Advances in Power ElectronicsVolume 2014 (2014), Article ID 383089, 11 pageshttp://dx.doi.org/10.1155/2014/383089

Research Article

An FPGA Chaos-Based PWM Technique Combined with Simple Passive Filter for Effective EMI Spectral Peak Reduction in DC-DC Converter

Sudhakar Natarajan and Rajasekar Natarajan

School of Electrical Engineering, VIT University, Vellore, Tamilnadu 632014, India

Received 21 September 2013; Revised 10 December 2013; Accepted 16 December 2013; Published 24 February 2014

Academic Editor: Gabriele Grandi

Copyright © 2014 Sudhakar Natarajan and Rajasekar Natarajan. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A new and simple but effective electromagnetic interference suppression technique based on field programmable logic array (FPGA) technology to provide a significant EMI noise attenuation in DC-DC converters is discussed. The voltage controlled boost converter for EMI reduction is analyzed using FFT under traditional PWM technique and chaotic mode operation. This technique aids the DC-DC converters to comply in specified EMI limits and replace conventional bulky passive filter with a simple passive filter. A prototype model has been tested and hardware results show significant reduction of EMI in chaotic mode operation of the boost converter.

1. Introduction

Electromagnetic iterference is a man-made or natural electromagnetic disturbance signal which results in unacceptable response and sometimes in malfunctioning of an electrical or electronic device. So it is essential to suppress the EMI at switching. Though there are organizations such as IEC, IEEE, and FCC that are consistently insisting on EMC standards for different environments, the increasing essentiality of DC-DC converter in different applications [1] also increases the conducted EMI problems. Wide deployment of DC-DC power converters in emerging engineering applications such as hybrid vehicles, SMPS, satellite power supply units, and bio medical instrumentation [2] also increases the risk of EMI. Generally DC-DC converters release electromagnetic emissions because of very high switching frequency and therefore are the main sources of EMI [3, 4]. So suppressing EMI in a DC-DC converter is of great significance to clean the environment.

The EMI filters are traditionally used in power converters to attenuate switching noise and to meet the EMI standards for many years now. However, the bulkiness, design limitation for a band of frequency, parasitic reactive elements, and chance of attenuating the useful signal lead to some other effective alternatives like soft switching and random modulation techniques. However, soft switching has some limitations because of its auxiliary circuits. But incorporation of chaotic modulation, a type of random modulation method, is effective in suppression of EMI for a wider range of frequency.

Over the years, EMI filters are widely used in power electronics systems for EMI noise suppression [5, 6]. However, the parasitic effect of filter plays vital role in Common Mode and in Differential Mode EMI filters. In order to compensate the degradation caused by the parasitic elements in the common mode (CM) filter [4], another element is connected on the LISN side. Thus the pi-shaped filter is very simple, economic, and less prone to parasitic effect.

Though there are lots of techniques, such as EMI filter and shielding, for mitigation of EMI, they work as a remedy after EMI is generated [7, 8]. However, in comparison, chaotic PWM method suppresses the EMI at switching itself. Chaotic switching reduces the chance of accumulation of noise power at the multiples of central frequency greatly. Hence, the noise power spreads over a wide range of frequency resulting in reduced spectral peaks.

FPGAs—field programmable gate arrays [9] are future-oriented building bricks which allow perfect customization of hardware with a lesser price even for lesser units. FPGA components are easily available in different sizes and also at a cheaper price. A possibility in near future of synthesizing an application-specific integrated IP cores FPGA may avoid the time-consuming and expensive redesign of the board, especially for very specialized applications with small or medium volumes. With help of FPGA-based random pulse generation, spread spectrum scheme can be accomplished [10].

By combining the advantages of EMI filtering with chaotic PWM switching, it is possible to achieve effective spectral peak reduction in the network. Hence, in this paper, the objective of effective EMI suppression is realized by incorporating the technique by this novel combination. First, the simulations of conventional PWM technique and chaotic switching are done. Then the hardware prototype of passive filter [7] is designed for EMI filtering and later added to the chaotically switched DC-DC converter in which the hard ware prototype is driven by pulses generated using the cost-effective FPGA.

The organization of this paper is as follows. Section 2 discusses the basic topology of boost converter and circuit diagram of the proposed method. Section 3 deals with design of passive EMI filter. Section 4 describes the chaotic PWM generation and advantages of randomization of pulse frequency in detail. Section 5 deals with the simulation results and analysis of the above-discussed technique. The practical implementation and conclusion through validation are discussed in Sections 6 and 7, respectively.

Figure 1 describes the basic functionality of a power supply unit supplying different applications and the EMI coupling path. The arrow mark indicates the path of the conducted EMI through the equipment. The common mode noise enters into the medical equipment through lines and returns back via the chassis ground, wherein, the differential mode noise couples between the lines. , , and are different voltage levels.

Figure 1: EMI Coupling path in ideal AC-DC power supply.

2. DC-DC Power Converter

Power electronic circuits are typical examples of variable structure systems where the topology is changed due to the operation of the switching element. As a result, systems become nonlinear and time varying. Although DC-DC converters are well known for their significant advancement in power density and their low thermal dissipation, threat of generating EMI by di/dt and dv/dt at high frequencies is always been a concern. As the DC-DC converter follows a new trend of power generation, their switching frequencies have increased dramatically to reduce their dimensions.

DC-DC converter sheds electromagnetic emissions and thus forms the main source of EMI. Therefore, controlling EMI in a DC-DC converter is of great importance for cleaning the entire EMI environment. Of all types of DC-DC converters, boost converters are widely adopted and its general circuit diagram is shown in Figure 2. And the functional block diagram for the proposed combined technique is shown in Figure 3.

Figure 2: Basic topology of boost converter with chaotic PWM.

Figure 3: Block diagram for the proposed method.

The elaborated circuit diagram of the proposed methodology is shown in Figure 4 which is comprised of both EMI filter [11–15] and chaotic switching method, where Inductor , Capacitor , Diode , and Switch belong to the power circuit and and are the filter parameters.

Figure 4: Circuit diagram for the proposed method.

The LISN is stabilizing the impedance of the source and the circuit for the accurate measurement of conducted EMI generated in the boost converter. The techniques are combined for the effective reduction of the EMI as discussed earlier.

3. EMI Filter Design

EMI Filters are widely used in power electronic systems for EMI noise suppression. Conventional passive EMI filters are either one-or two-stage LC filters. EMI filters are usually composed of common mode (CM) and differential mode (DM) filters. CM filters are used to suppress CM noise, which flows through the parasitic capacitance between the power electronics systems, ground, line impedance stabilization network (LISN), and the power lines. The capacitance of common mode (CM) filter is usually limited by the safety standard-IEC60950-1. As a result, the total CM capacitance cannot be too large. Hence, to achieve the low cutoff frequency to achieve high attenuation on CM noise, the CM inductance in CM filters is usually very large. The inductors and capacitors in EMI filters are not ideal components. Firstly, they are self-parasitic [16]. For capacitors, the equivalent series inductance (ESL) is very important for its performance. Likewise in inductors, the equivalent parallel capacitance (EPC) is very important for its performance. Secondly, there are parasitic couplings between these two components. The coupling between the input and output loops of the filters is also important. For CM filters, the EPC of the CM inductors is usually the most important parasitic parameter since it may resonate with the CM inductance at very low frequencies. The magnetic flux of CM current is constrained in magnetic cores of the CM inductors and the size of CM capacitors is small, so the coupling is not as significant as that of DM filters. Here a simplified common mode passive filter is designed to aid the random modulation switching for 100 kHz central frequency for EMI suppression. The equivalent circuit for CM noise with filter is shown in the Figure 5(a).

(a)

(b)

Figure 5: (a) General equivalent circuit of CM noise with filter. (b) Schematic of CM filter and CM noise source.

The common mode noise is considered with high source but low load impedances and, according to the impedance mismatch criteria for EMI filter design, a Γ-shaped filter (CL topology) should be incorporated for CM noise suppression, where the capacitor is faced with an inverter and the CM choke is faced with a line impedance stabilization network (LISN). However, due to the effect of stray winding capacitance, the CM choke is no longer with an inductance property after its self-resonant frequency. In order to pay off the filtration performance degradation caused by the parasitic winding capacitance of the CM choke, another capacitor is connected on the LISN side; thus, a -shaped filter is created. Figure 5(b) demonstrates the topology of a CM filter and CM noise source power converter, where EPC signifies the parasitic winding capacitance of the CM choke [17]. The main origin of CM noise in a pulse width modulation (PWM) converter is the mandatory parasitic capacitance distributed from converter inductor and inductive loads to ground. The capacitor shown in Figure 5(b) provides the return path for the current charging and discharging. The parasitic capacitance of the CM choke prevents the charging current from running through the supply lines to the LISN resistor, and the capacitor is used because of the nonideal property of the CM choke [18, 19]. Therefore, it is recommended that -shaped topology should be used for single-stage high-performance CM filter design in high-frequency applications.

The common mode filter is designed as follows. The attenuation amplitude is shown in (1) which is the ratio of common-mode voltage without filter over its counterpart with common-mode filter: where is the common-mode voltage by measuring LISN with common-mode filter, in dBV; is the common-mode voltage by measuring LISN without common-mode filter, in dBV; indicates the impedance of LISN and means the impedance of common-mode noise source. The common-mode voltage measured across the LISN without the common-mode filter can be derived as Further the reduction of (2) can be derived as shown in (3) provided that : means the impedance of common-mode inductance and means the impedance of common-mode capacitance:

The common-mode voltage measured across the LISN with the common-mode filter can be therefore derived as where Further reduction of (5) can be derived as shown in (7) provided that Substituting (3) and (7) into (1) yields And, by (8), the impedance of common-mode inductance can be derived as follows:

For the output voltage 24 V and the load current of 0.2423 A, the output impedance calculated is 99.05 ohms. The filter capacitor and inductor that could be calculated from the formula (10) are 0.01606 F and 0.158 mH. The inductor value is split with half in the hot side and half in the return side of 0.079 mH each:

4. Chaotic Pulse Width Modulation (CPWM)

Pulse width modulation technique is generally used for generating the pulses required for switching operation in the DC-DC converter. In PWM, the carrier wave will be a chaotic carrier wave and the modulating signal remains the same, that is, DC signal. The frequency of the carrier wave determines the frequency of the PWM pulses; since the carrier wave is chaotic in nature [10], the PWM pulse also being chaotic; that is, the frequency will spread over a range. Therefore the main part of chaotic PWM generator is the generation of a chaotic carrier wave.

4.1. Randomization of PWM Pulse Parameters

PWM technique is generally used for generating the pulses required for the switches of the DC-DC converter. Here, for the PWM, the carrier wave is chaotic in nature and the modulating signal remains the same, that is, DC signal [10]. The theoretical setup needed to analyse randomized switching schemes is quite different from the deterministic PWM analysis approach. For a general representative scheme, the power spectrum formula can be computed. As shown in Figure 6, if the th switching cycle begins at a time , where then, with denoting the defined single-pulse waveform, the switching function can be written as where is the duration of the th cycle, is the duration of the ON state within this cycle or the ON Time, and is the delay from the beginning of the switching cycle to the turn-on within the cycle. is the duty ratio is the switching frequency .

Figure 6: Randomization parameters in switching signal.

In Figure 6, is the duration of the th cycle, is the duration of the ON state within this cycle, and is the delay from the beginning of the switching cycle to the turn-on within the cycle. Note that the duty ratio is = / and the switching frequency is = 1/. The switching function consists of a series of such switching cycles. To spread the frequency spectrum of the switching noise, can be randomized. Among all the possibilities of randomization, one of the new schemes RCFMFD is designed, implemented, and addressed in this paper with the flexibility and programmability of FPGA technology.

4.2. Randomized Carrier Frequency Modulation with Fixed Duty Ratio (RCFMFD)

Among the different randomized carrier frequency techniques, the RCFMFD is chosen because of its simplicity and characteristics of giving a constant output voltage for the DC-DC converter. In this scheme, the carrier frequency is randomized maintaining the duty ratio constant. This switching frequency of the random switching techniques has its own limitation such as increasing randomization range of the switching frequency increases the noise reduction until a certain ratio, after which the noise reduction again starts to decrease. The later may be due to the increased low-frequency noise and the overlaps between the successive frequency spectrum ranges. To avoid such overlapping, a superior limit of the randomization range of the switching frequency should not be taken more than ± one-third of the central switching frequency. The improved performance and cost reduction of FPGA technology have made it applicable for power supply application in DC- DC Converters.

In order to investigate the effectiveness of the stochastic variable randomness level on spreading harmonic power, a randomness level for RCFMFD is defined as follows: In this modulation scheme, varies between a minimum possible value and maximum possible value . The PSD of the waveform shown in Figure 6 with RCFMFD scheme is equal to where is the complex conjugate of , and the expected terms are expressed as follows: Thus, the PSD of RCFMFD with randomness level can be obtained by substituting (16) into (15). The observation from the PSD shows the continuous spectrum.

4.3. Pseudorandom Number Generation

Pseudorandom number is assimilated to make the PWM period random, which can be generated using a linear feedback shift register (LFSR). A LFSR is a shift register; when clocked, it advances the signal through the register from one bit to the next Most Significant Bit. Some of the outputs are combined in XOR configuration to form a feedback mechanism. A linear feedback shift register can be formed by performing XOR on the outputs of two or more of the flip-flops together and feeding those outputs back into the input of one of the flip-flops as shown in Figure 7.

Figure 7: 12-bit linear feedback shift register.

When the outputs of the flip-flops are loaded with a seed value (anything except all 0’s, which would cause the LFSR to produce all 0 patterns) and the LFSR is clocked, a pseudorandom pattern of 1’s and 0’s is generated. Note that the only signal necessary to generate the test patterns is the clock. LFSR produces the maximum number of (– 1) random numbers, where is the number of register elements in the LFSR.

The boost converter tested for conducted noise has a single switch and therefore requires a single PWM signal of central frequency of 100 kHz. Pulse width modulation signals are generated using a Xilinx Spartan-3E LX45 FPGA board, which has a clock frequency of 50 MHz; the logic used here for pulse generation is counting the clock frequency: Where   is the switching frequency, is the Lower frequency limit (68 kHz taken), RFS is the value generated using LFSR, and is the Constant (chosen as 2).

4.4. Algorithm and Flowchart

The randomization technique used for generation of chaotic PWM pulse is RCFMFD. The algorithm can be written as follows.(i)Initialize the PWM period value and count value and instantiate the LFSR module.(ii)Always when a positive edge of clock occurs, do the following steps.(iii)Calculate the ON time for the PWM signal based on required duty cycle and PWM period value.(iv)Initially begin with ON pulse increment count with 1 on each positive edge of clock till count reaches ONtime. Now make PWM pulse OFF, increment count with 1 on each positive edge of clock till count value reaches the PWM period value.(v)When the count value exceeds the PWM period value, reinitialize count with 1 and calculate the next PWM period value by adding LFSR output value with a fixed value corresponding to the maximum frequency.

And also it can be represented through flowchart shown in Figure 8.

Figure 8: Flowchart for RCFMFD-based chaotic PWM generation.

5. Simulation Study

The various cases like PWM without and with filter and chaotic switching without and with filter are simulated in MATLAB/SIMULINK. The FFT of the common-mode output voltages is obtained. Figures 9(a) and 9(b) depict the conventional PWM technique and chaotic modulation without filter. Figures 10(a) and 10(b) depict the conventional PWM technique and chaotic modulation with the simple passive filter. From the FFT it can be observed that the spectral peaks are reduced drastically in chaotic modulation using filter.

(a)

(b)

Figure 9: (a) FFT of output voltage without EMI filter for periodic pulses. (b) FFT of output voltage without EMI filter for chaotic pulses.

(a)

(b)

Figure 10: (a) FFT of output voltage with EMI filter for periodic pulses. (b) FFT of output voltage with EMI filter for chaotic pulses.

6. Hardware Results and Discussion

In order to verify the effectiveness of the proposed algorithm a hardware prototype with the specification mentioned in Table 1 is developed and tested. To implement the RCFMFD, the power switch is operated at a randomized frequency with the central frequency of 100 kHz, and the output voltage is varied by varying the duty cycle. The design values of boost converter is given as = 0.29 mH, = 0.5 F, = 12 V, and = 24 V with a duty cycle of 0.5 at a switching frequency of 100 kHz.

Table 1: Spectral peak magnitude for different methods.

Method
Multiplier
Instants

13 ns
16.5 ns
20 ns
27.5 ns

Periodic without filter
7.3/3.2
2.7
1.82
0.69
−0.912

Chaotic without filter
5.3/3.1
0.85
0.25
−1.02
−2.04

Periodic with filter
5.8/3.1
1.31
1.12
−0.19
−1.87

Chaotic with filter
3.3/3.1
0.11
−0.21
−1.06
−1.59

The programming and interfacing are done by Xilinx Spartan-3E XC3S500E FPGA board associated with Xilinx ISE Design Suite 13.1_2. The chaotic PWM pulses that are generated using Xilinx Spartan-3E XC3S500E FPGA are fed to the designed prototype boost converter to analyze and investigate the effect of randomization of carrier wave in reducing the conducted noise. The Xilinx Spartan-3E XC3S500E FPGA board has an oscillator frequency of 50 MHz and gives an output voltage of 3.3 V. This voltage is not sufficient enough to drive the switching device MOSFET IRF 540; therefore an amplifier and Opto-coupler circuit are being employed for making the gate pulses to 10 V.

The generated periodic and RCFMFD PWM pulses are shown in Figures 12(a) and 12(b). It is observed that, when DC-DC converter is switched periodically, it results in higher amplitude of peaks at the multiples of central frequency because of the accumulation of noise power as shown in the Figure 11(a). In which, the peaks 7.3 dB, 3.54 dB, 2.85 dB, and 1.71 dB could be observed at the multiples of central frequency, whereas from the Figure 13(b) and Figure 14(b) it can be concluded that the chaotic switching with and without filter makes the spectral power to be distributed over the wide range of the frequency. However the noise generated by the periodic switching is also reduced considerably by using the filter alone as shown Figure 14(a). The simulation results also support the hardware result. The comparisons of FFT obtained with different methods are graphically shown in the Figure 15 and the results are tabulated in Table 1.

Figure 11: Hardware setup.

(a)

(b)

Figure 12: (a) Periodic PWM pulse of 100 kHz. (b) CPWM pulses in the range 1/3 rd of 100 kHz.

(a)

(b)

Figure 13: FFT of output voltage without EMI filter for (a) periodic pulses and (b) chaotic pulses.

(a)

(b)

Figure 14: FFT of output voltage with EMI filter for (a) periodic pulses and (b) chaotic pulses.

Figure 15: Comparison of spectral peak magnitude.

7. Conclusion

The effect of FPGA-based chaotic PWM technique using RCFMFD spread spectrum scheme along with EMI filter on the conducted noise characteristics of a DC-DC converter (boost converter) has been experimentally investigated. The FFT analysis shows that the spectral peaks are reduced drastically in chaotic modulation using filter. The chaotic modulation is also more effective compared to PWM with and without filter. From Table 1 it can be observed that, at instant of 13 ns and 16.5 ns, the chaotic switching with filter is more effective than the other techniques. The max dBV is 3.3 dBV in chaotic switching with filter whereas, it is 7.3 dBV in conventional PWM technique without filter. The mitigation of spectral peaks after 20 ns is very promising. The scheme also illustrates the spreading of energy over the specified range of frequency. The chances of equipment malfunction, misdiagnose in medical instrumentation, performance degradation, and source of radiated emission are greatly reduced. The proposed scheme also improves the electromagnetic compatibility of the power supply unit very effectively.

Nomenclature

: | Inductor
: | Capacitor
: | Load resistor
: | Power switch
: | Power diode
: | Input voltage
: | Output voltage
: | Switching time period
: | Duration of the th cycle
: | Duration of the ON state within this cycle
: | Delay form the beginning of the switching cycle to the turn-on within the cycle
: | The switching function
: | Time at which th switching cycle begins
: | Switching Frequency.

Abbreviations

EMI: | Electromagnetic Interference
EMC: | Electromagnetic Compatibility
FPGA: | Fieldprogrammable gate array
PWM: | Pulse width modulation
CPWM: | Chaotic pulse width modulation
PCB: | Printed circuit board
LFSR: | Linear feedback shift register
PSD: | Power spectral density
RCFMFD: | Randomized carrier frequency modulation with fixed duty ratio
LISN: | Line impedance stabilization network
ESL: | Equivalent series inductance
EPC: | Equivalent parallel capacitance.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This work was supported by Power Electronics and Drives Division, School of Electrical Engineering, VIT University, Vellore, India.

References

B. Chi, J. Yao, S. Han, X. Xie, G. Li, and Z. Wang, “Low-power transceiver analog front-end circuits for bidirectional high data rate wireless telemetry in medical endoscopy applications,” IEEE Transactions on Biomedical Engineering, vol. 54, no. 7, pp. 1291–1299, 2007.

J. Hamilton, “Electromagnetic interference can cause hospital devices to malfunction, McGill group warns,” Canadian Medical Association Journal, vol. 154, no. 3, pp. 373–375, 1996.

R. van der Togt, E. J. van Lieshout, R. Hensbroek, E. Beinat, J. M. Binnekade, and P. J. M. Bakker, “Electromagnetic interference from radio frequency identification inducing potentially hazardous incidents in critical care medical equipment,” The Journal of the American Medical Association, vol. 299, no. 24, pp. 2884–2890, 2008.

M. Otto and K. E. von Mühlendahl, “Electromagnetic fields (EMF): do they play a role in children's environmental health (CEH)?” International Journal of Hygiene and Environmental Health, vol. 210, no. 5, pp. 635–644, 2007.

H. Li, Z. Li, B. Zhang, W. S. K. Tang, and W. A. Halang, “Suppressing electromagnetic interference in direct current converters,” IEEE Circuits and Systems Magazine, vol. 9, no. 4, pp. 10–28, 2009.

H. Li, Z. Li, B. Zhang, F. Wang, N. Tan, and W. A. Halang, “Design of analogue chaotic PWM for EMI suppression,” IEEE Transactions on Electromagnetic Compatibility, vol. 52, no. 4, pp. 1001–1007, 2010.

H. Chen, Z. Qian, Z. Zeng, and C. Wolf, “Modeling of parasitic inductive couplings in a Pi-shaped common mode EMI filter,” IEEE Transactions on Electromagnetic Compatibility, vol. 50, no. 1, pp. 71–79, 2008.

H. Chen, P. Meng, J. Li, and Z. Qian, “Series-connected grounding of common-mode EMI filter,” IEEE Transactions on Electromagnetic Compatibility, vol. 52, no. 4, pp. 1066–1068, 2010.

G. M. Dousoky, M. Shoyama, and T. Ninomiya, “FPGA-based spread-spectrum schemes for conducted-noise mitigation in DC–DC power converters: design, implementation, and experimental investigation,” IEEE Transactions on Industrial Electronics, vol. 58, no. 2, pp. 429–435, 2011.

G. M. Dousoky, M. Shoyama, and T. Ninomiya, “A novel implementation of an FPGA-based controller for conducted-noise reduction in randomly switched DC-DC converters,” in Proceedings of the 24th Annual IEEE Applied Power Electronics Conference and Exposition (APEC '09), pp. 65–69, Washington, DC, USA, February 2009.

W. J. Chen, X. Yang, and Z. A. Wang, “An active EMI filtering technique for improving passive filter low-frequency performance,” IEEE Transactions on Electromagnetic Compatibility, vol. 48, no. 1, pp. 172–177, 2006.

X. Wu, D. Xu, Z. Wen, Y. Okuma, and K. Mino, “Design, modeling, and improvement of integrated EMI filter with flexible multilayer foils,” IEEE Transactions on Power Electronics, vol. 26, no. 5, pp. 1344–1354, 2011.

M. C. Caponet, F. Profumo, and A. Tenconi, “EMI filters design for power electronics,” in Proceeding of the 33rd IEEE Annual Power Electronics Specialists Conference (PESC '02), vol. 4, pp. 2027–2032, Cairns, Australia, June 2002.

M. Hartmann, H. Ertl, and J. W. Kolar, “EMI filter design for a 1 MHz, 10 kW three-phase/level PWM rectifier,” IEEE Transactions on Power Electronics, vol. 26, no. 4, pp. 1192–1204, 2011.

Y.-S. Lai and P.-S. Chen, “New EMI filter design method for single phase power converter using software-based noise separation method,” in Proceedings of the 42nd IAS Annual Meeting Conference Record of the IEEE Industry Applications Conference, pp. 2282–2288, New Orleans, La, USA, September 2007.

D. Hamza and M. Qiu, “Application and stability analysis of a novel digital active EMI filter used in a grid-tied PV microinverter module,” IEEE Transaction on Power Electronics, vol. 28, no. 6, pp. 2867–2874, 2013.

W. Tan, C. Cuellar, X. Margueron, and N. A. Idir, “High frequency equivalent circuit and parameter extraction procedure for common mode choke in the EMI filter,” IEEE Transaction on Power Electronics, vol. 28, no. 3, pp. 1157–1166, 2013.

S. Wang and C. Xu, “Design theory and implementation of a planar EMI filter based on annular integrated inductor–capacitor unit,” IEEE Transaction on Power Electronics, vol. 28, no. 3, pp. 1167–1176, 2013.

V. Tarateeraseth, “EMI filter design: part III: selection of filter topology for optimal performance,” IEEE Electromagnetic Compatibility Magazine, vol. 1, no. 2, pp. 60–73, 2012.