BioMed Research International

Volume 2013 (2013), Article ID 160203, 7 pages

http://dx.doi.org/10.1155/2013/160203

Clinical Study

Videocapillaroscopic Alterations in Alopecia Areata

Agnieszka Gerkowicz, Dorota Krasowska, Aldona Pietrzak, Anna Michalak-Stoma, Joanna Bartosińska, Maria Juszkiewicz-Borowiec, and Grażyna Chodorowska

Department of Dermatology, Venereology and Paediatric Dermatology, Medical University of Lublin, Radziwiłłowska 13, 20-080 Lublin, Poland

Received 30 April 2013; Revised 29 July 2013; Accepted 19 August 2013

Academic Editor: Maxim E. Darvin

Copyright © 2013 Agnieszka Gerkowicz et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Alopecia areata (AA) is a common hair disorder observed in dermatological practice; however, the exact mechanisms that lead to the hair loss are still unknown. Disturbances in the blood supply of hair follicles may be one of the elements in the complex pathogenesis of AA. Nailfold videocapillaroscopy is a noninvasive technique that allows analysis of skin microcirculation in vivo. The aim of the study was the videocapillaroscopic assessment of skin microcirculation in AA patients. The study included 44 patients with patchy alopecia areata, 27 with alopecia universalis or totalis, and 40 healthy volunteers. Nailfold videocapillaroscopy was performed in all participants according to a standard protocol. Obtained images were assessed qualitatively and quantitatively. Two types of videocapillaroscopic images were distinguished in the study. Abnormal videocapillaroscopic images were found in 42% of patients. Tortuous and branching capillaries (, ), decreased density of capillaries (), enlargement of the efferent limb (), or top part of the loop () were observed significantly more often than in the control group. Only some patients with AA presented with microvascular abnormalities characterised by altered videocapillaroscopic images. More studies, including larger group of patients with AA, are required to determine the role of observed videocapillaroscopic alterations in AA.

1. Introduction

Alopecia areata (AA) is a disease of a hair-bearing area [1–3]. Its incidence varies among different authors, ranging from 0.1 to 3.8% [1, 4–6].

The sudden onset of well-defined oval or round, single or multiple patches of nonscarring hair loss is a typical feature of AA [1, 3, 4, 6, 7]. More extensive hair loss leads to total loss of scalp hair (alopecia totalis (AT)) or total loss of scalp and body hair (alopecia universalis (AU)) [1, 3, 5]. Other clinical features of AA are nail changes, found in 7–66% of patients [1, 8].

Nowadays, AA is regarded as a T cell-mediated autoimmune disease of hair follicles. Genetic and environmental factors are also considered in its pathogenesis [1, 9]. It is recognised that adequate blood supply of the hair follicle is crucial for normal hair growth [10] and angiogenesis is strongly associated with the hair cycle [11–13]. Therefore, it has been suggested that disturbances in the blood supply of hair follicles may be one of the elements in the complex nature of AA [14, 15]. It is thought that a proangiogenic factor such as VEGF (vascular endothelial growth factor) may also be engaged in the pathogenesis of this disease. It was histologically demonstrated that decreased VEGF synthesis is associated with reduced vascularisation of the affected skin in patients suffering from AA. Furthermore, an increase of VEGF in hair follicle keratinocytes after DPCP (diphenylcyclopropenone) therapy resulted in an increase in the number of capillary vessels [14].

Capillaroscopy is a noninvasive imaging technique that enables assessment of skin microcirculation in vivo [16]. Videocapillaroscopy is a modern variant of this technique which uses an optical fiber probe connected to a microvideotelecamera and allows morphologic and functional analysis of microcirculation in higher magnification (usually 200x) [16, 17]. Videocapillaroscopy is mainly performed at the nailfold where capillaries run parallel to the skin, which enables visualisation of the whole length of the capillary loops. It is assumed that any alterations in microcirculation should be noticeable in the nailfold and thus capillaroscopy may be performed in all clinical conditions in which microcirculation involvement is expected [16, 18].

The aim of the study was the videocapillaroscopic assessment of skin microcirculation in patients with AA.

2. Subjects and Methods

71 patients with AA (33 females, 38 males), aged between 22 and 56 (mean age 40.02 ± 11.02 years), were enrolled in this study. The control group consisted of 40 healthy volunteers (19 females, 21 males), aged between 21 and 56 (mean age 40.89 ± 9.88 years). AA was diagnosed in all patients. 44 patients (62%) had patchy AA, and 27 (38%) had extensive hair loss including AT, AU, and AU/AT. In 27 patients, changes of the fingernail plates, including pitting, trachyonychia, and onychorrhexis (resp., in 14, 10, and 3 patients), were recognised.

The excluding criteria were ages <18 and >60; coexisting diseases such as connective tissue diseases, lung diseases, hyperthyreosis and hypothyreosis, hypertension, types I and II diabetes, lipid abnormalities, ischemic heart disease, chronic venous insufficiency, and acrocyanosis; any nail plate involvement that resulted from a clinical condition other than AA; nicotine addiction or alcohol abuse; or manicure within 3 weeks prior to the videocapillaroscopy.

In all patients and in the control group, the nailfold videocapillaroscopy was performed using VideoCap 3.0 (DS Medica, Italy), 200x magnification. Videocapillaroscopy was performed in the morning to maintain the same conditions of the examination. All participants refrained from eating, drinking caffeinated drinks, and taking any drugs that might influence the circulatory system. Before the examination, each subject was adapted to the room temperature of  20–23°C for around 15–20 minutes. Nailfolds of the 2nd to 5th fingers of both hands were examined after applying a drop of cedar oil on the nailfold to obtain best visibility of the capillary network. Photos of each examined finger were taken and stored. The parameters that were evaluated during videocapillaroscopy are shown in Table 1.

Table 1: Videocapillaroscopic criteria.

Videocapillaroscopic parameters
Criteria

Distribution of the capillaries

    Regular
Homogenous distribution of capillaries

    Altered
Nonhomogenous distribution of capillaries

Density of the capillaries

    Normal
9–13 capillaries/mm

    Increased
>13 capillaries/mm

    Decreased
<9 capillaries/mm or avascular area

Diameter of the capillaries

    Normal
The diameter of the afferent limb (6 to 19 μm) and the diameter of the efferent limb (8–20 μm), venous limb width ratio: arterial limb no greater than 2 : 1

    Enlargement of the top part of the loop
Diameter of the limbs larger than average

    Enlargement of the efferent limb
Diameter of the limbs larger than average

Length of the capillaries

    Normal
Approximately 400 μm

    Elongated
>750 μm

Extravasation

    Absent
No extravasations

    Single
Present in 1-2 fingers

    Multiple
Present in >2 fingers

Subpapillary venular plexus visibility

    Invisible

    1-2 fingers
Visible in 1-2 fingers

    >2 fingers
Visible in >2 fingers

Background colour

    Pale

    Pink

    Reddish

Morphology of the capillaries

    Normal
Appearance like an inverted letter U

    Tortuous capillaries—regular appearance
Single crossovers

    Tortuous capillaries—irregular appearance
Multiple crossovers or appearance like “treble clef” loop, “antler” loop, “trefoil” loop or meandering appearance with single/multiple crossovers

The number of tortuous capillaries

    Single
<5 at least in two fingers

    Multiple
>5 at least in two fingers

Branching capillaries

    Present
At least one such loop in two fingers

Coiled capillaries

    Present
At least one such loop in two fingers

Features of the capillary neoformation

    Present
Thin, branching from one limb, or thin interconnection between the limbs (at least one such loop in two fingers)

Two-proportion -test was used to compare the videocapillaroscopic pattern between patients with AA and the control group. Pearson's chi-squared test was used to test associations between categorical variables. The level of significance was . Data analysis was performed using STATISTICA 9.0 software and Microsoft Excel 2007.

3. Results

Tortuous loops observed in 84.5% of patients with AA were the most common videocapillaroscopic findings in patients with AA. Among these patients, 57.75% had only single tortuous loops, while in 26.76% multiple tortuous loops were observed. The frequency of tortuosity was statistically higher in the studied group than in the control group (). Branching capillaries and features of neovascularisation were observed significantly more often in the patients with AA when compared to the control group ( and , resp.). The nailfold videocapillaroscopy showed enlargement of the top part of the loop in 12.68% of patients, while 11.27% of patients had dilatation of the efferent limb. The frequency of these alterations was significantly higher in the studied group than in the control group ( and , resp.). It is worth noting that a decreased density of capillaries was observed significantly more often in the patients with AA than in the control group (). None of the patients had extremely elongated loops. The results of all the videocapillaroscopic parameters investigated in both groups are shown in Table 2.

Table 2: Videocapillaroscopic findings in patients with alopecia areata and in the control group.

Videocapillaroscopic parameters
Alopecia areata
Control group

Distribution of the capillaries

    Regular
55 (77.46%)
40 (100%)
0.001

    Altered
16 (22.53%)
0

Density of the capillaries

    Normal
58 (81.7%)
40
—

    Increased
2 (02.28%)
0
—

    Decreased
11 (15.49%)
0
0.009

Diameter of the capillaries

    Normal
54 (76%)
40
—

    Enlargement of the top part of the loop
9 (12.68%)
0
0.009

    Enlargement of the efferent limb
8 (11.27%)
0
0.017

Length of the capillaries

    Normal
71 (100%)
40
—

Extravasations

    Absent
52 (73.24%)
36 (90%)
0.018

    Single
10 (14.08%)
4 (10%)

    Multiple
9 (12.68%)
0

Subpapillary venular plexus visibility

    Invisible
59 (83.10%)
34 (85%)
0.571

    1-2 fingers
11 (15.49%)
6 (15%)

    >2 fingers
1 (1.41%)
0

Background colour

    Pale
8 (11.27%)
0
0.002

    Pink
63 (88.73%)
40 (100%)
—

Tortuous capillaries

    Absent
11 (15.49%)
14 (35%)
0.013

    Single
41 (57.75%)
26 (65%)

    Multiple
19 (26.76%)
0

Tortuous capillaries irregular appearance

    Absent
44 (61.97%)
25 (62.50%)
0.802

    Present
27 (38.03%)
15 (37.50%)

Branching capillaries

    Absent
49 (69.01%)
40 (100%)
0.001

    Present
22 (30.99%)
0

Coiled capillaries

    Absent
68 (95.77%)
40 (100%)
0.187

    Present
3 (4.23%)
0

Features of the capillary neoformation

    Absent
45 (63.38%)
40 (100%)
—

    Present
26 (36.62%)
0
0.021

Based on the results, two types of videocapillaroscopic images in the patients with AA were distinguished. The first, normal pattern (or close to the one observed in healthy population) was shown in 41 (57.8%) patients. Among them, 23 people had patchy AA and 18 had extensive hair loss. The second, abnormal pattern was observed in 30 (42.2%) patients, including 21 people with patchy AA and 9 with extensive hair loss. There was no statistical correlation between the type of AA and the presence of abnormal videocapillaroscopic images ().

In the first type, the capillaries had normal density, along with regular distribution and loop size. The background was pink. The majority of the loops had a characteristic appearance, similar to an inverted letter U; however, some patients had single tortuous loops with an irregular appearance. Subpapillary venular plexus was visible in some patients (Figure 1).

Figure 1: The first type of videocapillaroscopic images (normal): pink background, normal loop density, and loop size single tortuous capillaries (200x magnification).

In the second type, the videocapillaroscopic images were varied. However, each patient had at least 2 videocapillaroscopic alterations in minimum 2 fingers, such as multiple tortuous loops, branching capillaries, features of capillary neoformation characterized by thin branching within one limb or thin connection between the afferent and efferent limb, increased or decreased density of the capillaries, enlargement of the loop size, or altered distribution of the capillary network (Figures 2, 3, and 4).

Figure 2: The second type of videocapillaroscopic images (abnormal): reduced density of capillaries, single tortuous loops, and branching capillaries (200x magnification).

Figure 3: The second type of videocapillaroscopic images (abnormal): enlargement of the top part of the loop, features of capillary neoformation, and extravasations (200x magnification).

Figure 4: The second type of videocapillaroscopic images (abnormal): multiple tortuous loops with irregular appearance, dilatation of the efferent limb, and features of capillary neoformation (200x magnification).

Among patients with the second type of videocapillaroscopic pattern, 8 (30.77%) patients had nail abnormalities and 22 (48.89%) did not have any nail changes. Moreover, we observed no statistical correlation between the occurrence of the second type of videocapillaroscopic pattern and the presence of nail changes ().

4. Discussion

AA is a common hair disorder observed in dermatological practice; however, the exact mechanisms that lead to the hair loss are still unknown [1, 2, 6, 19, 20]. The possible role of microvascular disturbances has been suggested in the pathogenesis of AA [10–15]. Nailfold vidoecapillaroscopy is regarded as the most appropriate noninvasive technique which allows direct observation of skin microcirculation in vivo [16–18]. There are only a few studies evaluating capillaroscopic abnormalities in patients with AA [21, 22]. To the best of our knowledge, nailfold videocapillaroscopy has never been used to observe the microcirculation characteristics of alopecia areata.

In the current study, based on the videocapillaroscopic findings, two types of videocapillaroscopic images were distinguished in the patients with AA.

57.8% of patients from the study group were classified as having the first type of videocapillaroscopic images. The findings including pink background, regular distribution of the capillary network, along with normal loop density and loop size were similar to the images observed in our control group as well as in the healthy population described in other studies [16]. Within this group, some patients had single tortuous capillaries. It is thought that the tortuosity of the loops may appear in the healthy population [16, 18]. According to some authors, the presence of more than 20% of the tortuous loops may be recognized as a characteristic for microangiopathy [16]. Therefore, in this study, only the presence of multiple tortuous loops was classified as abnormal. Neither branching capillaries nor the features of capillary neoformation were observed in this group.

The second type of videocapillaroscopic pattern was identified in 42.2% of patients. The videocapillaroscopic findings varied among the patients, which may suggest different mechanisms that lead to the alteration in the microcirculation.

All patients with the second type of videocapillaroscopic pattern had multiple or single tortuous loops, the majority of which had an irregular appearance. In three patients, “coiled” loops were observed. It is worth noting that in this group, in contrast to the healthy controls or to the patients with the first type of videocapillaroscopic pattern, the presence of branching capillaries and features of capillary neoformation were shown. These videocapillaroscopic findings may suggest angiogenesis which can be considered to be an attempt to compensate the loss of capillaries [18, 23]. It cannot be excluded that alterations in microcirculation observed in our study might appear in response to reduced density of capillaries. It is essential to highlight that a decreased density of capillaries was observed only in patients with the second type of videocapillaroscopic pattern.

Other alterations included enlargement of the top part of the loop or its efferent limb. None of the patients had giant capillaries. The enlargement of the diameter of capillaries was observed in 24% of patients, which is in accordance with data published by other authors. Rubisz-Brzezinska and Bendkowski [21] performed nailfold capillaroscopy examination in 34 patients with AA. Their most prominent findings were the enlargement of the top part of the capillary loop associated with single extravasations. The other most frequently observed alterations were homogenously enlarged loops which varied in number from single to multiple. The increase in number of enlarged capillary loops was associated with the occurrence of single extravasations [21]. In our study, enlargement of the top part of the capillary loop was also detected. Additionally, 26% of patients had extravasations, among them 12.68% had extravasations in at least three fingers, whereas the others had them in just one or two fingers. According to these findings, extravasations and enlargement of the top part of the loop may be considered as a characteristic feature of the capillaroscopic pattern in patients with AA. However, further studies, including a larger group of patients with AA, are required to confirm this observation.

In contrast to the previous research, we did not observe homogenously enlarged loops. However, the enlargement of the efferent limb was found in 11.27% of patients with AA. It cannot be excluded that the differences resulted from a more precise diagnostic technique used in our study.

It is worth to note that the enlargement of capillary loops is not characteristic for only one disease, because similar changes were found in diabetes types I and II [24], acrocyanosis, [25] or chronic autoimmune thyroiditis [26]. In our study all participants did not suffer from any of these diseases. Therefore these morphologic alterations need to be assessed in the context of the other videocapillaroscopic parameters.

Videocapillaroscopic images observed in our study indicate the variability of changes in patients with AA. It is considered that in autoimmune diseases the variability of morphological alterations observed during capillaroscopic examinations may result from a different intensity of the pathological changes in the vascular bed [27].

We did not find any significant correlation between the presence of abnormal videocapillaroscopic images and the type of AA. However, the presence of videocapillaroscopic alterations in some patients with localised AA as well as in some patients with more extensive hair loss may suggest the possible involvement of microvascular abnormalities in the course of alopecia areata. Further studies are required to confirm or refuse this hypothesis.

Apart from hair abnormalities in the course of AA, nail abnormalities are also observed [1, 8]. It could be expected that disturbances in the skin microcirculation may lead to the development of nail changes [28]. Surprisingly, abnormal videocapillaroscopic images were not prevalent in patients with nail changes. Moreover, they were observed only in 8 patients with nail involvement and in 22 patients with unaffected nails. Contrary to our results, Rubisz-Brzezinska and Bendkowski observed more frequently altered capillaroscopic images in patients with AA and with nail changes [21]. Due to the lack of other studies considering nailfold videocapillaroscopy in alopecia areata, the obtained results are difficult to interpret.

Our study does not reveal specific videocapillaroscopic pattern in alopecia areata. We observed videocapillaroscopic alterations in 42.2% of patients. It may suggest some disturbances in microcirculation. It cannot be also excluded that more prominent changes will be observed within bald patches. Ganzetti et al. [22] performed videocapillaroscopic examinations of the scalp in patients with AA before and after the DPCP (diphenylcyclopropenone) therapy. In the study, the authors observed a significant increase of new vessels and a consequent hair regrowth in those places where features of neoangiogenesis were more marked after DPCP [22]. Therefore, it seems worth to compare videocapillaroscopic patterns of the nailfold with videocapillaroscopic images of the bold area in patients with AA.

5. Conclusions

Our results show that only some patients with AA presented abnormal videocapillaroscopic images. The videocapillaroscopic alterations observed in this group of patients may suggest disturbances in skin microcirculation in the course of alopecia areata. More studies including a larger group of patients with AA are required to determine the role of observed videocapillaroscopic alterations in alopecia areata.

Disclosure

Research protocol was approved by the Local Bioethical Committee.

Conflict of Interests

There is no conflict of interests to declare.

References

A. Alkhalifah, A. Alsantali, E. Wang, K. J. McElwee, and J. Shapiro, “Alopecia areata update. Part I. Clinical picture, histopathology, and pathogenesis,” Journal of the American Academy of Dermatology, vol. 62, no. 2, pp. 177–188, 2010.

L. Kos and J. Conlon, “An update on alopecia areata,” Current Opinion in Pediatrics, vol. 21, no. 4, pp. 475–480, 2009.

A. Kavak, N. Yeşildal, A. H. Parlak et al., “Alopecia areata in Turkey: demographic and clinical features,” Journal of the European Academy of Dermatology and Venereology, vol. 22, no. 8, pp. 977–981, 2008.

T. Nakajima, S. Inui, and S. Itami, “Pulse corticosteroid therapy for alopecia areata: study of 139 patients,” Dermatology, vol. 215, no. 4, pp. 320–324, 2007.

S. Madani and J. Shapiro, “Alopecia areata update,” Journal of the American Academy of Dermatology, vol. 42, no. 4, pp. 549–570, 2000.

D. Wasserman, D. A. Guzman-Sanchez, K. Scott, and A. Mcmichael, “Alopecia areata,” International Journal of Dermatology, vol. 46, no. 2, pp. 121–131, 2007.

A. G. Messenger, J. McKillop, P. Farrant, A. J. McDonagh, and M. Sladden, “British Association of Dermatologists' guidelines for the management of alopecia areata 2012,” British Journal of Dermatology, vol. 166, no. 5, pp. 916–926, 2012.

E. Kasumagic-Halilovic and A. Prohic, “Nail changes in alopecia areata: frequency and clinical presentation,” Journal of the European Academy of Dermatology and Venereology, vol. 23, no. 2, pp. 240–241, 2009.

A. Gilhar, R. Paus, and R. S. Kalish, “Lymphocytes, neuropeptides, and genes involved in alopecia areata,” Journal of Clinical Investigation, vol. 117, no. 8, pp. 2019–2027, 2007.

K. Yano, L. F. Brown, and M. Detmar, “Control of hair growth and follicle size by VEGF-mediated angiogenesis,” Journal of Clinical Investigation, vol. 107, no. 4, pp. 409–417, 2001.

P. Velasco and B. Lange-Asschenfeldt, “Dermatological aspects of angiogenesis,” British Journal of Dermatology, vol. 147, no. 5, pp. 841–852, 2002.

N. Zhou, W. Fan, and M. Li, “Angiogenin is expressed in human dermal papilla cells and stimulates hair growth,” Archives of Dermatological Research, vol. 301, no. 2, pp. 139–149, 2009.

L. Mecklenburg, D. J. Tobin, S. Müller-Röver et al., “Active hair growth (anagen) is associated with angiogenesis,” Journal of Investigative Dermatology, vol. 114, no. 5, pp. 909–916, 2000.

O. Simonetti, G. Lucarini, M. L. Bernardini, C. Simoncini, G. Biagini, and A. Offidani, “Expression of vascular endothelial growth factor, apoptosis inhibitors (survivin and p16) and CCL27 in alopecia areata before and after diphencyprone treatment: an immunohistochemical study,” British Journal of Dermatology, vol. 150, no. 5, pp. 940–948, 2004.

C. K. Goldman, J.-C. Tsai, L. Soroceanu, and G. Y. Gillespie, “Loss of vascular endothelial growth factor in human alopecia hair follicles,” Journal of Investigative Dermatology, vol. 104, supplement 5, pp. 18S–20S, 1995.

W. Grassi and P. Del Medico, Eds., Atlas of Capillaroscopy, EDRA-Medical Publishing & New Media, Milan, Italy, 2004.

M. Cutolo, C. Pizzorni, and A. Sulli, “Capillaroscopy,” Best Practice and Research, vol. 19, no. 3, pp. 437–452, 2005.

F. Gallucci, R. Russo, R. Buono, R. Acampora, E. Madrid, and G. Uomo, “Indications and results of videocapillaroscopy in clinical practice,” Advances in Medical Sciences, vol. 53, no. 2, pp. 149–157, 2008.

N. Al-Mutairi and O. N. Eldin, “Clinical profile and impact on quality of life: seven years experience with patients of alopecia areata,” Indian Journal of Dermatology, Venereology and Leprology, vol. 77, no. 4, pp. 489–493, 2011.

F. M. Camacho-Martínez, “Hair loss in women,” Seminars in Cutaneous Medicine and Surgery, vol. 28, no. 1, pp. 19–32, 2009.

J. Rubisz-Brzezinska and W. Bendkowski, “Capillaroscopic pattern of ungual folds on fingers in alopecia areata,” Przeglad Dermatologiczny, vol. 66, no. 5, pp. 471–475, 1979.

G. Ganzetti, A. Campanati, O. Simonetti, I. Cataldi, K. Giuliodori, and A. M. Offidani, “Videocapillaroscopic pattern of alopecia areata before and after diphenylciclopropenone treatment,” International Journal of Immunopathology and Pharmacology, vol. 24, no. 4, pp. 1087–1091, 2011.

M. Cutolo, A. Sulli, M. E. Secchi, M. Olivieri, and C. Pizzorni, “The contribution of capillaroscopy to the differential diagnosis of connective autoimmune diseases,” Best Practice and Research, vol. 21, no. 6, pp. 1093–1108, 2007.

M. F. Meyer, M. Pfohl, and H. Schatz, “Assessment of microcirculatory alterations in diabetic patients by means of capillaroscopy and laser Doppler anemometry,” Medizinische Klinik, vol. 96, no. 2, pp. 71–77, 2001.

G. Monticone, L. Colonna, G. Palermi, R. Bono, and P. Puddu, “Quantitative nailfold capillary microscopy findings in patients with acrocyanosis compared with patients having systemic sclerosis and control subjects,” Journal of the American Academy of Dermatology, vol. 42, no. 5, pp. 787–790, 2000.

G. Ruotolo, S. Mazzuca, P. Gareri, F. Talarico, S. Giancotti, and D. Galasso, “Videocapillaroscopy in the study of chronic autoimmune thyroiditis,” Thyroidology Clinical and Experimental, vol. 12, no. 1, pp. 9–12, 2000.

A. Kuryliszyn-Moskal, M. Ciołkiewicz, and A. Dubicki, “[Morphological alterations in nailfold capillaroscopy and the clinical picture of vascular involvement in autoimmune diseases: systemic lupus erythematosus and type 1 diabetes],” Annales Academiae Medicae Stetinensis, vol. 56, pp. 73–79, 2010.

M. Bhushan, T. Moore, A. L. Herrick, and C. E. M. Griffiths, “Nailfold video capillaroscopy in psoriasis,” British Journal of Dermatology, vol. 142, no. 6, pp. 1171–1176, 2000.