International Scholarly Research Notices
Volume 2017 (2017), Article ID 3493691, 1 page
https://doi.org/10.1155/2017/3493691

Erratum

Erratum to “Development of a Rapid and Precise Method of Digital Image Analysis to Quantify Canopy Density and Structural Complexity”

Anne E. Goodenough¹ and Andrew S. Goodenough²

¹Department of Natural and Social Sciences, Francis Close Hall, University of Gloucestershire, Swindon Road, Cheltenham, Glos GL50 4AZ, UK
²St Briavels, Forest of Dean, Gloucestershire, UK

Correspondence should be addressed to Andrew S. Goodenough; andrew.goodenough3@virginmedia.com

Received 29 May 2016; Accepted 8 August 2016; Published 18 January 2017

Copyright © 2017 Anne E. Goodenough and Andrew S. Goodenough. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Development of a Rapid and Precise Method of Digital Image Analysis to Quantify Canopy Density and Structural Complexity,” [1] the description of the Supplementary Materials was incorrect. The correct description should be as follows.

The suite of computer software comprising CanopyDigi is presented here as supplementary material as a zip file. The entire contents of the zip file, including all files and the folder structure, should be extracted to a root directory (e.g., C drive) in the format C:CanopyDigi (not C:CanopyDigiCanopyDigi). The software can run from any root drive, including an external drive.

References

A. E. Goodenough and A. S. Goodenough, “Development of a rapid and precise method of digital image analysis to quantify canopy density and structural complexity,” ISRN Ecology, vol. 2012, Article ID 619842, 11 pages, 2012.