Advances in Acoustics and Vibration

Volume 2012 (2012), Article ID 253121, 1 page

doi:10.1155/2012/253121

Erratum

Erratum to “Structural Pounding Detection by Using Wavelet Scalogram”

Shutao Xing,¹ Marvin W. Halling,² and Qingli Meng³

¹DeepSea (US) Inc., Houston, TX 77042, USA

²Department of Civil and Environmental Engineering, Utah State University, Logan, UT 84322, USA

³Institute of Engineering Mechanics, China Earthquake Administration, Harbin 150080, China

Received 18 October 2012; Accepted 22 October 2012

Copyright © 2012 Shutao Xing et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors would like to note that the figure in the present paper should be used instead of Figure 6 in the original paper.  

Figure 6: The pounding models of high-pier bridge under shaking table tests by Meng et al. .