Abstract and Applied Analysis

Volume 2014 (2014), Article ID 798572, 1 page

http://dx.doi.org/10.1155/2014/798572

Retraction

Retracted: Three Homoclinic Solutions for Second-Order -Laplacian Differential System

Abstract and Applied Analysis

Received 12 August 2014; Accepted 12 August 2014; Published 27 August 2014

Copyright © 2014 Abstract and Applied Analysis. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

This paper titled “Three Homoclinic Solutions for Second-Order -Laplacian Differential System” [1], published in Abstract and Applied Analysis, has been retracted since the limits of the three sequences included in the paper are likely to be the same, which cannot be ruled out in the proof. So, the three nontrivial homoclinic solutions in Theorem 15 are likely to be the same one.

References

J. Guo and B. Dai, “Three homoclinic solutions for second-order -Laplacian differential system,” Abstract and Applied Analysis, vol. 2013, Article ID 183585, 10 pages, 2013.