Advances in Urology

Volume 2012 (2012), Article ID 984809, 1 page

doi:10.1155/2012/984809

Erratum

Erratum to “Streamlined Approach for Infrapubic Placement of an Inflatable Penile Prosthesis”

Edward Karpman

El Camino Urology Medical Group, Mountain View, CA 94040, USA

Received 9 August 2012; Accepted 21 August 2012

Copyright © 2012 Edward Karpman. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

With reference to the paper “Streamlined Approach for Infrapubic Placement of an Inflatable Penile Prosthesis”, we want to change in the introduction section paragraph 3 on page 1 to read “our streamlined approach for infrapubic placement of penile prosthesis is a variation of the minimally invasive approach originally published by Perito [1, 2].”

References

P. E. Perito, “Minimally invasive infrapubic inflatable penile implant,” The Journal of Sexual Medicine, vol. 5, no. 1, pp. 27–30, 2008.

P. E. Perito, “Ectopic reservoir placement—no longer in the space of Retzius,” The Journal of Sexual Medicine, vol. 8, no. 9, pp. 2395–2398, 2011.