Advances in Meteorology
Volume 2017 (2017), Article ID 6482613, 1 page
https://doi.org/10.1155/2017/6482613

Corrigendum

Corrigendum to “Reliability of MODIS Evapotranspiration Products for Heterogeneous Dry Forest: A Study Case of Caatinga”

Rodrigo de Queiroga Miranda,¹ Josiclêda Domiciano Galvíncio,¹ Magna Soelma Beserra de Moura,² Charles Allan Jones,³ and Raghavan Srinivasan³

¹Laboratório de Sensoriamento Remoto e Geoprocessamento, Universidade Federal de Pernambuco, 50670901 Recife, PE, Brazil
²Empresa Brasileira de Pesquisa Agropecuária, Centro de Pesquisa Agropecuária do Trópico Semi-Árido, 56302970 Petrolina, PE, Brazil
³Spatial Sciences Laboratory, Texas A&M University, College Station, TX 77845, USA

Correspondence should be addressed to Rodrigo de Queiroga Miranda; rodrigo.qmiranda@gmail.com

Received 11 May 2017; Accepted 23 May 2017; Published 4 June 2017

Copyright © 2017 Rodrigo de Queiroga Miranda et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Reliability of MODIS Evapotranspiration Products for Heterogeneous Dry Forest: A Study Case of Caatinga” [1], there were errors in equations (8), (11), and (13), which should be corrected as follows:

Equation :

Equation :

Equation :

References

R. d. Miranda, J. D. Galvíncio, M. S. Moura, C. A. Jones, and R. Srinivasan, “Reliability of MODIS evapotranspiration products for heterogeneous dry forest: a study case of caatinga,” Advances in Meteorology, vol. 2017, Article ID 9314801, pp. 1–14, 2017.