Advances in Materials Science and Engineering
Volume 2018 (2018), Article ID 9853148, 10 pages
https://doi.org/10.1155/2018/9853148

Research Article

Triaxial Wetting Test on Rockfill Materials under Stress Combination Conditions of Spherical Stress p and Deviatoric Stress q

Yan-yi Zhang,¹ Ze-ping Xu,¹ Gang Deng,¹ Yan-feng Wen,¹ Shu Yu,¹ and Xiao-hui Wang²

¹Department of Geotechnical Engineering, State Key Laboratory of Simulation and Regulation of Water Cycle in River Basin, China Institute of Water Resources and Hydropower Research, Beijing 100048, China
²Beijing Wote Water Technology Company, Beijing 100048, China

Correspondence should be addressed to Yan-yi Zhang; 29791995@qq.com

Received 5 February 2018; Accepted 14 May 2018; Published 30 May 2018

Academic Editor: Rui Wang

Copyright © 2018 Yan-yi Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A GCTS medium-sized triaxial apparatus is used to conduct a single-line method wetting test on three kinds of rockfill materials of different mother rocks such as mixture of sandstone and slate, and dolomite and granite, and the test stress conditions is the combination of spherical stress p and deviatoric stress q. The test results show that (1) for wetting shear strain, the effects of spherical stress p and deviatoric stress q are equivalent, and wetting shear strain and deviatoric stress q show the power function relationship preferably. (2) For wetting volumetric strain, the effect of deviatoric stress q can be neglected because it is extremely insignificant, and spherical stress p is the main influencing factor and shows the power function relationship preferably. (3) The wetting strains decrease significantly with the increase in initial water content and sample density generally, but the excessively high dry density will increase the wetting deformation. Also, the wetting strains will decrease with the increase in the saturated uniaxial compressive strength and average softening coefficient of the mother rock. Based on the test results, a wetting strain model is proposed for rockfill materials. The verification results indicate that the model satisfactorily reflects the development law of wetting deformation.

1. Introduction

During the impounding process of core-wall rockfill dam, the rockfill materials of upstream dam shell usually experience the transition from “dry” to “wet.” Therefore, materials will be softened to a certain extent. The contact parts of the particles may be fragmented, thus the internal structure of rockfill body may be adjusted. It will eventually produce significant wetting deformation which may cause local collapsibility and threatens the dam safety.

In 1972, based on some monitoring data of dam bodies, Nobari and Duncan [1] investigated the development laws of stress and strain of earth-rockfill dams in impoundment and paid close attention to the effect of water on material properties. Since then, numerous wetting studies have been conducted on various kinds of rockfill materials [2–6], and multiple wetting models for rockfill materials have been developed [7–15]. The wetting test usually is adopted with two methods of “double-line” and “single-line.” The previous studies show that the single-line wetting test coincides with the process of impounding and wetting preferably [12, 16]. In single-line wetting tests, the stress conditions are usually adopted: the combination of confining pressure σ₃ and stress level Sl, and the wetting model usually expressed as a function of confining pressure σ₃ and stress level Sl. Actually, the impoundment process of the dam is usually accompanied by the simultaneous changes with confining pressure σ₃ and stress level Sl. As Shen analysed [17] (Figure 1), during the rise of water level, the spherical stress of upstream dam shell rockfill materials clearly decreases, the deviatoric stress slightly changes, and the stress level increases. Generally, volumetric strain εv and shear strain εs have closer relationships with spherical stress p and deviatoric stress q, respectively, and as the basic variables, spherical stress p and deviatoric stress q are usually adopted in some models including Cambridge elastic–plastic model and its modified model [18, 19]. On that account, it is more favourable to adopt spherical stress p and deviatoric stress q as the basic variables of wetting tests and models.

Figure 1: Stress circle change caused by impounding [1].

In this study, a single-line wetting test conducted by a medium-sized triaxial apparatus is introduced using three kinds of rockfill materials whose mother rocks are the mixed of sandstone and slate and dolomite and granite . Spherical stress p and deviatoric stress q are used as the stress combination. The effects of spherical stress p and deviatoric stress q on the wetting deformation of rockfill materials are investigated.

2. Test Scheme

2.1. Test Materials and Equipment

For the mixed rockfill materials, the mother rocks consist of sandstone (∼60%) and slate (∼40%). Sandstone has a saturated uniaxial compressive strength of >60 MPa and an average softening coefficient of 0.77, and slate has a saturated uniaxial compressive strength of 30–40 MPa and an average softening coefficient of 0.67. Dolomite has a saturated uniaxial compressive strength of 45–85 MPa and an average softening coefficient of 0.67–0.87, and granite has a saturated uniaxial compressive strength of 62–94 MPa and an average softening coefficient of 0.80–0.97.

The rockfill materials of natural gradation have a maximum particle size of 600 mm. According to the test methods of soils [20], the method of mixing gradation scale is used to obtain the test gradation in which the maximum particle size is 40 mm. The gradation curves of rockfill materials are shown in Figure 2, and the gradation data are shown in Table 1. The triaxial test apparatus manufactured by GCTS (USA) is used. Both the confining and axial pressures are provided using a servo pressure controller with a pressure control precision of 0.5 kPa. A confining pressure–volume controller is used to measure the change of water quantity in the confining pressure cell with the measurement accuracy of 0.01 ml. The test sample diameter is 200 mm and the height is 400 mm.

Figure 2: Grain-size distribution curve of test material.

Table 1: Grain-size distribution data of test material.

Materials
Percentage passing (%)
d₆₀
d₃₀
d₁₀
Cu
Cc

600
400
200
100
60
40
20
10
5
2
1
0.25

Prototype
100
91
77.5
64.8
55.8
48.8
39.0
31.0
23.5
15.0
9.5
5
76
9.1
1.1
69
0.9

Test
—
—
—
—
—
100.0
70.4
50.7
26.0
18.0
13.0
5
14
5.8
0.7
20
3.4

2.2. Test Procedure

Firstly, the confining pressure σ₃ and axial stress σ₁ based on the designed stress conditions are calculated. Secondly, the confining pressure is applied and the designed confining pressure stable was kept until the specimen deformation is stable under the isotropic stress. The sample is in contact with the atmosphere during this process. Thirdly, the axial strain rate (0.5%/min) is adopted until the designed axial stress is reached and also the deformation stability of the specimen under the stress state needs to be achieved. Finally, the sample will gradually be wetted and saturated from bottom to top (the water head of wetting test is about 60 cm). It indicates that the wetting deformation has been completed when no continuous bubbles are observed in the drain pipe; meanwhile, the sample has been stabilized as per the standard of deformation stability. Both under the isotropic stress and wetting process, the stabilization standard of sample deformation is 0.001%/min as the average axial strain rate within 10 min.

The parameters used in this study are provided in the following formulas: spherical stress p = (σ₁ + 2σ₃)/3 and deviatoric stress q = σ₁ − σ₃, where σ₁ and σ₃ represent the axial stress and confining pressure, respectively. Sample volumetric strain εv = , where is the volume change of water in the confining pressure cell, is the volume of the loading piston entering the pressure cell, and is the sample volume after the isotropic stress and deformation stabilization. In this study, volume expansion is taken as negative, and volume compression is taken as positive. Shear strain εs = εa − εv × 1/3, where εa is the axial strain.

3. Wetting Test Results

3.1. Stress Conditions of Equal p and Unequal q

In accordance with the combination of spherical stress p and deviatoric stress q designed in the test, the stress conditions included five spherical stress p conditions, each corresponding to 3–5 deviatoric stress q conditions. The stress conditions of the test and corresponding wetting deformation results are shown in Table 2. The dry density of the test sample is 2.18 g/cm³, the test materials are air-dried, and the water content of test rockfill materials whose maximum size is equal to 5 mm is 0.4%.

Table 2: Test stress conditions and test results (stress conditions of equal p and unequal q).

Test stress
Test results

p (kPa)
q (kPa)
εa (%)
εv (%)
εs (%)

1000
300
0.69
1.17
0.30

500
0.83
1.22
0.42

670
0.95
1.28
0.52

1000
1.24
1.35
0.79

1500
900
1.42
1.85
0.80

1500
1.94
1.93
1.30

1800
2.20
2.01
1.53

2000
900
1.42
2.16
0.70

1500
1.85
2.18
1.12

2000
2.29
2.26
1.53

2400
2.65
2.34
1.87

2500
1250
1.63
2.31
0.86

1670
1.93
2.33
1.15

3000
3.08
2.47
2.26

3000
900
1.40
2.63
0.52

1500
1.85
2.68
0.96

2000
2.22
2.72
1.31

3000
3.05
2.80
2.12

4000
3.95
2.85
3.00

Based on the wetting test results, the curves of wetting volumetric strain and wetting shear strain with deviatoric stress under different spherical stress conditions are plotted, as shown in Figures 3 and 4. As indicated by the results, the deviatoric stress exerts varying effect on both the wetting volumetric strain and shear strain. With the increase in deviatoric stress, the wetting shear strain shows significant increasing trend. The wetting volumetric strain also shows an increasing trend with the increase in deviatoric stress, but the magnitude of increase is not obvious. Corresponding to the five spherical stress conditions, the wetting shear strain increases by about 2.33, 1.0, 1.67, 1.4, and 3.44 times respectively, when deviatoric stress increased from its minimum value to the maximum value. However, the wetting volumetric strain only increases by about 0.15, 0.09, 0.08, 0.07, and 0.08 times, respectively, indicating that the effect of deviatoric stress on wetting volumetric strain is extremely insignificant.

Figure 3: q versus εv curve (stress conditions of equal p and unequal q).

Figure 4: q versus εs curve (stress conditions of equal p and unequal q).

3.2. Stress Conditions of Equal q and Unequal p

Based on the above test, the test under some stress conditions is supplemented. As per the combination of spherical stress p and deviatoric stress q, the test introduced three deviatoric stress q conditions, each corresponding to 3-4 spherical stress p conditions. The stress conditions and wetting deformation results are shown in Table 3. Based on the wetting test results, the curves of wetting volumetric strain and wetting shear strain with spherical stress under deviatoric stress conditions are plotted, as shown in Figures 5 and 6.

Table 3: Test stress conditions and test results (stress conditions of equal q and unequal p).

Test stress
Test results

q (kPa)
p (kPa)
εa (%)
εv (%)
εs (%)

900
1500
1.42
1.85
0.80

2000
1.42
2.16
0.70

3000
1.40
2.63
0.52

1500
1500
1.94
1.93
1.30

2000
1.85
2.18
1.12

3000
1.85
2.68
0.96

3000
2200
3.08
2.47
2.26

2500
3.06
2.65
2.18

2700
3.05
2.80
2.12

3000
1.42
1.85
0.80

Figure 5: p versus εv curve (stress conditions of equal q and unequal p).

Figure 6: p versus εs curve (stress conditions of equal q and unequal p).

The spherical stress shows the relatively obvious effect on both wetting volumetric strain and shear strain. Wetting shear strain decreased with the increase in spherical stress, and the wetting volumetric strain increased with the increase in spherical stress. Corresponding to three deviatoric stress conditions, when spherical stress increased from its minimum value to the maximum value, (i.e., increased by about 2, 2, and 0.36 times, resp.), the wetting shear strain decreases by about 0.35, 0.26, and 0.14 times, and the wetting volumetric strain increased by about 0.42, 0.39, and 0.17 times, respectively. The results indicate that spherical stress exerts the same degree of effect on the wetting volumetric strain and shear strain.

3.3. Initial Water Content

To research the effect of different initial water contents on wetting deformation, the water content of the test materials (maximum size <5 mm) is prepared according to particle weights, and the sample water contents are 5% and 10%. The sample dry density is 2.18 g/cm³. In this test, the spherical stress p is set at 2,000 kPa, and the deviatoric stress q is set at 900 kPa, 1,500 kPa, and 2,400 kPa. The gradation and test procedure of the test materials are the same as described above. The stress conditions and wetting deformation results of the test are shown in Table 4.

Table 4: Test stress conditions and test results (different initial water contents).

ω (%)
Test stress
Test results

p (kPa)
q (kPa)
εa (%)
εv (%)
εs (%)

0.4
2000
900
1.42
2.16
0.70

1500
1.85
2.18
1.12

2400
2.65
2.34
1.87

5
2000
900
1.13
1.65
0.58

1500
1.45
1.70
0.88

2400
2.12
1.75
1.54

10
2000
900
0.45
0.85
0.17

1500
0.76
0.90
0.46

2400
1.36
0.98
1.03

Clearly, with the increase in the sample’s initial water content, the wetting strains decrease significantly, indicating that the initial water content is an important factor influencing the wetting deformation of materials. Under the three deviatoric stress conditions (from low to high), when the initial water content increases from 0.4% to 5%, the wetting volumetric strain decreases by about 0.51%, 0.48%, and 0.59%, and the wetting volumetric strain decreases by about 0.80%, 0.80%, and 0.77%. Under the three deviatoric stress conditions (from low to high), when the initial water content increased from 5 to 10%, the wetting shear strain decreases by about 0.12%, 0.24%, and 0.33%, and the wetting volumetric strain decreases by about 0.41%, 0.42%, and 0.50%, respectively.

The results indicate that the wetting deformation will decrease significantly as the water content of fine particles increases. Adopting suitable watering on materials during dam construction will not only improves the compaction of dam body, but also reduces the wetting deformation.

3.4. Sample Density

To investigate the effect of different sample densities on wetting deformation, two sample dry densities (ρd) are designed, that is, 2.12 g/cm³ and 2.05 g/cm³. In the test, the spherical stress p is 2,000 kPa, and the deviatoric stress q is set at 900 kPa, 1,500 kPa, and 2,400 kPa. The test procedure is the same as described above, and the test materials are air-dried. The stress conditions and wetting deformation results are shown in Table 5.

Table 5: Test stress conditions and test results (different dry densities).

ρd (g/cm³)
Test stress
Test results

p (kPa)
q (kPa)
εa (%)
εv (%)
εs (%)

2.18
2000
900
1.42
2.16
0.70

1500
1.85
2.18
1.12

2400
2.65
2.34
1.87

2.12
2000
900
1.27
1.78
0.68

1500
1.71
1.86
1.09

2400
2.36
1.92
1.72

2.05
2000
900
1.82
2.36
1.03

1500
2.20
2.45
1.38

2400
3.15
2.55
2.30

Clearly, with the increase in sample density, the wetting deformation decreases firstly and then slightly increased, but the wetting deformation shows decreasing trend on the whole when the sample density increases from 2.05 g/cm³ to 2.18 g/cm³, in which when ρd increases from 2.05 g/cm³ to 2.12 g/cm³, the wetting volumetric strain decreases by about 24%, and the wetting shear strain decreases by 20–35%. When ρd increases from 2.12 g/cm³ to 2.18 g/cm³, the wetting volumetric strain increases by 17–22%, and the wetting shear strain increases by 3–10%.

The results indicate that, with the increase in sample density, the porosity of rockfill materials decreased, causing closer contacts among rockfill particles and reducing the wetting deformation. But when the sample density is further increased, more fragmentation of rockfill materials during the sample preparation occurred due to excessively high density resulting in the content of fine particles in the test materials, and the wetting deformation increased consequently. During the filling and compacting process of rockfill materials, it is necessary to adopt appropriate compaction parameters and compaction density so as to reduce the wetting deformation. Especially it should avoid using excessively high compaction density which will make the wetting deformation increased.

3.5. Mother Rock

To study the effect of different the mother rock on wetting deformation, the other two kinds of materials with different mother rocks are adopted, such as dolomite and granite. For all the three materials, the gradation of rockfill materials is the same as shown in Figure 2 and also adopted with the same relative density. The sample density of dolomite and granite materials are 2.22 g/cm³ and 2.05 g/cm³, respectively, and the test materials are also air-dried.

In the test, the spherical stress p is 2,000 kPa, and the deviatoric stress q is set at 900 kPa, 1,500 kPa, and 2,400 kPa. The stress conditions and wetting deformation results are shown in Table 6.

Table 6: Test stress conditions and test results (different mother rocks).

Mother rock
Dr
Test stress
Test results

p (kPa)
q (kPa)
εa (%)
εv (%)
εs (%)

Mixture of sandstone and slate
0.80
2000
900
1.27
1.78
0.68

1500
1.71
1.86
1.09

2400
2.36
1.92
1.72

Dolomite
0.80
2000
900
0.87
1.19
0.47

1500
1.15
1.25
0.73

2400
1.63
1.32
1.19

Granite
0.80
2000
900
0.26
0.40
0.13

1500
0.40
0.43
0.26

2400
0.58
0.45
0.43

The test results show that the mother rock has significant effect on wetting deformation. For the three kinds of test materials, the saturated uniaxial compressive strength and average softening coefficient of the mother rock decrease generally from granite, and dolomite to mixed materials. And both the wetting volumetric strain and wetting shear strain increase significantly 3–5 times, respectively, than granite materials. For granite materials, the wetting volumetric strain is just about 0.4%, and the wetting shear strain is just 0.1–0.4%; it shows that there is just slight wetting deformation for the rock with high strength due to less particle breakage during wetting process.

4. Single-Line Wetting Model

4.1. Wetting Shear Strain Model

As indicated by the deformation trend of wetting shear strain in Section 3, the wetting shear strain and deviatoric stress p show relatively good power function relationship; the test results and power function fitting curves are plotted, as shown in Figure 7.

Figure 7: q/pa versus εs curve (fitting of wetting shear strain).

To be specific, the wetting test results are shown by icons of different shapes, and the power function relationships are expressed by curves. The relationship expression can be expressed as follows:

where and are the fitting parameters related to the spherical stress , is the wetting deviatoric stress, and is the standard atmospheric pressure, mainly introduced for the purpose of coordinating the magnitudes of deviatoric stress and wetting strain. Parameter mainly represents the development of the magnitude of wetting shear strain with normalized deviatoric stress , and parameter mainly represents the development speed of the magnitude of wetting deformation with normalized deviatoric stress .

The following values can be seen:

p = 1000 kPa, εs = 0.108 × (q/pa)0.857, R² = 0.98p = 1500 kPa, εs = 0.105 × (q/pa)0.929, R² = 0.99p = 2000 kPa, εs = 0.071 × (q/pa)1.027, R² = 0.99p = 2500 kPa, εs = 0.050 × (q/pa)1.120, R² = 0.99p = 3000 kPa, εs = 0.039 × (q/pa)1.177, R² = 0.99

Clearly, during deviatoric stress q approached 0, the stress conditions of the sample are close to isotropic state, and the wetting shear strain approaches 0 as well. The trend indicates that under isotropic conditions, the wetting shear strain of rockfill materials is not obvious. When the deviatoric stress q increased, the corresponding confining pressure decreased, the axial stress increased, and the sample is at relatively high stress level. At this state, the wetting shear strain increases obviously and indicates that the effect of deviatoric stress on wetting shear strain is relatively significant.

Both the parameters a and b are related to spherical stress p and the relationship curves of the two parameters with normalized spherical stress p are plotted, as shown in Figure 8.

Figure 8: a, b versus p/pa curve (fitting of parameters a and b).

The wetting parameters a and b show relatively good linear relationship with normalized spherical stress. The curves indicate that

The calculation formula for wetting shear strain can be deduced from (1) and (2):

The following values can be seen:

a = 0.1515 − 0.0039 × (p/pa), R² = 0.95b = 0.6893 + 0.0166 × (p/pa), R² = 0.99

The results indicate that the wetting shear strain is related to h, f, k, and . The wetting shear strain parameters of the test materials are as follows: h = 0.1515, f = 0.0039, k = 0.6893, and  = 0.0166. After substituting the wetting parameters into the calculation (3), the wetting shear strain of model calculation can be obtained. Comparison with the wetting shear strain measured experimentally and the model calculated are shown in Figure 9. The model calculation and experimental results show consistent trends (the test and model data are shown in Table 7), and the shear strain model relatively satisfactorily reflect the wetting test results.

Figure 9: εs versus q curve (comparison of experimental and model results).

Table 7: Test stress conditions and results (compared with test results and model results for εs).

Test stress
εs

p (kPa)
q (kPa)
Test results (%)
Model results (%)
Deviation (%)

1000
300
0.30
0.29
−4.03

500
0.42
0.45
5.56

670
0.52
0.57
9.37

1000
0.79
0.81
2.05

1500
900
0.80
0.73
−9.02

1500
1.30
1.18
−8.97

1800
1.53
1.40
−8.46

2000
900
0.70
0.69
−0.97

1500
1.12
1.17
3.97

2000
1.53
1.57
2.09

2400
1.87
1.89
0.94

2500
1250
0.86
0.88
2.15

1670
1.15
1.21
4.89

3000
2.26
2.31
2.36

3000
900
0.52
0.47
−10.46

1500
0.96
0.86
−10.17

2000
1.31
1.21
−7.90

3000
2.12
1.96
−7.54

4000
3.00
2.75
−8.22

4.2. Wetting Volumetric Strain Model

As indicated by the above results, spherical stress p is the main factor influencing the wetting volumetric strain, and deviatoric stress q exerts an extremely insignificant effect on wetting volumetric strain. Therefore, the effect of deviatoric stress on wetting volumetric strain in the wetting volumetric strain model is neglected. The relationship curves between normalized spherical stress p of different magnitudes and wetting volumetric strain εv are plotted, as shown in Figure 10.

Figure 10: p/pa versus εv curve (comparison of experimental and model results).

Clearly, under the same spherical stress p conditions, with the increase in spherical stress p, the wetting volumetric strain εv increases with a change law of power function as

where is the wetting volumetric strain, and are the test parameters of wetting volumetric strain, which are the same for the same material under the same test conditions and is the wetting spherical stress.

The following values can be seen:

εv = 0.3249 × (p/pa)0.6287, R² = 0.94

The wetting volumetric strain parameters of the test materials are as follows: s = 0.3249, and t = 0.6287. Clearly, the model calculation and experimental results are consistent, and the experimental and model data are shown in Table 8.

Table 8: Test stress conditions and results (compared with test results and model results for εv).

Test stress
εv

p (kPa)
q (kPa)
Test results (%)
Model results (%)
Deviation (%)

1000
300
1.17
1.33
−13.57

500
1.22
1.33
−8.89

670
1.28
1.33
−3.84

1000
1.35
1.33
1.55

1500
900
1.85
1.75
5.40

1500
1.93
1.75
9.33

1800
2.01
1.75
12.93

2000
900
2.16
2.13
1.50

1500
2.18
2.13
2.40

2000
2.26
2.13
5.87

2400
2.34
2.13
9.08

2500
1250
2.31
2.48
−7.16

1670
2.33
2.48
−6.24

3000
2.47
2.48
−0.23

3000
900
2.63
2.80
−6.54

1500
2.68
2.80
−4.55

2000
2.72
2.80
−3.01

3000
2.80
2.80
−0.07

4000
2.85
2.80
1.68

5. Model Verification

The relationship curves of wetting shear strain εs and normalized wetting deviatoric stress q under sample density, initial water content, and mother rock conditions are plotted, as shown in Figures 11–13, respectively. Under the three kinds of test conditions, the correspondence between wetting shear strain εs and normalized wetting deviatoric stress q can be relatively satisfactorily simulated with a power function in each case, and the fitting curves show very high correlation with the test results.

Figure 11: q/pa versus εs curve (different sample dry density conditions).

Figure 12: q/pa versus εs curve (different initial water content conditions).

Figure 13: q/pa versus εs curve (different mother rocks).

The following results can be seen:

ρd = 2.05 g/cm³, εs = 0.135 × (q/pa)0.888, R² = 0.95ρd = 2.12 g/cm³, εs = 0.083 × (q/pa)0.953, R² = 0.99ρd = 2.18 g/cm³, εs = 0.071 × (q/pa)1.027, R² = 0.99ω = 0.4%, εs = 0.071 × (q/pa)1.027, R² = 0.99ω = 5%, εs = 0.054 × (q/pa)1.051, R² = 0.98ω = 10%, εs = 0.004 × (q/pa)1.782, R² = 0.99Mixture of sandstone and slate: εs = 0.083 × (q/pa)0.953, R² = 0.99Dolomite: εs = 0.055 × (q/pa)0.966, R² = 0.99Granite: εs = 0.011 × (q/pa)1.164, R² = 0.99

The curves between wetting volumetric strain εv and normalized deviatoric stress q under sample density, initial water content, and mother rock conditions are plotted, as shown in Figures 14–16, respectively. Under the three kinds of test conditions, wetting volumetric strain εv and normalized deviatoric stress q uniformly shows linear function relationship, and the fitting curves shows very high correlation with the test results. However, the slope of the linear relationship curves indicates the insignificant effect of deviatoric stress q on the wetting volumetric strain.

Figure 14: q/pa versus εv curve (different sample dry density conditions).

Figure 15: q/pa versus εv curve (different initial water content conditions).

Figure 16: q/pa versus εv curve (different mother rock).

The following results can be seen:

ρd = 2.05 g/cm³, εv = 2.252 + 0.012 × (q/pa), R² = 0.99ρd = 2.12 g/cm³, εv = 1.707 + 0.009 × (q/pa), R² = 0.92ρd = 2.18 g/cm³, εv = 2.027 + 0.012 × (q/pa), R² = 0.82ω = 0.4%, εv = 2.027 + 0.012 × (q/pa), R² = 0.82ω = 5%, εv = 1.595 + 0.007 × (q/pa), R² = 0.97ω = 10%, εv = 0.771 + 0.009 × (q/pa), R² = 0.99Mixture of sandstone and slate: εv = 1.707 + 0.009 × (q/pa), R² = 0.92Dolomite: εv = 1.116 + 0.009 × (q/pa), R² = 0.99Granite: ε = 0.375 + 0.003 × (q/pa), R² = 0.90

6. Conclusions

A single-line wetting test is conducted on three kinds of rockfill materials of different mother rocks such as mixed of sandstone and slate, and dolomite and granite under the stress combination conditions of spherical stress p and deviatoric stress q, and the effects of initial water content, sample density, and mother rocks on the wetting deformation also are performed. The relationships between wetting strain characteristics and stress conditions are obtained. Based on the wetting test on rockfill materials under different stress conditions, a wetting strain model for rockfill materials and the related wetting parameters are proposed, and the model is verified with several test conditions. The verification results indicate that the model relatively satisfactorily reflects the development trend of wetting deformation. It should be noted that the process of the wetting deformation of rockfill materials is complex, and it is affected by numerous factors. In order to improve the accuracy of the wetting model, further studies are still needed.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Acknowledgments

This research was supported by the National Key Research and Development Program of China (Grant no. 2017YFC0404803), the National Nature Science Foundation of China (Grant no. 51379221), and the IWHR Research and Development Support Program (GE0145B562017).

References

E. S. Nobari and J. M. Duncan, “Effect of reservoir filling on stress and movement in earth and rockfill dam,” Department of Civil Engineering, University of California, Berkeley, CA, USA, 1972, Report TE-72-1.

L. I. Guang-xin, “Study on wetting of rock fill,” Chinese Journal of Geotechnical Engineering, vol. 12, no. 5, pp. 198–205, 1990.

C. Zhan-lin, Z. Yong-zhen, D. Hong-shun et al., “Wetting characteristics of coarse-grained materials,” Chinese Journal of Geotechnical Engineering, vol. 32, no. 2, pp. 243–247, 2010.

B. Shu-tian, Z. Xiao-guang, and C. Hua-yi, “Physical mechanical properties of soft rock materials,” Journal of Hydroelectric Engineering, vol. 79, no. 4, pp. 34–44, 2002.

F. Hua, H. Hua-qiang, and Z. Xiao-ju, “Experimental study on slacking deformation properties of rockfill,” Journal of Water Resources and Architectural Engineering, vol. 8, no. 4, pp. 50–53, 2010.

Y. Zong-ze, F. Yu-qi, and Z. Jin-fu, “Trixial test research on wetting deformation for materials of Xiaolangdi arch and rock fill dam,” Advances in Science and Technology of Water Resources, vol. 13, no. 4, pp. 73–76, 1993.

E. S. Nobari and J. M. Duncan, “Movement in dams due to reservoir filling,” in Proceedings of Performance of Earth and Earth Supported Structures, vol. 1, Part 1, Lafayette, IN, USA, June 1973.

Q. Jia-huan and Y. Zong-ze, Theory and Calculation Soil Engineering, China Water Power Press, Beijing, China, 1996.

S. Zhu-jiang and W. Jian-ping, “Numerical simulation of construction behavior of clay core dam and its movement due to reservoir impounding,” Journal of Nanjing Hydraulic Research Institute, no. 4, pp. 48–63, 1988.

L. Zu-de, “Some problems about the calculation of deformation of earth-rock dams,” Chinese Journal of Geotechnical Engineering, vol. 5, no. 1, pp. 1–13, 1983.

L. Guo-ying, S. Zhu-jiang, and Z. Kui-zhi, “Stress-strain analysis on second cofferdam of Three Gorges project,” Hydro-Science and Engineering, vol. 3, no. 1, pp. 40–47, 1997.

Z. Jun-gao, M. A. Alsakran, G. Xuan et al., “Triaxial test on wetting deformation behaviour of a slate rockfill material,” Chinese Journal of Geotechnical Engineering, vol. 35, no. 1, pp. 170–174, 2013.

Y. Xiao-long, Study on Wetting Deformation and Liquefaction Potential of Filters for Earth and Rockfill Dams, Dalian University of Technology, Dalian, China, 2015, Masteral Dissertation.

L. Xiang, C. Guo-xing, and S. Tian, “Experimental research on wetting deformation and strength of weathered granite,” Rock and Soil Mechanics, vol. 33, no. 11, pp. 3313–3317, 2012.

C. Shi-chun and Z. Xiong-xiong, “Slaking deformation model for rockfill materials,” Chinese Journal of Geotechnical Engineering, vol. 39, no. 1, pp. 48–55, 2017.

S. Zhen-yuan, J. Xin-wen, and H. Hua-qiang, “Influence of different test methods on wetting characteristics of rockfill materials,” Journal of Water Resources and Architectural Engineering, vol. 16, no. 1, pp. 189–193, 2018.

S. Zhu-jiang, “Some considerations on stress-strain analysis of earth and rockfill dams,” Journal of Hydroelectric Engineering, no. 2, pp. 12–21, 1985.

K. H. Roscoe, A. N. Schofield, and C. P. Wroth, “On yielding of soils,” Geotechnique, vol. 8, no. 1, pp. 22–53, 1958.

K. H. Roscoe and J. B. Burland, “On the generalized stress-strain behavior of “wet”clay,” in Engineering Plasticity, J. Heyman and F. A. Leckie, Eds., pp. 535–609, Cambridge University Press, Cambridge, UK, 1968.

SL237-1999, Specification of Soil Test, The Professional Standards Compilation Group of People’s Republic of China, China Water Power Press, Beijing, China, 1999.