Advances in Materials Science and Engineering

Volume 2013 (2013), Article ID 854928, 5 pages

http://dx.doi.org/10.1155/2013/854928

Research Article

Effects of Excess Cu Addition on Photochromic Properties of AgCl-Urethane Resin Composite Films

Hidetoshi Miyazaki,¹ Hirochi Shimoguchi,¹ Hiroki Nakayama,¹ Hisao Suzuki,² and Toshitaka Ota³

¹Department of Material Science, Interdisciplinary Faculty of Science and Engineering, Shimane University, 1060 Nishikawatsu, Matsue, Shimane 690-8504, Japan

²Graduate School of Science and Technology, Shizuoka University, 3-5-1 Johoku, Hamamatsu, Shizuoka 432-8561, Japan

³Ceramic Research Laboratory, Nagoya Institute of Technology, 10-6-29 Asahigaoka, Tajimi, Gifu 507-0071, Japan

Received 30 April 2013; Accepted 11 July 2013

Academic Editor: Yuanhua Lin

Copyright © 2013 Hidetoshi Miyazaki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

AgCl-resin photochromic composite films were prepared using AgNO₃, HCl-EtOH, CuCl₂ ethanol solutions, and a urethane resin as starting materials. The AgCl particle size in the composite films, which was confirmed via TEM observations, was 23–43 nm. The AgCl composite films showed photochromic properties: coloring induced by UV-vis irradiation and bleaching induced by cessation of UV-vis irradiation. The coloring and bleaching speed of the composite film increases with increasing CuCl₂ mixing ratio.

1. Introduction

A glass doped with silver chloride shows photochromic properties [1, 2]. This phenomenon is effective for controlling the transmittance of solar light through glass windows. Photochromic materials containing AgCl nanoparticles have been fabricated as films [3], hybrid materials [4], and composite materials [5].

In photochromic materials containing the silver chloride AgCl, an AgCl particle is decomposed into an Ag particle and Cl media by UV-light irradiation, as shown in the following equation:

(1)

Forming Ag particles (Ag⁰) in matrix by decomposition of AgCl particles, the photochromic materials are coloring. Furthermore, addition of Cu¹⁺ to AgCl photochromic glasses increases the coloring speed of these glasses, according to the equation given below [6]:

(2)

From this equation, the presence of Cu²⁺ in AgCl photochromic glasses causes the equilibrium in (2) to shift to the left-hand side, while the Ag⁰ formed by UV-vis irradiation is converted back to Ag⁺. In addition, the excess Cu²⁺ causes a decrease in the coloring speed and an increase in the bleaching speed of AgCl [6].

In a previous study, we fabricated AgCl-containing composite films and evaluated the photochromic properties of the films [5]. A Cu sensitizer was added to the AgCl composite films using only a CuCl₂ (Cu²⁺) source. However, the Cu²⁺ ions acted as coloring and bleaching sensitizers for the composite films, which is not in agreement with the results expected from (2). In this study, we fabricated AgCl-containing photochromic composite films with various Cu contents and observed the effects of excess Cu²⁺ ions on the photochromic properties of the composite films.

2. Experimental Procedure

AgNO₃ (99.5%; Wako Pure Chemical Industries Ltd., Osaka, Japan), HCl-EtOH (0.1 mol/L; Sigma-Aldrich Japan K.K., Tokyo, Japan), CuCl₂ (95%; Wako Pure Chemical Industries Ltd., Osaka, Japan), and a liquid-state urethane resin (M-40, density of 1.15 g/cm³; Asahi Kasei Chemicals Corp., Tokyo, Japan) were used as starting materials. The urethane resin can be cured using UV-vis irradiation. AgNO₃ powder was dissolved in ethanol at a concentration of 0.1 mol/L. The AgNO₃ solution thus prepared was mixed with a liquid urethane resin (the Ag ion concentration in urethane resin was 1.0 μmol/cm³), and the HCl-EtOH solution was added sequentially to the mixture with a Cl/Ag atomic ratio (Hereinafter, described as “Cl/Ag ratio”) of 1.0 to form AgCl nanoparticles. CuCl₂ powder was dissolved in ethanol at various concentrations, and the solution was added to the resulting mixture with varying Cu/Ag atomic ratios (Hereinafter, described as “Cu/Ag ratio”) ranging from 0 to 10. These mixtures were stirred, and, thereafter, the precursor solution was prepared. The mixture was degassed for 30 min at 100 kPa, and the resulting mixture was formed to a thickness of 1 mm using slide glasses. The precursor films were cured using UV-vis irradiation (with a low-pressure Hg lamp) for 5 min, thus producing composite films.

The transmission spectra of the obtained composite films were measured using a spectrophotometer (UV-1600; Shimadzu Corp., Japan) at a wavelength range of 200–1100 nm. Hg lamp was used for measuring the photochromic properties. To observe the microstructure of the films, the obtained sample was ground with an agate mortar, and the ground sample powder was supported by a copper grid. The microstructure of the composite films was then observed using transmission electron microscopy (TEM, EM-002B; Topcon Corp., Japan).

3. Results and Discussion

The as-prepared films were brown because the precursor films had been cured using UV-vis irradiation, and the composite film was colored. The darkened films were bleached in a dark room for 7 days, and the resulting transparent films were used to evaluate the photochromic properties. Figure 1 shows the transmission spectra for a representative composite film (Cu/Ag ratio of 1.0) measured before and after UV-vis irradiation for 1–20 min. As shown in the figure, the transparent composite film was colored by UV irradiation. Therefore, the resulting composite film shows photochromism. The inset photographs in Figure 1 show the film before and after UV-vis irradiation. The film showed coloring because of irradiation, and the colored film showed broad absorption at the absorption peak of 450 nm.

Figure 1: Transmission spectra of composite films with Cu/Ag atomic ratio of 1.0 at different UV-vis irradiation times.

Figure 2 presents the coloring and bleaching properties of the films with Cu/Ag ratios ranging from 0 to 10; the employed wavelength was 450 nm. The coloring property was evaluated with the time interval of 1 min. Increasing Cu contents in the composite films caused a slightly decrease of the transmittance at the bleached condition. Though we are considering the reason, it is assumed that excess Cu contents affect the initial transmittance of the composite films, for example, deterioration or coloration of the matrix by existence of excess Cu ions and so on.

(a)

(b)

Figure 2: Coloring and bleaching properties of the composite films with different Cu/Ag ratios and the employed wavelength of 450 nm.

Using the optical property of the composite films, the reaction rate constant was estimated at the wavelength of 450 nm, which represents a remarkable absorption peak of the film for the coloring condition. In this study, the absorbance of the films was calculated using the value of the transmittance. The method for calculating the photochromic-reaction rate constant was described in a previous study [7]. The reaction rate equation is

where is the initial absorbance, and is the absorbance after time from the initial state . The calculated reaction rate constants of the films with Cu/Ag ratios of 0, 0.1, 1, 2, 5, and 7.5 were 0.092, 0.118, 0.132, 0.134, 0.124, and 0.133 min⁻¹, respectively. The coloring speeds of Cu-added films were higher than those of films without Cu addition. The coloring speeds of films whose Cu/Ag ratios were greater than 1 were close to those of films whose Cu/Ag ratio was 1. This increase in the coloring speed with the addition of Cu²⁺ was not in agreement with the result expected from (2), and the conflict was discussed later.

In the case of bleaching, increasing the Cu/Ag ratio in the films resulted in an increase in the bleaching speed. To compare the bleaching speeds of the films semiquantitatively, we calculated the half-life period of the films , where was the time taken from the transmittance of the sufficiently coloring state (20 min UV-vis irradiation) to the transmittance of the on a half of its initial state. The calculated half-life periods of the films with Cu/Ag ratios of 1, 2, 5, and 7.5 were 144, 56.9, 29.8, and 28.0 h, respectively; the films with Cu/Ag ratios of 0 and 0.1 did not return to the initial state in 10 days. Therefore, increasing the Cu/Ag ratio in the films resulted in a decrease in the half-life periods corresponding to the bleaching speed. The acceleration of the bleaching speed with the addition of Cu²⁺ agreed with the result expected from (2). Furthermore, CuCl₂ was used as a source material, and, thus, the Cl concentration in the composite film increased slightly with an increase in the Cu concentration in the film. In addition, according to (1), the equilibrium in the composite film shifted to the right-hand side, and it was assumed that the bleaching speed increased.

In general, the presence of Cu²⁺ inhibits the formation of a Ag⁰ cluster in AgCl photochromic glasses, thereby decreasing the coloring speed of the AgCl photochromic glass owing to the addition of Cu²⁺. In contrast, the Cu²⁺ ions in this study act as coloring sensitizers for the composite films. To clarify the state of Cu ions in the composite film, we prepared a Cu-urethane-resin composite film without silver and confirmed the optical properties of the film using UV-vis irradiation as a blank test. The Cu-urethane-resin composite film was prepared as follows. A CuCl₂ ethanol solution was mixed with the urethane resin with a Cu concentration of 20 μmol/cm³, and the precursor was cured using UV-vis irradiation. For the clarification of the Cu-urethane-resin composite film, it was placed in a dark room for 7 days. Figure 3 shows the transmittance spectra for the composite films before and after UV-vis irradiation. The composite film before UV-vis irradiation showed absorption at the range of 600–900 nm [8, 9]; the color was attributed to the presence of Cu²⁺. After 2-3 min of UV-vis irradiation of the film, the absorption peak diminished, and, after 10 min of UV-vis irradiation, the absorption peak disappeared. This result suggests that Cu²⁺ ions in the composite film were reduced to Cu⁺ via UV-vis irradiation, as indicated by the following:

In previous study related to MoO₃ thin film based photochromic materials [10, 11], in the case of existence of water molecule in the films, electron-hole pairs were generated by visible light irradiation and the generated hole reduced water and induce of protons. The protons caused reduction of the host MoO₃ cluster, and the photochromism (the coloring property) of the MoO₃ thin film was improved [10, 11]. In the present study, to distribute Ag, Cl, and Cu ions in the urethane matrix, we used ethanol as a solvent. In the composite films, we assumed the following: protons were generated from ethanol by the UV-vis light irradiation, and the generated protons promoted reduction of Cu²⁺ ions as well as the previous investigations [10, 11]. The reduction time from Cu²⁺ to Cu⁺ was about 2 minutes, and the time was faster than that from Ag⁺ (as AgCl) to Ag⁰ in the nondoped AgCl-based composite film (~10 min, see Figure 2). The Cu⁺ caused acceleration of reduction of Ag⁺ to Ag⁰ (2). Thus, the coloring speed of the composite film increased with the addition of Cu²⁺. The blank test and bleaching proved that the Cu²⁺ ions added to AgCl photochromic composite films act as coloring and bleaching sensitizers

Figure 3: Transmittance spectra of CuCl₂-urethane-resin composite films (without AgCl) at UV-vis irradiation times of 0, 1, 2, 5, and 10 min.

Generally, the particle size of AgCl in photochromic glasses is less than tens of nanometers [6, 12]. To confirm the AgCl particle size in the composite films and the effects of Cu addition on the AgCl particle size, the microstructure of the composite films was evaluated using TEM. Figure 4 shows the bright field TEM images of the composite films with Cu/Ag ratios of 0.1 and 10. The average AgCl particle sizes in the composite films with Cu/Ag ratios of 0.1 and 10 were approximately 23 and 43 nm, respectively, and were close to the AgCl particle sizes (30–50 nm) of silver chloride containing photochromic glasses [12]. The AgCl particle size in a film with a Cu/Ag ratio of 10 (including excess Cu ions) was 1.8 times larger than that in a film with a Cu/Ag ratio of 0.1. The AgCl particle size in the composite films was larger than that with the Cu/Ag ratio, and, thus, it is assumed that the coloring and bleaching speeds also depended slightly on the AgCl particle size in the composite.

(a)

(b)

Figure 4: TEM image of composite films with (a) Cu/Ag = 0.1 and (b) Cu/Ag = 10.

4. Conclusion

In this study, AgCl-based photochromic composite films were fabricated, and the effects of the Cu²⁺ sensitizer on the composite films were evaluated. Additive Cu²⁺ ions acted as coloring and bleaching sensitizers in the AgCl photochromic composite films, which is different from the case of AgCl photochromic glasses. Cu²⁺ ions in the composite film were reduced to Cu⁺ by UV-vis irradiation, and the reducing speed was faster than that of Ag⁺ to Ag. The generated Cu⁺ ion acted subsequently to reduce Ag⁺ ions, and thus the coloring speed of the composite films was accelerated. The AgCl particle sizes in the composite films were 23–43 nm and were close to those of silver-chloride-based photochromic glasses. The AgCl particle sizes in the composite films depended slightly on the Cu concentration in the film.

Conflict of Interests

The authors state that they have no conflict of interests.

References

S. L. Kraevskii and V. F. Solinov, “Interface models for the photochromism and thermochromism of glasses with nanocrystals,” Journal of Non-Crystalline Solids, vol. 316, no. 2-3, pp. 372–383, 2003.

W. H. Armistead and S. D. Stookey, “Photochromic silicate glasses sensitized by silver halides,” Science, vol. 144, no. 3615, pp. 150–154, 1964.

H. Tomonaga and T. Morimoto, “Photochromic coatings containing Ag(Cl1−xBrx) microcrystals,” Journal of Sol-Gel Science and Technology, vol. 19, no. 1–3, pp. 681–685, 2000.

X. Dong, J. Wang, X. Feng et al., “Fabrication and characterization of nanometer-sized AgCl/PMMA hybrid materials,” Modern Applied Science, vol. 2, no. 6, pp. 49–54, 2008.

H. Miyazaki, H. Shimoguchi, H. Suzuki, and T. Ota, “Synthesis of photochromic AgCl-urethane resin composite films,” Advances in Materials Science and Engineering, vol. 2012, Article ID 784202, 4 pages, 2012.

I. Yasui, “Hikarizairyo amorphous-to-tankessyo,” Dainihon Tosho, pp. 178–184, 1991, Japanese

H. Miyazaki, Y. Baba, M. Inada, A. Nose, H. Suzuki, and T. Ota, “Fabrication of photochromic tungsten oxide based composite film using peroxoisopolytungstic acid,” Bulletin of the Chemical Society of Japan, vol. 84, no. 12, pp. 1390–1392, 2011.

H. Miyazaki, M. Inada, H. Suzuki, and T. Ota, “Fabrication of WO₃-based composite films and improvement its photochromic properties by copper doping,” Bulletin of the Chemical Society of Japan, vol. 85, no. 9, pp. 1053–1056, 2012.

R. K. Pathak, V. K. Hinge, P. Mondal, and C. P. Rao, “Ratiometric fluorescence off-on-off sensor for Cu²⁺ in aqueous buffer by a lower rim triazole linked benzimidazole conjugate of calix[4]arene,” Dalton Transactions, vol. 41, no. 35, pp. 10652–10660, 2012.

T. He, Y. Ma, Y. Cao, Y. Yin, W. Yang, and J. Yao, “Enhanced visible-light coloration and its mechanism of MoO₃ thin films by Au nanoparticles,” Applied Surface Science, vol. 180, no. 3-4, pp. 336–340, 2001.

T. He, Y. Ma, Y. Cao et al., “Enhancement effect of gold nanoparticles on the UV-light photochromism of molybdenum trioxide thin films,” Langmuir, vol. 17, no. 26, pp. 8024–8027, 2001.

R. Pascova and I. Gutzow, “Model investigation of the mechanism of formation of phototropic silver halide phases in glasses,” Glastechnische Berichte, vol. 56, no. 12, pp. 324–330, 1983.