Anatomy Research InternationalVolume 2013 (2013), Article ID 323194, 3 pageshttp://dx.doi.org/10.1155/2013/323194

Research Article

The Superior Transverse Scapular Ligament in Fetuses

José Aderval Aragão,1,2 Luiza Neves de Santana Teles,³ Ana Bárbara de Jesus Chaves,³ Jéssica Cândida Oliveira Prado,³ Priscila Soares Pereira,³ João Gabriel Lima Dantas,³ and Francisco Prado Reis²

¹Department of Morphology and the Postgraduate Physical Education and Applied Health Sciences Program, Federal University of Sergipe (UFS), Avenida Marechal Rondon, s/n, Jardim Rosa Elze, Cidade Universitária Professor José Aloísio de Campos, 49100-000 São Cristovão, SE, Brazil²School of Medicine, Tiradentes University (UNIT), Avenida Murilo Dantas 300, Farolândia, 49032-490 Aracaju, SE, Brazil³School of Medicine, Federal University of Sergipe (UFS), Avenida Marechal Rondon, s/n, Jardim Rosa Elze, Cidade Universitária Professor José Aloísio de Campos, 49100-000 São Cristovão, SE, Brazil

Received 21 July 2013; Revised 10 October 2013; Accepted 15 November 2013

Academic Editor: Ruijin Huang

Copyright © 2013 José Aderval Aragão et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Introduction. The superior transverse scapular ligament (STSL) links the margins of the suprascapular notch and converts it into a foramen, through which, the suprascapular nerve and, on some rare occasions, the suprascapular vessels pass. This conversion often results from partial or complete ossification of the STSL and may produce compressive symptoms in the suprascapular nerve. Material and Method. Twenty shoulders from human fetuses were dissected without the aid of optical instruments and, using a digital pachymeter of precision 0.01 millimeters, length measurements and thickness measurements were made. The fetal age was from 21 to 33 weeks of gestation, with a mean of weeks. Results. There was no statistically significant difference in STSL length or any difference in the thicknesses at the medial and lateral extremities between the halves of the body (). However, in the left half of the body, the medial extremity of the STSL was significantly thinner than the lateral extremity (). Conclusion. Anatomical and morphometric details about the STSL were described in human fetuses. These findings, in fetuses, may encourage the pursuit of further studies to understand the morphofunctional role and meaning of this small ligament.

1. Introduction

The superior transverse scapular ligament (STSL) links the margins of the suprascapular notch. This ligament converts the notch into a foramen through which the suprascapular nerve and, on some rare occasions, the suprascapular vessels pass [1, 2]. This is the region where compression of the suprascapular nerve most commonly occurs [3, 4]. In adult humans, this conversion frequently results from ossification of the STSL, which may be partial or complete [5]. Variations in the morphology of the STSL and the suprascapular notch are among the best known factors predisposing towards the occurrence of compression of the suprascapular nerve [6]. There are several classification systems for the suprascapular notch [6–9], but little attention has been given to the morphology of the STSL [5, 6]. This knowledge is specifically important during arthroscopic or surgical procedures in the shoulder region [10, 11]. Our study had the aim of making a morphometric analysis on the STSL in human fetuses.

2. Material and Method

Twenty shoulders from human fetuses were used (ten right and ten left, from nine males and one female). The fetuses belonged to the anatomy laboratory of the Federal University of Sergipe and had been obtained in accordance with Law 8501 of November 30, 1992, which deals with the use of unclaimed cadavers for the purposes of study and research. The fetal age was estimated from the hallux-calcaneus length and ranged from 21 to 33 weeks of gestation, with a mean of weeks.

The STSLs were dissected without the aid of optical instruments, and a digital pachymeter of precision 0.01 millimeters was used to make length measurements (the distance in the horizontal plane between the medial and lateral extremities of the ligament) and thickness measurements (in the vertical plane between the anterior and posterior borders of the ligament, at its medial and lateral extremities). The data were analysed using the chi-square test.

3. Results

In all the 20 shoulders dissected, single STSLs were found (Figure 1). The length of the STSL in the right half of the body ranged from 3.01 to 5.02 mm, with a mean of  mm, while in the left half it ranged from 3.02 to 5.07 mm with a mean of  mm. The thickness of the ligament at the lateral extremity in the right half of the body ranged from 0.57 to 1.98 mm, with a mean of , and at the medial extremity it ranged from 0.79 to 1.69, with a mean of  mm. In the left half of the body, the range of thickness was from 0.63 to 1.84 at the lateral extremity, with a mean of  mm and from 0.5 to 1.74 at the medial extremity, with a mean of  mm (Table 1).

Table 1: Morphometry of the STSL in millimeters.

Fetus
Length
Thickness

RH
LH
RLE
RME
LLE
LME

1
4.35
3.49
0.89
0.88
1.18
1.10

2
3.10
3.63
1.38
1.17
1.52
0.97

3
4.46
3.51
0.57
1.11
1.26
1.13

4
3.97
4.22
1.33
1.69
1.65
1.46

5
3.25
4.17
1.65
1.29
0.78
0.93

6
4.59
5.07
1.26
1.64
0.63
0.57

7
4.10
3.02
1.98
1.20
0.63
0.50

8
4.38
3.81
1.30
0.79
1.30
0.85

9
5.02
4.55
1.81
1.02
1.84
1.74

10
3.01
3.65
0.90
1.18
0.67
0.52

Mean
4.02
3.91
1.31
1.20
1.15
0.98

Standard deviation
0.69
0.60
0.44
0.29
0.45
0.40

RH: right half of the body; LH: left half of the body; RLE: right lateral extremity; RME: right medial extremity; LLE: left lateral extremity; LME: left medial extremity.

Figure 1: The superior transverse scapular ligament.

There was no statistically significant difference in STSL length or in the thicknesses of the lateral and medial extremities between the halves of the body (). Statistical analysis making comparisons within the same half of the body showed that, in the right half of the body, there was no significant difference in thickness between the lateral and medial extremities of the STSL (). On the other hand, in the left half of the body, the medial extremity of the STSL was significantly thinner than the lateral extremity () (Table 2).

Table 2: Significance level of comparisons between STSL lengths and between STSL thicknesses at the lateral and medial extremities in each half of the body.

Comparisons
Student’s -test ()

LR LL
0.65

TRL TLL
0.43

TRM TLM
0.20

TRL TRM
0.50

TLL TLM

indicates a statistically significant difference in relation to TLL ().

LR: length of the superior transverse ligament of the right scapula; LL: length of the superior transverse ligament of the left scapula; TRL: thickness of the superior transverse ligament at the right lateral extremity; TRM: thickness of the superior transverse ligament at the right medial extremity; TLL: thickness of the superior transverse ligament at the left lateral extremity; TLM: thickness of the superior transverse ligament at the left medial extremity.

4. Discussion

The ossification STSL is considered a rare occurrence; it has been a very recurrent theme in the literature and most often correlated with suprascapular nerve entrapment [1, 3, 12, 13]. It is natural, in view of the age of the studied material, that not this type of occurrence would be expected. On the other hand we found no report of a congenital ligament ossification.

Unlike previous studies in the literature, the present study dealt with the morphology of the STSL in fetuses, which seems to have been rarely addressed in the literature, if at all. Almost all previous studies on the STSL were conducted on adults.

The STSL was foundin all the 20 shoulders of the fetuses studied. In adults, Duparc et al. [14] and Yang et al. [15], found the STSL in 96.7% and 95.4%, respectively. In the literature the description of the multiple STSL bands has been usual [5]. Bifid STSLs were described by Bayramoğlu et al. [6], Polguj et al. [8], and Duparc et al. [14] and some trifid by Ticker et al. [5] and Polguj et al. [16]. All these authors admit that the ossification of these STSL bands may be the factor that predisposes to suprascapular entrapment. In the fetuses studied all the ligaments found were single.

The mean length of the STSL in the human fetuses studied was  mm. Among adult humans, Polguj et al. [8], Yang et al. [15], Das et al. [17], and Fabrizio [18] found mean lengths of 12.33 mm, 11.6 mm, 8 mm, and 16.7 mm, respectively.

We would envisage that the present study might at least contribute towards reflection on the growth patterns of the STSL and that it might contribute towards understanding morphological and functional abnormalities of the STSL during this growth.

5. Conclusion

This study provides some details of anatomy and morphometry of STSL in human fetuses. The average length and thickness of the STSL were slightly higher on the right side. There was a statistical significance on comparing the thickness between the medial and the lateral extremities of the left side. We hope that similar studies will provide new finding or confirm the present findings.

Conflict of Interests

The authors declare that they have no conflict of interests.

References

M. A. Khan, “Complete ossification of the superior transverse scapular ligament in an indian male adult,” International Journal of Morphology, vol. 24, no. 2, pp. 195–196, 2006.

J. G. Silva, M. Abidu-Figueiredo, R. M. P. Fernandes et al., “High incidence of complete ossification of the superior transverse scapular ligament in Brazilians and its clinical implications,” International Journal of Morphology, vol. 25, no. 4, pp. 855–859, 2007.

H. Zehetgruber, H. Noske, T. Lang, and C. Wurnig, “Suprascapular nerve entrapment. A meta-analysis,” International Orthopaedics, vol. 26, no. 6, pp. 339–343, 2002.

J. Gosk, M. Urban, and R. Rutowski, “Entrapment of the suprascapular nerve: anatomy, etiology, diagnosis, treatment,” Ortopedia Traumatologia Rehabilitacja, vol. 9, no. 1, pp. 68–74, 2007.

J. B. Ticker, M. Djurasovic, R. J. Strauch et al., “The incidence of ganglion cysts and other variations in anatomy along the course of the suprascapular nerve,” Journal of Shoulder and Elbow Surgery, vol. 7, no. 5, pp. 472–478, 1998.

A. Bayramoğlu, D. Demiryürek, E. Tüccar et al., “Variations in anatomy at the suprascapular notch possibly causing suprascapular nerve entrapment: an anatomical study,” Knee Surgery, Sports Traumatology, Arthroscopy, vol. 11, no. 6, pp. 393–398, 2003.

K. Natsis, T. Totlis, P. Tsikaras, H. J. Appell, P. Skandalakis, and J. Koebke, “Proposal for classification of the suprascapular notch: a study on 423 dried scapulas,” Clinical Anatomy, vol. 20, no. 2, pp. 135–139, 2007.

M. Polguj, K. Jędrzejewski, M. Podgórski, and M. Topol, “Morphometric study of the suprascapular notch: proposal of classification,” Surgical and Radiologic Anatomy, vol. 33, no. 9, pp. 781–787, 2011.

H. J. Wang, C. Chen, L. P. Wu, C. Q. Pan, W. J. Zhang, and Y. K. Li, “Variable morphology of the suprascapular notch: an investigation and quantitative measurements in Chinese population,” Clinical Anatomy, vol. 24, no. 1, pp. 47–55, 2011.

D. N. Bhatia, J. F. de Beer, K. S. van Rooyen, and D. F. du Toit, “Arthroscopic suprascapular nerve decompression at the suprascapular notch,” Arthroscopy, vol. 22, no. 9, pp. 1009–1013, 2006.

L. Lafosse, A. Tomasi, S. Corbett, G. Baier, K. Willems, and R. Gobezie, “Arthroscopic release of suprascapular nerve entrapment at the suprascapular notch: technique and preliminary results,” Arthroscopy, vol. 23, no. 1, pp. 34–42, 2007.

R. S. Tubbs, C. Nechtman, D. 'Antoni AV et al., “Ossification of the suprascapular ligament: a risk factor for suprascapular nerve compression?” International Journal of Shoulder Surgery, vol. 7, no. 1, pp. 19–22, 2013.

M. Polguj, K. Jędrzejewski, A. Majos, and M. Topol, “Coexistence of the supraescapular notch and the suprascapular foramen—a rare anatomical variation and a new hypothesis on its formation based on anatomical and radiological studies,” Anatomical Science International, vol. 88, no. 3, pp. 156–162, 2013.

F. Duparc, D. Coquerel, J. Ozeel, M. Noyon, A. Gerometta, and C. Michot, “Anatomical basis of the suprascapular nerve entrapment, and clinical relevance of the supraspinatus fascia,” Surgical and Radiologic Anatomy, vol. 32, no. 3, pp. 277–284, 2010.

H. J. Yang, Y. C. Gil, J. D. Jin, S. V. Ahn, and H. Y. Lee, “Topographical anatomy of the suprascapular nerve and vessels at the suprascapular notch,” Clinical Anatomy, vol. 25, no. 3, pp. 359–365, 2012.

M. Polguj, K. Jędrzejewski, A. Majos, and M. Topol, “The trifid superior transverse scapular ligament: a case report and review of the literature,” Folia Morphologica, vol. 71, no. 2, pp. 118–120, 2012.

S. Das, R. Suri, and V. Kapur, “Ossification of superior transverse scapular ligament and its clinical implications,” Sultan Qaboos University Medical Journal, vol. 7, no. 2, pp. 157–160, 2007.

P. A. Fabrizio, “Unusual ligament of the scapula,” International Journal of Anatomical Variations, vol. 5, pp. 54–55, 2012.