Advances in Civil Engineering
Volume 2020 (2020), Article ID 8201734, 1 page
https://doi.org/10.1155/2020/8201734

Corrigendum

Corrigendum to “Prediction of Concrete Compressive Strength and Slump by Machine Learning Methods”

M. Timur Cihan

Civil Engineering, Tekirdağ Namık Kemal University, Çorlu Faculty of Engineering, Tekirdağ 59860, Turkey

Correspondence should be addressed to M. Timur Cihan; mehmetcihan@nku.edu.tr

Received 20 July 2020; Accepted 20 July 2020; Published 30 August 2020

Copyright © 2020 M. Timur Cihan. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Prediction of Concrete Compressive Strength and Slump by Machine Learning Methods” [1], there was an error in equation (1), which should be corrected as follows:

References

M. Timur Cihan, “Prediction of concrete compressive strength and slump by machine learning methods,” Advances in Civil Engineering, vol. 2019, Article ID 3069046, p. 11, 2019.