Advances in Materials Science and Engineering
Volume 2017 (2017), Article ID 4056360, 6 pages
https://doi.org/10.1155/2017/4056360

Research Article

Impact of Hot Pressing Temperature on Medium Density Fiberboard (MDF) Performance

W. Gul,¹ A. Khan,² and A. Shakoor²

¹Department of Mechanical Technology, University of Technology, Nowshera, Pakistan
²Department of Mechanical Engineering, University of Engineering and Technology, Peshawar, Pakistan

Correspondence should be addressed to W. Gul; waheed@uotnowshera.edu.pk

Received 20 June 2016; Accepted 13 November 2016; Published 9 January 2017

Academic Editor: Stevulova Nadezda

Copyright © 2017 W. Gul et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Hot pressing temperature is determined according to the performance of boards, type of glue, and production efficiency of hot press. During hot pressing, the thermal energy has enhanced the plasticity of the fiber and created conditions for the integration of different bonds. The thermal energy will cause the moisture in raw board to vaporize. Temporary heating will expedite the solidification of hot set resin for decreased friction and increased fluidity. The hot pressing temperature usually refers to the temperature of hot pressing plate, but what plays function in actual use is the temperature inside the raw board. This research investigates the performance of MDF with respect to hot pressing temperature. The strength and water resistance of the product are improved with the increase of hot pressing temperature from 140°C to 160°C, the Modulus of Rupture (MOR) is increased by 9.8%, the Internal Bonding (IB) is increased by 33.6%, the water absorption (Wt) is decreased by 38.2%, and the thickness expansion rate () is decreased by 15.2%.

1. Introduction

Medium density fiberboard (MDF) is a type of wood sheet produced under optimum pressure and temperature by using wood fiber or other plant fibers as raw materials and applying the urea formaldehyde resin [1]. The density of MDF in production is generally controlled between 690 and 750 Kg/M³. The raw materials used for MDF are firewood from nearby plantations and forest, mango, Ghaz wood (Tamarix aphylla), poplar wood (Populus caspica), eucalypt, wheat straws, rice husk, cotton stalks, Sesbania, sugarcane bagasse, and so forth [2].

The performance index of MDF is divided into three categories, that is, physical performance, mechanical performance, and biological performance [3]. The physical performance mainly includes density, moisture content, and thickness swelling. The mechanical performance mainly includes Internal Bonding, Modulus of Elasticity (MOE), Modulus of Rupture (MOR), and screw holding force (face and side) [4]. The biological performance mainly includes the release of formaldehyde [5].

Figure 1 shows the whole manufacturing process associated with different work stations, that is, material preparation, fiber formation, fiber treatment, mat forming and hot pressing, board treatment, and warehouse. In material preparation section the wood is converted into chips through chipper machine. The chips are then screened to separate the required size [6]. The confirming chips are then transported to chips washer through a belt conveyor with iron remover installed over it. These chips are then washed to improve its quality. These chips are then transferred to fiber separation section. In fiber separation section, the chips are cooked at a temperature of 160–180°C @ 6–8 bar pressure for about 3–5 min to make it softer. About 1-2 wt% of paraffin wax is added to the softened chips to make them swelling resistant [7]. The softened chips are then delivered to grinding chamber. In grinding chamber, the materials are mechanically decomposed with the function of water and heat. Pulps are formed. These pulps are then flowing in blow line. While passing through the blow valve, urea formaldehyde resin is added into pulp. After that the pulp in the form of fiber enters into the dryer [8]. In fiber treatment section, the moisture is vaporizing in fiber and controls it within the required range. The final moisture content in the fiber is controlled within 8–13 (wt%). In mat forming section, the fiber is spread evenly into the matting conveyor belt. Under the function of air blow, the mat of specified thickness is formed. The prepress dispels the air out of mat and gives strength to the mat [9].

Figure 1: MDF manufacturing process (wood force plant).

In board trimming section, the board is cooled and is conveying to the longitudinal and transversal saw for cutting [10]. The dust is removed from sides of board. In sanding section, the board is polished to the required size by removing the extra surface. The board is then inspected and transferred to warehouse [11].

2. Methodology

Hot pressing is an important process to manufacture the MDF and plays a decisive role in the product quality and productivity.

Hot pressing refers to a process where the raw board, under the combined function of temperature and pressure, is subjected to moisture evaporation, increase of density, glue solidification, and water proof agent redistribution and the compositions in the raw materials are subjected to a series of physical and chemical changes to form bonding force between the fibers and form the products confirming to quality requirements [12]. Plant fiber material is a micromolecular organic substance complicated in chemical compositions, plus applying of composite resin. Hot pressing process involves not only the change in geometric shape but also such processes as chemical change and physical change [13]. The factors affecting the method include process temperature, type of raw materials, concentrations of ingredients, moisture content, type and performance of resin, and time and pressure of the process. The press cycle and parameters are shown in Table 1 and Figure 2. In Table 1, for 16 mm board thickness, the whole press cycle time is 275 sec plus position time ( + 30).

Table 1: Hot press parameters for different thickness of board.

Th (mm)

(°C)

8
170
30
40
90
80
20
12
11
10

55
35
15
15
10
15
+ 25
170

11
170
35
45
90
80
19
12
11
10

80
50
15
15
12
15
+ 30
170

16
190
30
40
160
140
19
12
11
10

100
100
15
20
20
20
+ 30
190

18
190
35
45
170
150
16
12
11
10

120
100
15
20
20
25
+ 30
190

Figure 2: Hot press cycle graph.

time is the press closing time which is normally 10 seconds. So the total cycle of the hot press for 16 mm is calculated as 320 seconds. The adjustment is based on the gel time of urea formaldehyde (UF) resin. Similarly, for different thickness and curing of resin, the different parameters are adjusted.

The graph shown in Figure 2 is formed from the hot press parameters mentioned in Table 1.

The main experiment was carried out on 16 mm board. Four samples of 16 mm MDF were manufactured with initial parameters as shown in Table 2.

Table 2: The final MDF properties at various temperature.

S. number
Parameters
Value

1
Moisture in fiber
11%

2
UF resin
10%

3
Hot press plates temperature
190°C

4
Thickness of the board
16 mm

5
Press closing time
40 sec

6
Total press cycle time
320 sec

3. Results and Discussions

Final manufactured MDF properties are concisely summarized in Table 3. The comparative analysis of the well-defined MDF properties, such as water resistance (Wt), swelling in thickness (), Modulus of Rupture (MOR), and Internal Bond (IB), can be accomplished on the basis of temperature variation [14, 15]. Wt and are physical properties of MDF, while MOR and IB are mechanical properties of the formed MDF.

Table 3: The final MDF properties at various temperature.

(°C)
IB (MPa)
Wt (%)
Density (gm/cm³)
MOR (MPa)
(%)

140
0.43
29.2
0.74
29.2
18

160
0.64
18
0.72
32.3
15.3

170
0.96
17.9
0.72
31.8
8.2

185
1.02
22
0.73
30
9.3

Four samples of MDF are produced at temperature of 140°C, 160°C, 170°C, and 185°C. Meanwhile, during manufacturing, the initial parameters, namely, preheating time, UF resin, wax, press timing, and board size, were kept constant [16].

The physical property, swelling in thickness () of MDF, is consummate with temperature variation ranging from 140°C to 185°C. At 140°C, 160°C, 170°C, and 185°C., values were recorded as 18%, 15.3%, 8.2%, and 9.3%, respectively, as shown in Figure 3.

Figure 3: Relationship between hot press temperature and swelling in thickness.

As the temperature increases from 140°C to 170°C, the value of decreases from 18% to 8.2%, but when we increase the temperature from 170°C to 180°C, value is slightly increased from 8.2% to 9.3%. It means that if we further increase the temperature, value will move in ascending order and the strength of MDF will be reduced. The best and acceptable temperature range for MDF is from 170°C to 180°C. This is the optimum medium range of temperature. Calculated values also depend upon the nature of curing of resin used as binder and hot press time [17, 18]. Low temperature and high temperature are strictly prohibited for MDF in normal case of resin curing. Meanwhile value according to standard (EN-317) is <12%.

In record of the manufactured MDF samples, the experimental values of mechanical adhesive property, that is, Internal Bond (IB), is ranging from 0.43 MPa to 1.02 MPa for a temperature range from 140°C to 185°C as shown in Figure 4.

Figure 4: Relationship between hot press temperature and Internal Bond (IB).

The IB value at low temperature (140°C) is 0.43 MPa, while for a 16 mm MDF the IB value is standardized (EN-319) as 0.6 MPa. Hence, at 140°C, the MDF will have a very poor strength. But when the temperature is exceeded from 140°C to 160°C, the IB value reaches 0.64 MPa. So at 160°C, the MDF follows the standard value and strength. If we further increase the temperature from 160°C to 170°C, a direct relation is set up between temperature and IB and the IB value continuously increases [19]. At maximum value of temperature (185°C), the IB value 1.02 MPa is obtained. But if we further increase the temperature, the surface and core layer may lead to a high temperature difference and ultimately the MDF may become brittle.

The samples of MDF are also tested for a very important mechanical property, namely, MOR [20]. The experimental values of MOR are calculated as 29.2 MPa, 32.2 MPa, 31.8 MPa, and 30 MPa for temperature of 140°C, 160°C, 170°C, and 185°C, respectively, as shown in Figure 5. Even at low temperature (140°C), the MOR value is very close to standard (EN-310) value (≥30 MPa). At 160°C, the MOR value is at its peak (32.3 MPa). However, if we further increase the temperature from 160°C to 185°C, the MOR behaves in reverse manner.

Figure 5: Relationship between hot press temperature and Modulus of Rupture (MOR).

Figure 6 demonstrates the effect of temperature over the density. The physical property, density of MDF, is consummate with temperature variation ranging from 140°C to 185°C. At 140°C, 160°C, 170°C, and 185°C, the values of density were recorded as 0.74 g/cm³, 0.72 g/cm³, 0.72 g/cm³, and 0.73 g/cm³. At low temperature, the density value is maximum, that is, 0.74 g/cm³. If we increase the temperature from 140°C to 160°C, the density value dropped from 0.74 g/cm³ to 0.72 g/cm³. If we further increase the temperature from 160°C to 170°C, the value of density remains constant. However, when temperature increases from 170°C to 185°C, the density is also increased from 0.72 gm/cm³ to 0.73 gm/cm³.

Figure 6: Relationship between hot press temperature and density of MDF.

For systematic judgment of the MDF property, the hot press temperature values are drawn against water resistance. The water resistance property shows dramatic behavior against temperature and the strength for MDF is fluctuating. At temperature of 140°C, the water resistance value is 29.2%, as shown in Figure 7. However, when the temperature increases from 140°C to 160°C, the water resistance value decreases from 29.2% to 18%. At 160°C, the water resistance value is ideal and the strength of MDF is at its peak. But as the temperature further increases from 160°C to 170°C, the water resistance value slightly decreases from 18% to 17.9%. However, at maximum recorded temperature, its value again increases. This fluctuating behavior of water resistance is the high temperature difference between the surface and core layer [21].

Figure 7: Relationship between hot press temperature and water resistance of MDF.

4. Conclusions

The MDF is of medium density, the moisture content of fibers in raw board is not high, and the raw board is thick but loose and poor in heat conductivity. The heating is mostly by means of contact transfer. Therefore, the temperature difference between the surface and core of the raw board is high. To ensure full solidification temperature of different glues, usually, 160–180°C is selected. The selection of temperature also depends on other factors such as the raw materials, type of trees, and moisture content in raw board, glue property, thickness of raw board, heating method, heating time, and pressure. It is shown in above results that the performance of MDF is closely related to hot pressing temperature. The strength and water resistance of the product are improved with the increase of hot pressing temperature from 140°C to 160°C; the MOR will be increased by 9.8%, the IB bond will be increased by 33.6%, the water absorption will be decreased by 38.2%, and the thickness expansion rate will be decreased by 15.2%. This is because, with the rise of hot pressing temperature, the lapse of the temperature on the surface and core layer of the raw board will be increased, the thermal conduction will be expedited, and the core layer temperature will rise quickly. So that the glue can flow better and be evenly distributed between the fibers; thus it can be thoroughly solidified. In addition, the rise of temperature may reinforce the degradation of chemical consumption in fiber thus to enhance the activity of fiber for easy bond between the fibers. But if the temperature continues to rise up to 185°C, the strength and water resistance of board may be decreased, which might be caused by degradation and brittleness of the resin. The determination of hot pressing temperature is related to the thickness and density of product. To produce the product with a density of 0.6 gm/cm³ and thickness of 11 mm, the temperature difference between the surface and core layer of the raw board may be high up to 40–60°C. A higher temperature difference will cause difficulty in production of thick boards. This is because the surface fiber of raw board is in direct contact with the hot pressing plate and the glue in the surface fiber will be solidified in the short time. However, it will take longer time for the core layer to reach this solidifying temperature, so that this will surely extend the hot pressing cycle. If we increase the temperature to enhance the heat transfer effect, this might cause the degradation of surface fiber and oversolidifying of the glue. Therefore, a lot of new technologies are being developed for the technology of heating medium. For example, when carrying out contact heating of the raw boards, addition of high-frequency heating and adoption of spray cooking can play a positive role in quickly increasing the temperature of raw boards, shortening the pressurizing time, and improving the performance of the products.

Competing Interests

The authors declare that there are no competing interests regarding the publication of this paper.

References

A. Ashori, A. Nourbakhsh, and A. Karegarfard, “Properties of medium density fiberboard based on bagasse fibers,” Journal of Composite Materials, vol. 43, no. 18, pp. 1927–1934, 2009.

N. Ayrilmis, S. Jarusombuti, V. Fueangvivat, and P. Bauchongkol, “Effects of thermal treatment of rubberwood fibres on physical and mechanical properties of medium density fibreboard,” Journal of Tropical Forest Science, vol. 23, no. 1, pp. 10–16, 2011.

W. Gul, A. Khan, and A. Shakoor, “Improving physical and mechanical properties of medium density fiberboard,” in Proceedings of the 4th International Conference on Aerospace Science and Engineering (ICASE '15), pp. 57–62, Islamabad, Pakistan, September 2015.

W. Gul, A. Khan, and A. Shakoor, “Investigation and analysis of Tamarix aphylla (Ghaz wood) and Populus caspica (poplar wood) used as raw materials for manufacturing of Medium Density Fiberboard (MDF),” Journal of Advanced Materials Science, 2016.

J. J. Balatinecz and D. E. Kretschmann, “Properties and Utilization of Poplar Wood,” in Poplar Culture in North America, part A, pp. 277–291, 2001.

S. B. Halvarsson, H. Edlund, and M. Norgren, “Wheat straw as raw material for manufacture of straw Mdf,” BioResources, vol. 5, no. 2, pp. 1215–1231, 2010.

Z. Ibrahim, A. Abdul Aziz, R. Ramli, W. H. WanHassan, and N. H. Zainal, “Optimum parameters for the production of MDF using 100% oil palm trunks,” MPOB Information Series 566, 2006.

Ü. Büyüksari, S. Hiziroglu, H. Akkılıç, and N. Ayrılmış, “Mechanical and physical properties of medium density fiberboard panels laminated with thermally compressed veneer,” Composites Part B: Engineering, vol. 43, no. 2, pp. 110–114, 2012.

A. Kargarfard, A. Nourbakhsh, and H. Hosseinkhani, “Investigation on Medium Density Fiberboard (MDF) properties produced from horn beam wood,” Pajouhesh-va-Sazandegi, vol. 20, no. 1, pp. 25–31, 2007.

A. Kargarfard and A. Jahan-Latibari, “The performance of corn and cotton stalks for medium density fiberboard production,” BioResources, vol. 6, no. 2, pp. 1147–1157, 2011.

S. Lee, T. F. Shupe, and C. Y. Hse, “Mechanical and physical properties of agro-based fiberboard,” Holz als Roh-und Werkstoff, vol. 64, no. 1, pp. 74–79, 2006.

L. M. H. Carvalho, M. R. N. Costa, and C. A. V. Costa, “A global model for the hot-pressing of MDF,” Wood Science and Technology, vol. 37, no. 3-4, pp. 241–258, 2003.

K. Li, “On determining density and specific heat of New Zealand medium density fibreboard,” Procedia Engineering, vol. 62, pp. 769–177, 2013.

X. Li, Physical, Chemical, and Mechanical Properties of Bamboo and Its Utilization Potential for Fiberboard Manufacturing, Beijing Forestry University, Beijing, China, 2004.

G. Mantanis and J. Berns, “Strawboards bonded with urea formaldehyde resins,” in Proceedings of the 35th International Particleboard/Composite Materials Symposium Proceedings, pp. 137–144, April 2001.

B. Mohebby, F. Ilbeighi, and S. Kazemi-Najafi, “Influence of hydrothermal modification of fibers on some physical and mechanical properties of medium density fiberboard (MDF),” Holz als Roh- und Werkstoff, vol. 66, no. 3, pp. 213–218, 2008.

M. Nazerian, A. Dalirzadeh, and S. R. Farrokhpayam, “Use of almond shell powder in modification of the physical and mechanical properties of medium density fiberboard,” BioResources, vol. 10, no. 1, pp. 169–181, 2014.

R. Ramli, S. Shaler, and M. A. Jamaludin, “Properties of medium density fibreboard from oil palm empty fruit bunch fibre,” Journal of Oil Palm Research, vol. 14, no. 2, pp. 34–40, 2002.

J. Valenzuela, E. Von Leyser, A. Pizzi, C. Westermeyer, and B. Gorrini, “Industrial production of pine tannin-bonded particleboard and MDF,” European Journal of Wood and Wood Products, vol. 70, no. 5, pp. 735–740, 2012.

J. E. Winandy and A. M. Krzysik, “Thermal degradation of wood fibers during hot-pressing of MDF composites: part I. Relative effects and benefits of thermal exposure,” Wood and Fiber Science, vol. 39, no. 3, pp. 450–461, 2007.

W. Xu, “Influence of vertical density distribution on bending modulus of elasticity of wood composite panels: a theoretical consideration,” Wood and Fiber Science, vol. 31, no. 3, pp. 277–282, 1999.