Advances in Orthopedics
Volume 2019 (2019), Article ID 7656878, 8 pages
https://doi.org/10.1155/2019/7656878

Review Article

Compensatory Function of the Subtalar Joint for Lower Extremity Malalignment

Kensei Yoshimoto, Masahiko Noguchi, Akifumi Yamada, and Yuki Nasu

Orthopaedic Foot and Ankle Center, Shiseikai Daini Hospital, 5-19-1 Kamisoshigaya, Setagaya-ku, Tokyo, 157-8550, Japan

Correspondence should be addressed to Masahiko Noguchi; mnfootor@yahoo.co.jp

Received 7 December 2018; Accepted 9 January 2019; Published 24 February 2019

Guest Editor: Yasushi Oshima

Copyright © 2019 Kensei Yoshimoto et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

It is important to evaluate the subtalar joint and hip-knee-ankle alignment to understand lower extremity alignment. In this review, we focused on the compensatory changes in the subtalar joint alignment for the deformity of the knee and ankle joint, reviewing previous research. The subtalar joint alignment was compensatory valgus in patients with varus knee and ankle deformity, whereas it was uncertain whether the subtalar joint alignment was compensatory varus in patients with valgus knee and ankle deformity. The subtalar joint valgus alignment improved after total knee arthroplasty or high tibial osteotomy for varus knee deformity, even if the deformity was severe. In contrast, whether the subtalar joint alignment changed after the surgery for ankle or valgus knee deformity has not been considered. Further research on the compensatory function of the subtalar joint is needed.

1. Introduction

When treatment for lower extremity malalignment is needed, it is important to evaluate the lower extremity alignment correctly. Many studies assessed only the hip-knee-ankle alignment, such as the femorotibial alignment or the mechanical axis running from the center of the femoral head to that of the ankle [1–3]. However, weight-bearing on the lower extremity runs from the hip to the knee, ankle, and foot, and then to the ground. As calcaneus is in contact with the ground, it is necessary to evaluate the alignment of the subtalar joint in addition to the hip-knee-ankle alignment to correctly measure the lower extremity alignment [4].

Each joint of the lower extremity compensates the malalignment caused by deformities of the other joints [10, 11, 20]. In particular, recent studies have discussed the compensatory function of the subtalar joint [7, 13, 19]: several reports show that the subtalar joint compensates for the deformities of the knee and ankle joints [10, 12, 17, 18, 20], and the subtalar joint alignment which was 2°-6° valgus in healthy legs [21, 22] changed after surgery to correct these deformities [7, 14, 16]. When surgery for knee or ankle deformity is needed, it is helpful for surgical planning to understand the mechanism of subtalar joint compensation and how the subtalar joint alignment changes after surgery.

In this literature review, we discuss the compensatory function of the subtalar joint in patients with deformities of the lower extremity, reviewing previous research.

2. Radiographic Assessment of the Hindfoot Alignment

Several methods can be used for the radiographic imaging of the coronal plane alignment of the subtalar joint or hindfoot. Cobey [23] and Saltzman et al. [24] reported the hindfoot alignment view: subjects stood on a floor, and an X-ray beam with an inclination angle of 20° to the floor was directed from the posterior to the anterior side. A modified method was also reported, with a film cassette lying on the floor and the X-ray beam directed at it with an inclination angle of 45° [5, 25] (Figure 1(b)). In these methods, the hindfoot alignment was usually evaluated using the heel alignment distance (HD) as the distance between the contact point of the heel and the intersection of the extended tibial axis and the distal part of the calcaneus [7, 19, 24], and the heel alignment angle (HA) measured as the angle between the axis of the distal tibia and the axis of the calcaneus [11, 12, 15, 26, 27] (Figure 2). HA is also referred to as hindfoot alignment angle or tibiocalcaneal angle. On the other hand, Ikoma et al. [6] reported a different method, whereby subjects stood on a radiolucent platform, which was flat in the rear part and inclined by 30° in the front part. The X-ray beam was oriented down 5° from the horizontal position (Figure 1(c)). This method assessed the hindfoot alignment using the V-V angle, measured as the angle between the axis of the line from the top of the sustentaculum tali to the lateral-inferior end of the posterior facet of the calcaneus and tibial axis (Figure 3). Moreover, the utility of weight-bearing computed tomography (CT) scans has also been recently suggested [28, 29]. In CT scans, the subtalar vertical angle (SVA) and subtalar inclination angle (SIA) were measured for evaluating the subtalar joint alignment (Figure 4).

(a)

(b)

(c)

Figure 1: (a) The inclination angle of the beam is 20° to the floor. The film cassette is perpendicular to the central beam of the radiation source. (b) The film cassette is lying on the floor and the subject is standing on the film cassette. The inclination angle of the beam is 45° to the floor. (a) and (b) are reproduced from Reilingh et al. 2010 [5] [under the Creative Commons Attribution License/public domain]. (c) Participants stood on a radiolucent platform with equal weight on both feet. This platform was flat in the rear part and inclined by 30° in the front part, so that the midfoot and forefoot of participants were planter-flexed. The X-ray beam was oriented down 5° from the horizontal position. (c) is reproduced from Ikoma et al. 2013 [6] [under the Creative Commons Attribution License/public domain].

Figure 2: Heel alignment angle (HA) was defined as the angle (d) between the tibial axis and the calcaneal axis. Heel alignment distance (HD) was defined as the distance (c) between the contact point of the heel and the intersection of the extended tibial axis and the distal part of the calcaneus. Figure 2 is reproduced from Jeong et al. 2018 [7].

Figure 3: The measurement of the V-V angle. Line a indicates the long axis of the tibia. Point b indicates the lateral extremity of the calcaneus at the posterior surface of the talocalcaneal joint. Point c indicates the superior margin of the sustentaculum tali. Angle d is the V-V angle. Figure 3 is reproduced from Takenaka et al. 2015 [8] [under the Creative Commons Attribution License/public domain].

(a)

(b)

Figure 4: (a) Corresponding weight-bearing computed tomography (CT) scan. The orientation of the subtalar joint to the ground was assessed using the subtalar vertical angle (SVA). (b) Corresponding weight-bearing CT scan. The subtalar inclination angle (SIA) was used to assess the inclination of the subtalar joint. Figure 4 is reproduced from Krahenbuhl et al. 2017 [9].

3. Compensatory Function of the Subtalar Joint for Deformity of the Knee

Norton et al. [12] showed that there was a significant correlation between knee and hindfoot alignment, and a moderately strong correlation in patients with knee deformity, and this correlation was remarkable with larger knee deformity (≥ 10°). The correlation coefficient between hindfoot angle and mechanical axis angle was -0.413 and was -0.536 for those with larger knee deformity. These results indicate that the hindfoot alignment was compensatory valgus in patients with varus knee osteoarthritis (OA) and was varus in patients with valgus knee OA. Several reports supported this hindfoot compensatory function in patients with varus knee OA [11, 14]. However, hindfoot compensation for valgus knee OA could not be found in the report by Mullaji et al. [11].

Nakada et al. [15] demonstrated the subtalar joint compensation for the deformity of knee joints with rheumatoid arthritis (RA). The positive correlation between the femorotibial angle (FTA) and the HA only existed in knees with a Larsen grade≥ 4 (r= 0.544), but not in knees with a Larsen grade≤ 3 (r= 0.180). In measurement of the FTA, a lesser value is considered as valgus knee and bigger as varus. In measurement of the HA, a lesser value is considered as varus hindfoot and bigger as valgus. This correlation was stronger in patients with less damaged subtalar joints (Larsen grade≤ 3) (r= 0.705).

4. Compensatory Function of the Subtalar Joint for Deformity of the Ankle

Several reports showed that the subtalar joint could compensate the varus ankle OA [9, 17–19]. The subtalar inclination angle (SIA) increased from Takakura Stages 1 to 3a [30] ( in Stage 1, in Stage 2, and in Stage 3a) compared to the control () and decreased at Stages 3b and 4 ( in Stage 3b and in Stage 4) [17]. This suggested that the subtalar joint was compensatory valgus in patients with early to intermediate Takakura stage but could not compensate in patients with the end stage. In contrast, Krahenbuhl et al. [9] found that the subtalar joint compensation for the varus ankle OA was independent of the stage of ankle joint osteoarthritis, extent of the talar tilt in the ankle joint mortise.

In patients with valgus ankle OA, the subtalar joint compensation might be small [9, 19]. Wang et al. [19] showed that only 38.6% of valgus ankles were compensated by subtalar joints (HA < -7.7°), whereas 53% of varus ankles were compensated (HA > -13.1°). Krahenbuhl et al. [9] could not find the subtalar joint compensation in patients with valgus ankle OA. In their study using weight-bearing CT scans, SVA and SIA measurement revealed that the subtalar joint was valgus synchronizing the valgus ankle deformity.

5. The Subtalar Joint Alignment after Surgery for the Knee Malalignment

Chandler et al. [10] first described that the hindfoot varus or valgus angle changed after the correction of knee deformity with total knee arthroplasty (TKA), showing that the hindfoot compensated the knee deformity. However, they did not clearly explain the correlation between them. Thereafter, several reports found that the compensatory subtalar valgus was corrected after TKA in patients with knee OA [7, 8, 11, 13, 14, 31]. Hara et al. [31] and Takenaka et al. [8] evaluated the subtalar joint alignment using the V-V angle, which averaged a normal value of 76.0° [6] and showed significant improvement in the subtalar joint alignment in patients with subtalar valgus (V-V angle ≥ 76.0°) from to three weeks after TKA and further improved to one year after TKA. However, in patients with subtalar varus (V-V angle < 76.0°), the preoperative V-V angle () did not improve three weeks and one year after TKA (, and , respectively). In another report from Cho et al. [14], greater improvements of hindfoot valgus were found in patients with a severe varus deformity of the knee joint (varus ≥ 10°). Greater improvement of the mechanical axis angle from varus to varus in these patients might result in a greater improvement of hindfoot valgus from valgus to valgus. Similar results were observed by Jeong et al. [7], who found a correlation between the pre-postoperative variance in the mechanical axis angle and the ground-talar dome angle, HA and HD (r = 0.7, -0.348 and -0.418, respectively). Okamoto et al. [13] focused on the American Orthopaedic Foot and Ankle Society (AOFAS) ankle–hindfoot scale in addition to the hindfoot alignment after TKA. They also evaluated calcaneal pitch and naviculocuboid overlap in plane weight-bearing lateral foot radiograph as the index of hindfoot alignment. They found that calcaneal pitch, naviculocuboid overlap, and AOFAS ankle–hindfoot scale with moderate varus deformity of the knee (≤ 6° varus) improved after TKA, but those with severe varus deformity of the knee (> 6°) did not improve after TKA.

In contrast, only one report assessed the subtalar joint alignment after TKA in patients with valgus knee OA [11]. They showed that the subtalar joint was valgus before TKA and remained valgus after TKA. However, because their study included quite a small number (n= 12) of patients with valgus OA, further studies with larger sample sizes are needed.

The change of the subtalar joint alignment after tibial osteotomy for knee malalignment was also assessed. Choi et al. [16] evaluated the hindfoot alignment after high tibial osteotomy. They found that the preoperative degree of hindfoot valgus deviation (7.8° valgus) decreased progressively 3 months, 6 months, and 12 months after HTO (4.0°, 3.4°, and 2.3° valgus, respectively).

6. The Subtalar Joint Alignment after Surgery for the Ankle Malalignment

There is only one report by Choi et al. [16] which evaluated the hindfoot alignment after surgery for ankle OA. They evaluated the hindfoot alignment after low tibial osteotomy (LTO) [32] for ankle OA. They included patients with severe ankle OA averaged Takakura stage of 3.2 [30], and preoperative mild hindfoot varus deviation (1.0° varus) was seen. After LTO, the hindfoot alignment was changed to valgus deviation without any compensatory mechanism 3 months, 6 months, and 12 months after LTO (4.8°, 4.7°, and 4.8° valgus, respectively).

7. Discussion

The subtalar joint alignment was compensatory valgus for varus knee deformity, but this compensatory function remains controversial in the valgus knee deformity (Table 1) [11, 12, 15]. On the other hand, the subtalar joint could compensate for early stage varus ankle OA, but not for end-stage varus ankle OA and valgus ankle OA [9, 17–19]. If the subtalar joint was destroyed, the subtalar joint compensation for deformity in the knee and ankle joints might not occur [15, 19]. Lee et al. [18] reported that patients with a well-preserved subtalar range of motion may better compensate varus ankle OA. These results may indicate that the destroyed subtalar joint was rigid and did not have enough joint movement to compensate for the deformity of the knee and ankle. Nakada et al. [15] assessed the subtalar compensatory alignment for the knee deformity in patients with RA. They found that the subtalar joint could compensate the knee deformity, and this compensation was stronger in patients with less damaged subtalar joints (Larsen grade≤ 3). The subtalar joint without severe destruction could compensate both the varus and valgus deformity of the knee in patients with RA. However, the destructed subtalar joint could not compensate the knee deformity and became varus or valgus synchronizing to the varus or valgus knee deformity.

Table 1: Review of studies which assessed the subtalar joint compensation for the knee or the ankle deformity.

Total number
Reasons for deformation
Surgical procedure
Evaluation of subtalar alignment
Findings

Chandler et al. [10]
86
Varus and valgus knee OA
TKA
plane radiographs
The subtalar joint compensated the deformity of the knee.
There was no correlation between the knee and subtalar joint alignment.

Mullaji et al. [11]
165
Varus and valgus knee OA
TKA
plane radiographs
The hindfoot valgus decreased after TKA.
87% of the subtalar joint continued to have valgus alignment even after TKA.

Norton et al. [12]
401
Varus and valgus knee OA
-
plane radiographs
Most of the compensation to angular deformity at the knee occurred in the subtalar joint.
There was a correlation between knee and hindfoot deformities in patients with a larger knee deformity (≥ 10°).

Takenaka et al. [8]
71
Varus knee OA
TKA
plane radiographs
The subtalar joint alignment improved 3 weeks after TKA in the subtalar joint valgus group, and further improvement was noted 1 year following TKA.
The subtalar joint alignment did not improve after TKA in the subtalar joint varus group.

Okamoto et al. [13]
75
Varus knee OA
TKA
plane radiographs
Calcaneal pitch, naviculocuboid overlap and hindfoot pain with moderate varus deformity of knee (≤ 6° varus) improved after TKA, but those with severe varus deformity of knee (> 6°) did not improve after TKA.

Cho et al. [14]
195
Varus knee OA
TKA
plane radiographs
Greater improvements of hindfoot valgus occurred in patients with a severe varus deformity of the knee joint (≥ 10°) after TKA.
There was no further improvement in hindfoot alignment between 6 weeks and 2 years post-operatively.

Jeong et al. [7]
375
Varus knee OA
TKA
plane radiographs
The variation of correction of varus knee alignment was significantly correlated with that of the valgus ankle and subtalar alignment after TKA.

Nakada et al. [15]
205
Knee RA with varus and valgus deformity
-
plane radiographs
Correlation exists between the knee and hindfoot alignments only in knees with a Larsen grade ≥ 4.
This correlation was stronger in patients with less damaged subtalar joints (Larsen grade ≤ 3).

Choi et al. [16]
38 for HTO 
46 for LTO
Varus knee and ankle OA
HTO and LTO
plane radiographs
Hindfoot alignment was valgus in patients with advanced arthritis of the knee, but mild hindfoot varus deviation was seen in patients with advanced arthritis of the ankle.
Preoperative hindfoot valgus deviation was decreased after HTO, whereas the hindfoot alignment was changed to valgus deviation synchronizing to the ankle alignment after LTO.

Hayashi et al. [17]
133
Varus ankle OA
-
plane radiographs
The subtalar joint compensates varus deformity of the ankle at the intermediate stage ankle OA, but not at the end stage.

Lee et al. [18]
154
Varus ankle OA
-
plane radiographs
Hindfoot alignment was valgus in many ankles in stage II and IIIA, and the mean value was varus in stage IIIB and IV.

Wang et al. [19]
233
Varus and valgus ankle OA
-
plane radiographs
Compensation of the subtalar joint was identified in 39% of valgus ankle OA and 53% of varus ankle OA.
The patients with no or mild degenerative changes of the subtalar joint may compensate the ankle malalignment

Krahenbuhl et al. [9]
88
Varus and valgus ankle OA
-
computed tomography
Compensation of the subtalar joint for the ankle deformity could only be verified for varus ankle osteoarthritis and not for valgus ankle osteoarthritis.
Subtalar joint alignment had no influence on the stage of ankle osteoarthritis, extent of the tibiotalar tilt and stage of subtalar joint osteoarthritis.

OA: osteoarthritis, TKA: total knee arthroplasty, HTO: high tibial osteotomy, LTO: low tibial osteotomy

Surgical procedures such as TKA or HTO for the varus knee OA could also improve the subtalar compensatory malalignment (Table 1) [7, 8, 11, 13, 14, 16]. In particular, greater improvements of hindfoot valgus occurred in patients with a severe varus deformity of the knee joint [14], and the variation of correction of varus knee alignment was significantly correlated with that of valgus subtalar alignment after TKA [7]. In contrast, Okamoto et al. [13] found that subtalar valgus did not improve in severe knee OA. However, they evaluated the subtalar alignment using calcaneal pitch and naviculocuboid overlap in a plane weight-bearing lateral foot radiograph. It was unclear whether these sagittal alignment parameters directly reflected the coronal subtalar joint varus or valgus alignment. Takenaka et al. [8] found that the subtalar joint alignment did not improve after TKA in the subtalar joint varus group. The preoperative subtalar joint varus could indicate that the subtalar joint lost the ability to compensate and result in rigid varus. Therefore, the subtalar joint remained varus after TKA. Although correction of varus knee OA could improve the subtalar valgus alignment, it was unclear whether correction of valgus knee OA could also influence the subtalar joint alignment. Further study is desirable to pursue these additional research gaps.

The influence of surgery for the ankle deformity to the subtalar joint was only evaluated in one study (Table 1) [16] and was quite unclear. They showed that the hindfoot alignment was varus in patients with advanced ankle OA and changed to valgus after LTO. Because the ability of subtalar joint compensation might be lost in advanced ankle OA [17, 18], hindfoot alignment became valgus after LTO, synchronizing to the correction of ankle alignment. Further assessments for change of the subtalar joint alignment at several stages of ankle OA after LTO, total ankle arthroplasty, and ankle arthrodesis could reveal the compensation mechanism of the subtalar joint.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

References

Y. Tashiro, S. Matsuda, K. Okazaki, H. Mizu-uchi, U. Kuwashima, and Y. Iwamoto, “The coronal alignment after medial unicompartmental knee arthroplasty can be predicted: usefulness of full-length valgus stress radiography for evaluating correctability,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 22, no. 12, pp. 3142–3149, 2014.

J. De Muylder, J. Victor, O. Cornu, L. Kaminski, and E. Thienpont, “Total knee arthroplasty in patients with substantial deformities using primary knee components,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 23, no. 12, pp. 3653–3659, 2015.

S. Kawahara, S. Matsuda, K. Okazaki et al., “Relationship between the tibial anteroposterior axis and the surgical epicondylar axis in varus and valgus knees,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 20, no. 10, pp. 2077–2081, 2012.

J.-M. Guichet, A. Javed, J. Russell, and M. Saleh, “Effect of the foot on the mechanical alignment of the lower limbs,” Clinical Orthopaedics and Related Research, vol. 415, pp. 193–201, 2003.

M. L. Reilingh, L. Beimers, G. J. M. Tuijthof, S. A. S. Stufkens, M. Maas, and C. N. Van Dijk, “Measuring hindfoot alignment radiographically: The long axial view is more reliable than the hindfoot alignment view,” Skeletal Radiology, vol. 39, no. 11, pp. 1103–1108, 2010.

K. Ikoma, M. Noguchi, K. Nagasawa et al., “A new radiographic view of the hindfoot,” Journal of Foot and Ankle Research, vol. 13, no. 6(1), article 48, 2013.

B. O. Jeong, T. Y. Kim, J. H. Baek, H. Jung, and S. H. Song, “Following the correction of varus deformity of the knee through total knee arthroplasty, significant compensatory changes occur not only at the ankle and subtalar joint, but also at the foot,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 26, no. 11, pp. 3230–3237, 2018.

T. Takenaka, K. Ikoma, S. Ohashi et al., “Hindfoot alignment at one year after total knee arthroplasty,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 24, no. 8, pp. 2442–2446, 2016.

N. Krähenbühl, L. Siegler, M. Deforth, L. Zwicky, B. Hintermann, and M. Knupp, “Subtalar joint alignment in ankle osteoarthritis,” Journal of Foot and Ankle Surgery, vol. S1268-7731(17)31298-5, 2017.

J. T. Chandler and J. T. Moskal, “Evaluation of knee and hindfoot alignment before and after total knee arthroplasty: A prospective analysis,” The Journal of Arthroplasty, vol. 19, no. 2, pp. 211–216, 2004.

A. Mullaji and G. M. Shetty, “Persistent hindfoot valgus causes lateral deviation of weightbearing axis after total knee arthroplasty,” Clinical Orthopaedics and Related Research, vol. 469, no. 4, pp. 1154–1160, 2011.

A. A. Norton, J. J. Callaghan, A. Amendola et al., “Correlation of knee and hindfoot deformities in advanced knee OA: compensatory hindfoot alignment and where it occurs,” Clinical Orthopaedics and Related Research, vol. 473, no. 1, pp. 166–174, 2015.

Y. Okamoto, S. Otsuki, T. Jotoku, M. Nakajima, and M. Neo, “Clinical usefulness of hindfoot assessment for total knee arthroplasty: persistent post-operative hindfoot pain and alignment in pre-existing severe knee deformity,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 25, pp. 2632–2639, 2017.

W.-S. Cho, H.-S. Cho, and S.-E. Byun, “Changes in hindfoot alignment after total knee arthroplasty in knee osteoarthritic patients with varus deformity,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 25, no. 11, pp. 3596–3604, 2017.

I. Nakada, I. Nakamura, T. Juji, K. Ito, and T. Matsumoto, “Correlation between knee and hindfoot alignment in patients with rheumatoid arthritis: The effects of subtalar joint destruction,” Modern Rheumatology, vol. 25, no. 5, pp. 689–693, 2015.

J. Y. Choi, S. J. Song, S. J. Kim, S. H. Kim, J. S. Park, and J. S. Suh, “Changes in hindfoot alignment after high or low tibial osteotomy,” Foot & Ankle International, vol. 39, pp. 1097–1105, 2018.

K. Hayashi, Y. Tanaka, T. Kumai, K. Sugimoto, and Y. Takakura, “Correlation of compensatory alignment of the subtalar joint to the progression of primary osteoarthritis of the ankle,” Foot & Ankle International, vol. 29, no. 4, pp. 400–406, 2008.

W.-C. Lee, J.-S. Moon, H. S. Lee, and K. Lee, “Alignment of ankle and hindfoot in early stage ankle osteoarthritis,” Foot & Ankle International, vol. 32, no. 7, pp. 693–699, 2011.

B. Wang, C. L. Saltzman, O. Chalayon, and A. Barg, “Does the subtalar joint compensate for ankle malalignment in end-stage ankle arthritis?” Clinical Orthopaedics and Related Research, vol. 473, no. 1, pp. 318–325, 2015.

S. S. Desai, G. M. Shetty, H.-R. Song, S. H. Lee, T. Y. Kim, and C. Y. Hur, “Effect of foot deformity on conventional mechanical axis deviation and ground mechanical axis deviation during single leg stance and two leg stance in genu varum,” The Knee, vol. 14, no. 6, pp. 452–457, 2007.

W. W. Strash and P. Berardo, “Radiographic assessment of the hindfoot and ankle,” Clinics in Podiatric Medicine and Surgery, vol. 21, no. 3, pp. 295–304, 2004.

H. J. Haight, D. L. Dahm, J. Smith, and D. A. Krause, “Measuring standing hindfoot alignment: Reliability of goniometric and visual measurements,” Archives of Physical Medicine and Rehabilitation, vol. 86, no. 3, pp. 571–575, 2005.

J. C. Cobey, “Posterior roentgenogram of the foot,” Clinical Orthopaedics and Related Research, pp. 202–207, 1976.

C. L. Saltzman and G. Y. El-Khoury, “The hindfoot alignment view,” Foot & Ankle International, vol. 16, no. 9, pp. 572–576, 1995.

B. M. Lamm, R. W. Mendicino, A. R. Catanzariti, and H. J. Hillstrom, “Static rearfoot alignment: A comparison of clinical and radiographic measures,” Journal of the American Podiatric Medical Association, vol. 95, no. 1, pp. 26–33, 2005.

S. E. Seltzer, B. N. Weissman, E. M. Braunstein, D. F. Adams, and W. H. Thomas, “Computed tomography of the hindfoot,” Journal of Computer Assisted Tomography, vol. 8, no. 3, pp. 488–497, 1984.

F. M. Buck, A. Hoffmann, N. Mamisch-Saupe, N. Espinosa, D. Resnick, and J. Hodler, “Hindfoot alignment measurements: Rotation-stability of measurement techniques on hindfoot alignment view and long axial view radiographs,” American Journal of Roentgenology, vol. 197, no. 3, pp. 578–582, 2011.

S. J. Ellis, T. Deyer, B. R. Williams et al., “Assessment of lateral hindfoot pain in acquired flatfoot deformity using weightbearing multiplanar imaging,” Foot & Ankle International, vol. 31, no. 5, pp. 361–371, 2010.

N. Krähenbühl, M. Tschuck, L. Bolliger, B. Hintermann, and M. Knupp, “Orientation of the subtalar joint: measurement and reliability using weightbearing CT scans,” Foot & Ankle International, vol. 37, no. 1, pp. 109–114, 2016.

Y. Takakura, Y. Tanaka, T. Kumai, and S. Tamai, “Low tibial osteotomy for osteoarthritis of the ankle. Results of a new operation in 18 patients,” The Journal of Bone & Joint Surgery (British Volume), vol. 77, no. 1, pp. 50–54, 1995.

Y. Hara, K. Ikoma, Y. Arai, S. Ohashi, M. Maki, and T. Kubo, “Alteration of hindfoot alignment after total knee arthroplasty using a novel hindfoot alignment view,” The Journal of Arthroplasty, vol. 30, no. 1, pp. 126–129, 2015.

K. W. Nha, S. H. Lee, I. J. Rhyu et al., “Safe zone for medial open-wedge supramalleolar osteotomy of the ankle: a cadaveric study,” Foot & Ankle International, vol. 37, no. 1, pp. 102–108, 2016.