Advances in Condensed Matter Physics

Volume 2014 (2014), Article ID 125454, 10 pages

http://dx.doi.org/10.1155/2014/125454

Research Article

Larmor Precession and Debye Relaxation of Single-Domain Magnetic Nanoparticles

Zs. Jánosfalvi,¹ J. Hakl,¹ and P. F. de Châtel1,2,3

¹Institute of Nuclear Research, P.O. Box 51, Debrecen 4001, Hungary

²Department of Physics, New Mexico State University, P.O. Box 30001, Las Cruces, NM 88003, USA

³Institute of Metal Research, CAS, Shenyang 110016, China

Received 31 October 2013; Accepted 20 December 2013; Published 23 January 2014

Academic Editor: Jörg Fink

Copyright © 2014 Zs. Jánosfalvi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The numerous phenomenological equations used in the study of the behaviour of single-domain magnetic nanoparticles are described and some issues clarified by means of qualitative comparison. To enable a quantitative application of the model based on the Debye (exponential) relaxation and the torque driving the Larmor precession, we present analytical solutions for the steady states in presence of circularly and linearly polarized AC magnetic fields. Using the exact analytical solutions, we can confirm the insight that underlies Rosensweig’s introduction of the “chord” susceptibility for an approximate calculation of the losses. As an important consequence, it can also explain experiments, where power dissipation for both fields was found to be identical in “root mean square” sense. We also find that this approximation provides satisfactory numerical accuracy only up to magnetic fields for which the argument of the Langevin function reaches the value 2.8.

1. Introduction

Enduring interest in colloidal dispersions of ferro- and ferrimagnetic nanoparticles is fueled by their applications. Colloids of small particles of iron oxide are used in magnetic resonance imaging (MRI) [1] as contrast agents and in hyperthermia treatment as heat-generating media [2]. Of the numerous applications of the exchange of energy between the magnetic particles and the fluid around them we are interested here in hyperthermia. The importance of this process lies in the transport of the energy the magnetic particles absorb from an external magnetic field into the cancer tissue. Dissolving the particles in a colloid is useful in targeting them to the tumour, where they may get anchored in inferior arteries. We assume that further movement of the particles, other than rotation, and the flow of the surrounding blood inside the tumour are not important. Even with this constraint, the process of energy exchange is complex and has been described in terms of numerous phenomenological models, treated in a variety of approximations. In an earlier paper [3], we have presented the analytic solutions of the Landau-Lifshitz-Gilbert (LLG) equation for isotropic single-domain particles in AC and circularly polarized field; later, Nándori and Rácz [4] included uniaxial anisotropy as well.

The LLG equation describes the movement of a magnetic dipole in the presence of a time-dependent magnetic field. Measurements on ferrofluids provide data on the magnetization, that is, the average over a large number of single-domain nanoparticles. Solutions of the LLG equation for various initial states are not sufficient to calculate the magnetization; the question of averaging is still left open. In this paper we report the solution of an equation of motion of the magnetization, which contains explicitly the torque driving the dipoles to the direction of the field. In itself, this torque leads to an exponential approach to the direction of a static external field, the Debye relaxation. Debye has studied the movement of electric dipoles carried by molecules [5]. In the case of magnetic dipoles, the coupling of the angular momentum to the magnetic momentum brings inevitably the Larmor torque into the equation of motion. This term is familiar from the Bloch equation in the literature of magnetic resonance [6]. In a comparison of eight phenomenological equations of motion for magnetic moments of ferro- or ferrimagnetic nanoparticles dispersed in a nonmagnetic medium Berger et al. [7] listed the equation combining the Larmor torque and the Debye relaxation under the name “modified Bloch equation.” This is the equation we have solved, analyzed, and compared with the LLG equation in this work.

In the next section, we give an overview of the various equations of movement used for the description of the simultaneous effect of external torques and relaxation, showing the place of the modified Bloch equation among them. En route, we give the shortest derivation of the Landau-Lifshitz-Gilbert [8–10] equation from the Landau-Lifshitz equation. In Section 3 we give an analytical solution of the modified Bloch equation for circularly polarized magnetic field. Surprisingly, the case of a linearly polarized field is more challenging; the analytical solution we can give in Section 4 is not valid for arbitrarily strong fields.

2. Equations of Motion and Simplifications

The behaviour of single-domain ferro- or ferrimagnetic nanoparticles in an external magnetic field has much in common with that of atomic or nuclear magnetic moments. The torque on a magnetic moment ,

determines the equation of motion of the angular moment, . The gyromagnetic relation, , enables a closed equation for which, applied to the magnetic moment of unit volume, provides the equation of motion of the magnetization:

Here is the gyromagnetic ratio. The magnetization of materials we have in mind in this work is due to the spin of electrons, accordingly  Am²/Js.

The vector product in (2) implies that any change of the magnetization is perpendicular to ; that is, the modulus of remains constant. Also, if is constant, ; that is, the angle between the two vectors is constant. The only motion satisfying these conditions is a precession of around . The angular velocity of the magnetization in this Larmor precession is , where is the projection of on the plane perpendicular to . The Larmor frequency is defined as a positive quantity, . To reduce the potential energy, , the contribution to due to relaxation must have a component parallel to . Landau and Lifshitz [8] have chosen a “damping term,” which evidently achieves this, being proportional to . The Landau-Lifshitz equation of motion is then

The coefficient goes under the name of “the dimensionless damping coefficient,” which is something of a misnomer, because addition of the “damping term” evidently enhances the motion of :

Gilbert’s approach [9, 10] is closer to the notion of friction, as it subtracts from the Larmor torque a torque proportional to . This is reminiscent of friction in linear motion, where a force opposite to the velocity is introduced into the equation of motion. The analogy allows a derivation of the Gilbert equation:

by adding a Rayleigh dissipation function to the Lagrangian which describes the Larmor precession of the magnetic moment.

A comparison of the Landau-Lifshitz and Gilbert equations reveals that (i) is perpendicular to in both equations and (ii) in the former it consists of two mutually perpendicular terms, while in the latter this is not the case. Observation (ii) implies that decomposition of the damping term in the Gilbert equation into components parallel and perpendicular to that of the Landau-Lifshitz equation will offer a direct comparison of the two. In fact, the Gilbert equation itself provides a decomposition into components which delivers the desired transformation. Multiplying both sides of (5) by and taking (i) in account yield

Substituting this result in the last term of the Gilbert equation and rearranging terms lead to the Landau-Lifshitz-Gilbert (LLG) equation:

where . Clearly, for the Landau-Lifshitz equation is a good approximation, but for the general case the factor is essential to eliminate the nonphysical implications of the Landau-Lifshitz equation pointed out by Kikuchi [11] and Gilbert [9, 10]. Also, due to this factor, Gilbert’s damping term reduces the motion of :

Strictly speaking, the effect of the Landau-Lifshitz and Gilbert damping coefficients cannot be described with a relaxation time, because the relaxation they stand for is not exponential. If is a constant field, pointing in the direction, the solution of the LLG equation is , with .

Shliomis [12] has suggested that under well-defined conditions the equation of exponential relaxation,

should suffice to describe the behaviour of a colloid of magnetic nanoparticles. Here, is the average magnetization of the particles:

where is the particle volume, is the unit vector pointing along and is the saturation magnetization of the colloid , by being the volume fraction and is the magnetization in the single-domain magnetic nanoparticle. In the Debye relaxation equation, especially when applied in magnetic resonance, as well in the LL and G equations, it is customary to use , rather than . Gilbert pointed out in the appendix of [9, 10] that is not limited to the externally applied field and he gives the definitions of the demagnetizing field, the exchange fields, the anisotropy fields, and the magnetoelastic fields in terms of the concomitant energies.

The Langevin function, , gives the magnitude of the magnetization in thermal equilibrium. Note that must be an ensemble average and consequently so is . In this respect, in the context of superparamagnetic resonance or hyperthermia, (9) is more expedient than the LLG equation. In the latter case, having found the possible solutions of the equation of motion, one has to face the issue of the appropriate weighed average of the associated energy losses.

Clearly, the parameter in (9) is a proper relaxation time. In a stationary field, where is also constant, the solution of this equation for the component of along is

In [13], Shliomis names (9) the Debye relaxation equation.

Recently, Cantillon-Murphy et al. [14] have published a thorough analysis of the implications of Debye relaxation equation, equation (9). Apart from the approximation inherent in the exclusion of the gyromagnetic torque they also applied Rosensweig’s chord susceptibility [15]:

instead of the Langevin function appearing in (10).

Equation (9) implies that in a field the relaxation pulls the magnetization towards the equilibrium magnetization, which is oscillating in time. Figure 1 shows that this equilibrium magnetization is determined by the Langevin function and Rosensweig’s chord susceptibility . By definition of the latter, the two curves meet at and . In the limit of strong external field , Figure 1(d), the curve is flipping between the extrema, while the curve has sinusoidal characteristic. The magnetization does not exceed the saturation magnetization , even for field . In the weak field limit, Figure 1(a), where hyperthermia is applied, there is no difference. Figures 1(b) and 1(c) show the transition between the two behaviours. It is clear that when the field reaches a value where (Figures 1(c) and 1(d)), the magnetization calculated with the chord susceptibility substantially deviates from the correct function.

(a)

(b)

(c)

(d)

Figure 1: (colour online) The characteristic change of the equilibrium magnetization within a periodic driving cycle as given by the Langevin function (, equation (10)) and Rosensweig’s chord susceptibility (, (12)) for different amplitude magnetizing field . At low field amplitudes the two curves are identical (a). At increasing field amplitudes only the extrema remain identical.

The dependence of the discrepancy between the two curves on the amplitude of the AC field is shown in Figure 2. In the low-field limit there is no discrepancy, because and , but it is visible at  kA/m and increases with increasing field. Beyond  kA/m the relative difference remains constant at about , which is too large to use the approximation in calculations of the magnetization. In Section 4 we show that this does not disqualify the chord susceptibility in calculation of the energy loss.

Figure 2: (colour online) Equilibrium magnetization and approximate equilibrium magnetization calculated for and plotted against the amplitude of the AC magnetic field. At the two are identical by definition of , but at the relative difference between the and curves increases with , reaching at kA/m.

In Sections 3 and 4 we present analytical solutions to the Debye relaxation equation enriched with the Larmor torque:

with as given in (10), is the average of magnetization of the single-domain magnetic particles, and is the external magnetic field. In the calculations the effect of internal fields (crystalline anisotropy and demagnetization fields) is not considered. We will use these results to assess the effects of the torque on the steady-state solutions under linear and circular polarization of the AC magnetic field. As we take into account the curvature of the Langevin function, we can also discuss the implications of the chord susceptibility.

3. Circular Polarization

In this section we give the analytical solution of (13) for a rotating magnetic field. The first term, representing the Larmor torque, spoils the separation of Cartesian components, which has enabled the derivation of the solution, equation (11), found in Section 2 for the Debye relaxation equation. For a rotating magnetic field, ; ; , the coupled equations to be solved are as follows:

To handle the entanglement of the three components of , it will prove to be convenient to apply the series of transformations that enabled us in a previous work [3] to solve this set of equations for free precession, that is, in the absence of relaxation . Three transformations create a coordinate system, which rotates as dictated by free Larmor precession in the rotating field. First, a rotation around the -axis by an angle makes the plane follow the magnetic field, then the -axis is turned by an angle into the direction of the total angular velocity , and finally a rotation around this new -axis by an angle drives the plane to rotate together with the magnetization vector. The description is reminiscent of an Euler transformation and indeed the product of the three matrices representing the rotations listed above is of the form of the canonical Euler transformation [16] with the replacements , , and . As the axis of the Larmor precession is the magnetic field, which rotates in the plane perpendicular to the -axis, is perpendicular to and . Also, it follows from this configuration that and . In what follows, the transformation matrix will be used in the form

To find the derivative of the transformed magnetization vector , we need the derivative of the matrix :

Substituting here from (13), we find that the contribution of the Larmor torque to cancels , as it should, leaving the following differential equations for the transformed magnetization:

The first term on the right-hand side gives trivially , the second one can be found applying (15), to find the differential equations for the three components of the transformed magnetization vector. Ultimately, the analytical solution for the transformed magnetization vector is

Here is defined by , . Since the exponentially decaying terms are of no interest for applications on time scales exceeding by several orders of magnitude and we seek the steady-state solution in the laboratory frame, we will drop the exponential terms. The inverse transformation is easily carried out with the transpose of matrix (15). A compact form of the final result is

Note that , indicating that the interplay of Larmor precession and relaxation pushes the magnitude of the magnetization, which is time-independent, below the thermal equilibrium value in a static field . The energy loss per cycle is easily calculated:

This Debye-type dependence on is familiar in low-field magnetic resonance [17] and was shown by Garstens [18] to be exact in the limit of vanishing static field.

The basic functional dependence of and , and can be complicated if is too large to use a susceptibility to calculate . Separating , we can analyze the term as a function of and . As is an elusive quantity, not very easy to control experimentally, we have plotted as a function of under the condition that for various values of ; see Figure 3. The maxima of these functions are seen to occur, where . Indeed this conditional derivative vanishes at , where , which is reflected in the line connecting the maxima in Figure 3.

Figure 3: (colour online) The dependence of   ∝  , the energy loss, on for various ratios from to . See (20).

The basic functional dependence of on , , and is dictated by the term . Noting that , it has maximum either as a function of , , or products and . To facilitate comparison with Garstens and Kaplan’ [17] result for the frequency dependence of , we select the dimensionless parameters and and define and . Figure 3 shows (which is proportional to ) as a function of at various value of . The energy loss is seen to increase with up to a maximum at , the value of at the maxima being . It is remarkable how the interplay of relaxation and Larmor precession suppresses the energy loss, in the case of circular polarization.

The specific absorption rate (SAR) defined as energy loss per second and per kg of the colloid is the gauge of energy losses relevant to applications:

This is the figure of merit for colloids to be used in hyperthermia. In this application the weak magnetic fields are quite weak ( A/m) and the temperature not too low (>300 K); the ferrofluid is far from saturation and the usage of a susceptibility is justified, so that . Equation (21) can be visualized then by the function

which is plotted for various values of in Figure 4. In this case, the maxima can be found without any condition at and the value of at the maxima is given by , which is the equation of the curve connecting the maxima in Figure 4.

Figure 4: (colour online) The dependence of , the specific absorption rate on for various ratios from to . See (22).

4. Linear Polarization

To find the equation of motion for the magnetization subjected to a magnetic field oscillating along the -axis, the following vectors have to be inserted into (13): , , and , where . The matrix of the transformation that will eliminate the Larmor term of (13) depends on the sign of the gyromagnetic ratio. For both cases we can write the matrix as

where the upper sign equals that of and . The equation of motion for is

Taking into account that (irrespective of the sign of ), the first two terms in (24) cancel each other. The equation of motion for in terms of the new coordinate system is easy to find, as , by definition, and has only a component, which is evidently not affected by . What remains in the transformed frame is the set of equations of motion:

The solution for the first two equations must be the familiar exponential relaxation to zero:

Since separates the plane and the -axis, the transformation back to the laboratory frame can be done in two dimensions. As vanishes at , we have and , whence

where is the azimuth angle of and . We can determine the time dependence of the angular velocity:

with the upper sign for and the lower sign for . Equation (28) describes a Larmor precession whose frequency is following the time dependence of the magnetic field (note that is defined as the Larmor frequency at , so that gives the Larmor frequency at ). Whether the time dependence of the precession frequency is observable will depend on the magnitude of the projection of on the plane, which, according to (27), decays exponentially,

If the relaxation time is very short (like in hyperthermia, where ), the magnetization will be fully aligned along the -axis before the magnetic field undergoes a substantial change, let alone a change of sign. Of course, to observe the time dependence given in (27), we also need a Larmor frequency larger than the frequency of ; that is, . These conditions are met in hyperthermia, at  kA/m; the Larmor frequency is about GHz, whereas is of the order of kHz.

The last equation in (25), which is also the equation of motion of , can be reduced to a single (though not simple) integral. Multiplying both sides with and reordering terms lead to

To avoid the difficult integral, for one can take the susceptibility instead of the Langevin function, that is, the first term in the Taylor series of , that is, the Curie susceptibility, instead of the function . In fact, the integrals can be done for higher order terms also ([19], page 228). As the Taylor series of necessary here ([19], page 42) is only valid for , the same restriction, , is valid on the series of the Langevin function:

where the are Bernoulli numbers as defined and listed in [19, pages 1040 and 1045], respectively. Substituting the series (31) into (30),

Now it is straightforward to find a solution to the equation of motion for which is analytical, albeit in the form of an infinite series:

There are three features of this solution that can be revealed without evaluating the series: (i) the exponential factors have disappeared, meaning that the function describes a steady state, (ii) keeping only the term in the series the well-known result for the frequency-dependent Curie susceptibility, with

emerges, and (iii) the double summation is essentially a Fourier series, of which only the sine terms are needed for the calculation of losses, because , multiplied by , will be integrated over a cycle.

Keeping only the terms in the second sum in (33) amounts to eliminating the higher harmonics in the time dependence of the magnetization, which are generated due to the substantial nonlinearity of the Langevin function beyond . It follows then that for any value of a susceptibility can be found, which will provide the exact energy loss on the assumption that the magnetization is

Looking back at Figure 1(d), it becomes now clear that abrupt changes of the magnetization triggered by the flipping of the equilibrium magnetization will not influence the calculated energy loss, because they are represented by high-frequency terms in .

The effective magnetization of (35) may be looked upon as a fictitious magnetization, which, if realized, would give the correct losses without reproducing the correct hysteresis loop. Instead, the shape of the hysteresis loop and its frequency dependence are exactly the same as those one gets at low fields, where the static magnetization is proportional to the magnetic field. Equation (35) confirms then the insight that underlies Rosensweig’s introduction of the chord susceptibility (see [15], (2)) and enables the calculation of the “field dependence” of a fictitious susceptibility. In fact, the susceptibility relevant to the energy loss, implicitly defined by with

is not field dependent (that would contradict the definition of the susceptibility as a limes at ), but amplitude dependent, through , which is proportional to . Note that , so that , the Curie susceptibility, for .

In practice, the summation in (36) will be limited to a finite index . The rapid increase of the Bernoulli numbers with is a concern, but Figure 5 shows that taking , the convergence is reliable up to . The converged values of represent the amplitude dependence of the fictitious susceptibility . Note that while the deviation of from is increasing substantially, the difference between the exact and is small and remains constant within about even for . Hence for calculating the energy loss using is not reliable, but close enough results can be obtained using the susceptibility.

Figure 5: (colour online) Convergence of the Taylor series expansion of representing the sum term in (36) up to odd and even labels increasing in the direction of the arrows up to . The solid line belongs to . The thick dashed line shows .

We have calculated the energy loss per cycle, using the formula

The results are given in Figures 6 and 7 and will be discussed in Section 5. Comparing the dependence of in both polarized cases, prompt can be realized that frequency dependence of energy dissipation in circularly and linearly polarized cases can be equivalent by a factor of , if and the linear approximation of is taken for both polarized cases. This can also be the qualitative interpretation of experimental results of Ahsen et al. [20], where identity of both polarized fields, having the same “root mean square” magnitude, was stated for power dissipation.

Figure 6: (colour online) Energy loss as a function of frequency , parameterized by field strength  A/m from top to bottom. Solid lines correspond to linear polarization, dashed lines to circular. Vertical lines are at resonance and at the Larmor frequency belonging to  A/m from right to left. The calculation was done at magnetite nanoparticle of radius nm and  s.

Figure 7: (colour online) Specific absorption rate as a function of frequency . Notation as under Figure 6.

At high driving field amplitudes the energy absorption per cycle can be estimated as follows. For (25) implies that lags behind the target value by time , which yields for the energy absorption . For according to (25) the driving magnetic field causes only saw-tooth curve like oscillation of magnetization around the zero value with amplitude . The energy absorption per cycle in this case is .

5. Summary and Conclusions

In Section 2 we have attempted to clarify the relationship between a number of models, defined by the appropriate equations of motion and, in some cases, the approximations used to deal with the equations. Concerning the latter, we have analysed the suggestion of Rosensweig [15] to introduce a susceptibility (the chord susceptibility) dependent on the amplitude of the AC magnetic field, instead of following the nonlinear Langevin function. The large differences between the exact and approximate time dependence of the magnetization shown in Figure 1 suggest that using the chord susceptibility would lead to serious underestimation of the SAR.

The analytic solutions of the modified Bloch-Bloembergen equation for circular and linear polarization, presented in Sections 3 and 4, respectively, are in excellent agreement with the numerical solutions. In the case of linear polarization our solution is in the form of a Fourier series. Inserting this into the integral that gives the energy loss, it becomes clear that the features of the magnetization that in Section 2 seemed to disqualify the chord susceptibility in fact do not contribute to the SAR. This insight enables an estimation of the range where the chord susceptibility can be used. This range contains the parameters used in hyperthermia.

The frequency dependence of the energy dissipation is shown in Figure 3. The maxima are seen to decrease as the ratio increases and to shift to lower frequency when the relaxation time is kept constant. The specific absorption rate (SAR, Figure 4) shows saturation with increasing and it decreases with increasing . The equivalence of linear and circularly polarized fields can be verified (taking account of the factor of two due to the two linear components amounting to the circular one) for and .

To illustrate the difference between circular and linear susceptibilities mentioned in Section 4, in Figure 6 we show the energy loss per cycle as function of the driving angular frequency in five different values of the magnetic field amplitude for both polarizations. The curves are log-log plots of (20) and (37) for the circular (dashed lines) and linear (full lines) polarization, respectively. It is assumed that in (20) and in (37) are proportional to . The range of magnetic fields covers four orders of magnitude.

The dependence of on is quite simple in both cases. It is easily seen that if , for very low frequencies and for very large frequencies . Hence the tent-like shapes in the log-log plot of Figure 6, which can also understood as follows. For (25) implies that lags behind the target value by time , which yields for the energy absorption . For according to (25) the driving magnetic field causes only saw-tooth curve like oscillation of magnetization around the zero value with amplitude . The energy absorption per cycle in this case is .

For linear polarization, , the maxima in between the two straight lines do not depend on the magnetic field, that is, the Larmor frequency. However, for linear polarization , which shifts the maxima towards higher frequencies. Indeed, the plots do not show any difference in the positions of the maxima in the curves for weak magnetic fields, while in strong fields the maxima for circular polarization shift to higher frequencies in steps amounting to about one order of magnitude. This is easily explained taking into account that . Likewise, the almost identical straight lines running up to the points marked with in Figures 6 and 7 indicate that in that range . Note that in these calculations we have chosen  Am²/Js.

As to the relative merits of linear and circular polarization, we come to the conclusion followed from our work in the Landau-Lifshitz-Gilbert frame [3]: at the frequencies relevant to hyperthermia the linear option will produce more energy loss. To come to this conclusion from Figures 6 and 7, it is important to realize that the constant splitting between the thick and broken lines seen in the lower, right-side part of the pictures represents the factor of mentioned above in connection with Figures 3 and 4. We see the circular choice loosing even this apparent advantage as we cross the diagonal along which . In the upper left corner, at low frequencies and magnetic fields stronger than  kA/m, the circular polarization is useless for hyperthermia. It is gratifying to see that this conclusion confirms the finding of Berger et al. [7] that various phenomenological approach can serve equally well in the description of different aspects of magnetism.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors wish to express special thanks to I. Nándori and to colleagues in the lab for their valuable critical advices and continuous support. The authors acknowledge support from the Hungarian Scientific Research Fund (OTKA) no. 101329. This work was supported by the TAMOP 4.2.2.A-11/1/KONV-2012-0036 project, which is cofinanced by the European Union and European Social Fund.

References

H. B. Na, I. C. Song, and T. Hyeon, “Inorganic nanoparticles for MRI contrast agents,” Advanced Materials, vol. 21, no. 21, pp. 2133–2148, 2009.

R. Hergt, S. Dutz, R. Müller, and M. Zeisberger, “Magnetic particle hyperthermia: nanoparticle magnetism and materials development for cancer therapy,” Journal of Physics Condensed Matter, vol. 18, no. 38, pp. S2919–S2934, 2006.

P. F. de Châtel, I. Nándori, J. Hakl, S. Mészáros, and K. Vad, “Magnetic particle hyperthermia: Néel relaxation in magnetic nanoparticles under circularly polarized field,” Journal of Physics: Condensed Matter, vol. 21, no. 12, Article ID 124202, 2009.

I. Nándori and J. Rácz, “Magnetic particle hyperthermia: power losses under circularly polarized field in anisotropic nanoparticles,” Physical Review E, vol. 86, no. 6, Article ID 061404, 8 pages, 2012.

P. Debye, Polar Molecules, Dover, Chemical Catalog Company, 1929.

A. Abragam and B. Bleaney, Electron Paramagnetic Resonance of Transition Ions, Oxford University Press, New York, NY, USA, 1970.

R. Berger, J. C. Bissey, and J. Kliava, “Lineshapes in magnetic resonance spectra,” Journal of Physics Condensed Matter, vol. 12, no. 44, pp. 9347–9360, 2000.

L. D. Landau and E. M. Lifshitz, “On the theory of the dispersion of magnetic permeability in ferromagnetic bodies,” Physikalische Zeitschrift der Sowjetunion, vol. 8, pp. 153–169, 1935.

T. L. Gilbert, “A Lagrangian formulation of the gyromagnetic equation of the magnetic field,” Physical Review, vol. 100, p. 1243, 1956.

T. L. Gilbert, “A phenomenological theory of damping in ferromagnetic materials,” IEEE Transactions on Magnetics, vol. 40, no. 6, pp. 3443–3449, 2004.

R. Kikuchi, “On the minimum of magnetization reversal time,” Journal of Applied Physics, vol. 27, no. 11, article 1352, 1956.

M. I. Shliomis, “Magnetic fluids,” Soviet Physics Uspekhi, vol. 17, no. 2, p. 153, 1974.

M. I. Shliomis, “Comment on ‘ferrofluids as thermal ratchets’,” Physical Review Letters, vol. 92, no. 18, Article ID 188901, 1 pages, 2004.

P. Cantillon-Murphy, L. L. Wald, E. Adalsteinsson, and M. Zahn, “Heating in the MRI environment due to superparamagnetic fluid suspensions in a rotating magnetic field,” Journal of Magnetism and Magnetic Materials, vol. 322, no. 6, pp. 727–733, 2010.

R. E. Rosensweig, “Heating magnetic fluid with alternating magnetic field,” Journal of Magnetism and Magnetic Materials, vol. 252, pp. 370–374, 2002.

D. A. Varshalovich, A. N. Moskalev, and V. K. Khersinskii, Quantum Theory of Angular Momentum, World Scientific, River Edge, NJ, USA, 1988.

M. A. Garstens and J. I. Kaplan, “Low-field magnetic resonance,” Physical Review, vol. 99, no. 2, pp. 459–463, 1955.

M. A. Garstens, “Paramagnetic resonance in gases at low fields,” Physical Review, vol. 93, no. 6, pp. 1228–1231, 1954.

I. S. Gradshteyn and I. M. Ryzhik, Tables of Integrals, Series and Products, Academic Press, New York, NY, USA, 7th edition, 2007.

O. O. Ahsen, U. Yilmaz, M. D. Aksoy, G. Ertas, and E. Atalar, “Heating of magnetic fluid systems driven by circularly polarized magnetic field,” Journal of Magnetism and Magnetic Materials, vol. 322, no. 20, pp. 3053–3059, 2010.