AIDS Research and Treatment
Volume 2019 (2019), Article ID 4942573, 1 page
https://doi.org/10.1155/2019/4942573

Corrigendum

Corrigendum to “A Critical Review of the Evidence Concerning the HIV Latency Reversing Effect of Disulfiram, the Possible Explanations for Its Inability to Reduce the Size of the Latent Reservoir In Vivo, and the Caveats Associated with Its Use in Practice”

Harry D. J. Knights

Brasenose College, University of Oxford, Oxford, UK

Correspondence should be addressed to Harry D. J. Knights; harry.knights16@imperial.ac.uk

Received 13 August 2018; Accepted 15 August 2018; Published 13 March 2019

Copyright © 2019 Harry D. J. Knights. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Critical Review of the Evidence Concerning the HIV Latency Reversing Effect of Disulfiram, the Possible Explanations for Its Inability to Reduce the Size of the Latent Reservoir In Vivo, and the Caveats Associated with Its Use in Practice” [1], the Acknowledgments should be revised as follows:

“The author acknowledges Professor William James for his assistance. The author gratefully acknowledges the Imperial College London library services for funding the open access article processing charges.”

References

H. D. J. Knights, “A critical review of the evidence concerning the hiv latency reversing effect of disulfiram, the possible explanations for its inability to reduce the size of the latent reservoir in vivo, and the caveats associated with its use in practice,” AIDS Research and Treatment, vol. 2017, Article ID 8239428, 7 pages, 2017.