
LMWH: | Low molecular weight heparin
LOS: | Length of stay
MP: | Mechanical prophylaxis
PE: | Pulmonary embolism
PRBC: | Packed red blood cell
UFH: | Unfractionated heparin
VTE: | Venous thromboembolism.

Disclosure

This work was previously published/presented as an abstract and Poster Presentation at the Society of Critical Care Medicine, February 2012, Houston, TX.

Conflict of Interests

The authors do not have any conflict of interests.

References

C. E. Mahan, M. T. Holdsworth, S. M. Welch, M. Borrego, and A. C. Spyropoulos, “Deep-vein thrombosis: a United States cost model for a preventable and costly adverse event,” Thrombosis and Haemostasis, vol. 106, no. 3, pp. 405–415, 2011.

S. Z. Goldhaber and V. F. Tapson, “A prospective registry of 5,451 patients with ultrasound-confirmed deep vein thrombosis,” The American Journal of Cardiology, vol. 93, no. 2, pp. 259–262, 2004.

D. R. Hirsch, E. P. Ingenito, and S. Z. Goldhaber, “Prevalence of deep venous thrombosis among patients in medical intensive care,” The Journal of the American Medical Association, vol. 274, no. 4, pp. 335–337, 1995.

M. A. Crowther, D. J. Cook, L. E. Griffith et al., “Deep venous thrombosis: clinically silent in the intensive care unit,” Journal of Critical Care, vol. 20, no. 4, pp. 334–340, 2005.

S. Sud, N. Mittmann, D. J. Cook et al., “Screening and prevention of venous thromboembolism in critically ill patients. A decision analysis and economic evaluation,” American Journal of Respiratory and Critical Care Medicine, vol. 184, no. 11, pp. 1289–1298, 2011.

P. Roderick, G. Ferris, K. Wilson et al., “Towards evidence-based guidelines for the prevention of venous thromboembolism: systematic reviews of mechanical methods, oral anticoagulation, dextran and regional anaesthesia as thromboprophylaxis,” Health Technology Assessment, vol. 9, no. 49, pp. 1–78, 2005.

H. H. G. Handoll, M. J. Farrar, J. McBirnie, G. M. Tytherleigh-Strong, A. A. Milne, and W. J. Gillespie, “Heparin, low molecular weight heparin and physical methods for preventing deep vein thrombosis and pulmonary embolism following surgery for hip fractures,” Cochrane Database of Systematic Reviews, no. 4, Article ID CD000305, 2002.

S. R. Kahn, W. Lim, A. S. Dunn et al., “Prevention of VTE in nonsurgical patients: antithrombotic therapy and prevention of thrombosis, 9th ed: American College of Chest Physicians evidence-based clinical practice guidelines,” Chest, vol. 141, no. 2, supplement, pp. e195S–e226S, 2012.

R. J. Morris and J. P. Woodcock, “Intermittent pneumatic compression or graduated compression stockings for deep vein thrombosis prophylaxis? A systematic review of direct clinical comparisons,” Annals of Surgery, vol. 251, no. 3, pp. 393–396, 2010.

J. Hill and T. Treasure, “Reducing the risk of venous thromboembolism (deep vein thrombosis and pulmonary embolism) in patients admitted to hospital: summary of the NICE guideline,” Heart, vol. 96, no. 11, pp. 879–882, 2010.

F. A. Anderson Jr. and F. A. Spencer, “Risk factors for venous thromboembolism,” Circulation, vol. 107, no. 23, supplement 1, pp. I9–I16, 2003.

E. S. Xenos, H. D. Vargas, and D. L. Davenport, “Association of blood transfusion and venous thromboembolism after colorectal cancer resection,” Thrombosis Research, vol. 129, no. 5, pp. 568–572, 2012.

D. J. Cook and M. A. Crowther, “Thromboprophylaxis in the intensive care unit: focus on medical-surgical patients,” Critical Care Medicine, vol. 38, supplement 2, pp. S76–S82, 2010.