Advances in Materials Science and Engineering
Volume 2015 (2015), Article ID 250836, 10 pages
http://dx.doi.org/10.1155/2015/250836

Research Article

Interactions between Phosphoric/Tannic Acid and Different Forms of FeOOH

Lefu Mei,¹ Libing Liao,¹ Zise Wang,² and Chunchun Xu³

¹School of Material Sciences and Technology, China University of Geosciences, Beijing 100083, China
²China Science and Technology Museum, Beijing 100029, China
³School of Material Sciences and Technology, Beijing University of Chemical Technology, Beijing 100029, China

Received 23 July 2014; Accepted 17 September 2014

Academic Editor: Zhaohui Li

Copyright © 2015 Lefu Mei et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Alpha, beta, gamma, and delta hydroxyl ferric oxides (FeOOH), as the most common rust layers on iron surface, play different roles in iron preservation. Using modern surface analysis technologies such as X-ray diffraction (XRD), infrared spectra (IR), X-ray photoelectron spectroscopy (XPS), and scanning electron microscopy (SEM), we studied the interactions between these four types of synthetic FeOOH and phosphoric and tannic acid of different concentrations and proportions. A 3% tannic acid + 10% phosphoric acid + FeOOH was the most suitable formula for rust stabilizer and its reaction products were made up of iron phosphate and chelate of iron and tannin. This research provided technical basis in distinguishing FeOOH and selecting rust layer stabilizer for the preservation of iron, especially iron cultural relics.

1. Introduction

Structure and composition of corrosion products on iron are two important factors of causing its further corrosion, apart from environmental factors, iron components, and defect and inclusion in iron. There are two types of rust layers: a loose outer rust layer and a dense inner rust layer. The former was composed of -FeOOH, -FeOOH, magnetite (Fe₃O₄), H₂O, and amorphous ferric oxyhydroxide (FeOx(OH)3−2x, x = 0-1), while the latter was composed mainly of Fe₃O₄ with a little -FeOOH [1, 2]. The -FeOOH is a typical product of FeCl₃ hydrolysis, whereas -FeOOH is that of Fe(NO₃)₃ hydrolysis and under specific conditions these hydrolytic products may transform to -Fe₂O₃ [3–5]. The -FeOOH is a type of amorphous hydroxyl oxide rust layer on iron material surface [6], forming a compact rust layer that enhances corrosion resistance of the steel [7].

The underlying corrosion of carbon steel was dependent on the inherent properties of the rust layers formed under different conditions such as composition and structure with -FeOOH exerting significant influence among all the iron oxides [8]. In terms of reaction with Fe(OH)₂ to produce Fe₃O₄, the following order was observed: -FeOOH > -FeOOH -FeOOH [9].

Rust converters are chemical formulations that can be applied to corroded surfaces causing their passivation and elimination of possible further attack after the application of a coating [10]. To reduce the effects of hydroxyl ferric oxide on steel preservation, surface stabilizing treatment of rust layer has been widely used in the steel anticorrosion field. By employing a processing method of a chemical conversion film, the hydroxyl oxide rust layer on the iron may undertake a chemical conversion and form porous membrane barrier with good ventilation property and water permeability [11]. The excellent atmospheric corrosion resistance of the phosphoric Dhar pillar iron was attributed to the formation of a protective passive film on the surface [12]. Chemical conversion film, as inoxidizing coating of metal, reduces chemical activity of the metal and increases thermodynamic stability of steel in environmental medium. In addition, the surface products may also play a certain role in metal isolation from environmental medium. Chemical conversion films such as thin layer, exquisite crystallization, and porosity, may be combined with sealing materials. Accordingly, industrial anticorrosion methods provide research foundation for surface stabilizing treatment of iron relics.

The chromate salt passivation treatment method [13] is an effective chemical conversion technology. In spite of a good corrosion prevention effect, its use is limited by environmental regulations, due to high toxicity and carcinogenicity of hexavalent chromium [14–16].

Phosphate covering by forming a phosphate film on metals using phosphoric acid or zinc phosphate, manganese phosphate, or iron phosphate solution possesses many advantages, such as anticorrosion, wear-resisting, antifriction, increasing lubricity, and promoting base adhesion between coating and metal [17]. Phosphorus processing, therefore, is widely applied in processing steel parts, especially coating layer process [18]. Separately, pretreatment of reinforced steel surface with tannic acid based rust converter prior to the application of zinc rich coating improved the corrosion resistance appreciably [19, 20].

As one of metal surface treatment methods, tannins have potential application prospects, with low toxicity, low pollution, low usage volume, and even color with excellent corrosion-resistant performance [21]. Tannins as corrosion inhibitors were applied both in solvent and waterborne pretreatment formulations [22]. These formulations could be applied on partially rusted substrates, reducing the effort needed for cleaning the surface by methods which proved to be expensive and are not applicable in many situations [21]. Thus, combination of phosphoric acid and tannic acid may provide a synergistic effect on corrosion resistance of iron cultural relics.

In this study, X-ray diffraction (XRD), infrared spectroscopy (IR), X-ray photoelectron spectrometry (XPS), and transmission electron microscopy (TEM) were used to characterize the four types of FeOOH, as well as to investigate the interactions between FeOOH and mixed solutions containing different concentrations and proportions of phosphoric acid and tannic acid in order to provide technical basis to distinguish these types of FeOOH and enable rust layer stabilizer selection for preservation of steel, especially for iron cultural relics.

2. Experimental Details

2.1. Preparation of -, -, -, and -FeOOH

Rust analyses revealed the presence of crystalline magnetite (Fe3−xO₄), -Fe₂O₃ (haematite), goethite (-FeOOH), lepidocrocite (-FeOOH), akaganeite (-FeOOH), and amorphous -FeOOH phases [12]. Thus, the four FeOOH polymorphs were prepared to investigate their effects on iron rust.

The -FeOOH was prepared using a solution containing 40 g of FeSO₄ and 8 g of NaOH per liter of deionized (DI) water. The temperature was adjusted to 50°C and pH to 13 with 10 wt% NaOH. The solution was fluxed with oxygen for 8 h. The precipitates were washed with 10 portions of DI water until the filtrate became neutral in pH before being dried at 100°C.

The -FeOOH was prepared using a solution made of 60 g of FeCl₂·4H₂O in 1 L of DI water. Meanwhile, 84 g of urotropine and 21 g of NaNO₂ each were dissolved in 300 mL of DI water. After the FeCl₂·4H₂O solution was mixed with urotropine solution, NaNO₂ was added into the mixture under constant stir at room temperature. The mixture was heated to 60°C under constant stir for 3 h. The precipitates were washed with hot water and dried at 60°C.

The -FeOOH was prepared using a 0.2 M FeCl₃ solution heated to 60°C for 5 h. Then, small quantities of 3.175 mM EDTA and ammonia were added. The precipitates were washed with DI water until no Cl⁻ was detected before being dried at 70°C for 24 h.

The -FeOOH was prepared using a solution made of 40 g FeSO₄ and 8 g NaOH per liter of DI water. A 10 wt% NaOH solution was added dropwise till abundant brown precipitates were formed at room temperature. Then, small quantities of EDTA were added before the precipitates were filtered out.

2.2. Test on the Influence of -FeOOH and -FeOOH on Iron Rusting

Archaize iron was used as the experimental material. It had a composition of (wt%) 4.17% C, 0.59% Si, 0.32% Mn, 0.087% S, and 0.017% P. The samples were cut into coupons each with a dimension of 15 mm × 15 mm × 3 mm. A corrosion cell with a dimension of 10 mm × 10 mm × 0.5 mm was cut in the middle (Figure 1). One g synthetic -FeOOH powder and one g synthetic -FeOOH powder were added into separate cells. The FeOOH powder was pressed with a glass slide. A drop of each of the following corrosion media was added to the corresponding cell each day Monday through Friday for 10 months: 0.01 mol/L , 0.01 mol/L Cl⁻, 0.01 mol/L , and 0.01 mol/L Cl⁻+0.01 mol/L . At the end of the experiment the specimens were encapsulated into epoxy resin. The resin was carefully ground till the rust layer and iron clearly appeared. Observation of propagation of rust under the influence of , Cl⁻, , and Cl⁻+ was made using scanning electron microscope (SEM).

Figure 1: Test device for the study of iron corrosion in the presence of different types of FeOOH.

2.3. Interactions between FeOOH and Phosphoric Acid/Tannic Acid

To each test tube, 2 g of -FeOOH, -FeOOH, or -FeOOH was added. Then, 20 mL of tannic acid + phosphoric acid solution of different concentrations was added (Table 1). The tubes were sealed and shaken for varying amounts of time and then were allowed left aside for a while to ensure complete reaction inside. At the end of reaction, the products were filtered, washed with DI water repeatedly, and dried at 50°C.

Table 1: The combinations of tannic acid/phosphoric acid (wt%).

Number
Tannic acid/phosphoric acid
Labeling

1
3% tannic acid + 10% phosphoric acid
3T-10P

2
3% tannic acid + 20% phosphoric acid
3T-20P

3
3% tannic acid + 30% phosphoric acid
3T-30P

4
5% tannic acid + 10% phosphoric acid
5T-10P

5
5% tannic acid + 20% phosphoric acid
5T-20P

6
5% tannic acid + 30% phosphoric acid
5T-30P

2.4. Characterization of FeOOH

Phase identification was conducted using an XRD-6000 X-ray diffractometer (Shimadzu, Japan) with a CuK radiation () at 40 kV and 30 mA, a scanning speed of 5°/min, and a scan range of 3–90°. FTIR spectra were acquired on a Bruker VECTOR 22 infrared spectrometer at a resolution of 2 cm⁻¹ and a scan range of 4000–400 cm⁻¹ with a KBr pressing method. The morphology of FeOOH was characterized by a TEM. Power samples were added to anhydrous ethanol and ultrasonicated for 30 minutes. A little drip of suspension was put onto a copper mesh and dried naturally before TEM observation.

The elemental composition and valence state of elements were investigated by XPS (British VG’s MCROLAB MK II X-ray photoelectron spectroscopy). Magnesium was used as X-ray photon source with a power of 160 W. The energy analyser was set at 50 eV. The focusing voltage was 3 kV. An argon pressure of 1 × 10⁻⁴ Pa and a vacuum pressure of 0.5 × 10⁻⁶ Pa were used for sputtering. The angle between Ar⁺ ions sputtering gun and sample surface was 45°. Scan started 5 min after Ar⁺ ions sputtering.

3. Results and Discussion

3.1. Microstructures and Structures of FeOOH

FTIR spectra of the samples prepared in the present work showed typical features of -, -, -, and -FeOOH (Figure 2). The FTIR bands recorded at 1628 cm⁻¹ were ascribed to the –OH stretching vibration, whereas the bands at 883 and 795 cm⁻¹ were ascribed to the –OH bending modes in -FeOOH [23]; bands at 847 and 696 cm⁻¹ were ascribed to the –OH bending modes in -FeOOH [24]; nearby bands at 1020 and 750 cm⁻¹ were the bending vibration of –OH modes in -FeOOH [12]; and bands at 1120 and 975 cm⁻¹ were the bending vibration of OH modes in -FeOOH [25]. The four types of FeOOH were also confirmed by XRD analyses (Figure 3). Under the TEM observation, the -FeOOH was granular, -FeOOH appeared as rod-shaped, while -FeOOH looked like fine needles, and -FeOOH was irregularly cotton-like (Figure 4). Different types of corrosion products would cause different degrees of iron corrosion. As -FeOOH is relatively stable, it may attribute to nondetrimental rust. On the other hand, the club-shaped -FeOOH and fine needle-like -FeOOH had loose texture that could store large amounts of moisture, resulting in more iron corrosion.

Figure 2: FTIR spectra of different forms of FeOOH. ●: -FeOOH; ▲: -FeOOH; ■: -FeOOH; ◆: -FeOOH.

(a)

(b)

(c)

(d)

Figure 3: X-ray diffraction patterns of different forms of FeOOH. ◆: -FeOOH; ▼: -FeOOH; ●: -FeOOH; ■: -FeOOH.

(a)

(b)

(c)

(d)

Figure 4: TEM images of different forms of FeOOH.

3.2. Influence of -FeOOH and -FeOOH on Corrosion of Archaeological Iron

Corrosion morphologies of the surface between cast iron and -FeOOH or -FeOOH under the action of different ions , Cl⁻, , and Cl⁻+ were illustrated in Figure 5. FeOOH was sandwiched in between epoxide resin on top and cast iron on bottom. The boundaries were marked with white lines to help delineate the rust surface.

(a)

(b)

(c)

(d)

(e)

(f)

(g)

(h)

Figure 5: SEM images of rust powder/cast iron interface with the effects of ((a) and (b)); Cl⁻ ((c) and (d)); ((e) and (f)); and Cl⁻+ ((g) and (h)).

The surface between -FeOOH and cast iron varied significantly with different types of ions. The surface was relatively flat when was used (Figure 5(a)). Similar to , a clear -FeOOH layer could be seen under the action of Cl⁻ (Figure 5(c)). When was added, the interface became fuzzy (Figure 5(e)), indicating that could lead to more serious corrosion. The interface became more irregular under the influence of Cl⁻+ (Figure 5(g)). More corrosion of the cast iron was observed, when the freshly formed rust layer was connected to -FeOOH layer. In the presence of Cl⁻ and , green rust would form which had little protection on iron and was just an intermediate Fe(II)-Fe(III) hydroxyl-salt via which ferrous hydroxide Fe(OH)₂ usually oxidizes into different ferric oxyhydroxides [26].

The change in surface morphology of -FeOOH was similar to that of -FeOOH. When was added, the surface was relatively flat (Figure 5(b)). The surface corrosion became more serious as the anion was changed from Cl⁻ to (Figures 5(d) and 5(f)). When Cl⁻+ was acting on -FeOOH, corrosion of the interface was so serious that it connected to the original -FeOOH layers (Figure 5(h)).

The above observations showed that when either -FeOOH or -FeOOH adhered to iron surface, it was unable to prevent different anions from reaching the iron surface. In another word, the two hydroxy-oxide rust layers were not strong enough to provide a good protection and prevent iron from further corrosion. With relatively loose textures, -FeOOH and -FeOOH not only failed to stop anions from corroding the iron, but also became a storage area for anions and moisture, resulting in strong adsorption. Meanwhile, it slowed down the evaporation rate of moisture and extended the corrosion cycle of moisture, thus promoting corrosive ions acting on the cast iron.

Moreover, among the common anions in atmosphere that would cause corrosion, had the weakest corrosion power on cast iron. The corrosive power increased progressively, following the order Cl⁻+ > HSO₄ > Cl⁻. Under the combined action of Cl⁻ and , the corrosion of cast iron was much more serious than any other ions used alone, indicating synergistic activities between Cl⁻ and . -FeOOH was produced exclusively in the presence of Cl⁻ [27] which had weaker iron protection and resulted in more iron rusting. The corrosion product of cast iron in contact with the FeCl₂ solution over 138 days was made up of three layers: -FeOOH, Fe₃O₄, and a little -FeOOH in the inner layer, -FeOOH in the middle layer, and -FeOOH in the outer layer [28].

3.3. Interactions between FeOOH and Different Combinations of Phosphoric Acid/Tannic Acid

Different states and colors of reaction products after filtrating, drying, and grinding were documented in Table 2. The yellow powder and tannic acid were identical in material phases and composition, suggesting that the yellow powder was excess tannins. As tannic acid dissolves -FeOOH and higher concentrations of tannic acid speeded up the dissolution [29], it is suggested that FeOOH was completely dissolved. Thus, these proportions were not suitable as a choice of rust stabilizer formula, due to accumulation of residual tannic acid after reaction. In addition, for some combinations, the reaction products were very limited, indicating that most of the FeOOH was dissolved under the action of phosphoric acid/tannic acid. Only a small amount of FeOOH was involved in chemical transformation. Thus, these combinations were also undesirable for rust stabilizer formula.

Table 2: The state and color of reaction products.

Phosphoric acid/tannic acid
-FeOOH
-FeOOH
-FeOOH

3T-10P
Gray powder
Gray powder
Gray powder

3T-20P
Gray powder
Yellow powder
Less product, blue-gray

3T-30P
Less product, beige
Yellow powder
Yellow powder

5T-10P
Gray powder
Blue-gray, yellow
Blue-gray powder

5T-20P
Gray powder
Yellow powder
Blue-gray powder

5T-30P
Less product, beige
Less product, blue-gray
Yellow powder

At the same time, according to protection standards of cultural relics, protection materials must be close to original artifacts to the maximum extent. Among the combinations in Table 2, only the product of the 3T-10P, namely, 3% tannic acid + 10% phosphoric acid and FeOOH, was gray, similar to the color of steel materials, suggesting that 3% tannic acid + 10% phosphoric acid was the most suitable formula for rust stabilizer. Previous studies showed that conventional anticorrosive paints or the painting schemes applied on steel previously treated with a primer formulated with pine tannins extend the duration of painting schemes more than 50% relative to the case without this chemical treatment [30].

The XRD pattern of reaction products of -, -, and -FeOOH and 3T-10P was presented in Figure 6. A crystalline phosphate was the major product and it matched the XRD patterns of Fe₃P₆O₂ well. In contrast, the major constituents of the scale on Delhi iron pillar were crystalline iron hydrogen phosphate hydrate (FePO₄·H₃PO₄·4H₂O) as well as -, -, and -FeOOH and magnetite [30] or crystalline phosphate Fe₂(PO₄)(OH) [7]. No phases related to tannic acid were identified, suggesting that the transformation products of tannic acid and FeOOH were amorphous.

Figure 6: XRD patterns of the products formed from the reaction of FeOOH and 3T-10P.

The transformation products from the reaction of tannic acid/phosphoric acid and FeOOH were further characterized by XPS. The reaction products between -FeOOH and 3T-10P were mainly Fe, C, P, and O (Figure 7). The binding energy of Fe2p3/2 was 712.42 eV, confirming the presence of Fe³⁺ in the product. The binding energy of C1s can be decomposed to 285.07, 286.89, and 288.50 eV, with the former corresponding to carbon and the combination of the latter two corresponding to standard spectral peaks of carboxide in tannic acid. The binding energy of O1s was 531.95 eV, corresponding to C–OH in tannic acid. In addition, the peak at 133.64 eV was originated from P2p, confirming the presence of phosphate. The peaks of Fe2p3/2 in Fe³⁺ generally lie between 710.20 and 711.05 eV. However, the binding energy of Fe2p3/2 in this study was 712.42 eV, resulting in a chemical shift of more than 1 eV. Such a shift may suggest a change in chemical environment of the elements, thus indicating formation of a new chemical bond between Fe³⁺ and other substances. Due to the presence of tannic acid, it may suggest the formation of chelate between iron and tannin [31] as illustrated in Scheme 1.

Scheme 1: Single-chelate complex ion body.

(a)

(b)

(c)

(d)

Figure 7: XPS spectra of the products formed from the reaction of -FeOOH and 3T-10P.

Thus, it was speculated that the reaction products of -FeOOH and 3T-10P were made up of iron phosphate and chelate of iron and tannin.

The results of XPS analyses of the reaction products generated by -FeOOH and 3T-10P and by -FeOOH and 3T-10P were illustrated in Figures 8 and 9. The composition of these two products was similar to the reaction products of -FeOOH and 3T-10P, that is, was made mainly of Fe, C, P, and O and having about the same peak positions. Therefore, the reaction products were mainly made of iron phosphate and chelate of iron and tannin.

(a)

(b)

(c)

(d)

Figure 8: XPS spectra of the products formed from the reaction of -FeOOH and 3T-10P.

(a)

(b)

(c)

(d)

Figure 9: XPS spectra of the products formed from the reaction of -FeOOH and 3T-10P.

The structures of iron phosphate and chelate of iron and tannin are relatively stable. If acting as chemical conversion layer, the cast iron may develop strong corrosion resistance capacity. Meanwhile, the layer can enhance bonding between the coating and the substrate. These favorable physical and chemical properties could meet the need of coating and sealing treatment for iron artifact. However, the mechanisms of tannic acid/phosphoric acid rust conversion may need further study.

4. Conclusions

(1)When cast iron was covered by -FeOOH and -FeOOH corrosion, the rust layer was porous and not tight enough to provide a good protection against corrosion by , Cl⁻, , and Cl⁻+.(2)Among common anions tested, had the weakest corrosive power on cast iron. The corrosion power increased in the following sequence: Cl⁻, , and Cl⁻+. Meanwhile, synergistic corrosion could be enhanced when both Cl⁻ and were present.(3)Analyses of the reaction products between FeOOH and different combinations of phosphoric acid/tannic acid showed that 3% tannic acid + 10% phosphoric acid was the most suitable formula as rust stabilizer.(4)The reaction products between -FeOOH, -FeOOH, or -FeOOH and 3T-10P were made up of iron phosphate and chelate of iron and tannin.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This present work was supported by the National Natural Science Foundation of China (Grants nos. 51202226 and 51172216) and the Fundamental Research Funds for the Central Universities (Grant no. 2652013043).

References

W. Xu, K. Daub, X. Zhang, J. J. Noel, D. W. Shoesmith, and J. C. Wren, “Oxide formation and conversion on carbon steel in mildly basic solutions,” Electrochimica Acta, vol. 54, no. 24, pp. 5727–5738, 2009.

X. Liu, G. Qiu, A. Yan, Z. Wang, and X. Li, “Hydrothermal synthesis and characterization of α-FeOOH and α-Fe₂O₃ uniform nanocrystallines,” Journal of Alloys and Compounds, vol. 433, no. 1-2, pp. 216–220, 2007.

H. Abdel-Samad and P. R. Watson, “An XPS study of the adsorption of lead on goethite (α-FeOOH),” Applied Surface Science, vol. 136, no. 1-2, pp. 46–54, 1998.

C.-J. Jia, L.-D. Sun, Z.-G. Yan et al., “Single-crystalline iron oxide nanotubes,” Angewandte Chemie, vol. 44, no. 28, pp. 4328–4333, 2005.

M. Žic, M. Ristić, and S. Musić, “The effect of temperature on the crystallization of α-Fe₂O₃ particles from dense β-FeOOH suspensions,” Materials Chemistry and Physics, vol. 120, no. 1, pp. 160–166, 2010.

A. Jagminas, K. Mažeika, E. Juška, J. Reklaitis, and D. Baltrunas, “Electrochemical fabrication and characterization of lepidocrocite (γ-FeOOH) nanowire arrays,” Applied Surface Science, vol. 256, no. 12, pp. 3993–3996, 2010.

P. Dillmann, R. Balasubramaniam, and G. Beranger, “Characterization of protective rust on ancient Indian iron using microprobe analyses,” Corrosion Science, vol. 44, no. 10, pp. 2231–2242, 2002.

H. Tanaka, J. Wakatsuki, K. Kandori, T. Ishikawa, and T. Nakayama, “Role of zinc compounds on the formation, morphology, and adsorption characteristics of β-FeOOH rusts,” Corrosion Science, vol. 52, no. 9, pp. 2973–2978, 2010.

T. Ishikawa, M. Kumagai, A. Yasukawa, K. Kandori, T. Nakayama, and F. Yuse, “Influences of metal ions on the formation of γ-FeOOH and magnetite rusts,” Corrosion Science, vol. 44, no. 5, pp. 1073–1086, 2002.

A. Collazo, X. R. Nóvoa, C. Pérez, and B. Puga, “The corrosion protection mechanism of rust converters: an electrochemical impedance spectroscopy study,” Electrochimica Acta, vol. 55, no. 21, pp. 6156–6162, 2010.

M. Žic, M. Ristić, and S. Musić, “Precipitation of α-Fe₂O₃ from dense β-FeOOH suspensions with added ammonium amidosulfonate,” Journal of Molecular Structure, vol. 924-926, pp. 235–242, 2009.

C. Q. Cheng, J. Zhao, T. S. Cao, Q. Q. Fu, M. K. Lei, and D. W. Deng, “Facile chromaticity approach for the inspection of passive films on austenitic stainless steel,” Corrosion Science, vol. 70, pp. 235–242, 2013.

A. I. Muñoz, J. G. Antón, J. L. Guiñón, and V. P. Herranz, “Inhibition effect of chromate on the passivation and pitting corrosion of a duplex stainless steel in LiBr solutions using electrochemical techniques,” Corrosion Science, vol. 49, no. 8, pp. 3200–3225, 2007.

S. Powell, “Evaluation of alternative corrosion inhibitors to chromate for use in organic coatings using scanning reference electrode technique,” Surface Engineering, vol. 16, no. 2, pp. 169–175, 2000.

B. J. Basu, A. Srinivasan, J. Manasa, and V. K. W. Grips, “Improved corrosion protection of aluminium alloy AA 2024 by sol-gel hybrid coatings after surface pretreatment by silanisation,” Surface Engineering, vol. 28, no. 4, pp. 294–299, 2012.

Z. Liu, D. Yan, Y. Dong, Y. Yang, Z. Chu, and Z. Zhang, “The effect of modified epoxy sealing on the electrochemical corrosion behaviour of reactive plasma-sprayed TiN coatings,” Corrosion Science, vol. 75, pp. 220–227, 2013.

A. M. Simões, J. Torres, R. Picciochi, and J. C. S. Fernandes, “Corrosion inhibition at galvanized steel cut edges by phosphate pigments,” Electrochimica Acta, vol. 54, no. 15, pp. 3857–3865, 2009.

B. Gruss, “Iron phosphating,” Metal Finishing, vol. 108, no. 11-12, pp. 33–37, 2010.

D. Singh and S. Yadav, “Role of tannic acid based rust converter on formation of passive film on zinc rich coating exposed in simulated concrete pore solution,” Surface and Coatings Technology, vol. 202, no. 8, pp. 1526–1542, 2008.

B. Qian, B. Hou, and M. Zheng, “The inhibition effect of tannic acid on mild steel corrosion in seawater wet/dry cyclic conditions,” Corrosion Science, vol. 72, pp. 1–9, 2013.

A. Ostovari, S. M. Hoseinieh, M. Peikari, S. R. Shadizadeh, and S. J. Hashemi, “Corrosion inhibition of mild steel in 1 M HCl solution by henna extract: a comparative study of the inhibition by henna and its constituents (Lawsone, Gallic acid, α-d-Glucose and Tannic acid),” Corrosion Science, vol. 51, no. 9, pp. 1935–1949, 2009.

K. W. Tan, M. J. Kassim, and C. W. Oo, “Possible improvement of catechin as corrosion inhibitor in acidic medium,” Corrosion Science, vol. 65, pp. 152–162, 2012.

B. Yuan, J. Xu, X. Li, and M.-L. Fu, “Preparation of Si-Al/α-FeOOH catalyst from an iron-containing waste and surface-catalytic oxidation of methylene blue at neutral pH value in the presence of H₂O₂,” Chemical Engineering Journal, vol. 226, pp. 181–188, 2013.

S. Bashir, R. W. McCabe, C. Boxall, M. S. Leaver, and D. Mobbs, “Synthesis of α- and β-FeOOH iron oxide nanoparticles in non-ionic surfactant medium,” Journal of Nanoparticle Research, vol. 11, no. 3, pp. 701–706, 2009.

L. Carlson and U. Schwertmann, “Natural occurrence of feroxyhite (δ'-FeOOH),” Clays & Clay Minerals, vol. 28, no. 4, pp. 272–280, 1980.

Z. Wang, C. Xu, and X. Dong, “Localized corrosion and phase transformation of simulated archaeological iron,” Chinese Journal of Chemical Engineering, vol. 16, no. 2, pp. 299–305, 2008.

C. Rémazeilles and P. Refait, “On the formation of β-FeOOH (akaganéite) in chloride-containing environments,” Corrosion Science, vol. 49, no. 2, pp. 844–857, 2007.

Z. Wang, C. Xu, X. Cao, and B. Xu, “The Morphology, phase composition and effect of corrosion product on simulated archaeological iron,” Chinese Journal of Chemical Engineering, vol. 15, no. 3, pp. 433–438, 2007.

S. Nasrazadani, “The application of infrared spectroscopy to a study of phosphoric and tannic acids interactions with magnetite (Fe₃O₄), goethite (α-FeOOH) and lepidocrocite (γ-FeOOH),” Corrosion Science, vol. 39, no. 10-11, pp. 1845–1859, 1997.

R. Balasubramaniam, “On the corrosion resistance of the Delhi iron pillar,” Corrosion Science, vol. 42, no. 12, pp. 2103–2129, 2000.

A. M. Al-Mayouf, “Inhibitors for chemical cleaning of iron with tannic acid,” Desalination, vol. 121, no. 2, pp. 173–182, 1999.