Advances in Materials Science and Engineering
Volume 2016 (2016), Article ID 5294062, 9 pages
http://dx.doi.org/10.1155/2016/5294062

Research Article

The Study of Microwave and Electric Hybrid Sintering Process of AZO Target

Ling-yun Han, Yong-chun Shu, Yang Liu, Lu Gao, Qing-tong Wang, and Xiao-na Zhang

The Key Laboratory of Weak Light Nonlinear Photonics, Ministry of Education, Nankai University, Tianjin 300457, China

Received 9 November 2015; Revised 1 February 2016; Accepted 17 February 2016

Academic Editor: Philip Eisenlohr

Copyright © 2016 Ling-yun Han et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

We simulated the microwave sintering of ZnO by 3D modelling. A large-size Al-doped ZnO (AZO) green ceramic compact was prepared by slurry casting. Through studying the microwave and electric hybrid sintering of the green compact, a relative density of up to 98.1% could be obtained by starting microwave heating at 1200°C and increasing the power 20 min later to 4 kW for an AZO ceramic target measuring 120 × 240 × 12 mm. The resistivity of AZO targets sintered with microwave assistance was investigated. The energy consumption of sintering could be greatly reduced by this heating method. Until now, few studies have been reported on the microwave and electric hybrid sintering of large-size AZO ceramic targets. This research can aid in developing sintering technology for large-size high-quality oxide ceramic targets.

1. Introduction

Because of the high optical transmittance and low resistivity of transparent conducting oxide (TCO), TCO films are applied in many electronic devices such as solar cells, flat displays, and touch panels [1–4]. Indium tin oxide (ITO) is currently the most popular industrial TCO film material. However, because of the shortage and high cost of In as a resource, an alternative must be found. Some researchers have found Al-doped ZnO (AZO) film to be a potential alternative to ITO, with optical and electrical properties approaching those of the conventional material [5–7].

Magnetron sputtering is the main fabrication technology used for industrial TCO films. The method requires oxide ceramic feed materials with the same components and quality as the sputtering target. Sintering, as the most important step in preparing the target, has been studied by many researchers, but most studies have investigated electricity as the sintering power [8–12]. The obvious drawbacks of this method include power wastes and the possibility of cracking the ceramic target, as the temperature distribution is not homogeneous during sintering.

Microwave energy is a new sintering power that may increase sintering speed and homogeneity while decreasing the energy cost [13–15]. The working theory is that microwave radiation causes the electric dipole moment rotation of the polar molecules in the dielectric materials, converting the electromagnetic energy to heat energy instantaneously, rapidly, and efficiently. Gunnewiek and Kiminami studied the effect of microwave heating rate on the sintering of ZnO, indicating that the relative density of microwave sintered ZnO was independent of the heating rate, but the grain growth could be restricted by heating rates with a lower time and energy requirement [16]; Birnboim et al. studied the influence of microwave frequency on ZnO sintering, indicating that the temperature gradients could be reduced by changing the microwave frequency [17], while the research of Janney et al. revealed microwave radiation enhanced sintering of ceramic compacts, including lower sintering temperatures and reduced activation energies [18, 19]. However, the limit of microwave sintering research above is obvious: the compacts in the experiments are all in millimeter size, which is too small for industry. The size of AZO targets required for industry is usually beyond 100 × 200 × 10 mm.

This study addresses the technology of microwave and electric hybrid sintering to prepare large-size (100 × 200 × 10 mm) AZO ceramic targets with high density (98%) for magnetron sputtering.

2. Simulation of the Microwave Sintering Process

In this study, the finite element method (FEM) [20] is applied to simulate microwave sintering using COMSOL software. By setting the physical parameters of the microwave transmitter and the ZnO samples and investigating the sintering process with single- and double-source microwave transmitters, we obtain the distributions of temperature and electric field during sintering. Electromagnetic field equation (1), heat transport equation (2), and electromagnetic power equation (3) are as follows:

In the equations , , and are density, capacity, and thermal conductivity, respectively; is the working frequency, the complex permittivity , and the propagation vector of the electromagnetic wave .

2.1. Model and Simulation

Figure 1 depicts the configuration of the microwave furnace including the sample, as used in our study. The cavity volume of the microwave furnace is 420 × 420 × 420 mm. The 86 × 43 mm waveguide ports are excitation sources in the TE₁₀ mode, and the operating frequency is 2.45 GHz. The total output power of the microwave is 10 kW. Two equally sized ports are placed in the plane of the cavity. To reduce heat loss and protect the wall of the cavity, a porous Al₂O₃ sheet is introduced as insulation; the gap between the outer boundary of the sheet and the cavity wall is 20 mm. The thickness is 40 mm, and the ZnO sample in the furnace has a volume of 10 × 10 × 100 mm. During the simulation, the sample is perpendicular to the half-height surface and the locations of the two microwave ports have mirror symmetry relative to the half-height surface. Labels A, B, C, and D designate reference points at four different positions. The parameters of the porous Al₂O₃ and ZnO including complex permittivity (a.u.), density (g/cm³), specific heat capacity (J/(g·K)), and heat transfer coefficient (W/(m²·°C)) are shown in Table 1.

Table 1: Relevant parameters of ZnO and Al₂O₃.

Al₂O₃
ZnO

(a.u.)

See details in Figure 2

(g/cm³)
0.24
= 0.52 (for ≤ 600°C) 
= (for 600°C < ≤ 1150°C) 
(for 0°C)

(J/(g·K))
1.09

(W/(m²·°C))
for ≤ 500°C 
for > 500°C
Low temperature stage:  
High temperature stage:   
°C:

(a)

(b)

Figure 1: Cross-sectional view of the microwave sintering apparatus, (a) the plane view, (b) the plane view.

We selected air as the sintering atmosphere in the cavity and copper as a perfect cavity wall. The penetration of the electromagnetic field into the sample is characterized by the skin depth , given by (4) [21]. The permittivity and of the ZnO sample vary with temperature, as shown in Figure 2. Consider

where is the speed of light.

Figure 2: Real and imaginary parts and of the complex dielectric constant and the skin depth of ZnO versus temperature at 2.45 GHz.

2.2. Results and Discussion of Simulation

2.2.1. Electric Field Distribution

The total output power was 10 kW. Each port for the double-source microwave had an output power of 5 kW in the simulation. By comparing the output power of the single- and double-source microwave ports, we obtain the electric field distributions from the single- and double-source microwave transmitter ports, as shown in Figure 3. Although the dimension of the electric field does not differ between the double- and single-source microwaves, the intensity of the field produced by the double-source microwave is significantly higher and the cross-sectional symmetric conditions in both the and directions are satisfied by the double-source microwave, which greatly reduces the load on memory and computation.

(a)

(b)

Figure 3: Surface plots of microwave electric field distribution for (a) single-source and (b) double-source microwave ports.

2.2.2. Temperature Field Distribution

The single- and double-source microwave power was set to 10 kW and 5 kW, respectively, which ensured the same total output power. The initial temperature and density of the ZnO sample was 25°C and 2.917 g/cm³, respectively.

When the temperatures of the four reference points all reached or exceeded 1200°C, we terminated the simulation. The temperature changes of the four locations are plotted in Figure 4. Obvious differences in temperature occur among the four reference points at temperatures below 1000°C. However, these differences decrease gradually as the temperature increases. Eventually, the temperatures of all points equalize above 1000°C. This indicates that microwave sintering may be more homogenous at high temperatures. Additionally, single-source microwave sintering requires more time to reach 1100°C than the double-source system. With respect to energy utilization, double-source microwave sintering will be more effective and practical than single-source.

(a)

(b)

Figure 4: Plots of temperatures of four reference points versus heating time in the microwave heating process for (a) single-source and (b) double-source microwave output.

The simulation was the first time to use a 3D model to illustrate the microwave sintering process. It was closer to practical sintering process with the insulation and dynamic parameters introduced in the simulation. Though the simulation has some difference with the experiment because of the limit of computational ability, the results have shown us the possibility of getting a bigger homogeneous sintering area for solving the cracking problem in the preparation of big-size ceramic target by setting multisource microwave. Part of the furnace in the experiments was designed by the simulation.

3. Experimental

The ZnO and Al₂O₃ powders used in the experiment were nanosized particles; ammonium polyacrylate, polycarboxylate superplasticizer, and arabic gum were used as the dispersant, surface active agent, and binder, respectively. All the materials used were analytical reagent (AR). The AZO ceramic targets were prepared by sintering the AZO green compacts. The process consisted of several steps: the ZnO and Al₂O₃ powders were mixed in mass ratio of 98 : 2 by ball-milling for 2 h and then poured into a solution of distilled water, dispersant, surface active agent, and blinder in the volume ratio of 50 : 1.2 : 0.8 : 0.5. After ball-milling in vacuum for 2 h, white slurries with proper viscosity and fluidity were obtained. The slurries were poured into the plaster mold and allowed to consolidate for 48 h at 25°C. The wet green compacts were placed into a drying oven for 1 week at 80°C. After the thermal treatment at 500°C to remove the water and chemical reagents, we obtained dried AZO green compacts of 170 × 340 × 17 mm.

The green compacts were then electrically heated at 1°C/min to the setting temperatures (1000, 1100, 1200, and 1300°C), after which microwave heating was started. The output power of the microwave was varied from 1 to 5 kW and the change rate of power varied from 0.16 kW/min to 0.8 kW/min (5–25 min). The rectangular bulk AZO at the size of 120 × 240 × 12 mm was obtained after heating by electricity and microwave for 3 h at 1460°C.

Figure 5 shows a schematic view of the furnace, which was self-designed and made by Gaoge Thermal Treatment, Inc., Hefei, China. Resistance rods were located around the inner wall of the furnace, which produced heat by electricity. Eight microwave transmitters of the same standard were distributed symmetrically at the top of the furnace, which provided a stable, uniform, and freely controlled electromagnetic field. The frequency was 2.45 GHz and the maximum power of each transmitter was 1 kW. The theoretical density of AZO target in the experiment was 5.56 g/cm³. The densities of the targets were measured based on Archimedes’ principle. The microstructures and morphologies were observed by a Leo 1530vp scanning electron microscope (SEM). The resistivity of the sintered targets was tested by a four-point probe method (ST2258A, Jingge Electronic Co., Suzhou, China).

(a)

(b)

Figure 5: A schematic view of the furnace: (a) in view; (b) in view.

4. Results and Discussion

4.1. Effect of Microwave Starting Temperature on the Microstructure and Density of AZO Target

Figure 6 shows X-ray diffraction patterns for the samples prepared through conventional sintering and that prepared through microwave sintering at 1200°C , 1300°C as starting temperature. It is evident that both samples exhibit ZnO phase (Z) with ZnAl₂O₄ phase (ZA) as the second phase from and . But at 1300°C the XRD analysis shows only ZnO phase as shown in . The absence (presence in very low intensity) of the characteristic peaks of ZnAl₂O₄ may be explained by the melting of ZnAl₂O₄. The huge heat induced by microwave radiation and electricity at 1300°C turned ZnAl₂O₄ phase to amorphous state. Also, we can see that the intensity of the diffraction peaks for the sample prepared through microwave sintering is lower than that prepared through conventional sintering, which can be explained as the fact that the rapid heating of microwave prevented the growth of grain size.

Figure 6: X-ray diffraction patterns for the AZO sample prepared through conventional sintering,    microwave sintering started at 1200°C, 1300°C.

Figure 7 shows the microstructures of the AZO targets sintered at different starting temperatures for microwave heating. The average grain size of the sintered samples was estimated from the pictures using the linear intercept method [22]. The results are summarized in Table 2. The grain size increased from sample (a) to sample (d) with increasing microwave heating start temperatures. The starting temperature of microwave heating could alter the grain growth, such that the grains grow with increases in the starting temperature. The pictures also show that sample (c), with a start temperature of 1200°C, has fewer pores and a smaller average grain size than the other samples do.

Table 2: The grain size of microwave sintered samples.

Sample
Grain size (m)

a
8.3

b
12.1

c
22.5

d
28.4

Figure 7: Microstructures of AZO targets sintered at different microwave starting temperatures: (a) 1000, (b) 1100, (c) 1200, and (d) 1300°C.

Figure 8 reveals the fracture morphology of the AZO targets sintered at different microwave starting temperatures. The pore sizes in samples (a), (b), and (c) are greater than those in sample (d). Comparing samples (a), (b), (c), and (d) in Figure 8 we note the absence of the second-phase ZnAl₂O₄, which is confirmed by XRD study in Figure 6.

Figure 8: Fracture morphologies of AZO targets at different microwave starting temperatures: (a) 1000°C, (b) 1100°C, (c) 1200°C, and (d) 1300°C.

Figure 9 shows the variation of the relative density of the target in different microwave starting temperatures. The relative density could increase to 98% when the microwave starting temperature was raised to 1200°C. After this maximum, the relative density decreased with increases in the microwave starting temperature. According to the computational simulation, this result may be explained by the development of a high-intensity electromagnetic field around the sample. The temperature was raised rapidly by a large amount of heat generated from interactions between the electromagnetic field and the sample, which would increase the surface evaporation of ZnO. The reduction of ZnO would decrease the relative density of the target.

Figure 9: Relative densities of AZO targets as a function of microwave starting temperature.

All the above data show that 1200°C is the optimal temperature at which microwave heating should begin during the sintering of the AZO target.

4.2. Effect of Microwave Power on the Sintering of AZO Ceramic Target

As shown in Figure 10, the relative density of AZO target increased with increasing microwave power. When the microwave power was 4 kW, the relative density was 98.1% and remaining constant with further power increases. This may be caused by the increased energy of the electromagnetic field with increased microwave power, which would produce heat, promoting powder aggregation and decreasing the size of pores in the ceramic in rapid time. As the active energy for powder aggregation increases as a function of the sintering temperature, once the energy required for powder aggregation exceeded the microwave radiation energy, the powder aggregation process would be prevented by the high active energy; thus the ceramic density would remain constant.

Figure 10: Relative densities of AZO targets as a function of microwave power.

4.3. Effect of Change Rate of Microwave Power during the Sintering Process

Figure 11 shows the relative densities of the different samples as a function of change rate of microwave power. The change in relative density was very small with the increase in change rate of microwave power, which correlated with the observation that the microwave heating rate had little effect on the density [16]. According to the study of Rahaman and Chu et al. [23, 24], the ceramic density was not affected by factors other than the sintering temperature.

Figure 11: Relative densities of AZO targets as a function of change rate of microwave power.

Figure 12 displays photos of the AZO targets after sintering under different change rates of microwave power. Some obvious cracks occurred at the border of sample (a) and severe oversintering was visible on the surface. No cracks were found on the surfaces of sample (b) or (c). However, the sintering of (b) and (c) was inhomogeneous, as indicated by different surface colours. Sample (d) revealed homogeneous sintering without cracks on the sample surface. A comparison of these samples indicated that sintering was inhomogeneous and the target could crack when the microwave power changed too quickly. This may be because rapid increases in microwave power caused similarly rapid increases in temperature, resulting in a large amount of heat at the sintering area of the AZO target. The dramatic temperature gradient in the area could cause thermal stress in the target. Thermal stress was the main reason for the inhomogeneous sintering. So taking control of change rate of microwave power is necessary for a high-quality target.

(a) 5 min

(b) 10 min

(c) 15 min

(d) 20 min

Figure 12: Photographs of AZO targets after sintering with different change rates of microwave power.

4.4. Electrical Properties

Table 3 shows the resistivities of AZO targets prepared with microwave assistance at the starting temperatures of 1000–1300°C. The results indicated that the resistivities of AZO targets sintered with microwave assistance decreased from 7.2 × 10⁻² Ω·cm to 2.8 × 10⁻³ Ω·cm with the starting temperature raised from 1000°C to 1200°C. When the temperature was raised to 1300°C, the resistivity increased to 5.3 × 10⁻³ Ω·cm. The variation of resistivities can be attributed to the sintered densities as shown in Figure 9. The lower sintered density led to serious scattering of electrons by the large amounts of pores in the targets. When the microwave starting temperature was increased from 1000°C to 1200°C, the increase in sintered density and the change in pores alleviated the scattering of electrons, resulting in the increase of the resistivity. Moreover, as the formation of ZnAl₂O₄ phase, the Al dopant may gradually become more active as a conducting carrier between 1000°C and 1200°C. But with the absence of ZnAl₂O₄ phase and the decrease in sintered density after the starting temperature was raised to 1300°C, the resistivity increased slightly.

Table 3: Resistivities of AZO targets.

Sample
Microwave starting temperature (°C)
Resistivity (Ω·cm)

1
1000
7.2 × 10⁻²

2
1100
5.1 × 10⁻²

3
1200
2.8 × 10⁻³

4
1300
5.3 × 10⁻³

5. Conclusions

(1)FEM simulation indicated that a homogeneous electric field distribution for sintering could be achieved by designing a microwave furnace with proper constraints. The sintering field increased in homogeneity with a multisource microwave relative to that achieved by a single-source microwave at high temperature. The sintering time could be reduced by using a multisource microwave instead of a single-source microwave.(2)By preparing the AZO target of 120 × 240 × 12 mm with microwave and electric hybrid sintering, the microwave starting temperature was found to affect the densification of the AZO target. Increasing the microwave power could increase the density of the AZO target. The change rate of microwave power had no obvious effect on the density of the target but significant effects on the integrity and uniformity of the large-sized AZO target.(3)Based on the experimental results, an AZO target of 120 × 240 × 12 mm with a relative density of 98.1% can be obtained by introducing microwave power when the sample has reached 1200°C by electrical heating, with the output power increased to 4 kW in 20 min.(4)The resistivity of AZO targets sintered with microwave started at 1200°C could be as low as 2.8 × 10⁻³ Ω·cm.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this paper.

Acknowledgments

The authors are grateful for financial support from the National High Technology Research and Development Program of China (2012AA03030315).

References

X. T. Hao, F. R. Zhu, K. S. Ong, and L. W. Tan, “Hydrogenated aluminium-doped zinc oxide semiconductor thin films for polymeric light-emitting diodes,” Semiconductor Science and Technology, vol. 21, no. 1, pp. 48–54, 2006.

C. G. Granqvist, “Transparent conductors as solar energy materials: a panoramic review,” Solar Energy Materials and Solar Cells, vol. 91, no. 17, pp. 1529–1598, 2007.

T. Minami, “Present status of transparent conducting oxide thin-film development for Indium-Tin-Oxide (ITO) substitutes,” Thin Solid Films, vol. 516, no. 17, pp. 5822–5828, 2008.

X. Yu, X. M. Yu, J. J. Zhang, and H. J. Pan, “Gradient Al-doped ZnO multi-buffer layers: effect on the photovoltaic properties of organic solar cells,” Materials Letters, vol. 161, pp. 624–627, 2015.

B. Hwang, Y.-K. Paek, S.-H. Yang, S. Lim, W.-S. Seo, and K.-S. Oh, “Densification of Al-doped ZnO via preliminary heat treatment under external pressure,” Journal of Alloys and Compounds, vol. 509, no. 27, pp. 7478–7483, 2011.

T. Minami, “Substitution of transparent conducting oxide thin films for indium tin oxide transparent electrode applications,” Thin Solid Films, vol. 516, no. 7, pp. 1314–1321, 2008.

G. Fang, D. Li, and B.-L. Yao, “Fabrication and vacuum annealing of transparent conductive AZO thin films prepared by DC magnetron sputtering,” Vacuum, vol. 68, no. 4, pp. 363–372, 2002.

M.-W. Wu, “Two-step sintering of aluminum-doped zinc oxide sputtering target by using a submicrometer zinc oxide powder,” Ceramics International, vol. 38, no. 8, pp. 6229–6234, 2012.

H. Cheng, X. J. Xu, H. H. Hng, and J. Ma, “Characterization of Al-doped ZnO thermoelectric materials prepared by RF plasma powder processing and hot press sintering,” Ceramics International, vol. 35, no. 8, pp. 3067–3072, 2009.

X.-M. Wang, X. Bai, H.-Y. Duan et al., “Preparation of Al-doped ZnO sputter target by hot pressing,” Transactions of Nonferrous Metals Society of China, vol. 21, no. 7, pp. 1550–1556, 2011.

J. Zhang, W. Zhang, E. Zhao, and H. J. Jacques, “Study of high-density AZO ceramic target,” Materials Science in Semiconductor Processing, vol. 14, no. 3-4, pp. 189–192, 2011.

H. Bouhamed and S. Baklouti, “Synthesis and characterization of Al₂O₃/Zno nanocomposite by pressureless sintering,” Powder Technology, vol. 264, pp. 278–290, 2014.

D. E. Clark and W. H. Sutton, “Microwave processing of materials,” Annual Review of Materials Science, vol. 26, no. 1, pp. 299–331, 1996.

J. D. Katz and R. D. Blake, “Microwave sintering of multiple alumina and composite components,” American Ceramic Society Bulletin, vol. 67, pp. 1304–1308, 1991.

Z. Xie, J. Yang, X. Huang, and Y. Huang, “Microwave processing and properties of ceramics with different dielectric loss,” Journal of the European Ceramic Society, vol. 19, no. 3, pp. 381–387, 1999.

R. F. K. Gunnewiek and R. H. G. A. Kiminami, “Effect of heating rate on microwave sintering of nanocrystalline zinc oxide,” Ceramics International, vol. 40, no. 7, pp. 10667–10675, 2014.

A. Birnboim, D. Gershon, J. Calame et al., “Comparative study of microwave sintering of zinc oxide at 2.45, 30, and 83 GHz,” Journal of the American Ceramic Society, vol. 81, no. 6, pp. 1493–1501, 1998.

M. A. Janney and H. D. Kimrey, “Microstructure evolution in microwave sintered alumina,” in Ceramic Powder Science, Vol. II, pp. 919–924, American Ceramic Society, 1988.

M. A. Janney, C. L. Calhoun, and H. D. Kimrey, “Microwave sintering of zirconia-8 mol% yttria,” Ceramic Transactions, vol. 21, pp. 311–318, 1991.

D. C. Dibben and A. C. Metaxas, “Finite element time domain analysis of multimode applicators using edge elements,” Journal of Microwave Power & Electromagnetic Energy, vol. 29, no. 4, pp. 242–251, 1994.

A. K. Shukla, A. Mondal, and A. Upadhyaya, “Numerical modeling of microwave heating,” Science of Sintering, vol. 42, no. 1, pp. 99–124, 2010.

J. C. Wurst and J. A. Nelson, “Lineal intercept technique for measuring grain size in two-phase polycrystalline ceramics,” Journal of the American Ceramic Society, vol. 55, no. 2, p. 109, 1972.

M. N. Rahaman, Ceramic Processing and Sintering, Taylor & Francis, New York, NY, USA, 2nd edition, 2003.

M. Y. Chu, N. Rahaman, L. C. Jonghe, and R. J. Brook, “Effect of heating rate on sintering and coarsening,” Journal of the American Ceramic Society, vol. 74, no. 6, pp. 1217–1225, 1991.