Advances in Physical Chemistry
Volume 2017 (2017), Article ID 9437487, 7 pages
https://doi.org/10.1155/2017/9437487

Research Article

Superparamagnetic Iron Oxide (Fe₃O₄) Nanoparticles Coated with PEG/PEI for Biomedical Applications: A Facile and Scalable Preparation Route Based on the Cathodic Electrochemical Deposition Method

Isa Karimzadeh,1,2 Mustafa Aghazadeh,³ Taher Doroudi,¹ Mohammad Reza Ganjali,4,5 and Peir Hossein Kolivand¹

¹Shefa Neuroscience Research Center, Khatam ol Anbia Specialty and Subspecialty Hospital, Tehran, Iran
²Department of Physics, Faculty of Science, Islamic Azad University, Tehran, Iran
³NFCRS, Nuclear Science and Technology Research Institute (NSTRI), P.O. Box 14395-834, Tehran, Iran
⁴Center of Excellence in Electrochemistry, Faculty of Chemistry, University of Tehran, Tehran, Iran
⁵Biosensor Research Center, Endocrinology and Metabolism Molecular-Cellular Sciences Institute, Tehran University of Medical Sciences, Tehran, Iran

Correspondence should be addressed to Mustafa Aghazadeh; maghazadeh@aeoi.org.ir

Received 26 July 2016; Revised 13 December 2016; Accepted 9 January 2017; Published 13 February 2017

Academic Editor: Jeffrey M. Zaleski

Copyright © 2017 Isa Karimzadeh et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Cathodic electrochemical deposition (CED) is introduced as an efficient and effective method for synthesis and surface coating of superparamagnetic iron oxide nanoparticles (SPIONs). In this way, bare Fe₃O₄ nanoparticles were electrosynthesized through CED method from aqueous solution Fe³⁺ : Fe²⁺ chloride (molar ratio of 2 : 1). In the next step, the surface of NPs was coated with polyethyleneimine (PEI) and polyethylene glycol (PEG) during the CED procedure, and PEG/PEI coated SPIONs were obtained. The prepared NPs were evaluated by powder X-ray diffraction (XRD), Fourier transform infrared spectroscopy (FTIR), thermogravimetric analysis (TGA), dynamic light scattering (DLS), vibrating sample magnetometer (VSM), and field-emission scanning electron microscopy (FE-SEM). The pure magnetite phase and nanosize (about 15 nm) of the prepared NPs were confirmed by XRD and FE-SEM. The presence of two coats (i.e., PEG and PEI) on the surface of electrosynthesized NPs was proved via FTIR results. The percentage of polymer coat (37.5%) on the NPs surface was provided by TGA analysis. The high magnetization value, negligible coercivity, and remanence measured by VSM indicate the superparamagnetic nature of both prepared NPs. The obtained results confirmed that the prepared Fe₃O₄ nanoparticles have suitable physicochemical and magnetic properties for biomedical applications.

1. Introduction

In recent years, the application of magnetic nanoparticles (MNPs) in areas of bionanotechnology and biomedicine has been highly interesting, which is mainly due to the multiple properties offered by this type of material [1–3]. MNPs properties are essentially originated from their size and composition, when compared to the bulk material. Applications in the mentioned areas necessitate MNPs forming of stable colloidal suspensions, in addition to being compatible, nontoxic, and nonimmunogenic. Iron oxide MNPs are constructed by a magnetite (Fe₃O₄) or maghemite (γ-Fe₂O₃) core coated with biocompatible surface layer like a polymer. The biocompatibility and nontoxicity of the surface coating are very interesting features of nanoparticles that have direct effects on cellular uptake of nanoparticles, blood circulation, metabolism, and biodistribution [4, 5].

Up to now, there are many reports on the preparation of MNPs through various chemical methods like as sol-gel, coprecipitation, hydrothermal method, thermal decomposition, microemulsion, and colloidal chemistry method. In addition to these methods, electrochemical synthesis can be applied for the preparation of MNPs. But, this method has been rarely studied and only a few reports are available in literature [6–9]. As an electrochemical procedure, cathodic electrochemical deposition (CED) has advantages of facility and ability of controlling the purity, crystallinity, and size of synthesized NPs by manipulating the applied conditions like current, potential, electrolyte composition, pH, and concentration [10–13]. It was reported that cathodic deposition of Fe₃O₄ nanoparticles (NPs) can be easily achievable via base (OH) electrogeneration on the cathode surface [6–9]. For the first time, basic work on the CED preparation of Fe₃O₄ nanoparticles has been reported by Marques et al. [6, 7] where they observed that the CED method results in Fe₃O₄ nanoparticles with controlled size and dispersion. Recently, we report the preparation of Fe₃O₄ nanoparticles from aqueous medium through CED method and their in situ surface coating with polyethylene glycol, polyvinyl chloride, and poly(vinylpyrrolidone) polymers [8, 9]. It was reported that conducting polymers have outstanding mechanical, electrical, and thermal properties. This is the reason that these materials have been targeted for many potential applications [10–17]. Here, we applied, for the first time, this method for preparation of double coated iron oxide nanoparticles with desired size and magnetic behavior from aqueous medium. The polyethylene glycol (PEG) and polyethylene imine (PEI) were used as the coating agents. In the electrodeposition experiments, the electrochemical conditions were first optimized to obtain the bare or uncoated Fe₃O₄ NPs with proper characteristics. The purity, well dispersion, nanosize, and superparamagnetic property of the prepared nanoparticles were identified via XRD, FE-SEM, TEM, and VSM analyses. PEG and PEI polymers were then coated on the surface of Fe₃O₄ NPs during their CED synthesis. The double coat on the surface of the deposited NPs was confirmed by FTIR, DSC-TGA, and DLS analyses. In spite of the most used chemical routes which have multistep procedure and require long time (8–12 h) and high temperature (40–80°C) for coating process, our developed method was in situ, simple, one-pot, and time conserving. Furthermore, this one-pot, in situ, and simultaneous double coating of surface of Fe₃O₄ NPs has not been reported until now.

2. Experimental

2.1. Materials

Ferric chloride hexahydrate (FeCl₃·6H₂O), ferrous chloride tetrahydrate (FeCl₂·4H₂O), polyethylene glycol (PEG, ), polyethyleneimine (PEI, ~25000), and ethanol (C₂H₅OH) were purchased from Merck. Graphite plate and stainless steel (316L) were purchased from local companies. All the chemicals used were of reagent grade.

2.2. Preparation Procedure of Nanoparticles

Bare nanoparticles of Fe₃O₄ were prepared through cathodic electrochemical deposition (CED) method. Galvanostat regime was applied in the electrodeposition experiments. In this way, a two-electrode set-up was designed based on the stainless-steel cathode centered between two graphite anodes, as shown in Figure 1. A mixed solution of 0.005 M [FeCl₂ (1.6 g/l) and FeCl₃ (2.4 g/l)] with molar ratio of 1 : 2 was prepared and as the bath composition. The deposition experiments were performed using a DC power supply (PROVA 8000). The current density of 10 mA cm⁻² was applied for 30 min to the electrochemical cell and black deposit was formed on the steel cathode surface. After the deposition step, the steel substrate was removed from the electrolyte and rinsed with distilled water several times to remove free anions. Then, the black deposit was scraped form the electrode surface and dissolved in the ethanol solution to be centrifuged at 6000 rpm for 30 min. After this step, the deposits were washed several times with ethanol, separated by magnet, dried in a vacuum oven, and subjected to characterization analyses.

Figure 1: Electrochemical set-up used for electrosynthesis of nanoparticles.

2.3. Preparation Procedure of Coated Nanoparticles

The similar electrochemical set-up and conditions were used for the preparation of polymer coated nanoparticles. A mixed solution of 0.005 M [FeCl₂/FeCl₃: with molar ratio of 1 : 2] and 2 gr/L [PEG (1 gr) + PEI (1 gr)] was prepared as deposition bath. The bare Fe₃O₄ nanoparticles were synthesized from the deposition bath of 0.01 M [FeCl₂/FeCl₃] with molar ratio of 1 : 2. The electrosynthesis process was then carried out in the presence of PEG and PEI polymers with applying current density of 10 mA cm⁻² for 30 min. The black deposit was performed at this step on the cathode surface. After the deposition step, the purification steps were done as follows: (i) the steel substrate was removed from the electrochemical cell and washed several times with deionized water. (ii) The deposits were scraped from the surface of steel sheet and dissolved in ethanol solution. (iii) Washing several times with ethanol was done to remove the free and uncoated polymers to the surface of deposit. (iv) Then, the deposits were dispersed in ethanol and centrifuged at 6000 rpm for 30 min. (v) After this step, the black powder was separated from ethanol solution by magnet, and the obtained wet powder was dried in a vacuum oven. Finally, the prepared powder was characterized by various analyses.

2.4. Characterization Procedure

The XRD patterns of the prepared samples were recorded on a Philips powder diffractometer PW-1800 with Co Kα radiation ( Å). The crystallite sizes are estimated from the X-ray line broadening using Scherrer formula. The infrared spectra were recorded in the range 4000–400 cm⁻¹ on a Fourier transform infrared spectrometer (FTIR, Bruker Vector 22 spectroscope). The morphological micrographs were taken by field-emission scanning electron microscope (FE-SEM, TE-SCAN Model MIRA3, operating voltage 30 kV) and Zeiss transmission electron microscope (TEM, Zeiss EM 900 with accelerating voltage of 80 kV) for particle size determination. Thermal behavior analysis (DTA-TG) was done in N₂ between room temperature and 600°C at a heating rate of 5°C min⁻¹ using a STA-1500 thermoanalyzer. Dynamic light scattering (DLS) measurement was performed using Malvern 4700 Autosizer employing a 7132-digital correlator for the determination of hydrodynamic diameter. Vibrating sample magnetometer (VSM) (Model: Lake shore 7400, United States) was employed to study the hysteresis loops and the magnetic properties of the magnetite nanoparticles.

3. Results and Discussions

The XRD patterns of both prepared samples are shown in Figure 2. From these patterns, it can be easily observed that the prepared samples are composed of crystalline single phase cubic inverse spinel Fe₃O₄ structure, where the position and relative intensity of all observed diffraction peaks are matched well with those of the JCPDS Card number 88-0315 for magnetite. No peak is observed from any impurities. Notably, the characteristic peaks of the coated nanoparticles have no shift in the position but have some broadening, indicating that the coated sample has small crystalline size as compared with uncoated one. Furthermore, the peak intensity of the coated sample is lower than that of uncoated one, which is related to the existence of PEG/PEI coat on the surface of Fe₃O₄ nanoparticles. The crystallite size was calculated by measuring the half-height width of the strongest reflection plane (i.e., 311), using the well-known Scherrer formula (), where is the full width at half maxima (FWHM) of the (311) peak. Based on the calculations, crystallite sizes of the bare and coated Fe₃O₄ NPs were estimated to be 10.1 nm and 8.3 nm, respectively. These findings confirmed that the pure magnetite phase of iron oxide can be easily prepared by direct current CED method.

Figure 2: XRD patterns of the electrosynthesized (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

To better characterize the phase and composition of the prepared nanoparticles, FTIR analysis was performed. Figure 3 exhibits the IR spectra of the prepared nanoparticles. The FTIR spectrum of the uncoated NPs (in Figure 3(a)) has the characteristic absorbance bands of nanosized magnetite, that is, two strong bands around 565 and 621 cm⁻¹, resulting from a split of the ν1 band of the Fe-O bond and a weaker band at 421 cm⁻¹, corresponding to the ν2 band of the Fe-O bond [17, 18]. The absorption bands around 1633 and 3448 cm⁻¹ originate from stretching and deformation vibrations of hydroxyl groups connected to the surface of nanoparticles [8]. For the coated NPs, the three mentioned peaks are located around 571, 625, and 441 cm⁻¹, which exhibit a little blue shift. This shift implicates the change in environment of the NPs after coating with PEG/PEI, where the new bands between iron oxide and OH groups of PEG and amine groups of PEI have been formed [18, 19].

(a)

(b)

Figure 3: IR spectra of the prepared (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

In the spectrum of the coated nanoparticles, there are some new bands, which can be assigned to the following vibrations: the bands at 3435 and 1646 cm⁻¹ due to the -NH₂ groups in PEI structure [13, 19, 20]. Furthermore, the CH₂ bending vibration at 2882 cm⁻¹, the stretching of N-C-H at 2812 cm⁻¹, the scissoring of CH₂ at 1475 cm⁻¹, the wagging and twisting of CH₂ at 1354 and 1297 cm⁻¹, and the stretching of C-N at 1129 cm⁻¹ are all the characteristic IR peaks of PEI [13, 19, 20]. Also, a wide peak at 3200–3700 cm⁻¹ and sharp one at 1005 cm⁻¹ are related to the vibrations of O-H and C-O-C bonds of PEG, respectively. The bands of O-H vibration modes of PEG are also seen at 864 and 1156 cm⁻¹ [17, 19]. All of these findings completely confirmed the presence of both PEI and PEG on the surface of electrosynthesized nanoparticles and hence the prepared NPs are double coated. So, it can be stated that in situ, on-pot, and simultaneous double coating of iron oxide surface during the electrodeposition process is achievable by our used strategy.

FE-SEM observations were used to provide the morphological properties of the prepared samples which are shown in Figure 4. It is evident that both prepared Fe₃O₄ samples are nearly spherical in shape at nanoscale. In fact, both uncoated and coated samples have particle morphology with spherical shape and no obvious aggregation. The mean diameter of both uncoated and coated particles was measured to be around 20 nm. Notably, the PEG/PEI coated NPs have relative better dispersion as compared with bare NPs. For better observation of morphology of the prepared NPs, the TEM observations of NPS are shown in Figure 5. From TEM images in Figure 5, it is clearly observable that both prepared NPs have spherical shape. The PEG/PEI coated NPs exhibit better dispersibility, as seen in Figure 5(b), where the bare NPs are rather agglomerated. The less agglomerated texture of the PEG/PEI coated NPs can be related to the effect of polymer layer during the particle formation. It seems that coating of the Fe₃O₄ NPs with polymer leads to decreasing the magnetic interaction among the particles due to their reduced magnetism (as confirmed by VSM in Figure 8) and prevents their agglomeration. From TEM images, the mean diameters of the bare and PEG/PEI coated particles were estimated to be 10 nm and 15 nm, respectively. This size increase confirmed the presence of the polymer layer on the Fe₃O₄ particles.

(a)

(b)

Figure 4: FE-SEM images of the prepared (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

(a)

(b)

Figure 5: TEM images of the prepared (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

TGA and DSC curves of the prepared nanoparticles are shown in Figure 6. It can be seen that coated NPs have completely different thermal behavior as compared with bare NPs. This difference may be originated form the presence of polymer coat on the surface of NPs. The uncoated nanoparticles were thermally stable and no special endo and/or exothermic peak was observed in the DSC curve (Figure 6(a)), and correspondingly there was no essential weight loss over the entire temperature range in TG curve (Figure 6(b)). For the bare NPs, TG curve exhibited only 1.6% weight loss, where the largest portion of these weight losses occurred at the temperatures of 25–200°C. Hence, this weight loss is related to removal of the physically adsorbed water and/or hydroxyl groups on the surface of Fe₃O₄ nanoparticles. For the coated nanoparticles, DSC curve in Figure 6(a) exhibits a multistep exothermic peak at the temperature range of 100–600°C. Respectively, TG curve shows three sharp weight losses with total losses of about 37.5% (Figure 6(b)). It was reported that the decomposition of pure PEG started at around 350°C and ended at 425°C [24]. Furthermore, it was also observed that the decomposition of PEG coat of NPs is started around 177°C and ended at around 352°C [25–28]. It has been observed that PEI coat on the surface of NPs is decomposed at the temperatures of 200–400°C with a relative sharp peak at 250°C [21, 29–31]. Hence, the weight loss of 37.5% results from the decomposition of PEG and PEI polymers from the surface of NPs. After 500°C, there is no obvious change in weight throughout the temperature range up to 600°C (Figure 6), indicating the complete decomposition of coating agents. These results confirmed the in situ double coating of Fe₃O₄ nanoparticles during their electrosynthesis procedure.

(a)

(b)

Figure 6: DSC-TG curves for the prepared (a) bare and (b) PEG/PEI coated Fe₃O₄ nanoparticles.

DLS analysis was used for determination of the hydrodynamic diameter of both uncoated and coated nanoparticles. Figure 7 indicates the measured particle size of the bare and PEG/PEI coated nanoparticles. For the bare NPs (Figure 7(a)), the mean hydrodynamic diameter was measured to be ~20 nm. For the coated NPs, this value is observed to be ~58, which is larger than that of bare NPs. These results clearly prove the coat layer on the surface of electrodeposited NPs.

Figure 7: Particle size distributions of (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

Figure 8: VSM curves for the prepared (a) bare and (b) PEG/PEI coated Fe₃O₄ NPs.

The magnetic characteristics of the prepared nanoparticles in the presence of magnetic field were measured using a vibrating sample magnetometer (VSM). Figure 8 shows the hysteresis loops of the bare and PEG/PEI coated NPs at RT. For both prepared NPs, the magnetization reduces from plateau state to zero on removal of the magnetic field. This behavior proved that our particles are superparamagnetic. The uncoated NPs exhibit saturation magnetization () of 71.5 emu/g and have small remanent magnetization (≈0.81 emu/g) and coercivity (Ce~2.3Oe) indicating their suitable magnetic behavior. The polymer coated nanoparticles exhibit ≈32.5 emu/g, ≈0.54 emu/g, and Ce 1.25Oe. These findings indicate that our prepared particles have proper behavior and can be used in biomedical applications.

4. Conclusion

Bare and polymer coated Fe₃O₄ nanoparticles were prepared via cathodic electrochemical deposition method. The prepared bare and PEG/PEI coated nanoparticles were characterized by FTIR, DLS, TGA, FE-SEM, TEM, and VSM. The results confirmed the prepared nanoparticles have proper physicochemical and magnetic properties for biomedical applications.

Competing Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

G. Kandasamy and D. Maity, “Recent advances in superparamagnetic iron oxide nanoparticles (SPIONs) for in vitro and in vivo cancer nanotheranostics,” International Journal of Pharmaceutics, vol. 496, no. 2, pp. 191–218, 2015.

N. Lee, D. Yoo, D. Ling, M. H. Cho, T. Hyeon, and J. Cheon, “Iron Oxide based nanoparticles for multimodal imaging and magnetoresponsive therapy,” Chemical Reviews, vol. 115, no. 19, pp. 10637–10689, 2015.

W. Wu, Z. Wu, T. Yu, C. Jiang, and W.-S. Kim, “Recent progress on magnetic iron oxide nanoparticles: synthesis, surface functional strategies and biomedical applications,” Science and Technology of Advanced Materials, vol. 16, no. 2, Article ID 023501, 4 pages, 2015.

R. A. Bohara, N. D. Thorat, and S. H. Pawar, “Role of functionalization: strategies to explore potential nano-bio applications of magnetic nanoparticles,” RSC Advances, vol. 6, no. 50, pp. 43989–44012, 2016.

F. Roohi, J. Lohrke, A. Ide, G. Schütz, and K. Dassler, “Studying the effect of particle size and coating type on the blood kinetics of superparamagnetic iron oxide nanoparticles,” International Journal of Nanomedicine, vol. 7, pp. 4447–4458, 2012.

R. F. C. Marques, C. Garcia, P. Lecante et al., “Electro-precipitation of Fe₃O₄ nanoparticles in ethanol,” Journal of Magnetism and Magnetic Materials, vol. 320, no. 19, pp. 2311–2315, 2008.

M. Ibrahim, K. G. Serrano, L. Noe, C. Garcia, and M. Verelst, “Electro-precipitation of magnetite nanoparticles: An Electrochemical Study,” Electrochimica Acta, vol. 55, no. 1, pp. 155–158, 2009.

I. Karimzadeh, H. R. Dizaji, and M. Aghazadeh, “Development of a facile and effective electrochemical strategy for preparation of iron oxides (Fe₃O₄ and γ-Fe₂O₃) nanoparticles from aqueous and ethanol mediums and in situ PVC coating of Fe₃O₄ superparamagnetic nanoparticles for biomedical applications,” Journal of Magnetism and Magnetic Materials, vol. 416, pp. 81–88, 2016.

I. Karimzadeh, M. Aghazadeh, M. R. Ganjali et al., “A novel method for preparation of bare and poly(vinylpyrrolidone) coated superparamagnetic iron oxide nanoparticles for biomedical applications,” Materials Letters, vol. 179, pp. 5–8, 2016.

V. P. Pattar and S. T. Nandibewoor, “Electroanalytical method for the determination of 5-fluorouracil using a reduced graphene oxide/chitosan modified sensor,” RSC Advances, vol. 5, no. 43, pp. 34292–34301, 2015.

A. M. Bagoji and S. T. Nandibewoor, “Electrocatalytic redox behavior of graphene films towards acebutolol hydrochloride determination in real samples,” New Journal of Chemistry, vol. 40, no. 4, pp. 3763–3772, 2016.

V. P. Pattar and S. T. Nandibewoor, “Staircase voltammetric determination of 2-thiouracil in pharmaceuticals and human biological fluids at polyaniline and polypyrrole film modified sensors,” Sensors and Actuators A: Physical, vol. 250, pp. 40–47, 2016.

M. Aghazadeh, I. Karimzadeh, T. Droudi, M. R. Ganjali, and P. H. Kolivand, “Effective preparation, characterization and in situ surface coating of superparamagnetic Fe₃O₄ nanoparticles with polyethyleneimine through cathodic electrochemical deposition (CED) method for biomedical applications,” Current Nanoscience, vol. 13, 2016.

I. Karimzadeh, M. Aghazadeh, M. R. Ganjali, P. Norouzi, T. Doroudi, and P. H. Kolivand, “Saccharide-coated superparamagnetic Fe₃O₄ nanoparticles (SPIONs) for biomedical applications: an efficient and scalable route for preparation and in situ surface coating through cathodic electrochemical deposition (CED),” Materials Letters, vol. 189, pp. 290–294, 2017.

K. Movlae, M. R. Ganjali, M. Aghazadeh et al., “Graphene nanocomposite modified glassy carbon electrode: as a sensing platform for simultaneous determination of methyldopa and uric acid,” International Journal of Electrochemical Science, pp. 305–315, 2017.

I. Karimzadeh, M. Aghazadeh, and S. Shirvani-Arani, “Preparation of polymer coated superparamagnetic iron oxide (Fe₃O₄) nanoparticles for biomedical application,” International Journal of Bio-Inorganic Hybrid Nanomaterials, vol. 5, no. 1, pp. 33–41, 2016.

I. Karimzadeh, H. Rezagholipour Dizaji, and M. Aghazadeh, “Preparation, characterization and PEGylation of superparamagnetic Fe₃O₄ nanoparticles from ethanol medium via cathodic electrochemical deposition (CED) method,” Materials Research Express, vol. 3, no. 9, Article ID 095022, 2016.

M. Peng, H. Li, Z. Luo et al., “Dextran-coated superparamagnetic nanoparticles as potential cancer drug carriers in vivo,” Nanoscale, vol. 7, no. 25, pp. 11155–11162, 2015.

A. Masoudi, H. R. Madaah Hosseini, M. A. Shokrgozar, R. Ahmadi, and M. A. Oghabian, “The effect of poly(ethylene glycol) coating on colloidal stability of superparamagnetic iron oxide nanoparticles as potential MRI contrast agent,” The International Journal of Pharmaceutics, vol. 433, no. 1-2, pp. 129–141, 2012.

H. Cai, X. An, J. Cui et al., “Facile hydrothermal synthesis and surface functionalization of polyethyleneimine-coated iron oxide nanoparticles for biomedical applications,” ACS Applied Materials and Interfaces, vol. 5, no. 5, pp. 1722–1731, 2013.

C. Peng, Y. S. Thio, and R. A. Gerhardt, “Enhancing the layer-by-layer assembly of indium tin oxide thin films by using polyethyleneimine,” The Journal of Physical Chemistry C, vol. 114, no. 21, pp. 9685–9692, 2010.

L. Hu, D. Hach, D. Chaumont, C.-H. Brachais, and J.-P. Couvercelle, “One step grafting of monomethoxy poly(ethylene glycol) during synthesis of maghemite nanoparticles in aqueous medium,” Colloids and Surfaces A: Physicochemical and Engineering Aspects, vol. 330, no. 1, pp. 1–7, 2008.

J. L. Zhang, R. S. Srivastava, and R. D. K. Misra, “Core-shell magnetite nanoparticles surface encapsulated with smart stimuli-responsive polymer: synthesis, characterization, and LCST of viable drug-targeting delivery system,” Langmuir, vol. 23, no. 11, pp. 6342–6351, 2007.

S. Santra, R. Tapec, N. Theodoropoulou, J. Dobson, A. Hebard, and W. Tan, “Synthesis and characterization of silica-coated iron oxide nanoparticles in microemulsion: the effect of nonionic surfactants,” Langmuir, vol. 17, no. 10, pp. 2900–2906, 2001.

Y. Junejo, A. Baykal, and H. Sözeri, “Simple hydrothermal synthesis of Fe3O4-PEG nanocomposite,” Central European Journal of Chemistry, vol. 11, no. 9, pp. 1527–1532, 2013.

W. R. Viali, E. Da Silva Nunes, C. C. Dos Santos et al., “PEGylation of SPIONs by polycondensation reactions: a new strategy to improve colloidal stability in biological media,” Journal of Nanoparticle Research, vol. 15, no. 8, article no. 1824, 2013.

C. Barrera, A. P. Herrera, N. Bezares et al., “Effect of poly(ethylene oxide)-silane graft molecular weight on the colloidal properties of iron oxide nanoparticles for biomedical applications,” Journal of Colloid and Interface Science, vol. 377, no. 1, pp. 40–50, 2012.

A. Mukhopadhyay, N. Joshi, K. Chattopadhyay, and G. De, “A facile synthesis of PEG-coated magnetite (Fe₃O₄) nanoparticles and their prevention of the reduction of cytochrome C,” ACS Applied Materials and Interfaces, vol. 4, no. 1, pp. 142–149, 2012.

W.-J. Son, J.-S. Choi, and W.-S. Ahn, “Adsorptive removal of carbon dioxide using polyethyleneimine-loaded mesoporous silica materials,” Microporous and Mesoporous Materials, vol. 113, no. 1–3, pp. 31–40, 2008.

F. Wang, P. Liu, T. Nie, H. Wei, and Z. Cui, “Characterization of a polyamine microsphere and its adsorption for protein,” International Journal of Molecular Sciences, vol. 14, no. 1, pp. 17–29, 2013.

M. Qi, K. Zhang, S. Li et al., “Superparamagnetic Fe₃O₄ nanoparticles: synthesis by a solvothermal process and functionalization for a magnetic targeted curcumin delivery system,” New Journal of Chemistry, vol. 40, no. 5, pp. 4480–4491, 2016.