Advances in High Energy Physics
Volume 2015 (2015), Article ID 463141, 6 pages
http://dx.doi.org/10.1155/2015/463141

Research Article

A Gas Target Internal to the LHC for the Study of pp Single-Spin Asymmetries and Heavy Ion Collisions

Colin Barschel,¹ Paolo Lenisa,² Alexander Nass,³ and Erhard Steffens⁴

¹LHCb Collaboration, CERN, 1211 Geneva 23, Switzerland
²University of Ferrara and INFN, 44100 Ferrara, Italy
³Institut für Kernphysik, FZJ, 52425 Jülich, Germany
⁴Physics Institute, Friedrich-Alexander University Erlangen-Nürnberg, 91058 Erlangen, Germany

Received 19 March 2015; Revised 5 June 2015; Accepted 5 July 2015

Academic Editor: Barbara Trzeciak

Copyright © 2015 Colin Barschel et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited. The publication of this article was funded by SCOAP³.

Abstract.

We discuss the application of an open storage cell as gas target for a proposed LHC fixed-target experiment AFTER@LHC. The target provides a high areal density at minimum gas input, which may be polarized ¹H, ²H, or ³He gas or heavy inert gases in a wide mass range. For the study of single-spin asymmetries in pp interaction, luminosities of nearly 10³³/cm² s can be produced with existing techniques.

Devoted to Professor Willy Haeberli (Wisconsin) on his 90th birthday on June 17, 2015, who presented the first ideas on a polarized storage cell target 50 years ago at the 2nd Polarization Symposium, 1965, in Karlsruhe (Germany) and who pioneered this technique and brought it to maturity

1. Introduction

Colliding beam facilities are indispensable tools for achieving the highest possible collision energies . Their range of application may be enlarged by adding a fixed-target experiment, for example, using a thin internal gas target which does not affect the luminosity life time significantly. Experiments based on such targets offer distinct features as compared with collider experiments [1, 2]:

(1)Accessing the large negative Feynman domain,(2)achieving high luminosities with dense targets,(3)varying the atomic number of the target in a wide range,(4)polarizing light target atoms (¹H, ²H = D, ³He) with polarization of the nuclear spin s.

The target proposed consists of an open storage cell, a narrow straight tube with thin walls of length located in the machine vacuum along the beam axis into which gas is injected at the center in two modes:

(i)polarized atomic beam (e.g., H) into a feed tube of low gas conductance;(ii)unpolarized gas via capillary from a gas handling system.

The gas diffuses through the cell openings into the machine vacuum system, usually a powerful differential pumping system, and constitutes within the cell a density distribution of triangular shape with its maximum [atoms/cm³] at the center. The areal target density is then (see Section 3). Such kind of gas targets for storage rings is reviewed in [3]. Targets for proton beams at intermediate energies have been applied at the cooler ring COSY (FZ Jülich) [4–6] and at the IUCF Cooler Ring [7]. At the 30 GeV electron ring of the HERA collider (DESY Hamburg), the HERMES H&D target [8] has been operated successfully during 1996–2005. In 1995, prior to the HERMES H&D target, a polarized target [9] has been used for the measurement of the neutron spin structure function.

In the following, the design and performance of the HERMES H&D target which may be closest in design to the proposed LHC target are reviewed in Section 2. First ideas of a storage cell target in the LHC are presented in Section 3. The paper is concluded by discussing some of the open problems which need to be subject of further studies.

2. The HERMES Polarized Hydrogen and Deuterium Target

An overview of the HERMES polarized H and D target [8] is presented in Figure 1. It consists of three main components:

(i)the Atomic Beam Source (ABS) for the production of an intense polarized atomic hydrogen beam, consisting of a dissociator with cooled nozzle, a system of sextupole magnets focusing the wanted hfs components¹ into the feed tube of the cell, and adiabatic rf-transitions² for setting and switching the target polarization between states of opposite sign (Endnotes ¹,²);(ii)the target chamber with T-shaped storage cell of 400 mm in length and elliptical cross section with diameters horizontal/vertical of 21 and 9 mm, respectively, and a longitudinal or vertical holding field up to 350 mT. The cell temperature could be set to values between 50 and 300 K;(iii)the diagnostic system for analyzing a weak sample beam drawn from the target cell, consisting of the polarimeter (BRP) measuring the substate population and the target gas analyzer (TGA) detecting the molecular fraction and thus the degree of recombination within the cell. From these parameters, the target polarization as seen by the beam is deduced.

Figure 1: Schematic representation (top view) of the HERMES longitudinally polarized target (taken from [8]). From left to right: Atomic Beam Source (ABS), target chamber with cell and SC magnet coils, diagnostic system of target gas analyzer (TGA), and Breit-Rabi polarimeter (BRP).

For details of the design, operation, and analysis of the data of the diagnostic system the reader is referred to [8] and to the references therein, in particular on the various subsystems. Here a few important details are given, only. The ABS injects a flux of ≈6. atoms/s into the feed tube of the target cell, corresponding to a recombined H₂-flow rate of about  mbar l/s into the machine vacuum system. The target particles (H, H₂) are confined by the cell walls to the close vicinity of the beam axis, thus increasing the areal density to values of about 10¹⁴/cm², two orders of magnitude higher than the density of the injected atomic beam. The Al-walls of the cell are cooled to a temperature of about 100 K for two reasons: (i) increasing the density by and (ii) buildup of a thin layer of frozen water which suppresses wall recombination effectively. The water is produced within the dissociator from a small admixture to the hydrogen gas and flows with the atomic beam.

A “strong” guide field of sufficient homogeneity is required for the target, either longitudinal for helicity measurements or transverse for transverse spin effects. The strength of about 300 mT = ( mT is the critical field of the H atom) for the longitudinal field was chosen such that (i) proton and electron spins are fully decoupled and (ii) there is no depolarizing resonance due to the periodic bunch field of the beam. The target polarization³ is deduced from the data continuously recorded by the diagnostic system. The density-weighted target polarization along can be related to the sample beam data using assumptions about the relaxation mechanisms which contributes to the error.

The stability of the target is demonstrated in Figure 2, where the raw data of the transverse proton run 2002/03 are shown. For 2002, the average target polarization corrected for guide field and degree of dissociation was only, partly due to a less stable operation of HERA and to a weaker guide field of the normal-conducting transverse magnet, in contrast to the 1996/97 longitudinal proton run with average polarization (see Endnote³).

(a)

(b)

Figure 2: Results of the target analysis for the HERMES 2002/03 data taking period with transverse proton polarization as number of days, since August 1, 2002 (taken from [8]): (a) degree of dissociation α measured by the TGA (α = 1: no molecules); (b) positive and negative vector polarization of the sampled atomic part as measured by the BRP. During data taking the states of opposite sign are set periodically with a cycle time of the order of 1 min.

Polarized deuterium has been run in 1999/2000 with longitudinal field. In 2000, a very stable operation had been achieved, resulting in the following parameters: , with and and and [8] (see Endnote³).

It should be noted that the same target has been used with unpolarized gas in a broad mass range for the study of the -dependence of various effects in DIS⁴. The ³He target [9] run in 1995 had the following characteristics: target density and polarization . Today, the polarization of such optically pumped targets can reach values of 0.8, that is, 80% of the maximum [12].

3. First Ideas on an LHC Storage Cell Target

3.1. Density Achievable for Polarized Hydrogen

The target density depends on the geometry of the storage cell and the gas input. The required aperture at a beam waist may be estimated with safety margin of 1 mm by

with being the 1 beam radius in the horizontal and vertical plane. With nominal parameters for the LHC IP⁵ of  m and the beta function  m (. values at IP), (1) results in a required aperture of 1.24 mm, dominated by the safety margin. At  m the aperture increases slightly to 1.46 mm. It seems unlikely that such small apertures are compatible with a stable LHC operation. Another criterion is required for first estimates on a possible cell target for the LHC.

At the VELO detector [13–15] of LHCb, the two halves can be opened during injection and tuning. In the closed position, a narrow tube of 1 cm in diameter and 100 cm in length is wide enough to guide the LHC beam through the detector. In the following we assume conservatively (see Figure 3) a size of  cm and  cm for a cylindrical target cell, that is, a full length of 100 cm, which may have the option to open by being split into two halves. For the feed tube we assume  cm and  cm, a geometry for which the HERMES ABS has been optimized.

Figure 3: Storage cell geometry. The proton beam is traversing the beam tube of total length ; the polarized atomic beam enters “ballistically” via the feed tube into the center and diffuses outwards along the three tube elements with a density maximum in the center (figure taken from [3]).

The gas conductance of a tube in the molecular-flow regime is given by [3]

where is the temperature in K, the molecular mass for atomic hydrogen, and , are in cm. The total conductance of the cell from the center outwards is then which at  K amounts to  l/s. With a flux of polarized hydrogen atoms of  H/s into the cell, the central density is then

resulting in an areal polarized hydrogen density of the 100 cm long cell of 1.4 cm i.d. at  K of

The luminosity of such a target installed at LHC at nominal proton beam current of  p/s is then

For optimizing the cell wall conditions it might be necessary to run the cell at a temperature of 100 K instead of 300 K, as for the HERMES target [8] (see Section 2). This would result in a √3 higher target density and a maximum luminosity of (100 K) = 1.50³³/cm² s.

If such a target is run in addition to other experiments, it is important to know its effect on the life time of a stored LHC proton beam. Let us assume a maximum value of . The loss rate is then given by the product of with the loss cross section at a CM energy of 162 GeV, which we estimate by 0.1 b, resulting in a loss rate  p/s. The relative loss rate is with the number of stored protons , which gives a relative loss rate of 0⁻⁷/s, corresponding to a 1/ beam life time, the inverse of the relative loss rate, of 0⁶ s or 23 days. We conclude that for the pp case additional beam losses caused by the hydrogen target gas are negligible. The target density given above is limited by the present target technology, for example, the intensity of the source feeding the cell target.

These are first estimates only, which need to be developed further if the details of a fixed-target experiment at LHC are known. The calculated target densities and the resulting luminosities are within a favorable range. Clearly, several aspects need to be investigated to make such estimates more reliable, in particular (i) the amount of target gas the LHC machine vacuum system can accept, (ii) the rôle of frozen layers like water on the inner cell surface and whether they might cause instabilities, (iii) problems of access and reliability of running a complex pumping system in the LHC tunnel, and so forth.

3.2. Density Achievable for Heavy Ion Collisions

As mentioned earlier, heavy unpolarized target gas could be injected into the cell for the study of heavy ion collisions. In principle, the gas flow from a Gas Feed System and thus the density of a cell target can be very high. On the other hand, there will be limitations due to the maximum gas flow the vacuum system at a possible LHC target station can take. Another limit might come from the rate capability of the detector system. Here, we present estimates of a density limit set by the requirement that the cell target filled with a heavy gas must not shorten the beam life time of a heavy ion beam, for example, a Pb beam, by more than 10%. For the LHC in Pb-Pb collider mode without gas target we assume a beam life time of 10 h. As target gas we assume xenon with average molecular weight . As a loss cross section we start with the total hadronic cross section of Pb on Pb of 7.65 b [16]. By scaling with the nuclear radii, the Pb-Xe loss cross section is estimated to be 6.6 b. We require that the additional “target” life time⁶   h =  s is related to the the loss rate ( = number of stored Pb ions = 0¹⁰) by

This results in a maximum Pb-Xe luminosity of 0²⁸/cm² s and a maximum density of Xenon atoms of . The xenon flow rate into the target cell required to produce this density amounts to a value of 3.0−5 mbar l/s. It should be noted that the LHC Pb-Pb design luminosity in collider mode is 0²⁷/cm² s. We conclude that for the hypothetical Pb-Xe fixed-target case a high luminosity in the order of the LHC Pb-Pb design luminosity can be produced. The Pb-Xe fixed-target luminosity is not limited by the storage cell technology but rather by other factors like beam life time, detector rate, and so forth.

In Table 1, the results of this study are compared with past or existing targets in storage rings, their main operational parameters, and luminosities achieved.

Table 1: Comparison of gas targets in storage rings with a hypothetical target for the proposed AFTER@LHC initiative [1, 2].The target gas ¹H, ²D, or ³He is assumed to be spin polarized.

Storage ring
Particle

GeV
Target type

m

K

1/cm² s
Remarks
Reference

HERA-e
DESY
(term. 2007)
e±  pol.
27.6
Cell 
¹H, ²D, ³He
0.4
100
25

HERMES exp.
1995–2007
[9]

RHIC-p
BNL
p pol.
250
Jet
—
—

Absolute p polarimeter
[10]

COSY 
FZ Jülich
p, d pol.
3.77 
= 49.3 MeV
Cell  ¹H, ²D 
Cell ¹H
0.4
300
10²⁹

ANKE exp.
PAX exp.
[4, 5] 
[11]

LHC
CERN
(proposed)
p unpol.
heavy ions
7,000 

Cell 
¹H, ²D
Xe 

1.0
100
≥100
10³³
10²⁷–10²⁸
Based on techn. of HERMES target
this paper

4. Summary

In this study, the application and expected performance of a storage cell target interacting with the LHC beam are investigated. Using polarized light atoms (¹H, ²D, and possibly ³He) from external sources and a proton beam, single-spin asymmetries of various processes for longitudinal or transverse target polarization could be measured at high rate. With unpolarized atoms or molecules in a broad mass range from H₂ to Xe or beyond as target gas, heavy ion collisions could be studied with flexible choice of the target mass and target density. These estimates show that a high luminosity for proton-proton and heavy ion collisions at the LHC can be achieved using the storage cell technique. The optimum density has to be determined taking a number of operational aspects into account.

It should be noted that due to the strongly forward peaked particle emission, the physics accessible by such an ultrarelativistic fixed-target experiment depends very much on the design of the detector. This is not subject of the present study.

In summary, the promising results of this study indicate that a storage cell target combined with the LHC beam may open access to additional physics topics like the gluon contribution to the proton spin, the gluon EMC effect, or deconfinement studies using the Pb beam with targets of different mass, as discussed in [1, 2].

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

The authors thank Massimiliano Ferro-Luzzi (CERN) for valuable discussions.

Endnotes

1.Hyperfine structure components; see [3].

2.Radio-frequency transitions between hfs components; see [3].

3.The vector polarization is bound to −1 ≤ ≤ 1 and tensor polarization for spin = 1 to −2 ≤ ≤ 1; see [3].

4.Deep inelastic scattering.

5.Interaction point, for example, collision point.

6.Note: the total target life time is calculated from the individual loss rates by .

References

S. J. Brodsky, F. Fleuret, C. Hadjidakis, and J. P. Lansberg, “Physics opportunities of a fixed-target experiment using LHC beams,” Physics Reports, vol. 522, no. 4, pp. 239–255, 2013.

J. P. Lansberg, M. Anselmino, R. Arnaldi et al., “Spin physics and TMD studies at A Fixed-Target ExpeRiment at the LHC (AFTER@LHC),” EPJ Web of Conferences, vol. 85, Article ID 02038, 6 pages, 2015.

E. Steffens and W. Haeberli, “Polarized gas targets,” Reports on Progress in Physics, vol. 66, no. 11, article 1887, 2003.

M. Mikirtychyants, R. Engels, K. Grigoryev et al., “The polarized H and D atomic beam source for ANKE at COSY-Jülich,” Nuclear Instruments and Methods in Physics Research A: Accelerators, Spectrometers, Detectors and Associated Equipment, vol. 721, pp. 83–98, 2013.

K. Grigoryev, F. Rathmann, R. Engels et al., “Machine studies for the development of storage cells at the ANKE facility of COSY,” Nuclear Instruments and Methods in Physics Research Section A, vol. 599, no. 2-3, pp. 130–139, 2009.

G. Ciullo, “The H and D polarized target for spin-filtering measurements at COSY,” in Proceedings of the 21st International Symposium on Spin Physics (SPIN '14), Beijing, China, October 2014, http://collaborations.fz-juelich.de/ikp/pax/documents/talks.shtml.

W. A. Dezarn, J. Doskow, J. G. Hardie et al., “Polarized internal gas target for hydrogen and deuterium at the IUCF Cooler Ring,” Nuclear Instruments and Methods in Physics Research Section A, vol. 362, no. 1, pp. 36–40, 1995.

A. Airapetian, N. Akopov, Z. Akopov et al., “The HERMES polarized hydrogen and deuterium gas target in the HERA electron storage ring,” Nuclear Instruments and Methods in Physics Research Section A, vol. 540, no. 1, pp. 68–101, 2005.

D. De Schepper, L. H. Kramer, S. F. Pate et al., “The HERMES polarized ³He internal gas target,” Nuclear Instruments and Methods in Physics Research A: Accelerators, Spectrometers, Detectors and Associated Equipment, vol. 419, no. 1, pp. 16–44, 1998.

A. Poblaguev, “Polarimetry at the AGS,” in Proceedings of the 15th International Workshop on Polarized Sources, Targets, and Polarimetry (PSTP '13), p. 053, Charlottesville, Va, USA, 2013.

W. Augustyniak, L. Barion, S. Barsov et al., “Polarization of a stored beam by spin-filtering,” Physics Letters B, vol. 718, no. 1, pp. 64–69, 2012.

R. Milner, Private Communication, MIT, 2015.

C. Barschel, Precision luminosity measurements at LHCb with beam-gas imaging [Ph.D. thesis], RWTH Aachen University, Aachen, Germany, 2014, CERN-THESIS-2013-301.

M. Ferro-Luzzi, “Proposal for an absolute luminosity determination in colliding beam experiments using vertex detection of beam-gas interactions,” Nuclear Instruments and Methods in Physics Research Section A, vol. 553, no. 3, pp. 388–399, 2005.

R. Aaij, C. Abellan Beteta, R. Llull et al., “Precision luminosity measurements at LHCb,” Journal of Instrumentation, vol. 9, Article ID P12005, 2014.

K. Oyama, “Reference cross section measurements with ALICE in pp and Pb-Pb collisions at LHC,” http://arxiv.org/abs/1305.7044