Bioinorganic Chemistry and Applications
Volume 2018 (2018), Article ID 8097483, 11 pages
https://doi.org/10.1155/2018/8097483

Research Article

Synthesis of N-Tetradecyl-1,10-phenathrolinium-Based New Salts for Biological Applications

Atakilt Abebe,¹ Minaleshewa Atlabachew,¹ Misganaw Liyew,² and Elsabet Ferede²

¹Chemistry Department, Science College, Bahir Dar University, Bahir Dar, Ethiopia
²Biology Department, Science College, Microbiology Research Laboratory, Bahir Dar University, Bahir Dar, Ethiopia

Correspondence should be addressed to Atakilt Abebe; atakiltabebe1@gmail.com

Received 22 January 2018; Revised 2 April 2018; Accepted 18 April 2018; Published 17 July 2018

Academic Editor: Giovanni Natile

Copyright © 2018 Atakilt Abebe et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

New organic salts were synthesized by quaternizing 1,10-phenanthroline using 1-bromotetradecane. The first step yielded an organic salt of formula [C₂₆H₃₇N₂]Br. Anion exchange reaction using Li[(CF₃SO₂)₂N] resulted in a more stable salt of formula [C₂₆H₃₇N₂][(CF₃SO₂)₂N]. The organic salts were investigated by spectrometry (¹H, ¹³C, ¹⁹F NMR, X-ray photoelectron spectroscopy (XPS), UV-Vis, and matrix-assisted laser desorption/ionization mass spectroscopy (MALDI MS), CHNSBr elemental analysis, and thermal analysis (TGA and DSC). The thermal characterization showed the melting and decomposition points of [C₂₆H₃₇N₂][(CF₃SO₂)₂N] to be 48°C and 290°C, respectively, which indicates it is an ionic liquid with large liquidus range. The biological activities of the salts were investigated against two Gram-positive (Staphylococcus aureus and Streptococcus pyogenes) and two Gram-negative (Escherichia coli and Klebsiella pneumoniae) bacteria, and they are found to be active against all of them. They were compared with [Cu(1,10-phenanthroline)₂Cl]Cl. They are found more active against the Gram-negative bacteria. The salts demonstrated minimum inhibitory concentration as low as 50 µg/L. These results suggest the synthesized salts can be considered as a better alternative to certain transition metal complex drugs. This minimizes the concern of introducing metal ions into the organism.

1. Introduction

Nucleic acids play a central role in critical cellular processes including cell division and protein expression [1]. Therefore, they are very attractive targets for small molecule therapeutics [2]. Most biological processes are reliant upon molecular recognition and the reversible interactions of one set of molecules with another [3, 4]. Failure in these activities results in malfunctions in cell replication or gene expression. This could be controlled by modulating nucleic acid activity through use of sequence- or structure-specific drugs. Such compounds would have a direct and beneficial role in the treatment of major diseases [5]. Compounds that have the potential to be clinically useful are normally either intercalators, groove binders, or capable of external electrostatic interaction to DNA [6]. In this regard, aromatic molecules with rigid planar or approximately planar aromatic ring structure systems are the primary choices [7–9]. One such biologically active moiety is 1,10-phenanthroline. However, molecular 1,10-phenanthroline removes metal ions from biological systems using its conveniently placed coordinating two nitrogen atoms. This is expressed by the inhibition of metalloenzymes removing metal ions required for catalytic activity [10, 11]. Therefore, one present strategy in the field of pharmacological research is coordinating 1,10-phenanthroline with transition metal ions to make its nitrogen atoms unavailable for denaturation [12–15]. Furthermore, this activity enhances the medicinal activity of transition metal complexes [16, 17]. Based on this, many transition metal complexes of 1,10-phenanthroline have been found exhibiting numerous biological activities such as antiviral [18, 19], anti-inflammatory, antitumor [20], anti-Candida [21], antimycobacterial [22], and antimicrobial [23] activity upon binding to DNA. For example, [bis(1,10-phenanthroline)L₂copper(II)] (L = cis-5-norbornene-endo-2, 3-dicarboxylic acid; 2,2′-bipyridine; dicyanamide, adenine, and thymine) is well known for its numerous biological activities such as anti-Candida [21], antimycobacterial, and antimicrobial [23] activity. Its activity is believed to emerge from an efficient DNA cleavage activity [24]. However, their rigid three-dimensional structures allow intercalation of the coordinated 1,10-phenanthroline only partially in the major groove of the DNA strand. The latter diminishes the activity of the complex [25, 26].

In this work, an alternative to the employment of transition metal complexes of 1,10-phenanthroline for transportation of 1,10-phenanthroline to the cellular target is described. This is achieved by quaternizing one of the nitrogen atoms in 1,10-phenanthroline using 1-bromo-tetradecane which produces N-tetradecyl-1,10-phenanthrolinium bromide organic salt. This results in an amphiphilic, serpent-like, flat head cation. The amphiphilicity is a consequence of the combined effects of the hydrophobic alkyl chain and the positive charge delocalized throughout the aromatic ring portion of 1,10-phenanthroline [27]. Moreover, its required flat structure is retained intact. This possibly results a complete intercalation in both the major and minor grooves of DNA. The bromide is exchanged with the lipophilic bis(trifluoromethylsulfonyl) imide, [(CF₃SO₂)₂N]⁻, which compounds the penetration of the salt through the lipophilic cell membrane and cell wall which maximizes the biological activity of the salt. Furthermore, the biological activities of these organic salts will be compared with chloro-bis(1,10-phenanthroline)copper(II) chloride. In this comparison, the number of 1,10-phenanthroline moieties in both systems would be made equal. The synthesis of the organic salt from 1,10-phenanthroline is described in the experimental section. The synthesis of the copper complex was carried out following reported procedures [28].

2. Experimental

2.1. Materials and Methods

Chemicals used in this work include 1,10-phenanthroline monohydrate and lithium bis(trifluoromethanesulfonyl) imide obtained from Alfa Aesar. 1-Bromotetradecane, 1,4-dioxane, and all the solvents used were obtained from Sigma-Aldrich and used as received.

The prepared compounds were characterized by their ¹H NMR, ¹³C NMR, and ¹⁹F NMR spectra which were recorded on a 400 MHz Bruker 400 Ultrashield NMR with operating frequencies 270 MHz (¹H), 68 MHz (¹³C), and 376 MHz (¹⁹F). Chemical shifts (δ) are reported in parts per million (ppm) with reference to residual traces in the commercial deuterated solvent, dimethyl sulfoxide (CD₃)₂SO (δH 2.54, (δC 40.45)), at ambient temperature. Coupling constants (J) are given in Hz. The electronic environment of the component atoms of the cation, [C₂₆H₃₇N₂]¹⁺, and the anion, bistrifluorosulfonyl imide ([(CF₃SO₂)₂N]⁻), were investigated using ultra-high vacuum (UHV) characterization using X-ray photoelectron spectroscopy (XPS). We followed the method of Men et al. [29]. The X-ray photoelectron spectra were recorded using a Kratos Axis Ultra spectrometer employing a focused, monochromated Al Kα source (hν = 1486.6 eV), hybrid (magnetic/electrostatic) optics, hemispherical analyzer, and a multichannel plate and delay line detector (DLD) with an X-ray incident angle of 0° (relative to the surface normal). The spectrum was processed without charge correction. The information depth (ID) of these experiments may be defined as the depth, within the sample, from which 95% of the measured signal will originate. ID is assumed to vary mainly with cos θ, where θ is the electron emission angle relative to the surface normal. ID = 7–9 nm and the data obtained may be considered as a representative of the bulk composition. X-ray gun power was set to 100 W. All spectra were recorded using an entrance aperture of 300 × 700 μm with pass energy of 80 eV for survey spectra and 20 eV for high-resolution spectra. The instrument sensitivity was 7.5 × 10⁵ counts·s⁻¹ while measuring the Ag 3d5/2 photoemission peak for a clean Ag sample recorded at a pass energy of 20 eV and 450 W emission power. Ag 3d5/2 full width at half maximum (FWHM) was 0.55 eV for the same instrument settings. Binding energy calibration was made using Au 4f7/2 (83.96 eV), Ag 3d5/2 (368.21 eV), and Cu 2p3/2 (932.62 eV). The absolute error in the acquisition of binding energies is ±0.1 eV, as quoted by the instrument manufacturer (Kratos); consequently, any binding energy within 0.1 eV can be considered the same, within the experimental error. The absorption wave length in the UV-Vis was recorded using Cary 60, version 2.00, in the range 800 to 200 nm, with the UV-Vis scan rate 600 nm/min taking 0.01 mM solution. CHNS elemental analyses were performed with a Flash EA 1112 elemental analyzer (Thermo Quest) taking 15 mg sample. Bromide estimation was conducted taking 100 mg sample dissolved in 40 mL distilled water. Excess AgNO₃ solution was added for the formation of silver bromide (AgBr) precipitate. Then the cruddy white precipitate formed was filtered, dried in an oven, and the amount of bromide was calculated from the weight difference. Matrix-assisted laser desorption/ionization mass spectrometry (MALDI-MS) in the reflectron mode was performed in a Bruker Ultraflex III for the investigation of the cation and anions. The matrix used was trans-2[3-(4-tert-butylphenyl)-2-methyl-2-propenylidene] malononitrile, commonly referred to as DCTB. The sample solution and the DCTB in acetonitrile were mixed together to give about 10 : 1 excess of matrix. 0.5 µL of this mixture was spotted onto a stainless steel target plate and allowed to evaporate to dryness before introduction into the mass spectrometer. The laser operates at a wavelength of 337 nm. Calibration of the data was performed in the FlexControl software.

2.2. Synthesis of [C₂₆H₃₇N₂]Br

The coordinated water in 1,10-phenanthroline monohydrate was removed heating in an oven at 105°C for 2 h. 1-Bromotetradecane dissolved in 1,4-dioxane was added from a dropping funnel to a molar equivalent 1,4-dioxane solution of 1,10-phenanthroline in a 100 ml two-necked round-bottomed flask fitted to the reflux condenser and guarded from moisture using CaCl₂, being stirred in an oil bath at 50°C for 36 h. The completion of the reaction was followed up using thin-layer chromatography (TLC). Gray precipitate was obtained and washed thoroughly with 1,4-dioxane three times.

2.3. ¹H and ¹³C of C₂₆H₃₇N₂]Br

¹H NMR (270 MHz, DMSO-d₆) δ ppm: 0.81 (s, 3H), 1.19 (s, 18H), 1.34 (br. s., 2H), 1.48 (br. s., 2H), 2.07 (s, 2H), 5.89 (br. s., 2H), 8.07 (s, 1H), 8.43 (s, 3H), 8.80 (s, 1H), 9.27 (s, 1H), 9.44 (dd, J = 8.19, 1.31 Hz, 1H), and 9.70 (dd, J = 5.92, 1.38 Hz, 1H).

¹³C NMR (68 MHz, DMSO-d₆) δ ppm: 14.49 (s, 1C), 22.64 (s, 1C), 26.27 (s, 1C), 29.11 (s, 1C), 29.25 (s, 1C), 29.44 (s, 1C), 29.58 (s, 2C), 31.57 (s, 1C), 31.84 (s, 1C), 63.92 (s, 1C), 125.19 (s, 1C), 125.91 (s, 1C), 127.72 (s, 1C), 131.10 (s, 1C), 132.23 (s, 1C), 133.16 (s, 1C), 136.94 (s, 1C), 138.52 (s, 1C), 140.15 (s, 1C), 147.59 (s, 1C), 150.45 (s, 1C), and 151.46 (s, 1C).

Spectra are indicated in Supporting information 1(a) and 1(b).

2.4. Synthesis of [C₂₆H₃₇N₂][(CF₃SO₂)₂N]

The halide anion was exchanged with (CF₃SO₂)₂N⁻ by dissolving [C₂₆H₃₇N₂]Br in deionized water in round-bottomed flask at 70°C to which slightly excess from equimolar amount solution of LiN(CF₃SO₂)₂ was added dropwise. A separate phase viscous liquid following the formation of white suspension was formed. The viscous liquid was decanted, washed thoroughly at 70°C, and dried in vacuum. The viscous mass was solidified after several days. The path of the synthesis is indicated in Scheme 1.

Scheme 1: Synthesis path of the salts.

2.5. ¹H, ¹³C, and ¹⁹F NMR of [C₂₆H₃₇N₂][(CF₃SO₂)₂N]

¹H NMR (270 MHz, DMSO-d₆) δ ppm: 0.83 (t, J = 6.20 Hz, 3H), 1.21 (s, 18H), 1.35 (d, J = 6.47 Hz, 2H), 1.52 (br. s., 2H), 2.06 (d, J = 7.71 Hz, 2H), 5.80–5.98 (m, 2H), 7.99–8.11 (m, 1H), 8.32–8.54 (m, 3H), 8.74–8.86 (m, 1H), 9.30 (dd, J = 4.06, 1.58 Hz, 1H), 9.39 (d, J = 7.71 Hz, 1H), and 9.62 (d, J = 5.65 Hz, 1H).

¹³C NMR (68 MHz, DMSO-d₆) δ ppm: 14.47 (s, 1C), 22.63 (s, 1C), 26.28 (s, 1C), 28.43–29.99 (m, 4C), 31.41–32.69 (m, 2C), 64.01 (s, 1C), 112.92–127.15 (q, 1C), 125.14 (s, 1C), 125.22–126.21 (m, 1C), 126.92–127.35 (m, 1C), 127.77–128.34 (m, 1C), 130.47–131.60 (m, 1C), 132.03–132.74 (m, 1C), 133.20 (s, 1C), 136.71–137.71 (m, 1C), 138.13–139.12 (m, 1C), 140.19 (s, 1C), 147.58 (s, 1C), 150.19–151.05 (m, 1C), and 151.39 (s, 1C).

Spectra are indicated in Supporting information 1(c) and 1(d).

¹⁹F NMR (376 MHz, DMSO-d₆) δ ppm: −78.75 (s, 1 F).

Spectra are indicated in Supporting information 1(e).

2.6. Antibacterial Activity Testing

The organic salts were evaluated for in vitro antibacterial activities against strains of two Gram-positive (S. aureus and S. pyogenes) and two Gram-negative (E. coli and K. pneumoniae) bacteria. We followed the methods of Lawal et al. [30]. The bacterial strains were maintained in the appropriate blood agar base at 4°C. Antibiotic disc (gentamicin 10 μg) was used as a reference. The minimum inhibitory concentration (MIC) against each bacterium was determined by preparing ethanolic solutions of different concentrations of the salts by serial dilution (50 μg/mL, 75 μg/mL, 100 μg/mL, 125 μg/mL, 150 μg/mL, 175 μg/mL, and 200 μg/mL).

3. Results and Discussions

The salts are stable in air. They are soluble methanol, ethanol, acetonitrile, acetone, dichloromethane, and DMSO. The bromide salt dissolves in water as well. Elemental analyses value is in agreement with the assigned formulae. The elemental analysis values are given in Table 1.

Table 1: CHNBrS elemental analysis measurements.

Compound
Elemental estimation

Calculated (found) (%)

H
C
N
Br
S

[C₂₆H₃₇N₂]Br
8.10 (7.98)
68.27 (68.04)
6.13 (6.00)
17.51 (17.28)
—

[C₂₆H₃₇ N₂][(CF₃SO₂)₂N]
5.67 (5.64)
51.14 (51.01)
6.39 (6.28)
—
9.74 (9.59)

3.1. ¹H, ¹³C, and ¹⁹F NMR Results

1,10-Phenanthroline is a symmetric molecule that shows four types of protons and six types of carbon atoms in the aromatic region of its ¹H NMR and ¹³C NMR spectra, respectively. However, following the quaternization reaction, it loses its symmetry evident from the appearance of eight types of protons and twelve types of carbons in this region. This new characteristic feature helps in the identification of the new salt. Moreover, the upfield appearance of fourteen types of protons and fourteen types of carbons and the number of alkyl protons of each type identified using their integration taking aromatic protons as references is a strong confirmation for the occurrence of quaternization (Supporting information 1(a)–1(d)). However, the possibility of di-quaternization of 1,10-phenanthroline is ruled out due to the steric hindrance of one of the nitrogen atoms after the first quaternization [31]. The successful anion exchange performed to get the intended salt is evident from the appearance of four new peaks in ¹³C NMR at δ ppm 112.92–127.15 assignable to the carbon in [(CF₃SO₂)₂N]⁻ (Supporting information 1(d)). It is quartet because of the coupling with the bonded fluorine atoms. Moreover, the single strong peak signaled in the ¹⁹F NMR is an additional confirmation for the purity of the salt and the successful anion exchange reaction (Supporting information 1(e)).

3.2. XP Spectroscopy Results

X-ray photoelectron spectroscopy is very reliable in confirming purity. The survey spectrum (Figure 1(a)) signaled only those elements expected from [C₂₆H₃₇N₂][(CF₃SO₂)₂N] in the appropriate percentage. This strongly supports the CHNS elemental analysis result.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 1: X-ray photoelectron spectrum recorded for (a) survey, (b) wide scan for C1s, (c) wide scan for N1s, (d) wide scan for F1s, (e) wide scan for O1s, and (f) wide scan for S2p of [C₂₆H₃₇N₂][(CF₃SO₂)₂N].

3.3. Wide-Scan XPS Spectra: The Electronic Environments of the Component Atoms of [C₂₆H₃₇N₂][(CF₃SO₂)₂N]

In [C₂₆H₃₇N₂][(CF₃SO₂)₂N], there are 28 C atoms whose type of electronic environment is differentiated into five groups as CF₃, C¹⁺², C³, C⁴ + C⁵, and CAlkyl. Their corresponding binding energies are 293.00, 286.90, 286.30, 285.70, and 285.00 eV, respectively (Figure 1(b)). The N 1s XP spectrum contains three characteristic peaks. The peak at higher binding energy, 402.20 eV, is assigned to the alkylated nitrogen of the cation, NCation, while the peak at lower binding energy whose peak is nearly twice the former represents enveloped two nitrogenes, the unalkylated nitrogen, (399.52 eV), of the cation and that of the anion, [(CF₃SO₂)₂N]⁻ (399.35 eV) (Figure 1(c)). Fluorine, oxygen, and sulfur of these compounds each show a single electronic environment (Figures 1(d)–1(f)). This is because of the obvious reason that the six fluorine atoms are chemically indistinguishable. This fact works the same for the four oxygen atoms and the two sulfur atoms. The sulfur signal is a doublet due to spin-orbit splitting.

3.4. Mass Spectra

The matrix-assisted laser desorption/ionization (MALDI MS) spectra of [C₂₉H₃₇N₂][(CF₃SO₂)N] were recorded for both the cation and anion targeting the cation and anion, respectively (Figure 2). The obtained molecular ion peaks for the cation appeared at m/z 377.2956 confirmed the quaternization of 1,10-phenanthroline with 1-bromotetradecane and the acquisition of the intended salt with the proposed formula (Figure 2(a)). Moreover, the recorded molecular ion peak for the anion appeared at m/e 279.9165 confirmed the successful anion exchange and isolation of pure salt (Figure 2(b)).

(a)

(b)

Figure 2: (a) MALDI MS+ and (b) MALDI MS for [C₂₆H₃₇N₂][(CF₃SO₂)₂N].

3.5. UV-Vis Spectra

In addition to XPS, UV-Vis spectroscopy was employed to investigate the electronic environments of the final product and the starting of 1,10-phenanthroline to confirm the successful monoquaternization. The UV-Vis spectrum of 1,10-phenanthroline shows bands at 229 nm and 264 nm corresponding to n →  and π →  transitions, respectively. Following the quaternization, these bands appeared shifted to 215 nm and 274 nm, respectively (Figure 3). This is because, the quaternization involves the nonbonding electron in the bonding, thereby lowers the energy. The latter increases the energy gap between the nonbonding and the orbitals. On the other hand, the quaternization develops a delocalized positive charge in the ring system that increases the energy of the π orbitals. Subsequently, it decreases the energy gap between π and orbitals.

Figure 3: UV-Vis spectra of 1,10-phenanthroline and [C₂₆H₃₇N₂][(CF₃SO₂)₂N].

3.6. Thermal Properties

The response obtained from heating of the samples clearly demonstrated the influence of the anion on the nature of the salt produced. The cation is large in size over which the monopositive charge is highly delocalized over the entire aromatic portion. This makes it classified as a soft acid. The increase in the size of the counter mono-charged anion increases the extent of its softness [32]. In [C₂₆H₃₇N₂]Br, the soft cation is coupled with a relatively hard anion which creates incompatibility in their interaction that made the salt relatively unstable. Because of this, it showed decomposition without melting, starting around 129.72°C. This is the consequence of the localized negative charge on the bromide that easily attacks the cation which creates relative instability [33]. On the other hand, the coupling of the soft cation with a relatively softer base in [C₂₆H₃₇N₂][(CF₃SO₂)₂N] resulted in thermally stable salt. This is expressed by its higher decomposition point which started at around 244°C (Table 2 and Supporting information 2(b) and 3). Furthermore, the cation and anion are both unsymmetrical that they hinder the crystalline packing of the salt. This fact significantly reduced the melting point to 48.77°C. The latter property makes it to be classified as a new ionic liquid, and the wide gap between its melting and decomposition temperatures gives [C₂₆H₃₇N₂][(CF₃SO₂)₂N], an attractive feature for potential applications such as electrochemistry [31, 34, 35] (Supporting information 2(b) and 3 and Table 2). Moreover, [C₂₆H₃₇N₂][(CF₃SO₂)₂N] typically demonstrated substantial supercooling as its freezing point is significantly lower than the melting point (−11.28 to 48.77°C) (Supporting information 3 and Table 2).

Table 2: Starting point and onset temperatures with the weight loss curves and melting and crystallization temperatures of the salts.

Compound
Temperature (°C)

Start
Onset
Glass transition
Crystallization
Melting

[C₂₆H₃₇N₂]Br
129.72
157.41
—
—
—

[C₂₆H₃₇N₂][(CF₃SO₂)₂N]
244.41
290.31
−0.60
−11.28
48.77

3.7. Antibacterial Screening

The compounds were tested for their in vitro antimicrobial activity and were compared with the commercially available gentamicin. They were tested against two Gram-positive (S. aureus and S. pyogenes) and two Gram-negative (E. coli and K. pneumoniae) bacteria, and they all were found active against all the tested pathogens (Figure 4). The synthesized compounds, the metal complex, and gentamicin showed less activities than the molecular 1,10-phenanthroline against all the bacteria. The metal complex, [Cu(Phen)₂Cl]Cl, showed better activities than the organic salts and gentamicin against the Gram-positive bacteria (S. aureus and S. pyogenes). On the other hand, the synthesized organic salts demonstrated better activities than [Cu(Phen)₂Cl]Cl against the Gram-negative (E. coli and K. pneumoniae) bacteria (Figure 4 and Table 3). Furthermore, [C₂₆H₃₇N₂][(CF₃SO₂)₂N] is found better than its precursor, [C₂₆H₃₇N₂]Br. The former statement is encouraging because these compounds succeeded in reaching the target passing two barriers of the Gram-negative bacteria, namely, the cell membrane and the cell wall of even the highly drug resistant K. pneumoniae. This is probably due to the very long and rod-like cation which contained relatively long lipophilic alkyl chain; its positive charge is highly delocalized throughout the aromatic ring portion; subsequently, it becomes amphiphilic which increased the cell permeability. Subsequently, the cell wall and cell membrane that surrounds the cell favors the passage of salts to reach to their target [36]. Moreover, significant biological activity differences are observed between [C₂₆H₃₇N₂][(CF₃SO₂)₂N] and [C₂₆H₃₇N₂]Br. This is attributed to the better penetration of the former into the cellular target due to the lipophilicity of [(CF₃SO₂)₂N]⁻. This is in very good agreement with the solubility experiment result that [C₂₆H₃₇N₂][(CF₃SO₂)₂N] is soluble only in organic solvents. The minimum inhibitory concentration (MIC) values of the salts are summarized in Table 4. The result shows that even though the organic salts show less inhibition zones than the metal complex against Gram-positive bacteria, they are found inhibiting at such very small minimum concentrations (Table 4).

Figure 4: The inhibition observed by the actions of the salts.

Table 3: Antibacterial studies of the investigated compounds (inhibition zones).

Compound
Inhibition zone (mm)

Gram-negative bacteria
Gram-positive bacteria

E. coli
K. pneumoniae
S. aureus
S. pyogenes

[C₂₆H₃₇ N₂]Br
19.75
19.75
16.50
25.00

[C₂₆H₃₇ N₂][(CF₃SO₂)₂N]
20.25
20.25
23.50
20.25

Gentamicin
31.25
25.00
26.50
28.25

[Cu(Phen)₂Cl]Cl
15.00
17.25
29.75
29.50

1,10-Phenanthroline
36.00
18.75
36.00
31.25

Table 4: MIC assays of the salts against four bacterial pathogens.

Compound
Minimum concentration of microorganism growth (μg/mL)

Gram-negative bacteria
Gram-positive bacteria

E. coli
K. pneumoniae
S. aureus
S. pyogenes

[C₂₆H₃₇ N₂]Br
50
50
50
50

[C₂₆H₃₇ N₂][(CF₃SO₂)₂N]
50
75
75
75

[Cu(Phen)₂Cl]Cl
100
125
75
75

4. Conclusions

The purity and synthesis of the intended salt was confirmed from the data obtained using all characterization techniques employed here. The results demonstrated that the effect of the anion on the properties of the salt is significant. This was revealed on their thermal and antibacterial results. The result of the in vitro biological activity studies indicated that the organic salts are biologically active against all the tested pathogens. This result makes them classified as a wide-range antibacterial agent. These organic salts are found better than the copper complex in their activities against the Gram-negative bacteria. This can be considered promising news as alternative drugs providing the cytotoxicity issue is resolved. This can lighten the concern of introducing metal ions into organisms. The DSC result showed that [C₂₆H₃₇ N₂][(CF₃SO₂)₂N] is an ionic liquid with large liquidus range.

Data Availability

The authors are not making their data available at this time.

Conflicts of Interest

There are no conflicts of interest among the authors and the funding institution.

Acknowledgments

The authors express sincere thanks to Bahir Dar University for financial support.

Supplementary Materials

The supporting information contained NMR (¹H, ¹³C, and ³¹F) (Supporting information 1(a)–1(e)), thermograms and thermogravimetric analysis (TGA) curves for [C₂₆H₃₇ N₂] and [C₂₆H₃₇ N₂][(CF₃SO₂)₂N] (Supporting information 2(a) and 2(b)), and differential scanning calorimetric curve for [C₂₆H₃₇ N₂][(CF₃SO₂)₂N] (Supporting information 3). (Supplementary Materials)

References

R. R. Breaker and G. F. Joyce, “The expanding view of RNA and DNA function,” Chemistry & Biology, vol. 21, no. 9, pp. 1059–1065, 2014.

T. A. Cooper, L. Wan, and G. Dreyfuss, “RNA and disease,” Cell, vol. 136, no. 4, pp. 777–793, 2009.

J. W. Lown, K. Krowicki, U. G. Bhat, A. Skorobogaty, B. Ward, and J. C. Dabrowiak, “Molecular recognition between oligopeptides and nucleic acids: novel imidazole-containing oligopeptides related to netropsin that exhibit altered DNA sequence specificity,” Biochemistry, vol. 25, no. 23, pp. 7408–7416, 1986.

M. H. Caruthers, “Deciphering the protein-DNA recognition code,” Accounts of Chemical Research, vol. 13, no. 5, pp. 155–160, 1980.

L. Liu, Y. Lin, and S. L. Gerson, “MGMT: a critical DNA repair gene target for chemotherapy resistance and for stem cell protection,” in DNA Repair in Cancer Therapy, pp. 17–28, Elsevier Inc., New York, NY, USA, 2012.

S. Neidle, D. G. Brown, T. C. Jenkins, C. A. Laughton, M. R. Sanderson, and J. V. Skelly, “Drug-DNA recognition: sequence-specificity of the DNA minor groove binder berenil,” in Molecular Basis of Specificity in Nucleic Acid-Drug Interactions, pp. 43–57, Springer, Dordrecht, Netherlands, 1990.

S. C. Zimmerman, “Molecular tweezers: synthetic receptors for π-sandwich complexation of aromatic substrates,” Bioorganic Chemistry Frontiers, vol. 2, pp. 33–71, 1991.

A. Tawani, A. Amanullah, A. Mishra, and A. Kumar, “Evidences for Piperine inhibiting cancer by targeting human G-quadruplex DNA sequences,” Scientific Reports, vol. 6, no. 1, Article ID 39239, 2016.

S. Yadav, B. Narasimhan, S. M. Lim et al., “Synthesis, characterization, biological evaluation and molecular docking studies of 2-(1H-benzo [d] imidazol-2-ylthio)-N-(substituted 4-oxothiazolidin-3-yl) acetamides,” Chemistry Central Journal, vol. 11, no. 1, p. 137, 2017.

D. Schomburg and I. Schomburg, “N-acetyl-1-d-myo-inositol-2-amino-2-deoxy-α-d-glucopyranoside deacetylase 3.5.1.103,” in Class 3.4–6 Hydrolases, Lyases, Isomerases, Ligases: Springer Handbook of Enzymes, D. Schomburg and I. Schomburg, Eds., vol. 10, pp. 247–254, Springer, Berlin, Heidelberg, Germany, 2013.

A. Meister, Advances in Enzymology and Related Areas of Molecular Biology, vol. 56, John Wiley & Sons, Hoboken, NJ, USA, 2009, ISBN: 978-0-470-12380-5.

A. Abebe and T. Hailemariam, “Synthesis and assessment of antibacterial activities of ruthenium (III) mixed ligand complexes containing 1, 10-phenanthroline and guanide,” Bioinorganic Chemistry and Applications, vol. 2016, Article ID 3607924, 9 pages, 2016.

R. Gup and B. Kırkan, “Synthesis and spectroscopic studies of mixed-ligand and polymeric dinuclear transition metal complexes with bis-acylhydrazone tetradentate ligands and 1, 10-phenanthroline,” Spectrochimica Acta Part A: Molecular and Biomolecular Spectroscopy, vol. 64, no. 3, pp. 809–815, 2006.

I. Turel, A. Golobič, J. Kljun, P. Samastur, U. Batista, and K. Sepčić, “New synthetic routes for the preparation of ruthenium-1, 10-phenanthroline complexes: tests of cytotoxic and antibacterial activity of selected ruthenium complexes,” Acta Chimica Slovenica, vol. 62, no. 2, pp. 337–345, 2015.

M. Cusumano, M. L. Di Pietro, and A. Giannetto, “DNA interaction of platinum (II) complexes with 1, 10-phenanthroline and extended phenanthrolines,” Inorganic Chemistry, vol. 45, no. 1, pp. 230–235, 2006.

M. R. Jones, D. Duncan, and T. Storr, “Ligand Design in Medicinal Inorganic Chemistry,” in Introduction to Ligand Design in Medicinal Inorganic Chemistry, T. Storr, Ed., pp. 1–8, Wiley, Chichester, UK, 2014.

T. Aiyelabola, E. Akinkunmi, E. Obuotor, I. Olawuni, D. Isabirye, and J. Jordaan, “Synthesis characterization and biological activities of coordination compounds of 4-hydroxy-3-nitro-2h-chromen-2-one and its aminoethanoic acid and pyrrolidine-2-carboxylic acid mixed ligand complexes,” Bioinorganic Chemistry and Applications, vol. 2017, Article ID 6426747, 9 pages, 2017.

N. Margiotta, F. P. Fanizzi, J. Kobe, and G. Natile, “Synthesis, characterisation and antiviral activity of platinum (II) complexes with 1, 10-phenanthrolines and the antiviral agents acyclovir and penciclovir,” European Journal of Inorganic Chemistry, vol. 2001, no. 5, pp. 1303–1310, 2001.

N. Margiotta, A. Bergamo, G. Sava, G. Padovano, E. De Clercq, and G. Natile, “Antiviral properties and cytotoxic activity of platinum (II) complexes with 1, 10-phenanthrolines and acyclovir or penciclovir,” Journal of Inorganic Biochemistry, vol. 8, pp. 1385–1390, 2004.

J. D. Ranford, P. J. Sadler, and D. A. Tocher, “Cytotoxicity and antiviral activity of transition-metal salicylato complexes and crystal structure of bis (diisopropylsalicylato)(1, 10-phenanthroline) copper (II),” Journal of the Chemical Society, Dalton Transactions, vol. 22, pp. 3393–3399, 1993.

M. Geraghty, V. Sheridan, M. McCann, M. Devereux, and V. McKee, “Synthesis and anti-Candida activity of copper (II) and manganese (II) carboxylate complexes: X-ray crystal structures of [Cu (sal)(bipy)]·C₂H₅OH·H₂O and [Cu (norb)(phen)₂]·6.5 H₂O (salH₂ = salicylic acid; norbH₂ = cis-5-norbornene-endo-2, 3-dicarboxylic acid; bipy= 2, 2′-bipyridine; phen = 1, 10-phenanthroline),” Polyhedron, vol. 18, no. 22, pp. 2931–2939, 1999.

D. K. Saha, U. Sandbhor, K. Shirisha et al., “A novel mixed-ligand antimycobacterial dimeric copper complex of ciprofloxacin and phenanthroline,” Bioorganic & Medicinal Chemistry Letters, vol. 14, no. 12, pp. 3027–3032, 2004.

M. A. Zoroddu, S. Zanetti, R. Pogni, and R. Basosi, “An electron spin resonance study and antimicrobial activity of copper (II)-phenanthroline complexes,” Journal of Inorganic Biochemistry, vol. 63, no. 4, pp. 291–300, 1996.

C. H. Chen and D. S. Sigman, “Nuclease activity of 1, 10-phenanthroline-copper: sequence-specific targeting,” Proceedings of the National Academy of Sciences, vol. 83, no. 19, pp. 7147–7151, 1986.

I. Potočňák, M. Dunaj-Jurčo, D. Mikloš, M. Kabešová, and L. Jäger, “Bis (dicyanamide) bis (1, 10-phenanthroline) copper (II),” Acta Crystallographica Section C: Crystal Structure Communications, vol. 51, no. 4, pp. 600–602, 1995.

J. K. Barton, A. Danishefsky, and J. Goldberg, “Tris (phenanthroline) ruthenium (II): stereoselectivity in binding to DNA,” Journal of the American Chemical Society, vol. 106, no. 7, pp. 2172–2176, 1984.

M. Bonchio, M. Carraro, G. Casella, V. Causin, F. Rastrelli, and G. Saielli, “Thermal behaviour and electrochemical properties of bis (trifluoromethanesulfonyl) amide and dodecatungstosilicate viologen dimers,” Physical Chemistry Chemical Physics, vol. 14, pp. 2710–2717, 2012.

A. Abebe, A. Sendek, S. Ayalew, and M. Kibret, “Copper (II) mixed-ligand complexes containing 1, 10-phenanthroline, adenine and thymine: Synthesis, characterization and antibacterial activities,” Chemistry International, vol. 3, no. 3, pp. 230–239, 2017.

S. Men, K.R. Lovelock, and P. Licence, “X-ray photoelectron spectroscopy as a probe of rhodium-ligand interaction in ionic liquids,” Chemical Physics Letters, vol. 645, pp. 53–58, 2016.

A. Lawal, A. S. Shodeinde, S. A. Amolegbe, S. E. Elaigwu, and M. T. Yunus-Issa, “Synthesis, characterization and antimicrobial activity of mixed transition metal complexes of salicylic acid with 1, 10-phenanthroline,” Journal of Applied Sciences and Environmental Management, vol. 21, no. 3, pp. 568–573, 2017.

I. J. Villar-Garcia, A. Abebe, and Y. Chebude, “1, 10-Phenanthrolinium ionic liquids exhibiting excellent solubility for metal complexes: potential solvents for biphasic and supported ionic liquid phase (SILP) catalysis,” Inorganic Chemistry Communications, vol. 19, pp. 1–3, 2012.

J. E. Huheey, E. A. Keiter, and R. L. Keiter, Inorganic Chemistry: Principles of Structure and Reactivity, College Publishers, New York, NY, USA, 4th edition, 1993.

H. L. Ngo, K. LeCompte, L. Hargens, and A. B. McEwen, “Thermal properties of imidazolium ionic liquids,” Thermochimica Acta, vol. 357-358, pp. 97–102, 2000.

R. D. Rogers and K. R. Seddon, Ionic Liquids: Industrial Applications for Green Chemistry, American Chemical Society, Washington, DC, USA, 2002.

T. Welton, “Room-temperature ionic liquids: solvents for synthesis and catalysis,” Chemical Reviews, vol. 99, no. 8, pp. 2071–2084, 1999.

L. A. Summers, “The Phenanthrolines,” in Advances in Heterocyclic Chemistry, vol. 22, pp. 1–69, Elsevier, Gainesville, FL, USA, 1978.