Abstract and Applied Analysis

Volume 2012 (2012), Article ID 412042, 1 page

doi:10.1155/2012/412042

Erratum

Erratum to “Hybrid Projection Algorithms for Asymptotically Strict Quasi-ϕ-Pseudocontractions”

Xiaolong Qin,¹ Tianze Wang,² and Sun Young Cho³

¹Department of Mathematics, Hangzhou Normal University, Hangzhou 310036, China

²School of Mathematics and Information Sciences, North China University of Water Conservancy and Electric Power, Zhengzhou 450011, China

³Department of Mathematics, Gyeongsang National University, Jinju 660-701, Republic of Korea

Received 27 May 2012; Accepted 28 May 2012

Copyright © 2012 Xiaolong Qin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The first author of the above-mentioned paper regrets that the paper was published with the wrong address. The corrected address of the first author is given as above.