Abstract and Applied Analysis

Volume 2014 (2014), Article ID 214756, 8 pages

http://dx.doi.org/10.1155/2014/214756

Research Article

Stability Analysis of a Class of Switched Nonlinear Systems with an Improved Average Dwell Time Method

Rongwei Guo

School of Science, Qilu University of Technology, Jinan 250353, China

Received 10 December 2013; Accepted 30 January 2014; Published 6 March 2014

Academic Editor: Tongxing Li

Copyright © 2014 Rongwei Guo. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This paper investigates the stability of switched nonlinear (SN) systems in two cases: (1) all subsystems are globally asymptotically stable (GAS), and (2) both GAS subsystems and unstable subsystems coexist, and it proposes a number of new results on the stability analysis. Firstly, an improved average dwell time (ADT) method is presented for the stability of such switched system by extending our previous dwell time method. In particular, an improved mode-dependent average dwell time (MDADT) method for the switched systems whose subsystems are quadratically stable (QS) is also obtained. Secondly, based on the improved ADT and MDADT methods, several new results to the stability analysis are obtained. It should be pointed out that the obtained results have two advantages over the existing ones; one is that the improved ADT method simplifies the conditions of the existing ADT method, the other is that the obtained lower bound of ADT () is also smaller than that obtained by other methods. Finally, illustrative examples are given to show the correctness and the effectiveness of the proposed methods.

1. Introduction

Switched systems arise in various fields of real life world, such as manufacturing, communication networks, autopilot design, automotive engine control, computer synchronization, traffic control, and chemical processes. In the past two decades, increasing attention has been paid to the analysis and synthesis of switched systems due to their significance in both theory and applications, and many significant results have been obtained for the analysis and design of switched systems, see [1–11] and references therein. For the switched systems, there are several important problems to be investigated, such as stability analysis and control design. Stability analysis has been a very important and hot issue since the switched systems came into being, and a lot of efforts have been devoted to it. For the stability analysis problem, there are two famous methods, that is, Common Lyapunov Function (CLF) method [4, 6] and Multiple Lyapunov Functions (MLF) method [11]. For the CLF method, for a given switched system, it is very difficult to determine whether all the subsystems share a CLF or not, even for the switched linear (SL) systems. Regarding the MLF method, it is well known that the switched system is GAS for any switching signal if the time between consecutive switching (i.e., dwell time) is sufficiently large when all the subsystems are stable. Also, some results have appeared in recent works to compute lower bounds of the dwell time for ensuring the stability [12–14]. But, how to obtain the minimum dwell time (MDT) for a given switched system has had no general method so far, even for the SL systems. As pointed out in [13], the ADT switching is a class of restricted switching signals which means that the number of switches in a finite interval is bounded and the average dwell time between consecutive switching is not less than a constant. It was well known that the ADT scheme characterizes a large class of stable switching signals than dwell time scheme, and its extreme case is the arbitrary switching. Thus, the ADT method is very important not only in theory, but also in practice, and considerable attention has been paid, and a lot of efforts have been done to take advantage of the ADT method to investigate the stability and stabilization problems both in linear and nonlinear systems.

However, on the one hand, almost all the results mentioned above are concerned with the stability of the switched linear or nonlinear systems with stable subsystems; see [12–15] and the references therein. Although the results in [12] deal with the SL system with stable and unstable subsystems, the ADT method used in such paper has two disadvantages: one is this ADT method is only used for the SL system, the other is the lower bound of ADT obtained by the results in [12] has much conservative property. Therefore, to obtain an improved ADT method for the SN systems with stable and unstable subsystem is very important, and to investigate this problem is of value both in theory and in practice. On the other hand, as the authors in [16] point out that the property in the ADT switching that the average time interval between any two consecutive switching is at least , which is independent of the system modes, is probably still not anticipated. In order to solve this problem, they obtain MDADT method, which can reduce the conservative property of ADT.

Motivated by the above reasons, we extend our previous results in [17, 18] to investigate the stability of SN system in both cases: one is where all subsystems are GAS, the other is where both GAS and unstable subsystems coexist. Firstly, we obtained an improved ADT method for studying the stability of such SN system and an improved MDADT method for a class of SN systems which have QS property inspired by the study of MDADT method. Secondly, based on which, some new stability analysis results for the SN system are obtained, which have some advantages over the existing result [12]. Finally, illustrative examples are studied by using the results obtained in this paper. The study of examples shows that our analysis methods work very well in analyzing the stability of SN systems with GAS subsystems or both GAS and unstable subsystems.

The rest of the paper is organized as follows. Section 2 presents the problem formulation of this paper, and Section 3 gives the main results. In Section 4, illustrative examples are given to support our new results, which is followed by the conclusion in Section 5.

2. Problem Formulation

Consider the SN system described as

where is the state, the map is a piecewise right-continuous function, called the switching law or switching path, which will be determined later, and means that the th subsystem is active, and is smooth, . Throughout this paper, we assume that there are no jumps in the state at the switching instants and that a finite number of switches occur on every bounded time interval. Let denote the trajectory of the system (1) starting from , .

If , , the SN system (1) becomes

where is a real matrix, .

For an arbitrary switching path , is called the switching time sequence, which is assumed to satisfy

Let denote the dwell time, .

For the development of this paper, we introduce several definitions.

Definition 1 (see [19]). Let denote the number of switching of over the interval , for given , ,

where is called average dwell time and denotes the chatter bound.

Definition 2 (see [20, 21]). The SN system (1) with is called quadratic stability, if there is a Lyapunov function which ensures the system (1) is stable, where .

Definition 3 (see [16]). For a switching signal and any , let be the switching numbers that the th subsystem is activated over the interval , and denote the total running time of the th subsystem over the interval , . We say that has a MDADT if there exist positive numbers (we call the mode-dependent chatter bounds here) and such that

The objective of this paper is to investigate the stability of SN systems in two cases: all subsystems are GAS, and both GAS subsystems and unstable subsystems coexist.

3. Main Results

Firstly, we investigate the stability of SN system (1) whose subsystems are GAS and propose the following results.

Theorem 4. Consider the SN system (1), if there exist functions , and two class functions , such that, for all

where , , then the SN system (1) is GAS for any switching signal with ADT

where

Proof. Let , denote the time points at which switching occurs, and write for the value of on . Integrating the inequality (7) over the interval , we obtain that

and then

According to inequality (6), we obtain that

Then, for any satisfying , we obtain

where .

When , that is, , we can obtain that

which implies that the switched system (1) is GAS for arbitrary switching signals.

When , according to (4), we obtain

Substituting (15) into (13), we arrive at

If , which implies that the system (1) is GAS with the above ADT.

Remark 5. In general, . Especially, if , which implies that , , that is, is a CLF for the switched system (1), and thus this system is GAS under arbitrary switching. It is also noted that the ADT method proposed in [12, 14, 15, 19] needs the conditions (6)-(7) and an additional condition as “, , , ”. Comparing Theorem 4 with [12, 19], Theorem 4 needs fewer conditions and thus can be applied to a wider range of systems. Furthermore, for SL systems, the lower bound of ADT obtained by Theorem 4 is smaller than the lower bound of ADT obtained in [19]. In fact,

where with is the Lyapunov function for the th subsystem, .

With Theorem 4, we can obtain the following corollary.

Corollary 6. For the SL system (2), if is Hurwitz, , then the switched system (2) is GAS for any ADT , where is given as (8).

Remark 7. The proof of Corollary 6 can be obtained using similar techniques in Theorem 4, so we omit it here. In addition, if , where , , then we can obtain that

As the authors in [16] point out that the property in the ADT switching, that the average time interval between any two consecutive switching is at least , which is independent of the system modes, is probably still not anticipated. Then, they obtain an MDADT method, which can reduce the conservative property of ADT. Inspired by the study in which, we extend our results to obtain an improved MDADT method for a class of SN systems which have quadratic stability property.

Then, we give the result in the following.

Theorem 8. Consider the SN system (1), if there exist functions , where , and a class of real numbers , such that, for all

where , , then the switched system (1) is GAS for any switching signal with MDADT

where

Proof. For any satisfying , we obtain

where denotes the total activation time of the th subsystem in the interval .

When , that is, , , we conclude from (23) that

where is given as (9), which implies that the switched system (1) is GAS for any MDADT.

When , , according to (4), we obtain

Substituting (25) into (23), we arrive at

where , . If , and thus the switched system (1) is GAS for any MDADT .

With Theorem 8, we can obtain the following corollary.

Corollary 9. For the SL system (2), if , , is Hurwitz, then the switched system (2) is GAS for any MDADT , where are given as (21).

Next, we consider the SN systems in which both GAS and unstable subsystems exist. For the switching signal and any , we let (resp., ) denote the total activation time of the unstable subsystems (resp., the GAS subsystems) on interval . Then, we let , where .

Next, we give the main results in the following.

Theorem 10. Consider the SN system (1), if there exist functions , two class functions , such that (6), and

where , , then under the following switching law (S1) the switched system (1) is GAS for any switching signal with ADT

where is given as (9), and is an arbitrarily chosen number,

and the switching law

(S1)Determine the satisfying holds for any .

Proof. Let , denote the time points at which switching occurs, and write for the value of on . Integrating the inequality (27) or (28) over the interval , we obtain that

and then

where , if , , if .

Thus,

where is given as (9).

Then, for any satisfying , we obtain

where .

According to the switching law (S1), that is,

we obtain from (35) that

When , that is, , we can obtain from (36) that

which implies that the switched system (1) is GAS for arbitrary switching paths.

When , according to (4), we arrive at

and then

If , then under the following switching law (S1) the switched system (1) is GAS for the above ADT.

According to Theorem 10, we can obtain the following corollary.

Corollary 11. Consider the SL system (2), if is unstable, , and is Hurwitz, , then under the switching law (S1) the system (2) is GAS for any ADT , where is given as (29).

Learning form [22], we obtain other results which can deal with some subsystems of the switched system being stable, while some subsystems are not.

Theorem 12. Consider the SN system (1), if there exist functions and two class functions such that (6), (27), and (28). If there exist constants , such that

then the switched system (1) is GAS for any switching signal with ADT

where is given as (9), and , are given as (30).

Proof. The proof of Theorem 12 follows the lines of the proof of Theorem 10. Similar to Theorem 10, for any satisfying , we obtain

where .

According to (41), we get

We obtain from (44) that

When , that is, , we can obtain from (45) that

which implies that the switched system (1) is GAS for arbitrary switching paths.

When , according to (4), we arrive at

and then

If , then the switched system (1) is GAS for the above ADT.

According to Theorem 12, we can obtain the following corollary.

Corollary 13. Consider the SL system (2), if is unstable, , and is Hurwitz, , then the system (2) is GAS for any ADT , where is given as (42).

4. Illustrative Examples

In this section, we give two illustrative examples to show how to use the results obtained in this paper to analyze the stability of switched linear and nonlinear system with stable and unstable subsystems.

Example 1. Consider the following SL system [12]

where , and

Obviously, is unstable while is Hurwitz stable. In [12], the authors have obtained that and . Next, we will investigate the switched system (49) by our method.

It is easy to know that is a CLF for the switched system (49), and

According to the above results, we obtain that , , and . Therefore, the ADT ; that is, the ADT can be arbitrary. Next, we choose which are the same to those in [12]. Then, the switching law (S1) will require

According to Corollary 11, the system (49) is GAS under the above switching law (S1).

To illustrate the correctness of the above conclusion, we carry out some simulation results with the following choices. Initial Condition: , and Switching Path:

where . The simulation result is given in Figure 1, which is the response of the state under the above path .

It can be observed from Figure 1 that the trajectory converges to origin quickly. The simulation shows that Corollary 11 is very effective in analyzing the stability for the SL systems with both unstable and GAS subsystems.

Figure 1: The state’s response.

Remark. From this example, we show that the lower bound of ADT () for the switched system (49) obtained by our method is smaller than the ADT () by the method in [12], which implies that our method for determining the lower bound of ADT of switched system has some advantages in some cases.

Example 2. Consider the following SN system

where , and

It is easy to know that is a CLF for the switched system (54), and

According to the above results, we obtain that , and . Therefore, the lower bound of ADT ; that is, the ADT can be arbitrary. Next, we choose . Then, the switching law (S1) will require

According to Theorem 10, the switched system (54) is GAS under the above switching law (S1).

To illustrate the correctness of the above conclusion, we carry out some simulation results with the following choices. Initial Condition: , and Switching Path:

where . The simulation result is given in Figure 2, which is the response of the state under the above path .

It can be observed from Figure 2 that the trajectory converges to origin quickly. The simulation shows that Theorem 10 is very effective in analyzing the stability for the SN systems with both unstable and GAS subsystems.

Figure 2: The state’s response.

5. Conclusions

In conclusion, we have investigated the stability of SN systems in two cases: all subsystems are GAS and both GAS subsystems and unstable subsystems coexist, and we proposed a number of new results on the stability analysis. An improved ADT method has been established for the stability of such switched system, and an improved MDADT method for the switched systems whose subsystems are QS also has been obtained. Based on which several new results to the stability analysis have been obtained. Comparing with the exiting corresponding results, not only the conditions of the improved ADT method are simplified, but also the obtained lower bound of ADT is smaller than that obtained by other methods. Finally, illustrative examples with numerical simulations have been studied by using the obtained results to show the effectiveness and correctness of the obtained results.

Conflict of Interests

The author declares that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work is supported by the National Natural Science Foundation of China (11226154, 61304133, and 61305130), China Postdoctoral Science Foundation funded Project (2013M541915), and the Scientific Research Foundation of Shandong province Outstanding Young Scientist Award (BS2013SF023).

References

J. Daafouz, P. Riedinger, and C. Iung, “Stability analysis and control synthesis for switched systems: a switched Lyapunov function approach,” IEEE Transactions on Automatic Control, vol. 47, no. 11, pp. 1883–1887, 2002.

J. M. Gonçalves, A. Megretski, and M. A. Dahleh, “Global analysis of piecewise linear systems using impact maps and surface Lyapunov functions,” IEEE Transactions on Automatic Control, vol. 48, no. 12, pp. 2089–2106, 2003.

W. P. Dayawansa and C. F. Martin, “A converse Lyapunov theorem for a class of dynamical systems which undergo switching,” IEEE Transactions on Automatic Control, vol. 44, no. 4, pp. 751–760, 1999.

D. Liberzon and R. Tempo, “Common Lyapunov functions and gradient algorithms,” IEEE Transactions on Automatic Control, vol. 49, no. 6, pp. 990–994, 2004.

Z. Lixian, W. Changhong, and G. Huijun, “Delay-dependent stability and stabilization of a class of linear switched time-varying delay systems,” Journal of Systems Engineering and Electronics, vol. 18, no. 2, pp. 320–326, 2007.

H. Lin and P. J. Antsaklis, “Stability and stabilizability of switched linear systems: a survey of recent results,” IEEE Transactions on Automatic Control, vol. 54, no. 2, pp. 308–322, 2009.

L. Zhang, P. Shi, E.-K. Boukas, and C. Wang, “ model reduction for uncertain switched linear discrete-time systems,” Automatica, vol. 44, no. 11, pp. 2944–2949, 2008.

L. Zhang, “ estimation for discrete-time piecewise homogeneous Markov jump linear systems,” Automatica, vol. 45, no. 11, pp. 2570–2576, 2009.

P. Zhao, W. Feng, and Y. Kang, “Stochastic input-to-state stability of switched stochastic nonlinear systems,” Automatica, vol. 48, no. 10, pp. 2569–2576, 2012.

L. Zhang and H. Gao, “Asynchronously switched control of switched linear systems with average dwell time,” Automatica, vol. 46, no. 5, pp. 953–958, 2010.

M. S. Branicky, “Multiple Lyapunov functions and other analysis tools for switched and hybrid systems,” IEEE Transactions on Automatic Control, vol. 43, no. 4, pp. 475–482, 1998.

G. Zhai, B. Hu, K. Yasuda, and A. Michel, “Stability analysis of switched systems with stable and unstable subystems: an average dwell time approach,” in Proceedings of the American Control Conference (ACC '00), pp. 200–204, 2000.

D. Liberzon, Switching in Systems and Control, Birkhäauser, Berlin, Germany, 2003.

X. Zhao, L. Zhang, P. Shi, and M. Liu, “Stability of switched positive linear systems with average dwell time switching,” Automatica, vol. 48, no. 6, pp. 1132–1137, 2012.

M. A. Müller and F. Allgöwer, “Improving performance in model predictive control: switching cost functionals under average dwell-time,” Automatica, vol. 48, no. 2, pp. 402–409, 2012.

X. Zhao, L. Zhang, P. Shi, and M. Liu, “Stability and stabilization of switched linear systems with mode-dependent average dwell time,” IEEE Transactions on Automatic Control, vol. 57, no. 7, pp. 1809–1815, 2012.

R. Guo and Y. Wang, “Stability analysis for a class of switched linear systems,” Asian Journal of Control, vol. 14, no. 3, pp. 817–826, 2012.

R. Guo and Y. Wang, “Input-to-state stability for a class of nonlinear switched systems by minimum dwell time method,” in Proceedings of the 31th Chinese Control Conference, pp. 1383–1386, 2012.

J. P. Hespanha and A. S. Morse, “Stability of switched systems with average dwell-time,” in Proceedings of the 38th IEEE Conference on Decision & Control (CDC '99), pp. 2655–2660, December 1999.

S. Xu, J. Lam, and C. Yang, “Quadratic stability and stabilization of uncertain linear discrete-time systems with state delay,” Systems & Control Letters, vol. 43, no. 2, pp. 77–84, 2001.

R. Shorten, M. Corless, S. Sajja, and S. Solmaz, “On Padé approximations, quadratic stability and discretization of switched linear systems,” Systems & Control Letters, vol. 60, no. 9, pp. 683–689, 2011.

M. A. Müller and D. Liberzon, “Input/output-to-state stability and state-norm estimators for switched nonlinear systems,” Automatica, vol. 48, no. 9, pp. 2029–2039, 2012.