Advances in Urology
Volume 2015 (2015), Article ID 656459, 4 pages
http://dx.doi.org/10.1155/2015/656459

Clinical Study

Visual Internal Urethrotomy for Adult Male Urethral Stricture Has Poor Long-Term Results

Waleed Al Taweel¹ and Raouf Seyam1,2

¹Department of Urology, King Faisal Hospital and Research Center, Riyadh 11211, Saudi Arabia
²Faculty of Medicine, Suez Canal University, Ismailia, Egypt

Received 6 July 2015; Accepted 12 August 2015

Academic Editor: Miroslav L. Djordjevic

Copyright © 2015 Waleed Al Taweel and Raouf Seyam. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. To determine the long-term stricture-free rate after visual internal urethrotomy following initial and follow-up urethrotomies. Methods. The records of all male patients who underwent direct visual internal urethrotomy for urethral stricture disease in our hospital between July 2004 and May 2012 were reviewed. The Kaplan-Meier method was used to analyze stricture-free probability after the first, second, third, fourth, and fifth urethrotomies. Results. A total of 301 patients were included. The overall stricture-free rate at the 36-month follow-up was 8.3% with a median time to recurrence of 10 months (95% CI of 9.5 to 10.5, range: 2–36). The stricture-free rate after one urethrotomy was 12.1% with a median time to recurrence of eight months (95% CI of 7.1–8.9). After the second urethrotomy, the stricture-free rate was 7.9% with a median time to recurrence of 10 months (95% CI of 9.3 to 10.6). After the third to fifth procedures, the stricture-free rate was 0%. There was no significant difference in the stricture-free rate between single and multiple procedures. Conclusion. The long-term stricture-free rate of visual internal urethrotomy is modest even after a single procedure.

1. Introduction

Male urethral stricture continues to be a common and challenging urologic condition. Despite the high failure rate of visual internal urethrotomy (VIU), it remains the most commonly performed procedure for the treatment of urethral strictures [1–7]. Even when VIU is initially performed selectively for short bulbar strictures under optimal conditions, the recurrence rate at 12 months was approximately 40% for strictures shorter than 2 cm. VIU and/or urethral dilation is usually the initial treatment approach offered in most cases of male urethral stricture, with no difference in efficacy between urethral dilation and urethrotomy [8–10]. Repeated urethrotomies were not associated with an improved success rate, and VIU for longer strictures usually failed [11, 12]. Urethral reconstruction is usually offered only after repeated failed transurethral stricture treatments, which in some cases span several years [13]. Unfortunately, repeated transurethral manipulation of bulbar strictures is associated with increased stricture complexity, stricture length, and a marked delay to curative urethroplasty [14]. Few studies have shown long-term follow-up of patients after VIU [11].

The purposes of this study are to report the overall success rate of VIU and to analyze whether repeated VIUs are associated with a long-term stricture-free rate. This study reflects urologic practice in real-life situations by multiple urologists in a busy tertiary care hospital.

2. Materials and Methods

This is a retrospective study of male patients who presented to the Department of Urology and underwent VIU for urethral stricture disease between July 2004 and May 2012. We evaluated the long-term stricture-free rate after visual internal urethrotomy following initial and subsequent urethrotomies.

We extracted data from medical records and our Integrated Clinical Information System on ascending urethrogram findings, including the site and length of stricture, number of previous urethrotomies, and presence of complex stricture (after urethroplasty or after radiation). All patients with symptoms or signs suggestive of urethral stricture underwent a urethrogram to confirm the diagnosis and determine urethral stricture length. All patients underwent cystourethroscopy before urethrotomy, confirming the diagnosis.

Four urologists performed the urethrotomies using a single incision at the 12 o’clock position or using a modified procedure including multiple radial incisions at the 3, 9, and 12 o’clock positions; the incisions were made with a cold knife or laser. Associated fossa navicularis stricture was treated with meatotomy prior to urethrotomy. Penile urethral strictures were treated with cold knife urethrotomy.

Follow-up data included subjective and objective results and whether subsequent intervention was needed. Symptoms of recurrence included decreased force of the urine stream, feelings of incomplete bladder emptying, or recurrent urinary tract infections. Signs of recurrence were a significant increase in postvoid residual urine on bladder ultrasound or bladder scan, decreased urine flow rate (<15 mL/second), or stricture as determined by diagnostic cystoscopy or retrograde urethrogram. Absence of symptoms or signs of recurrent stricture in any patient at last follow-up defined the success of the procedure. The end point of the follow-up was the last visit that showed failure of treatment or being recurrence-free for 36 months. Only data up to the fifth recurrence after repeated urethrotomy were included.

The Kaplan-Meier method was used to evaluate the stricture-free rate (survival function) after the first, second, third, fourth, and fifth urethrotomies. We used the Statistical Package of Social Science (SPSS, version 20, IBM Corporation, NY, USA). The log-rank test was used to compare survival differences between procedures.

3. Results and Discussion

3.1. Results

The mean age was 37 years (range: 17–82). A total of 446 male patients with urethral stricture disease were identified in the computerized records of the Department of Urology. Sixty-three patients were lost during follow-up. We excluded 82 patients who had complex urethral strictures, strictures longer than 5 cm, or dense palpable spongiofibrosis. This left 301 eligible patients who continued follow-up until the failure of urethrotomy was observed, at which point an alternative management plan was offered to them. We reported the duration of follow-up and time to failure of urethrotomy as the same duration. Further management and follow-up are excluded from this paper.

The stricture characteristics are shown in Table 1. The most common location is bulbar urethral stricture in 227 (75%) patients, penile urethral stricture in 36 (11%) patients, combined penile and bulbar urethral stricture in 24 (8%) patients, and fossa navicularis stricture in 14 (5%) patients. The mean stricture length was 13 mm (range: 4–42). The overall stricture-free rate at the 36-month follow-up was 8.3% with a median time to recurrence of 10 months (95% CI 9.5 to 10.5, range: 2–36). The success rate following single urethrotomy was modest and dropped significantly after repeated urethrotomies (Table 2).

Table 1: Stricture characteristics.

Stricture length
Location
Number of patients

<1 cm
Penile
Bulbar
Penile and bulbar
Fossa navicularis
14
75
0
2

1-2 cm
Penile
Bulbar
Penile and bulbar
Fossa navicularis
16
87
10
4

>2 cm
Penile
Bulbar
Penile and bulbar
Fossa navicularis
6
65
14
8

Table 2: Urethrotomy and stricture-free rate.

Number of urethrotomies
Stricture-free rate
Median time to failure (months)
Number of stricture-free patients
Total number of patients (%)

First
12.1%
8 (95% CI 7.1 to 8.9)
17
140 (46.5%)

Second
7.9%
10 (95% CI 9.4 to 10.6)
8
101 (33.6%)

Third
0%
9 (95% CI 7.3 to 10.7)
0
27 (9%)

Fourth
0%
12 (95% CI 10.4 to 13.6)
0
25 (8.3%)

Fifth
0%
10 (95% CI 6.3 to 13.7)
0
9 (3%)

Overall
8.3%
10 (95% CI 9.5 to 10.5)
25
301 (100%)

Most recurrences occurred within the first postoperative year. Survivors or patients without recurrence were only those with a stricture length of <1 cm and in the bulbar urethra. There was no significant difference in the survival analysis of duration to recurrence among patients undergoing single or multiple procedures (, Figure 1). There was no significant difference in the outcome based on the length of the stricture or the type of treatment.

Figure 1: Stricture-free probability after the first, second, third, fourth, and fifth urethrotomies (Kaplan-Meier survival analysis).

3.2. Discussion

Urethral strictures are often treated with urethrotomy, most commonly direct visual internal urethrotomy [15]. With the introduction of lasers, holmium laser urethrotomy was subsequently used in many centers with equal recurrence outcomes as achieved with VIU [16, 17]. Many urologists prefer VIU over urethral reconstruction because of its ease to perform, low cost, short hospital stay, and perceived low complication rate. They may opt to repeat VIU several times to avoid complex urethral reconstruction, which requires significant surgical experience. This trend continues despite the moderate success rate reported in the selected patients. To reduce the stricture recurrence rate, several investigators evaluated different intralesional adjuvant injections with variable success [18–23]. We set out to report the results of VIU of our patients, including a wider inclusion base and strict criteria of success in a long follow-up period. We felt that these patients constitute a real patient group that tempts urologist to repeatedly administer VIU for the management of their stricture.

Our stricture-free rate of 8.3% at a median of 10 months (range: 2–36) is much lower than that reported by others on long-term follow-up [24]. Heyns et al. found that, after a single dilation or urethrotomy in patients who did not experience restricture within 3 months, the estimated stricture-free rate was 50–60% at 48 months [24]. The higher success rate in that study might be related to the exclusion of patients who failed the treatment in the first three months from the analysis and the shorter stricture length. Another study reported a 32% recurrence-free rate after a median follow-up of 98 months following a single internal urethrotomy. The prognostic characteristics of bulbar urethral strictures associated with good results included single or primary strictures and length shorter than 10 mm [11, 25]. The inclusion of strictures from 1 to 4 cm and the strict success criteria in our study might explain a more realistic success rate of 12.1% after single VIU. Comparison of studies that evaluate the outcome of stricture urethra treatment is greatly affected by the success criteria. This heterogeneity of the definition of success has been clearly shown in a meta-analysis of urethroplasty outcome involving more than 300 articles [26]. We did not separately report the details of the differences in outcome between different stricture lengths, associated location, or type of treatment because there was no significant difference. A focus on these comparisons would have been extremely relevant if we had a significant success rate. However, the overall success rate was poor. Only 25 patients remained stricture-free at 10 months. Compared to the total of 301 patients, subgroup analysis did not show a significant difference because of the small number of successful cases in each comparison cell.

Repeated VIU was associated with more dismal outcomes. This is in accordance with the previously reported data [11, 24, 27]. We found no significant advantage of single versus repeated VIU. We think that the inclusion of long strictures at different sites masks the claimed advantage of single VIU. Our findings stress that an early attempt at urethroplasty is warranted. This is particularly important because repeated urethrotomies have a negative impact on the success of subsequent urethroplasty [28].

Several studies have examined the cost-effectiveness of managing anterior urethral strictures. Urethroplasty as the primary therapy was cost-effective only when the expected success rate of the first VIU was less than 35% [29], whereas VIU became more favorable when the long-term risk of stricture recurrence was less than 60% [30]. If a repeat urethrotomy is required, open urethroplasty is the treatment of choice for recurrent urethral stricture.

4. Conclusions

Visual internal urethrotomy is a simple and popular treatment for male urethral stricture; however, the long-term stricture-free rate is modest even after only a single procedure. Most of the recurrences were found to occur within one year. Thus, definitive curative reconstruction should be planned as early as possible. Repeated visual internal urethrotomies should be considered only in patients who are poor surgical candidates and not because of the convenience of performing a simple procedure.

Conflict of Interests

The authors report no conflict of interests.

References

J. T. Anger, J. C. Buckley, R. A. Santucci, S. P. Elliott, and C. S. Saigal, “Trends in stricture management among male medicare beneficiaries: underuse of urethroplasty?” Urology, vol. 77, no. 2, pp. 481–486, 2011.

T. L. Bullock and S. B. Brandes, “Adult anterior urethral strictures: a national practice patterns survey of board certified urologists in the United States,” Journal of Urology, vol. 177, no. 2, pp. 685–690, 2007.

R. Veeratterapillay and R. S. Pickard, “Long-term effect of urethral dilatation and internal urethrotomy for urethral strictures,” Current Opinion in Urology, vol. 22, no. 6, pp. 467–473, 2012.

M. A. van Leeuwen, J. J. Brandenburg, E. T. Kok, P. L. M. Vijverberg, and J. L. H. R. Bosch, “Management of adult anterior urethral stricture disease: nationwide survey among urologists in the netherlands,” European Urology, vol. 60, no. 1, pp. 159–166, 2011.

M. A. Granieri and A. C. Peterson, “The management of bulbar urethral stricture disease before referral for definitive repair: have practice patterns changed?” Urology, vol. 84, no. 4, pp. 946–949, 2014.

E. Palminteri, S. Maruccia, E. Berdondini, G. B. Di Pierro, O. Sedigh, and F. Rocco, “Male urethral strictures: a national survey among urologists in Italy,” Urology, vol. 83, no. 2, pp. 477–482, 2014.

G. G. Ferguson, T. L. Bullock, R. E. Anderson, R. E. Blalock, and S. B. Brandes, “Minimally invasive methods for bulbar urethral strictures: a survey of members of the American Urological Association,” Urology, vol. 78, no. 3, pp. 701–706, 2011.

J. W. Steenkamp, C. F. Heyns, and M. L. S. De Kock, “Internal urethrotomy versus dilation as treatment for male urethral strictures: a prospective, randomized comparison,” Journal of Urology, vol. 157, no. 1, pp. 98–101, 1997.

S. S. W. Wong, O. M. Aboumarzouk, R. Narahari, A. O'Riordan, and R. Pickard, “Simple urethral dilatation, endoscopic urethrotomy, and urethroplasty for urethral stricture disease in adult men,” Cochrane Database of Systematic Reviews, vol. 12, Article ID CD006934, 2012.

J. W. Steenkamp, C. F. Heyns, and M. L. S. de Kock, “Outpatient treatment for male urethral strictures—dilatation versus internal urethrotomy,” South African Journal of Surgery, vol. 35, no. 3, pp. 125–130, 1997.

V. Pansadoro and P. Emiliozzi, “Internal urethrotomy in the management of anterior urethral strictures: long-term followup,” Journal of Urology, vol. 156, no. 1, pp. 73–75, 1996.

A. A. Zehri, M. H. Ather, and Q. Afshan, “Predictors of recurrence of urethral stricture disease following optical urethrotomy,” International Journal of Surgery, vol. 7, no. 4, pp. 361–364, 2009.

C. F. Heyns, J. van der Merwe, J. Basson, and A. van der Merwe, “Treatment of male urethral strictures—possible reasons for the use of repeated dilatation or internal urethrotomy rather than urethroplasty,” South African Journal of Surgery, vol. 50, no. 3, pp. 82–87, 2012.

S. J. Hudak, T. H. Atkinson, and A. F. Morey, “Repeat transurethral manipulation of bulbar urethral strictures is associated with increased stricture complexity and prolonged disease duration,” Journal of Urology, vol. 187, no. 5, pp. 1691–1695, 2012.

T. J. Greenwell, C. Castle, D. E. Andrich, J. T. MacDonald, D. L. Nicol, and A. R. Mundy, “Repeat urethrotomy and dilation for the treatment of urethral stricture are neither clinically effective nor cost-effective,” The Journal of Urology, vol. 172, no. 1, pp. 275–277, 2004.

S. Kamp, T. Knoll, M. M. Osman, K. U. Köhrmann, M. S. Michel, and P. Alken, “Low-power holmium: YAG laser urethrotomy for treatment of urethral strictures: functional outcome and quality of life,” Journal of Endourology, vol. 20, no. 1, pp. 38–41, 2006.

S. A. Dutkiewicz and M. Wroblewski, “Comparison of treatment results between holmium laser endourethrotomy and optical internal urethrotomy for urethral stricture,” International Urology and Nephrology, vol. 44, no. 3, pp. 717–724, 2012.

S. Kumar, N. Garg, S. K. Singh, and A. K. Mandal, “Efficacy of optical internal urethrotomy and intralesional injection of Vatsala-Santosh PGI tri-inject (triamcinolone, mitomycin C, and hyaluronidase) in the treatment of anterior urethral stricture,” Advances in Urology, vol. 2014, Article ID 192710, 4 pages, 2014.

H. Mazdak, I. Meshki, and F. Ghassami, “Effect of mitomycin C on anterior urethral stricture recurrence after internal urethrotomy,” European Urology, vol. 51, no. 4, pp. 1089–1092, 2007.

E. Hradec, L. Jarolim, and R. Petrik, “Optical internal urethrotomy for strictures of the male urethra. Effect of local steroid injection,” European Urology, vol. 7, no. 3, pp. 165–168, 1981.

H. Mazdak, M. H. Izadpanahi, A. Ghalamkari et al., “Internal urethrotomy and intraurethral submucosal injection of triamcinolone in short bulbar urethral strictures,” International Urology and Nephrology, vol. 42, no. 3, pp. 565–568, 2010.

S. Kumar, A. Kapoor, R. Ganesamoni, B. Nanjappa, V. Sharma, and U. K. Mete, “Efficacy of holmium laser urethrotomy in combination with intralesional triamcinolone in the treatment of anterior urethral stricture,” Korean Journal of Urology, vol. 53, no. 9, pp. 614–618, 2012.

H. M. Kim, D. I. Kang, B. S. Shim, and K. S. Min, “Early experience with hyaluronic acid instillation to assist with visual internal urethrotomy for urethral stricture,” Korean Journal of Urology, vol. 51, no. 12, pp. 853–857, 2010.

C. F. Heyns, J. W. Steenkamp, M. L. S. De Kock, and P. Whitaker, “Treatment of male urethral strictures: is repeated dilation or internal urethrotomy useful?” Journal of Urology, vol. 160, no. 2, pp. 356–358, 1998.

M. Ishigooka, M. Tomaru, T. Hashimoto, I. Sasagawa, T. Nakada, and K. Mitobe, “Recurrence of urethral stricture after single internal urethrotomy,” International Urology and Nephrology, vol. 27, no. 1, pp. 101–106, 1995.

J. J. Meeks, B. A. Erickson, M. A. Granieri, and C. M. Gonzalez, “Stricture recurrence after urethroplasty: a systematic review,” Journal of Urology, vol. 182, no. 4, pp. 1266–1270, 2009.

R. Santucci and L. Eisenberg, “Urethrotomy has a much lower success rate than previously reported,” The Journal of Urology, vol. 183, no. 5, pp. 1859–1862, 2010.

T. M. Kessler, F. Schreiter, G. Kralidis, M. Heitz, R. Olianas, and M. Fisch, “Long-term results of surgery for urethral stricture: a statistical analysis,” Journal of Urology, vol. 170, no. 3, pp. 840–844, 2003.

J. L. Wright, H. Wessells, A. B. Nathens, and W. Hollingworth, “What is the most cost-effective treatment for 1 to 2-cm bulbar urethral strictures: societal approach using decision analysis,” Urology, vol. 67, no. 5, pp. 889–893, 2006.

K. F. Rourke and G. H. Jordan, “Primary urethral reconstruction: the cost minimized approach to the bulbous urethral stricture,” Journal of Urology, vol. 173, no. 4, pp. 1206–1210, 2005.