Advances in Materials Science and Engineering

Volume 2014 (2014), Article ID 608608, 8 pages

http://dx.doi.org/10.1155/2014/608608

Research Article

A Study of Parameters Related to the Etch Rate for a Dry Etch Process Using NF₃/O₂ and SF₆/O₂

Seon-Geun Oh,¹ Kwang-Su Park,¹ Young-Jun Lee,¹ Jae-Hong Jeon,¹ Hee-Hwan Choe,¹ and Jong-Hyun Seo²

¹School of Electronics, Telecommunications and Computer Engineering, Korea Aerospace University, Goyang 412-791, Republic of Korea

²Department of Materials Science and Engineering, Korea Aerospace University, Goyang 412-791, Republic of Korea

Received 1 May 2013; Accepted 8 November 2013; Published 4 February 2014

Academic Editor: Mohd Sapuan Salit

Copyright © 2014 Seon-Geun Oh et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The characteristics of the dry etching of :H thin films for display devices using SF₆/O₂ and NF₃/O₂ were investigated using a dual-frequency capacitively coupled plasma reactive ion etching (CCP-RIE) system. The investigation was carried out by varying the RF power ratio (13.56 MHz/2 MHz), pressure, and gas flow ratio. For the :H film, the etch rates obtained using NF₃/O₂ were higher than those obtained using SF₆/O₂ under various process conditions. The relationships between the etch rates and the usual monitoring parameters—the optical emission spectroscopy (OES) intensity of atomic fluorine (685.1 nm and 702.89 nm) and the voltages and —were investigated. The OES intensity data indicated a correlation between the bulk plasma density and the atomic fluorine density. The etch rate was proportional to the product of the OES intensity of atomic fluorine and the square root of the voltages on the assumption that the velocity of the reactive fluorine was proportional to the square root of the voltages.

1. Introduction

In the fabrication of flat panel displays, SF₆ is used to etch various thin films. NF₃, on the other hand, is used for two reasons in particular. First, it is used to etch Si. Focus is put on films such as SiO₂ and Si₃N₄, which are used for semiconductor devices [1–7]. Second, NF₃ is used to clean the chamber in the plasma enhanced chemical vapor deposition (PECVD) process [8]. Previous studies have looked at the etching characteristics and mechanisms of films with NF₃. In these studies, a number of analysis tools, including a quadrupole mass spectrometer (QMS), ellipsometer, X-ray photoelectron spectrometer (XPS), and optical emission spectroscopy (OES), were used. With these studies in mind, this current paper postulates that NF₃ could be used as an alternative to SF₆ in the dry etching process for flat panel display manufacturing.

The replacement of SF₆ with NF₃ would offer certain advantages. Manufacturers would be able to change the etching gas on demand and would still be able to use existing facilities. Moreover, because of increasing concerns regarding the greenhouse effect, many research groups have looked for gases that could be used to replace SF₆ to reduce the global warming potential (GWP). Low GWP gases such as F₂ [9, 10], C₄F₈ [11], CHF₃O₂ [12], C₃F₈ [7], and C₃F₆O [13] in the dry etch process have been studied. These investigations indicated that it would be possible to use low GWP gases to replace SF₆ in the etching processes. Of importance to this current study, it has also been shown that the use of NF₃ would decrease the GWP of the flat panel manufacturing process [14–17].

To evaluate the possibility of replacing SF₆ with NF₃, the SiNx:H dry etching characteristics using SF₆ and NF₃ were compared. The similarities and dissimilarities between the processes using the two gases were studied. Because simple parameters such as the voltage of the input power and optical emission lines are commonly monitored in manufacturing equipment, the relationships between these parameters and the etch characteristics could be investigated in this work.

In this paper, Section 2 provides details regarding the experimental setup and process conditions. In Section 3, the results and a description of the experiment are presented. Section 4 covers the interpretation and analysis of the results.

2. Materials and Methods

The SiNx:H film samples were deposited on a glass substrate using PECVD and etched using a dual-frequency CCP-RIE system with SF₆/O₂ and NF₃/O₂ gas mixtures. The reference process conditions consisted of a gas flow ratio (gas/O₂) between the fluorine gas (SF₆ or NF₃) and O₂ of 30 sccm/30 sccm, a pressure of 200 mTorr, and a dual-frequency power ratio (13.56 MHz/2 MHz) of 25 W/75 W.

The gas flow ratio was varied by varying the O₂ flow rate from 15 sccm to 45 sccm. The pressure was varied from 100 mTorr to 200 mTorr at an interval of 50 mTorr, and the power ratio was changed between values of 25 W/75 W and 75 W/25 W, where the total power was fixed at 100 W.

The etch rate was measured with a general procedure as follows.

First, the photoresist was deposited on the SiNx:H film using the photolithography process, after which the thickness of the deposited photoresist was measured using a surface profiler (-step). Second, the thickness of the etched film and the oxidized photoresist was measured using the surface profiler after dry etching using a CCP-RIE. Third, the thickness of the etched film was measured using the surface profiler after stripping the oxidized photoresist.

A schematic diagram of the dual-frequency CCP-RIE system for the dry etching process is shown in Figure 1. The optical emissions from the plasma were collected through a view port on the chamber side wall. A V-I probe (V-I probe 4100 by MKS, ENI Products) measured the loads V and I for the RF plasma discharge. The optical emissions were analyzed with a spectrometer. The spectrometer (HR2000+ by Ocean Optics Inc.) with optical resolution of 0.035 nm and range of 200–1100 nm was used.

Figure 1: Diagram of the dual-frequency CCP-RIE with OES and V-I probe.

Typically, various radicals such as NF₂ and SF₅ participate in the dry etching processes. However, the optical emission intensity of atomic fluorine was measured to observe the common element between the SF₆ and NF₃ processes. The emission peaks of atomic fluorine at 658.6 nm and 703.7 nm were used [18–20] and the sum of them referred to the optical emission intensities of atomic fluorine in this experiment.

3. Results and Discussion

3.1. Results

The dry etching conditions and results are given in Table 1. Figure 2 shows the etching characteristics and optical emission intensities of atomic fluorine obtained using the two gases for different gas flow ratios (gas/O₂) at a fixed RF power ratio (13.56 MHz/2 MHz) of 25 W/75 W and 200 mTorr. A small increase in O₂ flow increased the etch rate, while further increases in the O₂ flow rate decreased the etch rate, as is usual [21]. In Figure 2(b), the behavior of for SF₆/O₂ follows the etch rate behavior.

Table 1: (a) Experimental conditions and results for SF₆ (b) experimental conditions and results for NF₃.

(a)

Number
Power (W)
Pressure

(mTorr)
Gas (sccm)
Etch rate

(nm/min)
13.56 (MHz)
2 (MHz)

13.56 (MHz)
2 (MHz)
SF₆
O₂
Vpp (V)
Vpp (V)

1
25
75
200
30
30
704
71.68
490.13

2
50
50
200
30
30
872
147.19
318.04

3
75
25
200
30
30
720
189.06
227.10

4
25
75
150
30
30
540
74.76
476.85

5
25
75
100
30
30
380
84.71
589.88

6
25
75
200
30
15
612
71.60
490.78

7
25
75
200
30
45
624
73.42
483.61

(b)

Number
Power (W)
Pressure

(mTorr)
Gas (sccm)
Etch rate

(nm/min)
13.56 (MHz)
2 (MHz)

13.56 (MHz)
2 (MHz)
NF₃
O₂
Vpp (V)
Vpp (V)

1
25
75
200
30
30
1,188
74.85
105.86

2
50
50
200
30
30
1,280
149.65
211.64

3
75
25
200
30
30
1,160
159.00
224.86

4
25
75
150
30
30
1,040
77.96
110.26

5
25
75
100
30
30
768
77.24
109.24

6
25
75
200
30
15
870
75.63
106.96

7
25
75
200
30
45
912
75.99
107.48

(a)

(b)

Figure 2: (a) Etch rates of SF₆/O₂ and NF₃/O₂ and (b) optical emission intensity of fluorine for SF₆/O₂ and NF₃/O₂ as a function of gas flow ratio.

Figure 3 shows the etching characteristics and for the two gases obtained using different pressures with a power ratio (13.56 MHz/2 MHz) of 25 W/75 W and a gas flow ratio of 30 sccm/30 sccm. The etch rate and tended to increase as the pressure increased.

(a)

(b)

Figure 3: (a) Etch rates of SF₆/O₂ and NF₃/O₂ and (b) optical emission intensity of fluorine for SF₆/O₂ and NF₃/O₂ as a function of pressure.

Figure 4 shows the results obtained when the power ratio of high and low RF frequencies was varied with a fixed total power of 100 W at 200 mTorr and a gas/O₂ flow ratio of 30 sccm/30 sccm. Although increased as the power of the 13.56 MHz source increased, the etch rate did not directly depend on .

(a)

(b)

Figure 4: (a) Etch rates of SF₆/O₂ and NF₃/O₂ and (b) optical emission intensity of fluorine for SF₆/O₂ and NF₃/O₂ as a function of power ratio.

In Figure 5, the voltages obtained under the same conditions are shown. As was the case in Figure 4(a), the etch rate did not directly depend on the voltages.

(a)

(b)

(c)

Figure 5: (a) Voltage of high-frequency RF source , (b) voltage of low-frequency RF source , and (c) sum of and as a function of power ratio.

3.2. Discussion

When SiNx:H film is etched using fluorine-based gases such as SF₆ and NF₃, the film is eliminated in the form of SiFx. In this mechanism, the gas-phase reactions that create the reactive species (F) are as follows [22, 23]:

“Reactions of ”

“Reactions of ”

Because the different reactions that create the reactive F cause differences in the etch rate and lead to different characteristics of the SF₆ and NF₃ processes, the optical emission intensity was observed as an alternative to a quantitative analysis of the reactive F.

In dual-frequency RF discharges, the following relationship between the density of the bulk plasma and the voltage of the RF sources exists [24]:

where is the density of the bulk plasma and is the collisional energy loss per electron.

In the etching of Si containing films in fluorine-based plasma, the F-atom density is directly involved in the etching process [25]. Although the plasma density would not be directly proportional to the atomic fluorine density, there would be a strong relation between them. As shown in Figure 3, increased as the pressure increased. It seems that the increase in pressure led to a higher bulk plasma density, and this higher density caused to increase. To confirm this reasoning, the relationship was investigated in Figure 6. In this work, the value of was dominant, so that . When the linear fitting model (least square fitting method) was applied to Figure 6, different slopes were obtained for SF₆/O₂ and NF₃/O₂. It is assumed that the different values and different reactions for the two gases led to the different slopes. In conclusion, was proportional to , and the density of atomic fluorine () could be described as directly dependent on . Figure 7(a) shows the proportional relation between the etch rate and . If we assume that the atomic fluorine density directly depends on , this shows that a relationship exists between the density of the atomic fluorine and the SiNx:H etch rate. In fact, a number of recent studies have produced similar results to utilize a relation between the OES intensity and plasma density [26–28].

Figure 6: Distribution of optical emission intensity of fluorine versus .

(a)

(b)

(c)

Figure 7: (a) Distribution of etch rate versus , (b) distribution of etch rate versus × , and (c) distribution of etch rate versus × .

In Figures 4(a) and 5, the etch rate did not depend on the voltage (, or ) directly. In the bulk plasma, the velocity of the fluorine ion was proportional to . This increased the velocity of the reactant atom () via an ion-neutral momentum transfer collision or charge exchange. However, the etch rate was not dependent on alone. Generally speaking, an etch rate is influenced by the flux of the reactant transported to the substrate. If is related to and is proportional to , the etch rate will be proportional to . Under the same linear fitting model, the relation of the etch rate to is shown in Figure 7(b). It was found that the standard fitting errors were reduced when the voltage was considered. This shows that the etch rate had a closer relationship with than it did solely for . In the dual-frequency CCP, it is believed that the bias (lower frequency) power contributed more to the ion energy than the source (higher frequency) power. Therefore, it is believed that the bias power had a greater effect on the etch rate. In Figure 7(c), only the bias power voltage is considered to see the bias power effect. The fitting results were similar to those of Figure 7(b). If the assumption that the velocity of the atomic fluorine was affected by voltage is invoked, this result shows that the major contribution on the flux of the atomic fluorine comes from bias power.

4. Conclusion

In this paper, the etch characteristics of SF₆/O₂ and NF₃/O₂ were compared for different process conditions using a CCP-RIE system, and the similarities and dissimilarities between the processes using the two gases were analyzed. The etch rate of SiNx:H using NF₃/O₂ rather than SF₆/O₂ increased by 1.4–2.0 times in the same process conditions. These results indicate that the etch time can be reduced to obtain similar results by replacing gases. Because the GWP of SF₆ is 3.1 times higher than that of NF₃, the gas replacement can reduce the GWP by factor of 1/4.3–1/6.2, while obtaining the same process results.

An optical analysis using an OES showed that the density of the atomic fluorine was dependent on the intensity of the atomic fluorine. By inspecting the relationships between the etch rate of SiNx:H and , the effects of atomic fluorine density on the etch rate and its proportionality could be monitored indirectly. A larger (more abundant atomic fluorine) enabled a capacity to contribute to the etch rate. An electrical analysis using a V-I probe indicated that the velocity of the reactive F was proportional to . The flux of the atomic fluorine was interpreted as , and it was proportional to the etch rate. The importance of the bias power on the etch rate was examined indirectly, and it was concluded that the greatest contribution to the etch rate was from the bias power. This suggests the possibility of utilizing the flux of the atomic fluorine for the simple monitoring parameters (OES and voltages).

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported in part by the International collaborative R&D program (N0000678) and by the Industrial Strategic Technology Development Program (10041681) funded by the Ministry of Trade, Industry and Energy of Korea.

References

D. J. Kim, Y. B. Yun, and J. Y. Hwang, “Role of N₂ during chemical dry etching of silicon oxide layers using NF₃/N₂/Ar remote plasmas,” Microelectronic Engineering, vol. 84, no. 4, pp. 560–566, 2007.

B. E. E. Kastenmeier, “Remote plasma etching of silicon nitride and silicon dioxide using NF₃/O₂ gas mixtures,” Journal of Vacuum Science and Technology A, vol. 16, no. 4, pp. 2047–2056, 1998.

P. Machima and N. Hershkowitz, “SiO₂ and Si₃N₄ etch mechanisms in NF₃/hydrocarbon plasma,” Journal of Physics D, vol. 39, no. 4, pp. 673–684, 2006.

G. Agarwal, S. D. Iuliis, L. Serenelli, En. Salza, and M. Tucci, “Dry texturing of mc-Si wafers,” Physica Status Solidi C, vol. 8, no. 3, pp. 903–906, 2011.

C. Reyes-Betanzo and S. A. Moshkalyyov, “Mechanisms of silicon nitride etching by electron cyclotron resonance plasmas using SF₆- and NF₃-based gas mixtures,” Journal of Vacuum Science and Technology A, vol. 22, p. 1513, 2004.

J. H. Kim and Y. C. Hong, “Simple microwave plasma source at atmospheric pressure,” Journal of the Korean Physical Society, vol. 42, p. S876, 2003.

J. H. Kim and C. H. Oh, “Effect of N-based gases to C₃F₈/O₂ on global warming during silicon nitride PECVD chamber cleaning using a remote plasma source,” Journal of the Korean Physical Society, vol. 42, p. S800, 2003.

H. Hsueh, R. T. McGrath, B. Ji, B. S. Felker, J. G. Langan, and E. J. Karwacki, “Ion energy distributions and optical emission spectra in NF₃-based process chamber cleaning plasmas,” Journal of Vacuum Science and Technology B, vol. 19, no. 4, pp. 1346–1357, 2001.

P. Brault and P. Ranson, “Analysis of SF₆ and F₂ plasma etched silicon surfaces: an x-ray photoelectron spectroscopy investigation,” Applied Physics Letters, vol. 57, p. 2649, 1990.

Y. B. Yun, S. M. Park, and N.-E. Lee, “Effect of plasma modulation on Si chemical dry etching in F₂ remote plasmas,” Journal of the Korean Physical Society, vol. 53, no. 5, pp. 2386–2390, 2008.

S. Nakamura and M. Itano, “Comparative studies of perfluorocarbon alternative gas plasmas for contact hole etch,” Japanese Journal of Applied Physics, vol. 42, pp. 5759–5764, 2003.

Ch. Steinbrchel, H. W. Lehmann, and K. Frick, “Mechanism of dry etching of silicon dioxide. A case of direct reactive ion etching,” Journal of the Electrochemical Society, vol. 132, no. 1, pp. 180–186, 1985.

F. Fracassi, R. D'Agostino, A. Fornelli, and T. Shirafuji, “Dry etching of SiO₂ thin films with perfluoropropenoxide-O₂ and perfluoropropene-O₂ plasmas,” Journal of Applied Physics, vol. 41, pp. 6287–6290, 2002.

W. T. Tsai, H. P. Chen, and W. Hsien, “A review of uses, environmental hazards and recovery/recycle technologies of perfluorocarbons (PFCs) emissions from the semiconductor manufacturing processes,” Journal of Loss Prevention in the Process Industries, vol. 15, no. 2, pp. 65–75, 2002.

J. G. Owens, “Low GWP alternatives to HFCs and PFCs,” in Proceedings of the 1999 Taipei International Conference on Atmosphere Protection, Taipei, Taiwan, 1999.

L. C. Pruette, S. M. Karecki, R. Reif, et al., “Evaluation of trifluoroacetic anhydride as an alternative plasma enhanced chemical vapor deposition chamber clean chemistry,” Journal of Vacuum Science and Technology A, vol. 16, pp. 1577–1581, 1998.

H. Reichardt, A. Frenzel, and K. Schober, “Environmentally friendly wafer production: NF₃ remote microwave plasma for chamber cleaning,” Microelectronic Engineering, vol. 56, no. 1-2, pp. 73–76, 2001.

S. Q. Gu, R. Fujimoto, and P. McGrath, “Impact of F species on plasma charge damage in a RF asher,” in Proceedings of the 7th International Symposium on Plasma- and Process-Induced Damage, Maui, Hawaii, USA, 2002.

A. Matsutani, H. Ohtsuki, and F. Koyama, “Reactive ion etching of Si using Ar/F₂ plasma,” Japanese Journal of Applied Physics, vol. 49, Article ID 06GH05-2, 3 pages, 2010.

G. Bruno, P. Capezzuto, P. Manodoro, et al., “On the use of NF3 plasmas for amorphous silicon ablation,” in Proceedings of the 11th International Symposium on Plasma Chemistry, p. 875, Loughborough, UK, 1993.

M. A. Lieberman and A. J. Lichtenberg, Principles of Plasma Discharges and Materials Processing, p. 596, John Wiley & Sons, Hoboken, NJ, USA, 2005.

G. Kokkoris, A. Panagiotopoulos, A. Goodyear, M. Cooke, and E. Gogolides, “A global model for SF₆ plasmas coupling reaction kinetics in the gas phase and on the surface of the reactor walls,” Journal of Physics D, vol. 42, Article ID 055209, 5 pages, 2009.

B. Bai, An experimental study and modeling of Transformer-Coupled Toroidal Plasma processing of materials [Ph.D. thesis], Massachusetts Institute of Technology, Boston, Mass, USA, 2006.

M. A. Lieberman and A. J. Lichtenberg, Principles of Plasma Discharges and Materials Processing, p. 410, John Wiley & Sons, Hoboken, NJ, USA, 2005.

C. J. Mogab, “The loading effect in plasma etching,” Journal of the Electrochemical Society, vol. 124, no. 8, pp. 1262–1268, 1977.

I. P. Herman, “Optical diagnostics for thin film processing,” Annual Review of Physical Chemistry, vol. 54, pp. 277–305, 2003.

Z. Chen, V. M. Donnelly, D. J. Economou, et al., “Measurement of electron temperatures and electron energy distribution functions in dual frequency capacitively coupled CF₄/O₂ plasmas using trace rare gases optical emission spectroscopy,” Journal of Vacuum Science and Technology A, vol. 27, pp. 1159–1165, 2009.

W. Liu, A. Zhu, X. Li, et al., “Determination of plasma parameters in a dual-frequency capacitively coupled CF₄ plasma using optical emission spectroscopy,” Plasma Science and Technology, vol. 15, no. 9, p. 885, 2013.