Advances in Condensed Matter Physics

Volume 2014 (2014), Article ID 174362, 7 pages

http://dx.doi.org/10.1155/2014/174362

Research Article

Effect of Concurrent ZnO Addition and AlF₃ Reduction on the Elastic Properties of Tellurite Based Glass System

Haji Abdul Aziz Sidek,¹ Raouf El-Mallawany,² Krishnaswamy Hariharan,³ and Shaharuddin Rosmawati¹

¹Glass, Ceramic and Composite Research Group, Department of Physics, Faculty of Science, Universiti Putra Malaysia, 43400 Serdang, Selangor, Malaysia

²Department of Physics, Faculty of Science, Menofia University, Shebin Al-Kom, Egypt

³Department of Physics, Indian Institute of Technology Madras, Chennai, India

Received 30 April 2014; Revised 19 June 2014; Accepted 19 June 2014; Published 8 July 2014

Academic Editor: Changgui Lin

Copyright © 2014 Haji Abdul Aziz Sidek et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

New ternary zinc oxyfluorotellurite (ZOFT) with the composition --, where ; ; , has been successfully prepared by the conventional rapid melt quenching technique. Density, molar volume, and glass transition temperature have been assessed for each ZOFT glass sample. The longitudinal and transverse ultrasonic waves propagated in each glass sample were measured using a MBS8020 ultrasonic data acquisition system at 5 MHz frequency and room temperature. The longitudinal modulus (), shear modulus (), Young’s modulus (), bulk modulus (), and Poisson’s ratio () are assessed from both velocity data and their respective density. The compositional dependence of the ultrasonic velocities and related parameters are discussed to understand the rigidity and compactness of the glass system studied.

1. Introduction

Tellurite glasses are very interesting glasses due to their unique physical properties and applications [1–12]. Tellurite glass was applied at the back of amorphous silicon solar cells in combination with a rear reflector to improve the efficiency of the cell [3]. The propagation of ultrasonic waves in solids provides valuable information about the solid state motion in the material. In recent years, the subject of glasses has rapidly increased because of their various applications in electronics, nuclear and solar energy technologies, and acoustooptic devices [11, 12]. The acoustic wave propagation in bulk glasses has been of considerable interest to understand their mechanical properties. Elastic properties provide information on the structures of solids which are directly related to the interatomic potentials. Glasses are isotropic and have only two independent elastic constant: longitudinal and shear elastic moduli. These two parameters are obtained from the longitudinal and shear sound velocities and density of the glass [13]. An extensive series of research works related to elastic properties of binary, ternary, and quaternary tellurite glasses have been carried out recently [14–23].

The choice of new ternary glass series, namely, zinc oxyfluorotellurite (ZOFT), is of particular interest since they are expected to have chemical durability and thermal stability representing a compromise between pure fluoride and oxide glass with flexible optical properties. Furthermore, the introduction of metal halides into the system could improve such properties and will decrease their hygroscopic behaviour which limits the applications of many pure halides glasses. Also, the main objective of the current work is to study the effect of concurrent ZnO addition and AlF₃ reduction on the density and the elastic properties of zinc tellurite glass systems.

2. Materials and Experimental Method

Zinc oxyfluorotellurite (ZOFT) with the composition --, where ; ; , has been successfully synthesized using the rapid melt quenching method and , , are mole % as shown in Table 1. Detailed preparation of these types of glasses is well documented and available elsewhere [14–17]. The density () of the glasses was determined by the Archimedes method with acetone as floating liquid. All the glass samples’ weight was measured with a digital balance (±0.0001 g accuracy). Their molar volume was calculated from the molecular weight () and density (). The accuracy in the measurement of the density is ±0.01 g cm⁻³ and the relative error is ±0.05%. All the glass samples were checked by X-ray diffraction for their amorphous nature using X’Pert Pro Panalytical PW 3040 MPD X-ray powder diffractometer by employing Cr-Ka radiation. The glass transition temperature () was determined by the differential thermogravimetric analysis (SETARAM instrumentation Labsys DTA/6) at a heating rate of 20 K min⁻¹. The accuracy in the measurement of () is ±2°C.

Table 1: Starting composition bulk density, molar volume, glass transition temperature (), and molecular weight of ZOFT glass systems at room temperature.

Sample Code
Glass Composition (mol%)
Density

(gcm⁻³)
Molar Volume

(10⁻⁶ cm⁻³)

(°C)

ZnO
AlF₃
TeO₂

P1
5
25
70
4.67
29.28
391

P2
10
20
70
4.84
28.24
387

P3
15
15
70
4.91
27.83
386

P4
20
10
70
5.01
27.24
383

P5
25
5
70
5.13
26.54
374

Q1
10
25
65
4.7
28.25
395

Q2
15
20
65
4.86
27.34
390

Q3
20
15
65
4.97
26.69
384

Q4
25
10
65
5.04
26.3
380

Q5
30
5
65
5.14
25.76
373

R1
15
25
60
4.72
27.32
397

R2
20
20
60
4.96
26.02
384

R3
25
15
60
5.07
25.04
376

R4
30
10
60
5.11
25.14
371

R5
35
5
60
5.19
24.77
362

Ultrasonic velocity measurements were carried out at a frequency of 10 MHz using -cut and -cut quartz transducers. A pulse superposition technique was employed using Ultrasonic Data Acquisition System (MATEC 8020, Matec Instruments, USA) [17, 18]. Burnt honey was used as a bonding material between the glass samples and transducers. By measuring the thickness of the sample (), longitudinal (), and transverse (), wave velocities were calculated using the relation . The absolute accuracy in the measurement of the velocity is ±5 m s⁻¹ and the relative error is ±0.1%. The detailed information related with the experimental method has been discussed elsewhere [20–22].

Glasses are isotropic and have only two independent elastic constants of and which can be obtained from their longitudinal and shear sound wave velocity and density. The various elastic properties of the glasses were calculated using the following standard relations [13, 21]:

3. Results and Discussion

3.1. Glass Composition

Table 1 shows the composition of glass series of zinc oxyfluorotellurite (ZOFT) which have an empirical formula of --, where ; ; , where their densities, molar volumes, and glass transition temperature () are also included. Three systematic series of ZOFT glass system each denoted with Pn, Qn, and Rn () have been successfully prepared. It was observed that the color of glass sample changes from semitransparent yellow to transparent yellow as more AlF₃ content is added to the ZOFT glass system as shown in Figure 1.

Figure 1: The variation of density and molar volume of ZOFT glass series at various ZnO contents (mol%).

3.2. Density

As shown in Figure 1 and Table 1, the densities of all ZOFT glass series increase as the ZnO was added to substitute the AlF₃ content in the tellurite based glass network system where the trend shows the similar pattern as in the binary zinc tellurite [14, 17]. Generally, the variation of density of ZOFT glass is in accord with their molecular weight where the molecular weight of the glass series increases as more AlF₃ content is substituted by ZnO in the tellurite glass network. However, the existence of AlF₃  in zinc tellurite glass causes the values of the densities to be slightly lower than that of binary ZnO-TeO₂  glass samples which range from 4.80 to 5.28 cm⁻³ [17]. The present results are in good agreement with the earlier statement of Mallawany’s that the halogen substitution lowered the density of the glass sample [11, 13]. Even the addition of ZnCl₂ into the oxychloride glass system (TeO₂-ZnO-ZnCl₂) also lowered the densities of the TeO₂-ZnO glass system [24, 25]. Density values of (50-)ZnO-Bi₂O₃-50V₂O₅ [26] were changed from 3.5 to 5.13 g/cm³.

As shown in Figure 1, the densities increase linearly with the concurrent addition of ZnO and reduction of AlF₃ content. In this case, as more ZnO content is added into the zinc tellurite glass system, two Zn–F single bonds will replace the Zn=O double bonds; hence, the structure of the glasses becomes close-packed, which results in an increase in density. Fluorine plays an important role in the glass matrix; replacing the O²⁻ ions causes the compositional dependence of the density and molar volume [27]. The molecular weight of TeO₂ is 159.599 which is greater than AlF₃ (83.977) and ZnO (81.408), whereas the atomic weight of individual constituent atom is Te (127.6) > Zn (65.39) > Al (26.9815) > F (18.998) > O (15.9999) and the atomic radius of each of the constituent atoms (in ppm) is Al (143) > Te (140) > Zn (134) > O (66) > F (64).

3.3. Molar Volume

Figure 2 also shows the variation of molar volume with ZnO content for all ZOFT glass series. The decrease in molar volumes for all glass systems which range from 29.28 to 24.77 × 10⁻⁶ cm³/mol attributed to a decrease in the bond length or interatomic spacing between the atoms. The radius of Te²⁺ (0.097 nm) is much greater than that of Zn²⁺ (0.074 nm) and since the radius of Al³⁺ is 0.0535 nm which also has a smaller radius than Zn²⁺ attributed to this situation. Molar volume of the pure TeO₂ glass was 31.28 × 10⁻⁶ cm³/mol [13]. The current finding shows that the molar volume for ZOFT glass system results shows slightly higher values than that of the binary zinc tellurite glasses [14]. The much higher reduction in the molar volume for the ZOFT glass sample containing flourine is attributed to the decrease in viscosity due to the breaking of the Te–O–Te bond to form two Te–F bonds, which increase the efficiency of the crystallization process [28]. The addition of ZnO that consists of Zn²⁺ will certainly modify the tellurite glass structure by creating NBOs in the network, and this situation might occur in ZOFT glass system. The NBOs created were believed to alter the glass structure in a way that packing of the molecule becomes denser as more network modifier ions (in this case Al³⁺) attempt to occupy the interstices within the network.

Figure 2: Variation of longitudinal, (top), and shear, (bottom), ultrasonic wave velocities for ZOFT glass series.

3.4. Glass Transition

In the present investigation, all of the glasses have an endothermic change between 362 and 395°C which attributes to the glass transition temperature, . The Zn²⁺ is incorporated into the glass structure as a network modifier, resulting in closed packing of the glass structure. However, a continuous decrease in with the increase in network modifier contents of ZnO and reduction of AlF₃ has been observed as collected in Table 1. In the present glasses, the decrease in values with increase in Zn²⁺ content contributes to a decrease in thermal stability of the ZOFT glasses that will be discussed elsewhere. The glass transition reflects a change in the coordination number of the network forming atoms and destruction of the network structure brought about by the formation of some nonbridging atoms. The decrease in the glass transition temperature values implies that the number of bridging oxygen groups decreases. This is mainly due to the addition of ZnO which weakens the bond between each atom (increases the number of NBOs atom). The bond is easier to break and hence the of the sample decreased. Furthermore, it also implies a decrease in rigidity of the glass network. It was observed that replacing O²⁻ with F⁻ in the oxyfluoride tellurite glass matrix causes the compositional dependence of the glass transition temperature, , and other physical properties in the ZOFT glass system.

3.5. Sound Wave Velocity

Figure 2 depicts the variation of longitudinal and shear velocities for ZOFT glass series. The variation of both wave velocities that propagated in the present ZOFT bulk glass samples strongly depends on the structural change of the glass network. The longitudinal and shear ultrasonic velocities for each ZOFT glass series are given in Table 2 for a different mole fraction of ZnO content. As shown in Figure 2, it can be seen that, in the glasses studied, both longitudinal and shear ultrasonic velocities decrease nonlinearly with ZnO addition to substitute the AlF₃ in the ZOFT glass system for all series.

Table 2: The longitudinal and shear ultrasonic velocities and their ratio for ZOFT glass series.

Sample

code
Ultrasonic wave velocity (ms⁻¹)

P1
3669
2198
1.67

P2
3618
2166
1.67

P3
3576
2142
1.67

P4
3482
2071
1.68

P5
3390
1999
1.70

Q1
3743
2201
1.70

Q2
3585
2158
1.66

Q3
3553
2110
1.68

Q4
3478
2061
1.69

Q5
3380
1970
1.72

R1
3714
2194
1.69

R2
3601
2134
1.69

R3
3528
2046
1.72

R4
3440
2014
1.71

R5
3337
1931
1.73

It is obviously seen that the decreasing values of both velocities are much higher (>10%) in the lower concentration of 60 mol% TeO₂ as compared with 70 mol% glass series (>7%). For instance, the longitudinal velocity for R1 to R5 (TeO₂ : 0.60) glass samples decreases from 3714 m/s to 3337 m/s and shear velocity from 2194 m/s to 1931 m/s as the ZnO content increases from 15 to 35 mol% and AlF₃ content decreases from 25 to 5 mol%, whereas the longitudinal velocity for glass series (TeO₂ : 70) glass samples decreases from 3669 m/s to 3390 m/s as the ZnO content increases from 5to 25 mol% and AlF₃ content decreases from 25 to 5 mol%. The overall percentage decrease of velocities of each glass series is given in Table 3. It is noticed that the percentage of decrement in velocity increases with the increasing of substituting AlF₃ content. It means that the more AlF₃ substitution to ZnO content, the higher the difference between maximum velocity and minimum velocity for both longitudinal and shear velocity. The observed difference between higher values at low TeO₂ content ( mol%) and lower values at high TeO₂ content ( mol%) in the velocity confirms a substantial change in the glass structure. The decrease in AlF₃ content decreases velocities through glass, and elastic stiffness is also reduced as observed earlier [25]. As small quantity of AlF₃ is added into the TeO₂-ZnO glass network, a breaking of Te–O–Te takes place. The conversion of this linkage results in depolymerization of network leading to the formation of –Te bridges with the apparition of nonbridging oxygen (NBO) [29]. Therefore, the continual breaking of the Te–O–Te linkages with addition of ZnO to substitute AlF₃ contents leads to the loose packing of the glass network and, hence, a decrease in rigidity. The observed results can be further substantiated by revealing the composition dependent ultrasonic parameters.

Table 3: Variation of ultrasonic velocities due to ZnO addition and AlF₃ reduction in the tellurite glass network.

Sample

code
Longitudinal velocity (m/s)
Percent of decrease in velocity (%)
Shear velocity (m/s)
Percent of decrease in velocity (%)

Maximum
Minimum
Maximum
Minimum

P1–P5
3669
3390
7.60
2198
1999
9.05

Q1–Q5
3743
3380
9.70
2201
1970
10.49

R1–R5
3714
3337
10.15
2194
1931
11.99

It is inferred that a decrease in Te coordination number () has resulted with the increase in the modifier content [30]. Further, a decrease in the coordination number results in slight decrease in the mean Te–O bond length () [29]. Thus, it is inferred that the observed continuous decrease in sound velocity in the present glasses is due to the change in coordination number with the addition of ZnO to substitute AlF3 content. An introduction of fluorine into TeO₂-based glass system results in reduction of Te–O–Te linkages due to a gradual transformation of trigonal bipyramid TeO₄ (tbp) through TeO₃₊₁ to trigonal pyramid TeO₃ decreasing the connectivity of the tellurite glass former network. This behaviour is strengthened by the higher concentration of F⁻ ions [27].

3.6. Elastic Moduli

Elastic modulus of the present ZOFT glass series has been determined from the measured ultrasonic velocities and densities. Table 4 presents the experimental values of the elastic moduli: Young’s modulus (), longitudinal modulus (), shear modulus (), bulk modulus (), and Poisson’s ratio () for each ZOFT glass series.

Table 4: Longitudinal (), shear (), Young’s (), and bulk () modulus, Poisson’s ratio (), and fractal bond connectivity () for ZOFT glass series.

Sample code
Elastic moduli (GPa)

P1
62.89
22.57
32.80
55.08
0.220
2.753

P2
63.33
22.70
33.07
55.41
0.221
2.746

P3
62.72
22.50
32.72
54.92
0.220
2.751

P4
60.71
21.48
32.07
52.67
0.226
2.678

P5
58.99
20.51
31.64
50.60
0.233
2.593

Q1
65.90
22.79
35.52
56.32
0.236
2.566

Q2
62.40
22.61
32.25
54.98
0.216
2.804

Q3
62.73
22.12
33.23
54.31
0.228
2.663

Q4
60.93
21.40
32.40
52.61
0.229
2.641

Q5
58.70
19.94
32.11
49.56
0.243
2.484

R1
65.11
22.72
34.81
55.98
0.232
2.613

R2
64.21
22.55
34.15
55.45
0.229
2.642

R3
63.06
21.21
34.78
52.87
0.247
2.439

R4
60.51
20.74
32.85
51.40
0.239
2.525

R5
57.75
19.34
31.97
48.28
0.248
2.420

For P1 to P5 glass series, Young’s modulus decreases from 32.80 to 31.64 GPa. This pattern is applied to the rest of ZOFT glass series. The addition of ZnO and AlF₃ reduction result in low network rigidity, which in turn results in decrease of the longitudinal () and shear () modulus. The decrease of shear modulus () and bulk modulus () is probably due to the tendency of the change in the coordination number of Te in the ZOFT glass network. For the ZOFT glasses both the degree of cross-linking and the relative proportions of different types of bonds may be changed with the glass composition. The existence of AlF₃ and the nature of TeO₂ not only cause a decrease in the elastic moduli, but also cause an increase in Poisson’s ratio (Table 4).

3.7. Poisson’s Ratio

It has been reported that Poisson’s ratio is affected by the changes in the cross-link density of the glass network. The glass structure with high cross-link density has Poisson’s ratio in the order of 0.1 to 0.2, while structure with low cross-link density has Poisson’s ratio in the order of 0.3 to 0.5. As shown in Figure 4, Poisson’s ratio of the present glass shows a nonlinear increase as the ZnO content increases for all glass series. For instance, from Q1 to Q5 glass series, Poisson’s ratio increases from 0.232 to 0.248. Hence the values of the Poisson’s ratio are of the order 0.2 which reveals a high cross-link density [29]. Poisson’s ratio obtained from the calculation shows reverse changes and trend compared to other elastic moduli. The variation of Poisson’s ratio with composition should be exactly the reverse of elastic moduli variation [31]. For all series of glass, the transformation of cross-linkage is negligibly small (changes about 0.02) and almost remains constant. Flourine plays a role in decreasing the connectivity of the glass structure. It also indicates a strengthening in the glass structure which may be due to the introduction of stronger ionic bonds in the glass network [31, 32].

3.8. Fractal Bond Connectivity

The fractal bond connectivity () is a ratio between shear to bulk modulus ratio (of ZOFT glass series at room temperature and is presented in Table 4. The fractal bond connected as shown in Figure 4 for ZOFT glass series tends to decrease with increasing ZnO content which is consistent with the loss or weakening of cross-link between TeO₂ chains. In this study, the fractal bond connectivity, (), of these glasses ranges between 2.804 and 2.420. These suggest an intermediate connectivity between a two- and a three-dimensional disordered network, which implies a marked degree of cross-linkage between TeO₂ chains, as would be anticipated for modifier cations whose valence is greater than unity, or increased branching of the network of TeO₂ chains facilitated by an increase in the number of endings and branching units incorporated into the basic tellurite network.

3.9. Regression Analysis

All the current experimental data obtained from ZOFT glass series were analyzed using Microsoft Excel, with nonlinear fitting regression curves, where the results of the regression coefficients are presented in Table 5. The regression coefficients obtained from each curve are shown in Figures 1, 2, 3, and 4. In Table 5, stands for the variables shown in the first column. As can be seen in previous figures, for most of the variables, a nonlinear curve () gives the best fit. Except for Young’s modulus (), the values lie between 0.622 and 0.9161.

Table 5: Nonlinear regression analysis of the variables () for various properties of ZOFT glass series.

Variable

2

Density

4527.1
0.8907

Molar Volume

30.25
0.8989

Longitudinal wave velocity ()

3738.4
0.7965

Shear wave velocity ()

2229.5
0.9161

Longitudinal modulus ()

63.4
0.6626

Shear modulus ()

22.56
0.906

Bulk modulus ()

55.18
0.870

Poisson’s ratio (sigma)

0.224
0.623

Fractal Bond connectivity

2.707
0.622

Glass temperature,

664.74
0.886

Figure 3: Variation of elastic moduli (i.e., longitudinal modulus (), shear modulus (), bulk modulus (), and Young’s modulus () for ZOFT glass series).

Figure 4: Variation of Poisson’s ratio and fractal bond connectivity of ZOT glass series at various ZnO contents.

4. Conclusion

New ternary zinc oxyfluorotellurite (ZOFT) with the compositions - , where ;  ;  , has been achieved. The characteristics of ZOFT glass series were studied with the effect of concurrent ZnO addition and AlF₃ reduction in the tellurite glass matrix.

(i)The densities of the ZOFT glasses increase as the ZnO content was added to substitute the AlF₃ content for ZOFT glass series while their molar volume decreases. The increase in density was due to the decrease of molar volume as well as interatomic spacing.(ii)The glass transition temperatures show the decreasing trend with the addition of ZnO content. These decreases can be explained by the role of the fluorine ions which substitute the TeO₂-ZnO network.(iii)The observed decrease in ultrasonic velocities confirmed a substantial change in the glass structure. The concurrent Zn addition and AlF₃ reduction in the tellurite glass matrix cause more ions to be opened up in the network. Thus, weakening of the glass structure or reduction in the rigidity of the network takes place.(iv)All elastic constants decrease with the addition of the ZnO content and AlF₃ reduction in the ZOFT glass series. The effect of the halogen substitution F⁻ on the elastic properties was expected to produce quite different changes in physical properties.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The financial support from Ministry of Science, Technology and Innovation, Malaysia, and Universiti Putra Malaysia (UPM), each under the Fundamental Research Grant Scheme (vote no. 5524288) and Research University Grant Scheme (vote no. 9340800), is gratefully acknowledged.

References

T. Cheng, K. Asano, Z. Duan et al., “Design and optimization of tellurite hybrid microstructured optical fiber with high nonlinearity and low flattened chromatic dispersion for optical parametric amplification,” Optics Communications, vol. 318, pp. 105–111, 2014.

R. N. Hampton, W. Hong, G. A. Saunders, and R. A. El-Mallawany, “The dielectric properties of tellurite glass,” Physics and Chemistry of Glasses, vol. 29, no. 3, pp. 100–105, 1988.

F. Yang, C. Liu, D. Wei, Y. Chen, J. Lu, and Sh. Yang, “Er³⁺-Yb³⁺ co-doped TeO₂-PbF₂ oxyhalide tellurite glasses for amorphous silicon solar cells,” Optical Materials, vol. 36, pp. 1040–1043, 2014.

R. A. El-Mallawany, L. M. Sharaf El-Deen, and M. M. Elkholy, “Dielectric properties and polarizability of molybdenum tellurite glasses,” Journal of Materials Science, vol. 31, no. 23, pp. 6339–6343, 1996.

I. Z. Hager, R. El-Mallawany, and M. Poulain, “Infrared and Raman spectra of new molybdenum and tungsten oxyfluoride glasses,” Journal of Materials Science, vol. 34, no. 21, pp. 5163–5168, 1999.

R. El-Mallawany, “Quantitative analysis of elastic moduli of tellurite glasses,” Journal of Materials Research, vol. 5, no. 10, pp. 2218–2222, 1990.

S. Laila, A. Suraya, and A. Yahya, “Effect of glass network modification on elastic and structural properties of mixed electronic-ionic 35V₂O₅-(65-x)TeO₂-(x)Li₂O glass system,” Chalcogenide Letters, vol. 11, pp. 91–104, 2014.

H. M. M. Moawad, H. Jain, and R. El-Mallawany, “DC conductivity of silver vanadium tellurite glasses,” Journal of Physics and Chemistry of Solids, vol. 70, no. 1, pp. 224–233, 2009.

R. El-Mallawany, A. Abousehly, and E. Yousef, “Elastic moduli of tricomponent tellurite glasses TeO₂-V₂O₅-Ag₂O,” Journal of Materials Science Letters, vol. 19, no. 5, pp. 409–411, 2000.

F. Nawaz, M. R. Sahar, S. K. Ghoshal, A. Awang, and I. Ahmed, “Concentration dependent structural and spectroscopic properties of Sm3⁺ /Yb3⁺ co-doped sodium tellurite glass,” Physica B: Condensed Matter, vol. 433, pp. 89–95, 2014.

R. El-Mallawany and I. A. Ahmed, “Thermal properties of multicomponent tellurite glass,” Journal of Materials Science, vol. 43, no. 15, pp. 5131–5138, 2008.

R. El-Mallawany, A. Abousehly, A. A. El-Rahamani, and E. Yousef, “Radiation effect on the ultrasonic attenuation and internal friction of tellurite glasses,” Materials Chemistry and Physics, vol. 52, no. 2, pp. 161–165, 1998.

R. El-Mallawany, “Tellurite glasses part 1. Elastic properties,” Materials Chemistry and Physics, vol. 53, no. 2, pp. 93–120, 1998.

H. A. A. Sidek, S. Rosmawati, Z. A. Talib, M. K. Halimah, and W. M. Daud, “Synthesis and optical properties of ZnO-TeO₂ glass system,” American Journal of Applied Sciences, vol. 6, no. 8, pp. 1489–1494, 2009.

S. Rosmawati, H. A. A. Sidek, A. T. Zainal, and H. Mohd Zobir, “IR and UV spectral studies of zinc tellurite glasses,” Journal of Applied Sciences, vol. 7, no. 20, pp. 3051–3056, 2007.

P. Gayathri Pavani, K. Sadhana, and V. Chandra Mouli, “Optical, physical and structural studies of boro-zinc tellurite glasses,” Physica B: Condensed Matter, vol. 406, no. 6-7, pp. 1242–1247, 2011.

H. A. A. Sidek, S. Rosmawati, M. K. Halimah, K. A. Matori, and Z. A. Talib, “Effect of AlF₃ on the density and elastic properties of zinc tellurite glass systems,” Materials, vol. 5, no. 8, pp. 1361–1372, 2012.

S. Rosmawati, H. A. A. Sidek, A. T. Zainal, and H. M. Zobir, “Effect of zinc on the physical properties of tellurite glass,” Journal of Applied Sciences, vol. 8, no. 10, pp. 1956–1961, 2008.

J. N. Ayuni, M. K. Halimah, Z. A. Talib et al., “Optical properties of ternary TeO₂-B₂O₃-ZnO glass system,” IOP Conference Series: Materials Science and Engineering, vol. 17, no. 1, Article ID 012027, 2011.

M. K. Halimah, W. M. Daud, and H. A. A. Sidek, “Elastic properties of TeO₂-B₂O₃-Ag₂O glasses,” Ionics, vol. 16, no. 9, pp. 807–813, 2010.

S. H. Ab Aziz, R. Sharuddin, K. A. Matori, and H. M. Kamari, “Elastic moduli of zinc oxyfluorotellurite glasses,” Journal of Materials Science and Engineering, vol. 5, no. 3, pp. 319–322, 2011.

H. A. A. Sidek, S. Rosmawati, K. A. Matori, M. K. Halimah, and B. Z. Azmi, “Elastic constants of (TeO₂)₉₀(ZnO)x zinc oxyfluorotellurite glasses,” IOP Conference Series: Materials Science and Engineering, vol. 17, no. 1, Article ID 012031, 2011.

H. A. A. Sidek, S. Rosmawati, B. Z. Azmi, and A. H. Shaari, “Effect of ZnO on the thermal properties of tellurite glass,” Advances in Condensed Matter Physics, vol. 2013, Article ID 783207, 6 pages, 2013.

M. R. Sahar and N. Noordin, “Oxychloride glasses based on the TeO₂-ZnO-ZnCl₂ system,” Journal of Non-Crystalline Solids, vol. 184, no. 1, pp. 137–140, 1995.

R. A. El-Mallawany and G. A. Saunders, “Elastic behaviour under pressure of the binary tellurite glasses TeO₂-ZnCl₂ and TeO₂-WO₃,” Journal of Materials Science Letters, vol. 6, no. 4, pp. 443–446, 1987.

R. Punia, R. Kundu, J. Hooda, S. Dhankhar, S. Dahiya, and N. kishore, “Effect of Bi₂O₃ on structural, optical, and other physical properties of semiconducting zinc vanadate glasses,” Journal of Applied Physics, vol. 110, Article ID 033527, 2011.

G. Wang, S. Dai, J. Zhang, S. Xu, L. Hu, and Z. Jiang, “Effect of F- ions on physical and spectroscopic properties of Yb3+-doped TeO₂-based glasses,” Journal of Luminescence, vol. 113, no. 1-2, pp. 27–32, 2005.

S. Likitvanichkul and W. C. Lacourse, “Effect of fluorine content on crystallization of canasite glass-ceramics,” Journal of Materials Science, vol. 30, no. 24, pp. 6151–6155, 1995.

A. N. Begum and V. Rajendran, “Structure and elastic properties of TeO₂-BaF₂ glasses,” Journal of Physics and Chemistry of Solids, vol. 67, no. 8, pp. 1697–1702, 2006.

A. Ibanez, T. Ericsson, O. Lindqvist, D. Bazin, and E. Philippot, “Local range order of tellurium atoms in TeO₂-BaO and TeO₂-BaF₂ glassy systems,” Journal of Materials Chemistry, vol. 4, no. 7, pp. 1101–1106, 1994.

A. El-Adawy and Y. Moustafa, “Elastic properties of bismuth borate glasses,” Journal of Physics D: Applied Physics, vol. 32, no. 21, pp. 2791–2796, 1999.

R. El-Mallawany, M. Sidkey, A. Khafagy, and H. Afifi, “Ultrasonic attenuation of tellurite glasses,” Materials Chemistry and Physics, vol. 37, no. 2, pp. 197–200, 1994.