Advances in Orthopedics

Volume 2012 (2012), Article ID 496817, 7 pages

doi:10.1155/2012/496817

Clinical Study

Skipping Posterior Dynamic Transpedicular Stabilization for Distant Segment Degenerative Disease

Bilgehan Solmaz,¹ Ahmet Levent Aydin,² Cengiz Gomleksiz,³ Yaprak Ataker,⁴ Mehdi Sasani,⁵ Tunc Oktenoglu,⁵ and Ali Fahir Ozer⁶

¹Neurosurgery Department, Medistate Hospital, Istanbul, Turkey

²Neurosurgery Department, Istanbul Physical Therapy and Rehabilitation Training Hospital, Istanbul, Turkey

³Neurosurgery Department, School of Medicine, Mengücek Gazi Training and Research Hospital, Erzincan University, Erzincan, Turkey

⁴Physical Therapy and Rehabilitation Department, American Hospital, Istanbul, Turkey

⁵Neurosurgery Department, American Hospital, Istanbul, Turkey

⁶Neurosurgery Department, School of Medicine, Koc University, Istanbul, Turkey

Received 6 June 2012; Accepted 24 August 2012

Academic Editor: Deniz Erbulut

Copyright © 2012 Bilgehan Solmaz et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. To date, there is still no consensus on the treatment of spinal degenerative disease. Current surgical techniques to manage painful spinal disorders are imperfect. In this paper, we aimed to evaluate the prospective results of posterior transpedicular dynamic stabilization, a novel surgical approach that skips the segments that do not produce pain. This technique has been proven biomechanically and radiologically in spinal degenerative diseases. Methods. A prospective study of 18 patients averaging 54.94 years of age with distant spinal segment degenerative disease. Indications consisted of degenerative disc disease (57%), herniated nucleus pulposus (50%), spinal stenosis (14.28%), degenerative spondylolisthesis (14.28%), and foraminal stenosis (7.1%). The Oswestry Low-Back Pain Disability Questionnaire and visual analog scale (VAS) for pain were recorded preoperatively and at the third and twelfth postoperative months. Results. Both the Oswestry and VAS scores showed significant improvement postoperatively (). We observed complications in one patient who had spinal epidural hematoma. Conclusion. We recommend skipping posterior transpedicular dynamic stabilization for surgical treatment of distant segment spinal degenerative disease.

1. Introduction

The most frequent clinical problem of the adult spine is back pain. It is known that 60–80% of the population will have back pain at some point in their lives that may affect their general health, daily activities, and their working capacity. It is assumed that back pain only has a defined pathology in 15% of patients [1], and dysfunctional segmental motion and discogenic pain are problems that may need to be treated surgically. According to Bertagnoli, disc-related spinal problems could be treated because of the state of degenerative segmental alterations [2]. Those at an earlier stage of disc degeneration may respond to the conservative treatment. More advanced disc degeneration may require open-disc surgery, especially concomitant nerve root compression. Fusion surgery is usually indicated in more advanced segmental degeneration. Discectomy and fusion are performed with the aim of reducing pain and eliminating neural compression rather than restoring disc or segmental function. Researchers have demonstrated the benefits of fusion over nonsurgical treatment in the alleviation of chronic low-back pain [3, 4]. Although studies have shown improvements in the instrumentation techniques that have increased the radiological fusion rate to >94%, they have failed to provide evidence of actual improvements in clinical outcome [5].

Retrospective clinical studies have demonstrated that the lumbar fusion can lead to an acceleration in pathologic changes of the adjacent motion segment [6]. The quest for a more physiological surgical solution than fusion has initiated the so-called nonfusion technologies. One of them, posterior dynamic stabilizing implants, is intended to realign and stabilize one or more linked vertebral segments without complete immobilization of the segments. Therefore, we planned a novel surgical approach using posterior dynamic transpedicular stabilization (PDTS) to relieve pain and reduce morbidity and mortality. This paper presents prospective results of skipping the segments that do not cause pain. This technique is proven biomechanically and radiologically as a surgical approach of PDTS in spinal degenerative diseases.

2. Materials and Methods

This study included 18 patients averaging 54.94 years of age; there were 10 females and 8 males. Our selection criteria for this procedure included any neurogenic, radicular pain and/or chronic low-back pain that was resistant to any conservative treatment and neurological deficit. The level of provocative pain was determined by discography in cases where the source of pain was not confirmed by clinical and radiological findings (Figure 1). Radiological evaluations prior to magnetic resonance (MR) (Figure 2) and after surgery consisted of anteroposterior (AP) and lateral X-ray studies (Figure 3). Primary indications, demographic data, and details of the operations performed are shown in Table 1.

Table 1: Patient demographic data.

Patient No.
Gender
Age
Preoperative neurological findings
Radiologic findings (X-Ray, MRI)
Operation
Complication

1
M

66
Bilateral SLR 30°+

Left FST+

Left gastrocnemius 2/5 MW
Left L3-4 HNP

Right L5-S1 HNP

L3-4 spinal stenosis

Left L3-4, right L5-S1 microlumbar discectomy

L3-4, L5-S1 PDI
None

2
F

60
LBP
L3-4, L4-5 DDD
L3-4, L4-5 PDI
None

3
F
48
LBP

Left FST+

Left SLR 60°+
Left L3-4 HNP

Right L5-S1 HNP
Left L3-4, right L5-S1 microlomber discectomy

L3-4, L5-S1 PDI
None

4
F
74
LBP

Left L5 dermatomal hypoesthesia
L1-2, L4-5 spinal stenosis
L1, L4 hemilaminectomy

L1-2, L4-5 PDI
None

5
F
60
LBP

Left SLR 60°+
L1-2 midline HNP

L5-S1 left HNP
Right L1-2, left L5-S1 microlumbar discectomy +

L1-2 and L5-S1 PDI
None

6
M
40
LBP
T11-T12, L1-2 DDD
T11-T12, L1-2 PDI
None

7
F
54
LBP
L2-3, L4-5, DDD, spondylolisthesis
L2-3, L4-5 PDI
None

8
M
53
LBP
L5-S1 and L1-2, L2-3 DDD
L1-2, L2-3, L5-S1 PDI
None

9
M
47
LBP

Right SLR 45°+

S1 dermatomal hypoesthesia
L3-4 DDD

right L5-S1 HNP
Right L5-S1 microlomber discectomy

L3-4, L5-S1 PDI
None

10
M
29
LBP
L3-4, L5-S1 DDD
L3-4, L5-S1 PDI
None

11
F
49
Left FST+

Left SLR 30°+

Left achilles reflex hypoactive

Left gastrocnemius L5-S1 1/5 MW

Left T12-L1 HNP

Left L5-S1 HNP

L4-5 retrolisthesis
Left T12-L1, L5-S1 microlomber discectomy

L4-5-S1 PDI
None

12
F
74
LBP
L3-4, L5-S1 DDD
L3-4, L5-S1 PDI
Spinal epidural hematoma

13
M
50
LBP

Left SLR 45°

Left L4 dermatomal paresthesia
Left L3-4, L5-S1 HNP

Foraminal stenosis
Left L3-4, L5-S1 microlomber discectomy

L3-4, L5-S1 PDI
None

14
F
48
LBP
L1-2 HNP,

L1-2, L4-5, L5-S1 DDD
Left L1-2 microlomber discectomy

Left L4-5 microlomber decompression, L1-2, L4-5-S1 PDI
None

15
M
73
LBP
L5-S1 DDD

T12-L2 foraminal stenosis
L5-S1, microlomber discectomy

L5-S1, T12-L2 PDI
None

16
F
68
LBP
L2-3, L5-S1 DDD
L2-3, L5-S1 PDI
None

17
F
54
LBP
L1–3 and L4-5 DDD
L1–3 and L4-5 PDI
None

18
M
42
LBP
L2-3 and L4-5 DDD
L2-3 and L4-5 PDI
None

PDI: posterior dynamic instrumentation, FST: femoral stretching test, SLR: straight leg rising, HNP: hernia nucleus pulposus, LBP: lower back pain, and DDD: degenerative disc disease.

Figure 1: Provocative discography shows degeneration of the disc.

Figure 2: The patient has two distinct degenerative disc diseases in the spine. The rest of the vertebral column has no problem.

Figure 3: Two different levels of posterior dynamic stabilizations were performed in the same patient.

Statistical Methods

The Oswestry Disability Index (ODI) and the visual analog scale (VAS) were used for preoperative and postoperative subjective patient evaluations.

Preoperative and postoperative values (VAS and ODI) were compared with the Wilcoxon ranked sum test.

3. Results

Oswestry scale and VAS scale values were compared between the following groups: preoperative and 3-month postoperative, preoperative and 12-month postoperative, 3-month postoperative and 12-month postoperative. We observed significant changes between the groups. The preoperative mean Oswestry scale score was 68.00, the 3-month postoperative mean Oswestry scale score was 23.89, and the 12-month postoperative mean Oswestry scale score was 14.00. This decrease in the mean Oswestry scale score as the postoperative time increased was significant (, Wilcoxon test). The preoperative mean VAS score was 7.28, the 3-month postoperative mean VAS score was 2.50, and the 12-month postoperative mean VAS score was 1.33 (Table 2). This decrease in the mean VAS as the postoperative time increased was also significant (, Wilcoxon test).

Table 2: Patient preoperative and postoperative data.

Patient no.
Preoperative

VAS
Postoperative

3-month

VAS
Postoperative

12-month

VAS
Preoperative

Oswestry
Postoperative

3-month

Oswestry
Postoperative

12-month

Oswestry

1
5
3
1
56
48
10

2
8
2
2
58
32
24

3
6
3
2
68
32
24

4
7
3
1
52
24
6

5
7
3
2
72
28
16

6
6
4
2
56
32
26

7
7
2
1
74
24
16

8
8
3
2
68
48
26

9
7
1
1
64
8
12

10
8
2
2
78
6
12

11
8
3
2
64
18
16

12
8
2
2
72
12
8

13
7
3
3
68
24
18

14
6
3
2
64
18
12

15
8
2
1
78
18
12

16
9
3
0
74
24
6

17
8
1
1
82
18
8

18
8
2
0
76
16
4

Mean
7.28
2.50
1.33
68.00
23.89
14.00

4. Discussion

Back pain at a symptomatic motion segment may originate from vertebral endplates, disc annulus, vertebral periosteum, facet joints, and/or surrounding soft tissue structures [7]. These structures also contribute to the biomechanical stability of the spinal column. The pathology of discogenic pain and degenerative instability has been described by Kirkaldy-Willis and Farfan [8]. Pain is reported to be the simplest description as well as the major symptom of instability. If a patient’s limited instability is the result of glacial instability and dysfunctional segmental motion, he or she will experience pain but will be able to lead a life without neurologic deficit [9]. Recent studies have suggested that the chronic instability related to the disc or vertebral body degenerative changes associated with abnormal motion results in the potential for pain.

The management of painful, unstable spinal segments due to degenerative disorders is much more difficult than spinal trauma or tumor surgery. During spinal surgery, instability must be taken into account when relieving pain with adequate neural tissue decompression. Whenever possible, bone, joint, ligament, and muscle tissues must be preserved, and suitable fixation methods must be chosen for the damaged ones; otherwise, decompressive procedures may induce or increase instability [10–13].

The concept of spinal segment arthrodesis as a treatment for unstable degenerate spinal segments evolved almost 100 years ago. Spinal fusion was first described by Albee [3], for the treatment of Pott disease, and Hibbs [14], who performed spinal fusion as a treatment for spinal deformity. Since that time, fusion has been the conventional surgical treatment for chronic low-back pain attributed to degenerative disorders. For a long time, fusion was thought to be a necessity for a successful outcome, but the results of many recent studies have challenged this concept by showing that patients had limited improvements in pain relief and increased mobility after surgery [15–18]. Posterior spinal instrumentation and fusion led to deteriorated biomechanical properties of the ligamentum flavum, posterior longitudinal ligament, and interspinous and supraspinous ligaments [19]. Adequate preservation of the partial lamina, spinous process, and supraspinous and interspinous ligaments during laminectomy was helpful for alleviating the stress on the adjacent segment. Furthermore, biomechanical studies showed that posterolateral fusion with hemilaminectomy had less stress concentrated on the adjacent disc than posterolateral fusion with total laminectomy had on flexion [20]. Moreover, fusion eliminates the motion of the functional spinal segment and may overload the adjacent segments. Indeed, adjacent segment degeneration is a known consequence of spinal fusion [3, 4, 21–25]. Lehmann et al. reported accelerated degenerative changes of the adjacent segment and segmental instability above the fusion in 45% of their patients [26]. Major drawbacks of spinal fusion are stiffness, pseudoarthrosis, mechanical failure, and/or adjacent degenerative disease [27–31]. Because of these problems, less rigid stabilization systems have recently become more popular in spine surgery. Mobile stabilization systems have been shown to neutralize injurious forces and restore normal functions of the spine segments while also protecting the adjacent segments [32]. One of the motion preservation technologies is the dynamic pedicular screw-rod system. It is a nonfusion dynamic implant system that controls displacement in rotation and translation as well as providing stabilization. This system allows potential sagittal mobility at the hinge site between the screw head and the shank of the screw. Mobility occurs mechanically between the longitudinally oriented rod and the sagittally placed screw shank. This articulated connection between the rod and the screw caused a reduction in flexion strain and resulted in a lower rate of implant failure [33]. In these systems, the stress load was transferred from the implant to the spine, which decreased the tension on the bone [34]. Although it tends to restrict mobility in flexion, extension, lateral bending, and axial rotation, a sharing of the motion and stress load still permits movement, prevents deterioration of the neighboring superior disc level, and slows the process of degenerative progression at the adjacent levels [35]. Further, this controlled distribution of load between the implant and the spine may reduce postoperative damage to joint segments.

Microdiscectomy using Yasargil’s microscope has been the standard surgical treatment for symptomatic disc herniation. However, treatment of disc herniations with degenerative changes is still a matter of debate. A simple discectomy cannot stop the continuing segmental degeneration and in some instances can even cause an acceleration of this process [6, 36–39]. In addition, the segmental fusion leads to an irreversible loss of function of the treated segment and a resulting risk of adjacent segmental degeneration and pseudoarthrosis [6, 36–39]. Disappointing surgical outcomes observed in the literature were generally due to increasing instability after surgery [40, 41]. Additional dynamic stabilization, applied by Putzier et al., showed significantly fewer signs of progressive degeneration and stabilized the motion segment after nucleotomy to prevent further disc degeneration [35]. Kaner et al. showed the importance of the annular defect. They concluded that to apply a posterior dynamic stabilization is reasonable to the patients with disc herniation and an annular defect larger than 6 mm [42].

In spinal stenosis with degenerative spondylolisthesis, decompression and fusion are widely recommended. Clinical improvements observed in patients with spinal stenosis and degenerative spondylolisthesis generally depend on the effectiveness of the neural decompression; however, the value of instrumentation is still a matter of debate. Some surgeons recommend fusion with instrumentation because it prevents further sliding and applies more decompression without the risk of destabilization. Studies show that the decompression combined with arthrodesis (posterolateral or interbody) significantly improved patient outcome compared to decompression alone [43–48]. However, some studies revealed that the additive instrumentation leads to higher fusion rates and less progression of spondylolisthesis; however, it is unlikely to improve clinical outcome [17, 46, 49–52].

Surgeons advocating fusion without instrumentation indicate that this process gives a little chance to adjacent segment degeneration, and this concept is supported by various studies. Fischgrund et al. reported a randomized study comparing decompressive laminectomy and arthrodesis with or without spinal instrumentation. After a 2-year followup period, the authors concluded that successful fusion did not influence the patients’ outcomes [17]. Considering the older age of patients, major lengthy procedures like a fusion operation, especially posterolateral and interbody fusion with autogenous iliac crest graft, are associated with wound problems in the donor site, neurovascular damage, infections, pelvic fracture, and bleeding, all of which increase morbidity and mortality [53, 54]. Because the degenerative spondylolisthesis is a dynamic process, the purpose of fusion should be to prevent listhesis rather than cure the mechanical pain. Recent studies suggest that the dynamic stabilization system may maintain enough stability to prevent further translation of vertebra without fusion [55–57].

Lumbar arthrodesis for the management of an unstable spine has dramatically increased over the last few decades. The purpose of spinal instrumentation is to increase fusion, but it is obvious that fusion with very long segment instrumentation is being tried, especially for different segment degenerative disorders.

In our study, we adopted a surgical approach that only targeted unstable degenerated and pain-producing segments. Using this approach, we applied neural decompression by a minimally invasive approach that resulted in very little disruption of tissue integrity, discectomy by sparing ligamentum flavum, and decompression by hemilaminectomy in stenosis [58]. We provided stabilization of pain-producing degenerated unstable segments by posterior dynamic transpedicular instrumentation while skipping stable segments. Postoperative VAS and Oswestry scores of a limited series of patients treated with this preservative surgical approach were satisfactory.

References

G. Waddell, “Diagnostic triage,” in The Back Pain Revolution, G. Waddell, Ed., pp. 9–26, Churcill Livingstone, Edinburgh, UK, 2004.

R. Bertagnoli, “Review of modern treatment options for degenerative disc disease,” in Spinal Restabilization Procedures, D. L. Kaech and J. R. Jinkins, Eds., pp. 365–375, Elsevier Science, Amsterdam, The Netherlands, 2002.

F. H. Albee, “Transportation of a portion of the tibia into the spine for Pott's disease,” Journal of the American Medical Association, vol. 57, p. 885, 1911.

P. Fritzell, O. Hägg, P. Wessberg, and A. Nordwall, “2001 Volvo award winner in clinical studies: lumbar fusion versus nonsurgical treatment for chronic low back pain. A multicenter randomized controlled trial from the Swedish Lumbar Spine Study Group,” Spine, vol. 26, no. 23, pp. 2521–2534, 2001.

C. K. Lee, P. Vessa, June Kyu Lee, and S. Wiesel, “Chronic disabling low back pain syndrome caused by internal disc derangements: the results of disc excision and posterior lumbar interbody fusion,” Spine, vol. 20, no. 3, pp. 356–361, 1995.

J. C. Eck, S. C. Humphreys, and S. D. Hodges, “Adjacent-segment degeneration after lumbar fusion: a review of clinical, biomechanical, and radiologic studies.,” American journal of orthopedics, vol. 28, no. 6, pp. 336–340, 1999.

N. Bogduk, “The innervation of the lumbar spine,” Spine, vol. 8, no. 3, pp. 286–293, 1983.

W. H. Kirkaldy-Willis and H. F. Farfan, “Instability of the lumbar spine,” Clinical Orthopaedics and Related Research, vol. 165, pp. 110–123, 1982.

K. Abumi, M. M. Panjabi, K.M. Kramer, J. Duranceau, T. Oxland, and J. J. Crisco, “Biomechanical evaluation of lumbar spinal stability after graded facetectomies,” Spine, vol. 15, no. 11, pp. 1142–1147, 1990.

K. Abumi, M. M. Panjabi, K. M. Kramer, J. Duranceau, T. Oxland, and J. J. Crisco, “Biomechanical evaluation of lumbar spinal stability after graded facetectomies,” Spine, vol. 15, no. 11, pp. 1142–1147, 1990.

S. D. Boden, C. Martin, R. Rudolph, J. S. Kirkpatrick, S. M. R. Moeini, and W. C. Hutton, “Increase of motion between lumbar vertebrae after excision of the capsule and cartilage of the facets. A cadaver study,” Journal of Bone and Joint Surgery A, vol. 76, no. 12, pp. 1847–1853, 1994.

J. W. Frymoyer and D. K. Selby, “Segmental instability: rationale for treatment,” Spine, vol. 10, no. 3, pp. 280–286, 1985.

B. Jönsson, M. Akesson, K. Jonsson, and B. Stromqvist, “Low risk for vertebral slipping after decompression with facet joint preserving technique for lumbar spinal stenosis,” European Spine Journal, vol. 1, no. 2, pp. 100–104, 1992.

R. H. Hibbs, “An operation for progressive spinal deformities,” New York Medical Journal, vol. 93, pp. 10–13, 1911.

S. Agazzi, A. Reverdin, and D. May, “Posterior lumbar interbody fusion with cages: an independent review of 71 cases,” Journal of Neurosurgery, vol. 91, no. 2, pp. 186–192, 1999.

F. B. Christensen, E. Stender Hansen, M. Laursen, K. Thomsen, and C. E. Bünger, “Long-term functional outcome of pedicle screw instrumentation as a support for posterolateral spinal fusion: randomized clinical study with a 5-year follow-up,” Spine, vol. 27, no. 12, pp. 1269–1277, 2002.

J. S. Fischgrund, M. Mackay, H. N. Herkowitz, R. Brower, D. M. Montgomery, and L. T. Kurz, “Degenerative lumbar spondylolisthesis with spinal stenosis: a prospective, randomized study comparing decompressive laminectomy and arthrodesis with and without spinal instrumentation,” Spine, vol. 22, no. 24, pp. 2807–2812, 1997.

P. Fritzell, O. Hägg, P. Wessberg, and A. Nordwall, “Chronic low back pain and fusion: a comparison of three surgical techniques: a prospective multicenter randomized study from the Swedish Lumbar Spine Study Group,” Spine, vol. 27, no. 11, pp. 1131–1141, 2002.

Y. Kotani, B. W. Cunningham, A. Cappuccino, K. Kaneda, and P. C. McAfee, “The effects of spinal fixation and destabilization on the biomechanical and histologic properties of spinal ligaments: an in vivo study,” Spine, vol. 23, no. 6, pp. 672–683, 1998.

C. S. Chen, C. K. Feng, C. K. Cheng, M. J. Tzeng, C. L. Liu, and W. J. Chen, “Biomechanical analysis of the disc adjacent to posterolateral fusion with laminectomy in lumbar spine,” Journal of Spinal Disorders and Techniques, vol. 18, no. 1, pp. 58–65, 2005.

P. Fritzell, O. Hägg, P. Wessberg, and A. Nordwall, “2001 Volvo award winner in clinical studies: lumbar fusion versus nonsurgical treatment for chronic low back pain. A multicenter randomized controlled trial from the Swedish Lumbar Spine Study Group,” Spine, vol. 26, no. 23, pp. 2521–2534, 2001.

J. N. A. Gibson, I. C. Grant, and G. Waddell, “The Cochrane review of surgery for lumbar disc prolapse and degenerative lumbar spondylosis,” Spine, vol. 24, no. 17, pp. 1820–1832, 1999.

J. Glaser, M. Stanley, H. Sayre, J. Woody, E. Found, and K. Spratt, “A 10-year follow-up evaluation of lumbar spine fusion with pedicle screw fixation,” Spine, vol. 28, no. 13, pp. 1390–1395, 2003.

P. V. Mummaneni, R. W. Haid, and G. E. Rodts, “Lumbar interbody fusion: state-of-the-art technical advances,” Journal of Neurosurgery, vol. 101, no. 1, pp. 24–30, 2004.

O. Schwarzenbach, U. Berlemann, T. M. Stoll, and G. Dubois, “Posterior dynamic stabilization systems: Dynesys,” Orthopedic Clinics of North America, vol. 36, no. 3, pp. 363–372, 2005.

T. R. Lehmann, K. F. Spratt, and J. E. Tozzi, “Long-term follow-up of lower lumbar fusion patients,” Spine, vol. 12, no. 2, pp. 97–104, 1987.

G. Ghiselli, J. C. Wang, N. N. Bhatia, W. K. Hsu, and E. G. Dawson, “Adjacent segment degeneration in the lumbar spine,” Journal of Bone and Joint Surgery A, vol. 86, no. 7, pp. 1497–1503, 2004.

R. C. Huang, F. P. Girardi, M. R. Lim, and F. P. Cammisa Jr, “Advantages and disadvantages of nonfusion technology in spine surgery,” Orthopedic Clinics of North America, vol. 36, no. 3, pp. 263–269, 2005.

R. C. Huang, T. M. Wright, M. M. Panjabi, and J. D. Lipman, “Biomechanics of nonfusion implants,” Orthopedic Clinics of North America, vol. 36, no. 3, pp. 271–280, 2005.

S. Inceoglu, “Posterior dynamic stabilization of the lumbar spine,” World Spine Journal, vol. 1, pp. 62–67, 2006.

H. Ishihara, R. Osada, M. Kanamori et al., “Minimum 10-year follow-up study of anterior lumbar interbody fusion for isthmic spondylolisthesis,” Journal of Spinal Disorders, vol. 14, no. 2, pp. 91–99, 2001.

T. M. Stoll, G. Dubois, and O. Schwarzenbach, “The dynamic neutralization system for the spine: a multi-center study of a novel non-fusion system,” European Spine Journal, vol. 11, supplement 2, pp. S170–S178, 2002.

M. Sasani, A. L. Aydin, T. Oktenoglu et al., “The combined use of a posterior dynamic transpedicular stabilization system and a prosthetic disc nucleus device in treating lumbar degenerative disc disease with disc herniations,” SAS Journal, vol. 2, no. 3, pp. 130–136, 2008.

A. Strempel, A. Neckritz, P. Mualenaere, and G. du Toit, “Dynamic versus rigid spinal implants,” in Lumbar Spinal Stenosis, R. Gunzburg and M. Szpalski, Eds., pp. 275–285, Lippincott-Williams and Wilkins, Philadelphia, Pa, USA, 2000.

M. Putzier, S. V. Schneider, J. F. Funk, S. W. Tohtz, and C. Perka, “The surgical treatment of the lumbar disc prolapse: nucleotomy with additional transpedicular dynamic stabilization versus nucleotomy alone.,” Spine., vol. 30, no. 5, pp. E109–E114, 2005.

H. Frei, T. R. Oxland, G. C. Rathonyi, and L. P. Nolte, “The effect of nucleotomy on lumbar spine mechanics in compression and shear loading,” Spine, vol. 26, no. 19, pp. 2080–2089, 2001.

O. L. Osti, B. Vernon-Roberts, and R. D. Fraser, “1990 Volvo award in experimental studies: anulus tears and intervertebral disc degeneration: an experimental study using an animal model,” Spine, vol. 15, no. 8, pp. 762–767, 1990.

M. D. Rahm and B. B. Hall, “Adjacent-segment degeneration after lumbar fusion with instrumentation: a retrospective study,” Journal of Spinal Disorders, vol. 9, no. 5, pp. 392–400, 1996.

J. Zucherman, K. Hsu, G. Picetti, A. White, G. Wynne, and L. Taylor, “Clinical efficacy of spinal instrumentation in lumbar degenerative disc disease,” Spine, vol. 17, no. 7, pp. 834–837, 1992.

K. E. Johnsson, S. Willner, and K. Johnsson, “Postoperative instability after decompression for lumbar spinal stenosis,” Spine, vol. 11, no. 2, pp. 107–110, 1986.

E. Kotilainen, A. Alanen, M. Erkintalo, S. Valtonen, and M. Kormano, “Association between decreased disc signal intensity in T2-weighted MRI and a 5-year outcome after lumbar minimally invasive discectomy association between decreased disc signal intensity in preoperative,” Minimally Invasive Neurosurgery, vol. 44, no. 1, pp. 31–36, 2001.

T. Kaner, S. Dalbayrak, T. Oktenoglu, M. Sasani, A. L. Aydin, and F. O. Ozer, “Comparison of posterior dynamic and posterior rigid transpedicular stabilization with fusion to treat degenerative spondylolisthesis,” Orthopedics, vol. 33, no. 5, p. 12, 2010.

H. Bassewitz and H. Herkowitz, “Lumbar stenosis with spondylolisthesis: current concepts of surgical treatment,” Clinical Orthopaedics and Related Research, no. 384, pp. 54–60, 2001.

H. L. Feffer, S. W. Wiesel, J. M. Cuckler, and R. H. Rothman, “Degenerative spondylolisthesis: to fuse or not to fuse,” Spine, vol. 10, no. 3, pp. 287–289, 1985.

H. N. Herkowitz and L. T. Kurz, “Degenerative lumbar spondylolisthesis with spinal stenosis: a prospective study comparing decompression with decompression and intertransverse process arthrodesis,” Journal of Bone and Joint Surgery A, vol. 73, no. 6, pp. 802–808, 1991.

J. S. Lombardi, L. L. Wiltse, and J. Reynolds, “Treatment of degenerative spondylolisthesis,” Spine, vol. 10, no. 9, pp. 821–827, 1985.

R. J. Nasca, “Rationale for spinal fusion in lumbar spinal stenosis,” Spine, vol. 14, no. 4, pp. 451–454, 1989.

S. E. Nork, S. S. Hu, K. L. Workman, P. A. Glazer, and D. S. Bradford, “Patient outcomes after decompression and instrumented posterior spinal fusion for degenerative spondylolisthesis,” Spine, vol. 24, no. 6, pp. 561–569, 1999.

K. C. Booth, K. H. Bridwell, B. A. Eisenberg, C. R. Baldus, and L. G. Lenke, “Minimum 5-year results of degenerative spondylolisthesis treated with decompression and instrumented posterior fusion,” Spine, vol. 24, no. 16, pp. 1721–1727, 1999.

K. H. Bridwell, T. A. Sedgewick, M. F. O'Brien, L. G. Lenke, and C. Baldus, “The role of fusion and instrumentation in the treatment of degenerative spondylolisthesis with spinal stenosis,” Journal of Spinal Disorders, vol. 6, no. 6, pp. 461–472, 1993.

J. N. Gibson, G. Waddell, and I. C. Grant, “Surgery for degenerative lumbar spondylosis.,” Cochrane Database of Systematic Reviews, no. 3, p. CD001352, 2000.

F. Postacchini, G. Cinotti, and D. Perugia, “Degenerative lumbar spondylolisthesis. II. Surgical treatment.,” Italian Journal of Orthopaedics and Traumatology, vol. 17, no. 4, pp. 467–477, 1991.

J. C. Banwart, M. A. Asher, and R. S. Hassanein, “Iliac crest bone graft harvest donor site morbidity: a statistical evaluation,” Spine, vol. 20, no. 9, pp. 1055–1060, 1995.

E. M. Younger and M. W. Chapman, “Morbidity at bone graft donor sites,” Journal of orthopaedic trauma, vol. 3, no. 3, pp. 192–195, 1989.

B. Cakir, B. Ulmar, H. Koepp, K. Huch, W. Puhl, and M. Richter, “Posterior dynamic stabiliziation as on alternative for instrumented fusion in the treatment of degenerative lumbar instability with spinal stenosis,” Zeitschrift fur Orthopadie und Ihre Grenzgebiete, vol. 141, no. 4, pp. 418–424, 2003.

W. Schmoelz, J. F. Huber, T. Nydegger, Dipl-Ing, L. Claes, and H. J. Wilke, “Dynamic stabilization of the lumbar spine and its effects on adjacent segments: an in vitro experiment,” Journal of Spinal Disorders and Techniques, vol. 16, no. 4, pp. 418–423, 2003.

K. J. Schnake, S. Schaeren, and B. Jeanneret, “Dynamic stabilization in addition to decompression for lumbar spinal stenosis with degenerative spondylolisthesis,” Spine, vol. 31, no. 4, pp. 442–449, 2006.

A. F. Ozer, T. Oktenoglu, M. Sasani et al., “Preserving the ligamentum flavum in lumbar discectomy: a new technique that prevents scar tissue formation in the first 6 months postsurgery,” Neurosurgery, vol. 59, supplement 1, pp. S-126–S-133, 2006.