Advances in Materials Science and Engineering
Volume 2018 (2018), Article ID 1763918, 1 page
https://doi.org/10.1155/2018/1763918

Corrigendum

Corrigendum to “The Size Stability of Alginate Beads by Different Ionic Crosslinkers”

Shu-Ling Huang, Ming-Yuan Lee, and Yung-Sheng Lin

Department of Chemical Engineering, National United University, Miaoli, Taiwan

Correspondence should be addressed to Yung-Sheng Lin; linys@nuu.edu.tw

Received 14 May 2018; Accepted 17 May 2018; Published 18 July 2018

Copyright © 2018 Shu-Ling Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “The Size Stability of Alginate Beads by Different Ionic Crosslinkers” [1], Mr. Ming-Yuan Lee, who contributed to the writing of the article, was missing from the authors’ list. The corrected authors’ list is shown above.

References

S.-L. Huang and Y.-S. Lin, “The size stability of alginate beads by different ionic crosslinkers,” Advances in Materials Science and Engineering, vol. 2017, Article ID 9304592, 7 pages, 2017.