Advances in Materials Science and Engineering

Volume 2014 (2014), Article ID 873028, 6 pages

http://dx.doi.org/10.1155/2014/873028

Research Article

Nanocomposite Thin Film of Poly(3-aminobenzoic acid) and Multiwalled Carbon Nanotubes Fabricated through an Electrochemical Method

Paphawadee Netsuwan,¹ Wirat Chaisu,² Sukon Phanichphant,³ and Saengrawee Sriwichai²

¹Nanoscience and Nanotechnology Program, Graduate School, Chiang Mai University, Chiang Mai 50200, Thailand

²Department of Chemistry, Faculty of Science, Chiang Mai University, Chiang Mai 50200, Thailand

³Materials Science Research Center, Faculty of Science, Chiang Mai University, Chiang Mai 50200, Thailand

Received 27 February 2014; Revised 6 June 2014; Accepted 10 June 2014; Published 24 June 2014

Academic Editor: Amit Bandyopadhyay

Copyright © 2014 Paphawadee Netsuwan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The composite thin films of poly(3-aminobenzoic acid) (PABA) and multiwalled carbon nanotubes (MWNTs) are successfully fabricated through an electrochemical method. The composite mixtures containing 50 mM of 3-aminobenzoic acid with various concentrations of MWNTs (1.0, 2.5, 5.0, 7.5, and 10 mg/mL) in 0.5 M H₂SO₄ were prepared and used in this study. Cyclic voltammetry (CV) was used for fabrication and monitoring the electropolymerization of the composite thin films with potential range of 0 to 1100 mV for 5 cycles at scan rate of 20 mV/s on indium tin oxide- (ITO)-coated glass substrate. UV-vis absorption spectroscopy, atomic force microscopy (AFM), and scanning electron microscopy (SEM) techniques were employed to characterize the obtained composite thin films. It was found that MWNTs can enhance the peak current of CV traces of the PABA/MWNTs composite thin films without affecting the UV-vis absorption spectra. The surface morphology of the thin films can be studied using AFM and SEM techniques.

1. Introduction

The application of the conducting polymers has attracted attention in various fields such as medical, industrial, and environmental fields [1–5]. Conducting polymers such as polypyrrole, polyaniline, polythiophene, and their derivatives can be obtained through both chemical and electrochemical polymerization. Their unique conjugated π-electron backbone system had led them to have unusual electronic properties such as electrical conductivity, low energy optical transitions, low ionization potential, and high electron affinity. Various conducting polymers have been widely used in sensor applications [5–10]. Among these conducting polymers, poly(aminobenzoic acid), which is one of polyaniline derivatives, is a conducting polymer containing electron-rich nitrogen atom and high electron density of carbonyl group. This makes it easily electropolymerized on the electrode [11, 12]. Carboxylated polyanilines with both ortho- and metasubstitutions known to show self-doping have been studied as a promising polyaniline derivative for biosensor applications. The carboxylic acid group serves as a functional group that can be used as a matrix material for immobilization onto substrates or for covalent bonds with biomolecules such as proteins and antibodies [13]. Recently, the ultrathin films of poly(3-aminobenzoic acid) (PABA) were fabricated by electropolymerization on gold-coated high-refractive index glass slide as working electrode to construct the surface plasmon resonance (SPR) immunosensor for detecting human immunoglobulin G [13]. The other poly(aminobenzoic acid), poly(o-aminobenzoic acid), was also electropolymerized on boron-doped diamond electrode by cyclic voltammetry for construction of the amperometric immunosensor [14].

Carbon nanotubes (CNTs) show many advantages such as small size, high electrical, thermal conductivity, high specific surface area, and long term chemical stability which can improve the electrochemical reactivity of biomolecules and promote the electron transfer of redox reaction in electropolymerization [15–20]. CNTs are hexagonal arrangements of carbon atoms which can be classified as single-walled (SWNTs) and multiwalled (MWNTs) carbon nanotubes. Since MWNTs are easier to synthesize and are of lower price than SWNTs [16], MWNTs were chosen for preparing the composite mixture in this work. The film of poly(2,6-pyridindediamine)/MWNTs composite and gold nanoparticles was developed to be used as amperometric immunosensor for detecting human chorionic gonadotrophin [21]. The cytochrome C biosensor base on the hybrid material consisting of the conducting polymer poly(3-methylthiophene) and MWNTs exhibited a good electrochemical performance concerning direct electron transfer. Moreover, it showed better sensitivity than other structured cytochrome C biosensors [22].

In this study, the PABA/MWNTs thin films were fabricated by electropolymerization of the composite mixtures prepared from 50 mM 3-aminobenzoic acid (ABA) and various concentrations of MWNTs in 0.5 M H₂SO₄. The effect of the concentration of MWNTs on PABA film were demonstrated by cyclic voltammetry and characterized by UV-vis absorption spectra, atomic force microscopy (AFM), and scanning electron microscopy (SEM) techniques.

2. Experimental

2.1. Materials

All materials and indium tin oxide- (ITO-) coated glass substrates were purchased from Sigma-Aldrich and used as received. The multiwalled carbon nanotubes (MWNTs) were synthesized by chemical vapor deposition method from Department of Physics and Materials Science, Faculty of Science, Chiang Mai University.

Before electropolymerization, the composite mixtures of 50 mM of ABA and various concentrations (1.0, 2.5, 5.0, 7.5, and 10.0 mg/mL) of MWNTs were prepared. The 1.0, 2.5, 5.0, 7.5, and 10.0 mg/mL of MWNTs were dispersed in a solution of 50 mM ABA in 0.5 M H₂SO₄ by ultrasonication for 30 min. The aggregated MWNTs were then removed by centrifugation at 4000 rpm for 1 h. The dispersed MWNTs in ABA solution (after sonication) and the supernatant solution (after sonication/centrifugation) were studied by UV-vis absorption spectroscopy (Lambda 950 UV-vis spectrophotometer). An ITO-coated glass substrate was cleaned in ultrasonic bath before being used in electropolymerization experiment.

2.2. Fabrication of the Composite Thin Films

Electropolymerization processes were performed in 3-electrode setup potentiostat (eDAQ potentiostat ED410 e-corder 410) using platinum wire as counter electrode, Ag/AgCl aqueous electrode as reference electrode, and ITO-coated glass substrate as working electrode. The ITO electrode surface area for electropolymerization was 1 cm². The PABA/MWNTs composite thin films were electropolymerized on the ITO-coated glass slide by switching potential range from 0 to 1100 mV at scan rate of 20 mV/s for 5 cycles. The composite thin films were washed with 0.5 M H₂SO₄ and distilled water, respectively, for several times to wash out the ABA monomer residue on the ITO electrode surface. The thin films were then stored in desiccator before characterization. The AFM (NanoScope IIIa, Digital Instruments) and SEM (JEOL JEM-6335F) measurements were employed to study morphology of the obtained thin films.

3. Results and Discussion

The UV-vis absorption spectra of the obtained composite mixtures and thin films are shown in Figure 1. As can be seen in Figure 1(a), for the composite mixture after sonication, and Figure 1(b), for the composite mixtures after sonication/centrifugation, the absorption peaks were clearly observed at around 295 nm. The baseline of the spectra was found to increase for the mixture after sonication. The different baseline can also be observed for each composite mixture probably due to the aggregated complex bundles of ABA/MWNTs in the mixtures. However, the baselines were decreased for the composite mixture after sonication/centrifugation because the aggregated complex bundles were removed from the composite mixtures [23, 24]. Moreover, the unique baseline can be obtained after centrifugation. We therefore used these mixtures for preparation of the composite thin films. The absorption peaks of the obtained PABA/MWNTs composite films as shown in Figure 1(c) appeared at around 295 nm in UV region and at around 480 nm in visible region. The two absorption bands were assigned to π-π ∗ interband transition associated to the benzoid/quinoid ring structure and -π ∗ transition from the nonbonding nitrogen lone pair to the π ∗ conduction band [23, 24]. Therefore, this indicated that MWNTs did not exhibit the UV-vis absorption peak of both the composite mixture and the PABA/MWNTs composite films.

(a)

(b)

(c)

Figure 1: UV-vis spectra of (a) composite mixtures after sonication, (b) composite mixtures after sonication/centrifugation, and (c) composite thin films after electropolymerization for 5 cycles.

To fabricate the PABA/MWNTs composite thin films, electropolymerization of 50 mM ABA monomer solution containing 0, 1.0, 2.5, 5.0, 7.5, and 10.0 mg/mL of MWNTs in 0.5 M H₂SO₄ on ITO-coated glass substrate was performed by cyclic voltammetry (potential range between 0 and 1100 mV at a 20 mV/s). Figure 2 shows the CV traces for electropolymerization of 1 cycle of the composite mixtures of ABA containing various concentrations of MWNTs. The PABA/MWNTs composite thin films were deposited and grown on the ITO-coated glass substrates. The PABA thin film showed one pair redox peak with the anodic current peak at around 0.35 V and cathodic peak at around 0.2 V. In addition, the PABA/MWNTs composite thin films showed another anodic current peak at about 0.75 V. It can be concluded that this anodic current peak of the composite thin films was probably due to the presence of MWNTs in the thin films. The anodic peak currents of the PABA/MWNTs composite thin films were clearly observed indicating higher electroactivity than PABA thin film. Moreover, MWNTs had larger effective surface area which can increase the amount of PABA loading on the films. Therefore, the pair redox current peaks at 0.75 V (anodic peak from PABA/MWNTs composite) increased and at 0.2 V (cathodic peak) decreased whereas the anodic peak at 0.35 V (from pure PABA) was decreased with increasing of MWNTs concentration. This indicated that the MWNTs affected the oxidation process of the PABA thin film; therefore, MWNTs can enhance the electroactivity of the PABA film.

Figure 2: CV traces (selected from the second cycle) during electropolymerization at scan rate of 20 mV/s of composite mixtures containing 50 mM ABA and 0, 1.0, 2.5, 5.0, 7.5, and 10.0 mg/mL MWNTs in 0.5 M H₂SO₄.

Moreover, the potential of anodic peak was shifted with increasing concentration of MWNTs. The reason for potential shifting was that the strong adsorption of PABA in MWNTs led to more conjugated structure of PABA [22]. Furthermore, the increase of the current peak indicated that higher concentration of MWNTs, which had large specific surface area, could increase the amount of PABA loading and lead them to have good electron transfer. Therefore, the electron transfer of redox reaction in this work was promoted by the presence of MWNTs.

The surface morphology of the PABA/MWNTs composite thin films was further studied by SEM and AFM techniques. Figure 3(a) shows the surface morphology of MWNTs which have average diameters of about 72 nm. The example of surface morphology of the composite thin film obtained from electropolymerization of the composite mixture containing 7.5 mg/mL MWNTs was presented in Figure 3(b). As shown in the Figure 3(b), the aggregates of the PABA/MWNTs composite formed on the ITO electrode with average diameter of about 226 nm. This can be also previously observed in AFM image as shown in Figure 4.

(a)

(b)

Figure 3: SEM images of (a) MWNTs and (b) PABA/MWNTs composite thin film containing 7.5 mg/mL MWNTs after electropolymerization for 5 cycles in 0.5 M H₂SO₄.

Figure 4: AFM image of the PABA/MWNTs composite film containing 7.5 mg/mL MWNTs after electropolymerization for 5 cycles in 0.5 M H₂SO₄.

From the SEM and AFM images in Figures 3 and 4, respectively, we proposed that the presence of MWNTs can lead PABA to wrap around the MWNTs bundles as noncovalent attachment between PABA and MWNTs. The schematic drawing of this proposed structure is shown in Figure 5. This may be the utility to future use as modified electrode in biosensor application.

Figure 5: Schematic drawing of the proposed noncovalent attachment between PABA and MWNTs of the composite thin film.

4. Conclusion

In summary, the electropolymerization of PABA/MWNTs composite thin films was successfully fabricated on ITO-coated glass substrate which is also used as working electrode. The presence of MWNTs can enhance the current of redox peaks of the PABA and lead the composite thin films showing good electron transfer. The AFM and SEM images demonstrated the aggregation bundles of MWNTs and PABA on the substrate. We proposed that PABA can wrap around MWNTs. These composite thin films will be investigated in biosensor application in the future work.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors wish to acknowledge the Research Grant for New Scholar (MRG5580133) from the Thailand Research Fund (TRF), the Thailand’s Office of the Higher Education Commission (CHE), and Chiang Mai University. The supports from the Thailand’s Office of the Higher Education Commission, Rajamangala University of Technology Lanna, and the Graduate School, Chiang Mai University, are also acknowledged.

References

T. F. Otero and I. Cantero, “Conducting polymers as positive electrodes in rechargeable lithium-ion batteries,” Journal of Power Sources, vol. 81-82, pp. 838–841, 1999.

F. M. Kelly, L. Meunier, C. Cochrane, and V. Koncar, “Polyaniline: application as solid state electrochromic in a flexible textile display,” Displays, vol. 34, no. 1, pp. 1–7, 2013.

K. K. Krishnani, S. Srinives, B. C. Mohapatra et al., “Hexavalent chromium removal mechanism using conducting polymers,” Journal of Hazardous Materials, vol. 252-253, pp. 99–106, 2013.

P. Humpolicek, V. Kasparkova, P. Saha, and J. Stejskal, “Biocompatibility of polyaniline,” Synthetic Metals, vol. 162, no. 7-8, pp. 722–727, 2012.

N. K. Guimard, N. Gomez, and C. E. Schmidt, “Conducting polymers in biomedical engineering,” Progress in Polymer Science, vol. 32, no. 8-9, pp. 876–921, 2007.

S. Ramakrishnan, “Conducting polymers: from a laboratory curiosity to the market place,” Resonance, vol. 2, no. 11, pp. 44–58, 1997.

J. L. Bredas and R. Silbey, Conjugated Polymers, Kluwer Academic Publishers, 1991.

F. R. R. Teles and L. P. Fonseca, “Applications of polymers for biomolecule immobilization in electrochemical biosensors,” Materials Science and Engineering C, vol. 28, no. 8, pp. 1530–1543, 2008.

A. Baba, P. Taranekar, R. R. Ponnapati, W. Knoll, and R. C. Advincula, “Electrochemical surface plasmon resonance and waveguide-enhanced glucose biosensing with N-alkylaminated polypyrrole/glucose oxidase multilayers,” ACS Applied Materials and Interfaces, vol. 2, no. 8, pp. 2347–2354, 2010.

A. Baba, T. Mannen, Y. Ohdaira et al., “Detection of adrenaline on poly(3-aminobenzylamine) ultrathin film by electrochemical-surface plasmon resonance spectroscopy,” Langmuir, vol. 26, no. 23, pp. 18476–18482, 2010.

A. Benyoucef, F. Huerta, J. L. Vázquez, and E. Morallon, “Synthesis and in situ FTIRS characterization of conducting polymers obtained from aminobenzoic acid isomers at platinum electrodes,” European Polymer Journal, vol. 41, no. 4, pp. 843–852, 2005.

A. B. Mattos, T. A. Freitas, L. T. Kubota, and R. F. Dutra, “An o-aminobenzoic acid film-based immunoelectrode for detection of the cardiac troponin T in human serum,” Biochemical Engineering Journal, vol. 71, pp. 97–104, 2013.

S. Sriwichai, A. Baba, S. Phanichphant, K. Shinbo, K. Kato, and F. Kaneko, “Electrochemically controlled surface plasmon resonance immunosensor for the detection of human immunoglobulin G on poly(3-aminobenzoic acid) ultrathin films,” Sensors and Actuators B: Chemical, vol. 147, no. 1, pp. 322–329, 2010.

A. Preechaworapun, T. A. Ivandini, A. Suzuki, A. Fujishima, O. Chailapakul, and Y. Einaga, “Development of amperometric immunosensor using boron-doped diamond with poly(o-aminobenzoic acid),” Analytical Chemistry, vol. 80, no. 6, pp. 2077–2083, 2008.

Y. Liao, C. Zhang, Y. Zhang et al., “Carbon nanotube/polyaniline composite nanofibers: facile synthesis and chemosensors,” Nano Letters, vol. 11, no. 3, pp. 954–959, 2011.

L. Hu, D. S. Hecht, and G. Grüner, “Carbon nanotube thin films: fabrication, properties, and applications,” Chemical Reviews, vol. 110, no. 10, pp. 5790–5844, 2010.

D. Olney, L. Fuller, and K. S. V. Santhanam, “A greenhouse gas silicon microchip sensor using a conducting composite with single walled carbon nanotubes,” Sensors and Actuators B: Chemical, vol. 191, pp. 545–552, 2014.

G. Xu, B. Li, X. T. Cui, L. Ling, and X. Luo, “Electrodeposited conducting polymer PEDOT doped with pure carbon nanotubes for the detection of dopamine in the presence of ascorbic acid,” Sensors and Actuators B: Chemical, vol. 188, pp. 405–410, 2013.

P. D. Tam and N. V. Hieu, “Conducting polymer film-based immunosensors using carbon nanotube/antibodies doped polypyrrole,” Applied Surface Science, vol. 257, no. 23, pp. 9817–9824, 2011.

K. Shen, C. Hu, L. Chang, and K. Ho, “A complementary electrochromic device based on carbon nanotubes/conducting polymers,” Solar Energy Materials and Solar Cells, vol. 98, pp. 294–299, 2012.

M. S. Dresselhaus, G. Dresselhaus, and P. Avouris, Carbon Nanotubes: Synthesis, Structure, Properties and Applications, Springer, Berlin, Germany, 2001.

M. Eguilaz, L. Agui, P. Yanez-Sedeno, and J. M. Pingarron, “A biosensor based on cytochrome C immobilization on poly3methylthiophene/multiwalled carbon nanotubes hybrid-modified electrode. Application to the electrochemical determination of nitrite,” Journal of Electroanalytical Chemistry, vol. 644, pp. 30–35, 2010.

V. Bavastrello, T. B. C. Terencio, L. Belmonte, P. Cossari, and C. Nicolini, “Influence of substituents in electrochemical and conducting properties of polyaniline derivatives and multi walled carbon nanotubes nanocomposites,” Thin Solid Films, vol. 520, no. 18, pp. 5877–5883, 2012.

A. Baba, Y. Kanetsuna, S. Sriwichai et al., “Nanostructured carbon nanotubes/copper phthalocyanine hybrid multilayers prepared using layer-by-layer self-assembly approach,” Thin Solid Films, vol. 518, no. 8, pp. 2200–2205, 2010.