Advances in Orthopedics
Volume 2016 (2016), Article ID 7683272, 5 pages
http://dx.doi.org/10.1155/2016/7683272

Clinical Study

Impact of Active Ankle Movement Frequency on Velocity of Lower Limb Venous Flow following Total Hip Arthroplasty

Tsutomu Nakayama,¹ Sachiyuki Tsukada,² Takayuki Hiyama,³ Tatsuya Yamada,¹ and Naoyuki Hirasawa²

¹Department of Rehabilitation, Hokusuikai Kinen Hospital, Ibaraki, Japan
²Department of Orthopaedic Surgery, Hokusuikai Kinen Hospital, Ibaraki, Japan
³Department of Clinical Laboratory, Hokusuikai Kinen Hospital, Ibaraki, Japan

Received 26 September 2016; Accepted 18 October 2016

Academic Editor: Elizaveta Kon

Copyright © 2016 Tsutomu Nakayama et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Although active ankle movement plays a predominant role in mechanical thromboprophylaxis following total hip arthroplasty (THA), the most effective frequency of movement remains unclear. Materials and Methods. In 29 consecutive patients undergoing THA, the velocity of blood flow in the profunda femoris was measured after various frequencies of ankle movement two days after THA using a pulse wave Doppler ultrasound system. To test the interobserver reliabilities for the velocity measured with Doppler ultrasound system, the intraclass correlation coefficient was calculated based on the measurement in 10 limbs of healthy volunteers. Results. At 0, 1, and 2 minutes after ankle movement, the velocity after movement at 60 contractions per minute was significantly faster than that after movement at 40 or 80 contractions per minute (, repeated-measures analysis of variance). The intraclass correlation coefficient score in two investigators was 0.849 (95% confidence interval, 0.428 to 0.962). Conclusions. Active ankle movement at 60 contractions per minute is recommended in patients receiving THA to obtain optimal venous blood flow.

1. Introduction

Venous thromboembolism (VTE) is the most important preventable cause of mortality in patients following total hip arthroplasty (THA) [1, 2]. Active movement of the ankle can increase venous blood flow of the limb following THA [3] and has been proposed as an effective means of preventing VTE [4].

Kagaya investigated the relationship between frequency of ankle movement and venous blood flow in six healthy women and concluded that ankle movement at a rate of 60 contractions per minute was most effective to obtain a high velocity of venous blood flow [5]. The most effective frequency of ankle movement for patients following THA remains unclear because venous blood flow of the limb following THA differs from healthy limb [6].

We investigated patients undergoing THA to assess the relationship between frequency of ankle movement and venous blood flow. The hypothesis of this study was that the ankle movement at 60 contractions per minute would increase venous blood flow more effectively than that at 40 or 80 contractions per minute in patients undergoing THA.

2. Materials and Methods

The study was approved by our institutional review board, and patients provided written informed consent. This study was performed at the rehabilitation department of a single private hospital.

Patients scheduled for unilateral THA from March 2015 to May 2015 were eligible for inclusion. Patients scheduled for revision THA or simultaneous bilateral THA and with peripheral circulation insufficiency in the lower limb were excluded.

2.1. Intervention and Outcome

The study interventions were three different frequencies of active ankle movement: 40 contractions per minute, 60 contractions per minute, and 80 contractions per minute. The primary outcome was the mean velocity of blood flow in the profunda femoris measured two days after surgery using a pulse wave Doppler ultrasound system (APLIO 400 TUS-A400; Toshiba Medical Systems Corporation, Tochigi, Japan).

The patients received instruction regarding the ankle movement used in the study protocol one day before surgery. Baseline measurement of venous flow in the profunda femoris was obtained on the same day as instruction was given.

The patients were instructed to move the ankle of the affected side in time to a metronome. The patients were in the supine position with the knees and hips in a neutral position and instructed to perform ankle plantar flexion and dorsiflexion over the full range of motion.

All measurements of blood flow velocity were performed by a single experienced clinical laboratory technician (TH). The measurement site of the profunda femoris was 3 cm proximal from the bifurcation point of the common femoral vein.

The order of the three different frequencies of ankle motion was determined by drawing lots just prior to the measurement. The measurement protocol is shown in Figure 1. The active ankle movement at the predetermined frequency was performed for one minute. The venous blood flow velocity in the profunda femoris was measured by Doppler ultrasound just after 1 minute and 2 minutes after 1 minute of ankle movement. Four minutes after the first set of ankle movement and measurements, another frequency of active ankle movement was performed, and the velocity of venous blood flow was measured in the same manner. Again, 4 minutes after the second set of ankle movement and measurements, active ankle movement was performed at the third frequency, and the velocity of venous blood flow was measured in the same manner.

Figure 1: Protocol for active ankle movement at three frequencies and measurement of blood flow velocity at the profunda femoris. After one minute of active ankle movement, the velocity of venous blood flow was measured three times (black arrows indicate the point of measurement: (1) just after movement, (2) 1 minute after movement, and (3) 2 minutes after movement). The order of the three different frequencies (40, 60, and 80 contractions per minute) was determined by drawing lots. Four minutes after the first frequency of ankle movement, another frequency of active ankle movement was performed, and similar measurements were repeated.

2.2. Surgery, Rehabilitation, and Postoperative Medications

All patients received general anesthesia without any epidural injection. Surgery was performed using a minimally invasive anterolateral approach without detachment of muscle or tendon with the patient in the lateral decubitus position [7]. All surgeries were performed or supervised by a high-volume hip surgeon (NH).

To prevent VTE, intraoperative calf bandage and postoperative intermittent pneumatic compression until 09:00 one day after surgery were performed. Rehabilitation was started one day after surgery. All patients were screened to detect deep vein thrombosis using a pulse wave Doppler ultrasound system on the morning after THA.

No routine medication was given to prevent VTE. Antibiotic prophylaxis with a first-generation cephalosporin (Cefamezin [cefazolin]; Astellas, Tokyo, Japan) was administered intravenously perioperatively and every 8 hours for the first 48 hours after surgery. From the day after surgery, oral nonsteroidal anti-inflammatory drug (4 mg of lornoxicam, Lorcam; Taisho-Toyama, Tokyo, Japan) was administered three times a day.

2.3. Statistical Analysis

For primary outcome, we used repeated-measures analysis of variance with Scheffé’s post hoc test to assess differences between the three groups. A two-sided value of <0.05 was considered significant.

To test the interobserver reliabilities for the primary outcome, the intraclass correlation coefficient with two-sided 95% confidence intervals was calculated. Two investigators (TH and ST) separately measured the velocity of blood flow in the profunda femoris for 10 limbs of healthy volunteers.

All statistical analyses were performed with (the Foundation for Statistical Computing).

3. Results

A total of 51 patients underwent THA during the study period and were eligible for inclusion in the study. The flowchart presented in Figure 2 outlines the study. Four patients that underwent revision THA, seven patients (14 hips) that underwent simultaneous bilateral THA, and four patients that had peripheral circulation insufficiency in the lower limb were excluded. Thus, 29 patients were finally included in the study. Table 1 summarizes the demographic characteristics of the patients. No deep vein thrombosis was found one day after surgery, and no symptomatic pulmonary embolism occurred.

Table 1: Patient demographics.

Variable
Value

Gender

    Female
27

    Male
2

Age (years)
(37–87)

Height (cm)
(137–170)

Weight (kg)
(45.8–74.4)

Body mass index
(17.6–33.7)

Diagnosis

    Osteoarthritis of the hip
28

    Osteonecrosis of the femoral head
1

Affected side

    Right
9

    Left
20

Preoperative plantar flexion angle (degree)
(30–45)

Preoperative dorsiflexion angle (degree)
(10–20)

Patient-based evaluation for hip joint disease (point)
(10–69)

Duration of operation (minute)
(37–165)

Intraoperative blood loss (milliliter)
(200–1700)

Lengthening of lower legs (millimeter)
(0.3–22.6)

Values are expressed as means standard deviation, with ranges in parentheses.

The score was evaluated using the Japanese Orthopaedic Association hip disease evaluation questionnaire [9].

Figure 2: Participant flow chart. THA, total hip arthroplasty.

In the baseline velocity of venous flow in the profunda femoris measured one day before surgery, the velocity after active ankle movement at 60 contractions per minute was significantly faster than those after active ankle movement at 40 or 80 contractions per minute (Figure 3 and Table 2). In post hoc analysis, all measurements showed significant differences between 60 and 80 contractions per minute ) and between 80 and 40 contractions per minute . In all measurements, the velocity was fastest at the end of active ankle movement and thereafter decreased gradually with time.

Table 2: Preoperative mean velocity of blood flow of profunda femoris measured one day before surgery.

40 contractions/min
60 contractions/min
80 contractions/min
p

Just after ankle movement

1 minute after ankle movement

2 minutes after ankle movement

Values are expressed as means standard deviation.

Repeated-measures ANOVA.

Figure 3: Velocity of blood flow in the profunda femoris after active ankle movement prior to total hip arthroplasty (mean standard deviation). The velocity of venous blood flow after active ankle movement at 60 contractions per minute was significantly faster than those after active ankle movement at 40 and 80 contractions per minute (, repeated-measures ANOVA). The horizontal line indicates the time after active ankle movement.

3.1. Primary Outcome

At two days after surgery, the mean velocity of venous blood flow in the profunda femoris after active ankle movement at 60 contractions per minute was significantly faster than those after active ankle movement at 40 and 80 contractions per minute (Figure 4 and Table 3). In post hoc analysis, all measurements showed significant differences between 60 and 80 contractions per minute and between 80 and 40 contractions per minute , except for the velocity between 60 and 80 contractions per minute at 2 minutes after finishing active ankle movement .

Table 3: Postoperative mean velocity of blood flow of profunda femoris measured two days after total hip arthroplasty.

40 contractions/min
60 contractions/min
80 contractions/min
p

Just after ankle movement

1 minute after ankle movement

2 minutes after ankle movement

Values are expressed as means standard deviation.

Repeated-measures ANOVA.

Figure 4: Velocity of blood flow in the profunda femoris after active ankle movement 2 days after total hip arthroplasty (mean standard deviation). The velocity of venous blood flow after active ankle movement at 60 contractions per minute was significantly faster than those after active ankle movement at 40 and 80 contractions per minute (, repeated-measures ANOVA). The horizontal line indicates the time after active ankle movement.

3.2. Interobserver Reliability

As an indicator of interobserver variability, the intraclass correlation coefficient score of the measurement of venous blood flow by two investigators was 0.849 (95% confidence interval, 0.428 to 0.962).

4. Discussion

The most important finding of this study was that when active ankle movement was performed at 60 contractions per minute, the mean velocity of venous blood flow in the profunda femoris was faster than those with ankle movement at 40 and 80 contractions per minute in patients that underwent THA.

Mechanical thromboprophylaxis has been considered both safe and effective in patients undergoing THA [4]. Although active ankle movement plays a predominant role in mechanical thromboprophylaxis, the most effective contractions had not been investigated. Although active ankle movement increases muscle blood flow, excessively frequent movement also increases intramuscular pressure [5]. Therefore, the most reasonable frequency of active ankle movement would be difficult to estimate. This was the first study to investigate the impact of active ankle movement frequency on the velocity of lower limb venous flow following THA.

Several limitations should be noted in this study. First, although this study clearly demonstrated that ankle movement at 60 contractions per minute was reasonable to achieve stable venous blood flow, the sample size was underpowered to make definitive conclusions about the prevalence of VTE. Second, as this study was performed in a single hospital, care should be taken when generalizing the findings to the community setting.

With regard to clinical relevance, this study supported the applicability of active ankle movement for preventing VTE following THA. All frequencies of ankle movement investigated in this study increased the velocity of venous blood flow in the profunda femoris and may have ameliorated venous stasis, which plays a central role in the initiation of thrombosis [8]. This study suggested that the active ankle movement at 60 contractions per minute should be recommended after THA.

5. Conclusion

Active ankle movement performed at a frequency of 60 contractions per minute provided a faster mean venous blood flow velocity in the profunda femoris compared with that performed at 40 or 80 contractions per minute in patients undergoing THA.

Competing Interests

The authors declare that they did not receive and will not receive any benefits or funding from any commercial party related directly or indirectly to the subject of this article.

References

H. Asano, M. Matsubara, K. Suzuki, S. Morita, and K. Shinomiya, “Prevention of pulmonary embolism by a foot sole pump,” The Journal of Bone & Joint Surgery—British Volume, vol. 83, no. 8, pp. 1130–1132, 2001.

R. Yokote, M. Matsubara, N. Hirasawa, S. Hagio, K. Ishii, and C. Takata, “Is routine chemical thromboprophylaxis after total hip replacement really necessary in a Japanese population?” Journal of Bone and Joint Surgery—Series B, vol. 93, no. 2, pp. 251–256, 2011.

M. A. McNally, E. A. Cooke, and R. A. B. Mollan, “The effect of active movement of the foot on venous blood flow after total hip replacement,” The Journal of Bone & Joint Surgery—American Volume, vol. 79, no. 8, pp. 1198–1201, 1997.

N. Sugano, H. Miki, N. Nakamura, M. Aihara, K. Yamamoto, and K. Ohzono, “Clinical efficacy of mechanical thromboprophylaxis without anticoagulant drugs for elective hip surgery in an Asian population,” Journal of Arthroplasty, vol. 24, no. 8, pp. 1254–1257, 2009.

A. Kagaya, “Reduced exercise hyperaemia in calf muscles working at high contraction frequencies,” European Journal of Applied Physiology and Occupational Physiology, vol. 64, no. 4, pp. 298–303, 1992.

M. A. McNally and R. A. B. Mollan, “Total hip replacement, lower limb blood flow and venous thrombogenesis,” Journal of Bone and Joint Surgery—Series B, vol. 75, no. 4, pp. 640–644, 1993.

H. Röttinger, “Minimally invasive anterolateral surgical approach for total hip arthroplasty: early clinical results,” HIP International, vol. 16, supplement 4, pp. 42–47, 2006.

D. H. Sochart and K. Hardinge, “The relationship of foot and ankle movements to venous return in the lower limb,” Journal of Bone and Joint Surgery—Series B, vol. 81, no. 4, pp. 700–704, 1999.

T. Matsumoto, A. Kaneuji, Y. Hiejima et al., “Japanese Orthopaedic Association Hip Disease Evaluation Questionnaire (JHEQ): a patient-based evaluation tool for hip-joint disease. The subcommittee on hip disease evaluation of the clinical outcome committee of the Japanese orthopaedic association,” Journal of Orthopaedic Science, vol. 17, no. 1, pp. 25–38, 2012.