Active and Passive Electronic Components

Volume 2013 (2013), Article ID 318560, 8 pages

http://dx.doi.org/10.1155/2013/318560

Research Article

Single-Input Four-Output Current Mode Filter Using Operational Floating Current Conveyor

Neeta Pandey, Deva Nand, and Zubair Khan

Department of Electronics and Communications, Delhi Technological University, Delhi, India

Received 26 March 2013; Revised 18 May 2013; Accepted 30 May 2013

Academic Editor: Sudhanshu Maheshwari

Copyright © 2013 Neeta Pandey et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This paper presents operational floating current conveyor (OFCC) based single input four output current mode filter. It employs only three OFCCs and two grounded capacitors and resistors each. The MOS based grounded resistors implementation is used, which adds feature of electronic tunability to the filter parameters. The filter also enjoys low component spread and low sensitivity performance. The effect of finite transimpedance and parasites of OFCC on the proposed circuit is also analyzed. The functionality of the proposed circuit is demonstrated through SPICE simulations using 0.5 µm CMOS process model provided by MOSIS (AGILENT).

1. Introduction

The development of current mode continuous time filters has received growing interest due to its applications in sampled data systems, communications, and control systems [1, 2]. This is also in consonance with the trend of operating circuits at lower supply voltages where the current mode concept is more useful. The circuit operation in current mode circuits is decided by current which enables the system design to have wider dynamic range [3]. These circuits are also simple and compact as current addition/subtraction does not require additional circuit elements. Owing to the advantages of current mode filters, considerable research has directed towards the realization of single-input multiple output filters. A variety of current mode building blocks [4–10], namely, current follower transconductance amplifier [4], current conveyor [5–7], operational transconductance amplifier [8], copy current follower transconductance amplifier [9], and -Copy Current Inverter Transconductance amplifier [10], have been used to implement these filters [1, 4–22]. The structures—use excessive number of elements [6, 7, 13, 15] some of the references cited in [17], do not present low input impedance [1, 8, 13–16, 19] which is necessary for a current mode filter, employ multiple inputs to provide output responses [15, 16], put matching constraint [7, 10, 15, 16] to obtain all five responses of universal filter, has less than three simultaneous output responses [4, 8, 15, 16, 21], employ different type of active blocks [12, 19, 20]. The operational floating current conveyor (OFCC) [23, 24], which was introduced as operational floating conveyor (OFC) [25], combines the features of current conveyor and the current feedback op-amp along with additional current outputs that add flexibility in the circuit design. Literature survey on OFCC based circuits [26–32] shows that voltage mode filter [26–28], variable gain amplifier [29], wheatsone bridge [30], and instrumentation amplifier [31] and read out circuit [32] are available. The study of current mode filters [1, 4–22] shows that no OFCC based current mode filter is available in the literature. Therefore, this paper aims at presenting a single-input four-output OFCC based current mode filter. The proposed filter uses three OFCCs, two grounded capacitors and two grounded resistors. The resistors are implemented using MOSFETs so as to achieve electronic tunability of filter parameters. The filter enjoys low component spread and low sensitivity performance. The proposed circuit is also analyzed to take finite transimpedance and parasites of OFCC into account. The functionality of the proposed circuit is demonstrated through SPICE simulations using 0.5 µm CMOS process model provided by MOSIS (AGILENT).

2. Circuit Description

2.1. OFCC

The circuit symbol of operational floating current conveyor (OFCC) [23, 24] is shown in Figure 1. It has a low impedance current input port and a high impedance voltage input port . It also has a low impedance voltage output port and high impedance current output ports , , , and . The output voltage at port is multiplication of input current at port and the open loop transimpedance gain . The port relationships of the OFCC is characterized by the following matrix:

It may be noted that the voltage at port is the same as input voltage at port , so voltage tracking action is available at input port. The output current flowing through port is copied to ports and in phase and to ports and out of phase, thereby offering current tracking at the output ports. Figure 2 shows the CMOS based schematic of OFCC which is based on topology proposed in [29].

Figure 1: Circuit symbol of OFCC.

Figure 2: CMOS schematic of OFCC [29].

2.2. Proposed Filter

In this section the implementation of OFCC based current mode single-input four-output filter, as shown in Figure 3, is proposed. It employs three OFCCs, and two grounded capacitors and resistors each. The analysis of the circuit gives the following transfer functions:

where

Thus the proposed circuit provides low pass, band pass, and notch (band stop) response simultaneously at high impedance. It may be noted that the current is not explicitly available at high impedance and therefore cannot be used directly. However, by connecting and , the high-pass response can be made available at high output impedance. This arrangement makes low pass, band pass, and high-pass responses available simultaneously. Similarly, the all pass function can easily be obtained by connecting band pass and notch output currents, that is, , and the corresponding transfer function is obtained as

It may be noted that all the five filter responses can be made simultaneously available by adding stages in 2nd OFCC (Figure 3). Further, there is no matching constraint for realization of filter responses.

Figure 3: Proposed OFCC based single-input four-output current mode filter.

All the responses are characterized by pole frequency (), bandwidth (/), and quality factor () given as

Equation (6) reveals that the pole frequency () and quality factor () can be adjusted by , without disturbing . The orthogonal adjustability of and can be achieved by simultaneous adjustment of and such that the product remains constant and the quotient varies and vice versa. With moderate values of ratios of component values (), that is, from low component spread [34], high values of -factor can be obtained. Hence the component spread is of the order of .

The proposed filter uses grounded resistors which can easily be implemented using the MOS based structure given in Figure 4 [33]. It uses two diode connected matched transistors, operating in saturation region. Assuming , the value of resistor is given by

where µ is carrier mobility, is gate capacitance per unit area, is threshold voltage, and , are the channel width and length respectively.

Figure 4: MOS realization of a resistor [33].

The sensitivity analysis of the proposed circuit is as follows:

Thus the all passive sensitivities are not more than unity in magnitude. So the proposed filter circuit can be classified as insensitive.

2.3. Effect of Finite Transimpedance Gain

In this section the effect of finite transimpedance gain of OFCC is considered and compensation is employed for high frequency applications. Ideally the transimpedance gain is assumed to approach infinity. However, in practice, is a frequency dependent finite value. Using single pole model for transimpedance gain, is expressed as [29]

The parameter is the DC open loop transimpedance gain and is the transimpedance cutoff frequency. For high frequency applications, the transimpedance gain, , is approximated as

where

Taking single pole model of into account, the low pass transfer function of (2) modifies to

where

The inclusion of a capacitor of value connected between the terminal and ground in second and third OFCCs cancels the coefficient of “” thereby making both and equal to unity. Thus the transfer function of low pass filter after compensation reduces to (2). Similar analysis is valid for other responses as well.

2.4. Effect of Other Nonidealities

The second group of nonidealities comes from parasites of OFCC comprising of resistances and capacitances connected in parallel at terminals , , ,, and (i.e., , , , ). The effects of these parasites on filter response depend strongly on circuit topology. The proposed filter topology of Figure 3 in the presence of these parasites modifies to Figure 5 where , , , and ; the subscript refers to parasites of th OFCC and denotes th terminal. It may be noted that effect of parasitic capacitances can be accommodated by pre adjusting the value of external capacitor. The parasitics introduce poles at and . So by choosing operating frequencies sufficiently below these frequencies the effect of parasitic impedance can be practically eliminated and hence filter may approach towards ideal response.

Figure 5: Proposed OFCC based current mode filter with parasites.

3. Simulation Results

To verify the functionality of the proposed OFCC based current mode filter, SPICE simulations have been carried out using 0.5 µm CMOS process model provided by MOSIS (AGILENT) and CMOS schematic of Figure 2 with power supply voltage of  V and  V. The aspect ratios of the transistor are reported in Table 1 [29].

Table 1: Transistors aspect ratios of the circuit shown in Figure 2.

Transistor
(m)/ (m)

M1, M2
50/1

M3, M4, M11, M12, M14

M16, M18, M20, M22, M24
50/2.5

M5, M7, M10, M15, M17, M19

M21, M23, M25
20/2.5

M6, M8
40/2.5

M9, M13
100/2.5

The simulations have been performed for a pole frequency of 1.59 MHz with component values as  pF and MOS based resistors of value 1  by selecting bias voltages as ±1.310 V. Figure 6 shows the simulation results for low pass, band pass, and high-pass responses. The phase and magnitude plots for notch and all pass responses are depicted in Figures 7 and 8, respectively. The responses confirm the theoretical predictions.

Figure 6: Simulated low pass, band pass, and high-pass responses.

Figure 7: Magnitude and phase plot for notch response.

Figure 8: Magnitude and phase plots for all-pass response.

The orthogonal adjustment of with is depicted in Figure 9 where the value of is considered. The capacitors and are taken as 100 pF and the bias voltages along with the resistor values for different values of as given in Table 2. Figure 10 shows orthogonal adjustment of with  kHz. The values of for constant value of as obtained with  pF and bias voltages and resulting resistor values are listed in Table 3.

Table 2: Bias voltages/resistor values for orthogonal adjustment of and .

  *(V)
  *(V)
(KΩ)
*(V)
*(V)
(KΩ)

(KHz)

1.310
−1.310
1
1.310
−1.310
1
1
1590

0.869
−0.869
2
0.869
−0.869
2
1
800

0.726
−0.726
5
0.726
−0.726
5
1
320

0.711
−0.711
10
0.711
−0.711
10
1
160

and refer to bias voltages corresponding to resistance .

Table 3: Bias voltages/resistor values for orthogonal adjustment of with .

  *(V)
  *(V)
(KΩ)
  *(V)
  *(V)
(KΩ)
(nF)
(nF)

(KHz)

1.310
−1.310
1
0.869
−0.869
2
0.1
0.2
0.5
800

0.869
−0.869
2
0.869
−0.869
2
0.1
0.1
1
800

0.869
−0.869
2
1.310
−1.310
1
0.2
0.1
2
800

and refer to bias voltages corresponding to resistance .

Figure 9: Tuning of .

Figure 10: Tuning of .

To study the time domain behavior of the proposed filter, an input sinusoidal signal of 500 KHz frequency and amplitude 2 µA is applied. The transient response for low pass output is shown in Figure 11. To show the effectiveness of proposed filter a mixed sinusoidal signal of frequencies of 50 KHz, 500 KHz, and 4 MHz having amplitude of 2 µA each is applied at the input of the filter. The transient response with its spectrum for input and output signals is shown in Figures 12(a) and 12(b). It is clear that the 50 KHz, and 500 KHz signals are passed without attenuated and 4 MHz signal is significantly attenuated.

Figure 11: Transient response for low pass output.

(a)

(b)

Figure 12: (a) Transient response of input and output signals (b) Spectrum of input and output signals.

4. Conclusion

In this paper, a single-input four-output current mode filter based on OFCC is presented. The circuit uses only three OFCCs, two grounded resistors, and two grounded capacitors. The low pass, band pass and notch responses are available at high impedance whereas high-pass and all pass responses can be obtained by adding stages in the second OFCC. The filter parameters are tuned electronically via MOS based grounded resistor. The effect of finite transimpedance and parasites on filter parameters is also included.

References

M. A. Ibrahim, S. Minaei, and H. Kuntman, “A 22.5 MHz current-mode KHN-biquad using differential voltage current conveyor and grounded passive elements,” AEU—International Journal of Electronics and Communications, vol. 59, no. 5, pp. 311–318, 2005.

A. S. Sedra and K. C. Smith, Microelectronic Circuits, Holt, Rinehart and Winston, Orlando, Fla, USA, 3rd edition, 1991.

S. S. Rajput and S. S. Jamuar, “Advanced applications of current conveyors: a tutorial,” Journal of Active and Passive Electronic Devices, vol. 2, pp. 143–164, 2007.

W. Tangsrirat, “Single-input three-output electronically tunable universal current-mode filter using current follower transconductance amplifiers,” AEU—International Journal of Electronics and Communications, vol. 65, no. 10, pp. 783–787, 2011.

C. Wang, J. Xu, A. Ü. Keskin, S. Du, and Q. Zhang, “A new current-mode current-controlled SIMO-type universal filter,” AEU—International Journal of Electronics and Communications, vol. 65, no. 3, pp. 231–234, 2011.

J.-W. Horng, “Current-mode and transimpedance-mode universal biquadratic filter using multiple outputs cciis,” Indian Journal of Engineering and Materials Sciences, vol. 17, no. 3, pp. 169–174, 2010.

K. K. Abdalla, D. R. Bhaskar, and R. Senani, “Configuration for realising a current-mode universal filter and dual-mode quadrature single resistor controlled oscillator,” Institution of Engineering and Technology Circuits, Devices and Systems, vol. 6, no. 3, pp. 159–167, 2012.

A. Qadir and T. Altaf, “Current mode canonic OTA-C universal filter with single input and multiple outputs,” in Proceedings of International Conference on Electronic Computer Technology (ICECT '10), pp. 32–34, May 2010.

J. Satansup and W. Tangsrirat, “Single-input five-output electronically tunable current-mode biquad consisting of only ZC-CFTAs and grounded capacitors,” Radioengineering, vol. 20, no. 3, pp. 650–655, 2011.

D. Biolek, V. Biolkova, Z. Kolka, and J. Bajer, “Single-input multi-output resistorless current-mode biquad,” in Proceedings of European Conference on Circuit Theory and Design Conference Program (ECCTD '09), pp. 225–228, August 2009.

R. Senani and A. K. Singh, “A new universal current-mode biquad filter,” Frequenz, vol. 56, no. 1-2, pp. 55–58, 2002.

J.-W. Horng, “Current conveyors based current-mode universal biquadratic filter,” Journal of the Chinese Institute of Electrical Engineering, vol. 9, no. 2, pp. 147–150, 2002.

R. Senani, A. K. Singh, and V. K. Singh, “New tunable SIMO-type current mode universal biquad using only three MOCCs and all grounded passive elements,” Frequenz, vol. 57, no. 7-8, pp. 160–161, 2003.

R. Senani, V. K. Singh, A. K. Singh, and D. R. Bhaskar, “Novel electronically controllable current-mode universal biquad filter,” IEICE Electronics Express (Japan), vol. 1, pp. 410–415, 2004.

R. Senani, “New universal current-mode biquad employing all grounded passive components but only two DOCCs,” Journal of Active and Passive Electronic Devices (USA), vol. 1, pp. 281–288, 2006.

T. Tsukutani, Y. Sumi, and N. Yabuki, “Novel current-mode biquadratic circuit using only plus type DO-DVCCs and grounded passive components,” International Journal of Electronics, vol. 94, no. 12, pp. 1137–1146, 2007.

A. M. Soliman, “Current-mode universal filters using current conveyors: classification and review,” Circuits, Systems, and Signal Processing, vol. 27, no. 3, pp. 405–427, 2008.

M. Sagbas and M. Koksal, “Current-mode state-variable filter,” Frequenz, vol. 62, no. 1-2, pp. 37–42, 2008.

W. Chunhua, A. U. Keskin, L. Yang, Z. Qiujing, and D. Sichun, “Minimum configuration insensitive multifunctional current-mode biquad using current conveyors and all-grounded passive components,” Radioengineering, vol. 19, no. 1, pp. 178–184, 2010.

K. K. Abdalla, “Universal current-mode biquad employing dual output current conveyors and MO-CCCA with grounded passive elements,” Circuits and Systems, vol. 4, pp. 83–88, 2013.

J. Jerabek, R. Sotner, and K. Vrba, “Comparison of the SITO current-mode universal filters using multiple-output current followers,” in Proceedings of the 35th International Conference on Telecommunications and Signal Processing (TSP '12), pp. 406–410, 2012.

E. Yuce, “Current-mode electronically tunable biquadratic filters consisting of only CCCIIs and grounded capacitors,” Microelectronics Journal, vol. 40, no. 12, pp. 1719–1725, 2009.

A. A. Khan, M. A. Al-Turaigi, and M. Abou El-Ela, “Operational floating current conveyor: characteristics, modelling and applications,” in Proceedings of the IEEE Instrumentation and Measurement Technology Conference, pp. 788–791, Hamamtsu, Japan, May 1994.

Y. H. Ghallab, M. A. El-Ela, and M. Elsaid, “Operational floating current conveyor: characteristics, modeling and experimental results,” in Proceedings of International Conference on Microelectronics, pp. 59–62, 1999.

C. Toumazou, A. Payne, and F. J. Lidgey, “Operational floating conveyor,” Electronics Letters, vol. 27, no. 8, pp. 651–652, 1991.

Y. H. Ghallab, W. Badawy, K. V. I. S. Kaler, M. A. El-Ela, and M. H. El-Said, “A new second-order active universal filter with single input and three outputs using operational floating current conveyor,” in Proceedings of IEEE International Conference on Microelectronics, pp. 42–45, 2002.

Y. H. Ghallab, M. A. El-Ela, and M. Elsaid, “A novel universal voltage mode filter with three inputs and single output using only operational floating current conveyor,” in Proceedings of International Conference on Microelectronics, pp. 95–98, 2000.

Y. H. Ghallab, W. Badawy, M. A. El-Ela, and M. H. El-Said, “The operational floating current conveyor and its applications,” Journal of Circuits, Systems and Computers, vol. 15, no. 3, pp. 351–372, 2006.

H. M. Hassan and A. M. Soliman, “Novel CMOS realizations of the operational floating conveyor and applications,” Journal of Circuits, Systems and Computers, vol. 14, no. 6, pp. 1113–1143, 2005.

Y. H. Ghallab and W. Badawy, “A new design of a current-mode wheatstone bridge using operational floating current conveyor,” in Proceedings of International Conference on MEMS, NANO and Smart Systems (ICMENS '06), pp. 41–44, December 2006.

Y. H. Ghallab, W. Badawy, K. V. I. S. Kaler, and B. J. Maundy, “A novel current-mode instrumentation amplifier based on operational floating current conveyor,” IEEE Transactions on Instrumentation and Measurement, vol. 54, no. 5, pp. 1941–1949, 2005.

Y. H. Ghallab and W. Badawy, “A new differential PH sensor current mode readout circuit using only two operational floating current conveyor,” in Proceedings of IEEE International Workshop on Biomedical Circuits and Systems, pp. 13–16, December 2004.

Z. Wang, “2-MOSFET transresistor with extremely low distortion for output reaching supply voltages,” Electronics Letters, vol. 26, no. 13, pp. 951–952, 1990.

S.-I. Liu, “High input impedance filters with low component spread using current-feedback amplifiers,” Electronics Letters, vol. 31, no. 13, pp. 1042–1043, 1995.