BioMed Research International

Volume 2013 (2013), Article ID 390630, 6 pages

http://dx.doi.org/10.1155/2013/390630

Review Article

A Review of Haptoglobin Typing Methods for Disease Association Study and Preventing Anaphylactic Transfusion Reaction

Dae-Hyun Ko,1,2 Ho Eun Chang,² Taek Soo Kim,1,2 Eun Young Song,¹ Kyoung Un Park,1,2 Junghan Song,1,2 and Kyou Sup Han¹

¹Department of Laboratory Medicine, Seoul National University College of Medicine, Seoul, Republic of Korea

²Department of Laboratory Medicine, Seoul National University Bundang Hospital, 300 Gumi-dong, Bundang-gu, Seongnam-si, Gyeonggi-do 463-707, Republic of Korea

Received 27 November 2012; Accepted 5 February 2013

Academic Editor: Mina Hur

Copyright © 2013 Dae-Hyun Ko et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Haptoglobin, the product of the gene, is a glycoprotein involved in the scavenging of free hemoglobin. Haptoglobin levels increase or decrease in response to various acquired conditions, and they are also influenced by genetic predisposition. There were 2 major alleles, and , and 1 minor allele, . Many researchers have attempted to study the haptoglobin types and their association with disease; however, no definitive conclusions have been reached yet. It is reported that patients who are genetically deficient in haptoglobin are at risk of anaphylaxis against blood components containing haptoglobin. Haptoglobin genotypes also affect the reference intervals of haptoglobin levels. Many studies have attempted to establish simple and accurate typing methods. In this paper, we have broadly reviewed several methods for haptoglobin typing—phenotyping, Southern blotting, conventional PCR, real-time PCR, and loop-mediated isothermal amplification. We discuss their characteristics, clinical applications, and limitations. The phenotyping methods are time consuming and labor intensive and not designed to detect patients harboring . The rapid and robust haptoglobin genotyping may help in preventing fatal anaphylactic reactions and in establishing the relationships between the haptoglobin phenotypes and diseases.

1. Introduction

Haptoglobin (Hp) is a plasma glycoprotein and a positive acute-phase reactant [1]. It binds to free hemoglobin, forming hemoglobin-haptoglobin (Hb-Hp) complex. This complex is then removed by macrophages via a cell-surface receptor (CD163) [2]. Haptoglobin can thus prevent tissue damage caused by free hemoglobin and reduce iron loss in hemolytic conditions. From a clinical perspective, haptoglobin is one of the most important indicators of hemolytic anemia.

Recently, many studies have revealed the association between haptoglobin phenotypes and various infections and diseases such as diabetes, cancer, and cardiovascular diseases [1, 3, 4]. However, no definitive conclusions have been made yet, and the results of some earlier studies were inconsistent. This may be because of the relatively small numbers of subjects evaluated and the lack of a simple and robust typing method.

The most important issue in clinical practice concerning haptoglobin is probably anaphylactic transfusion reactions, although this is not a commonly encountered problem. Patients who are genetically deficient in haptoglobin and carry the anti-haptoglobin antibody may experience adverse reactions against the haptoglobin protein in blood products. There have been several reports on this issue [5–8]. Muta et al. reported that even a non-haptoglobin-deficient patient could experience a transfusion reaction caused by the anti-haptoglobin antibody [9]. However, true anhaptoglobinemia cannot be determined on the basis of the haptoglobin level alone because many acquired conditions might lower the haptoglobin concentrations to undetectable levels [10, 11].

Recently, another issue related to haptoglobin typing in clinical practice has been recognized. Haptoglobin types may affect the interpretation of the HbA1c levels in the estimation of glucose controls in diabetes patients, since haptoglobin is involved in hemoglobin turnover [12].

The results of previous studies emphasize the need for a rapid and robust genotyping method for haptoglobin. In this paper, we discuss the haptoglobin typing methods reported till date and reassess their utility in clinical practice.

2. Gene Structure and Alleles of Haptoglobin

There are 2 major alleles of haptoglobin— and . is thought to be generated by the internal duplication of 2 exons of [16]. They are inherited in a codominant manner and may combine to result in 3 phenotypes, that is, Hp 1-1, Hp 2-1, and Hp 2-2. In contrast to Hp 1 proteins which exist in dimer forms, Hp 2 proteins can polymerize to form multimers with higher molecular mass [17]. This unique property can be used for haptoglobin phenotyping, as discussed later. Further, haptoglobin types affect the reference interval of haptoglobin levels in the serum; higher ranges are observed when the allele is present and lower ranges when the allele is present [17–19].

The allele—an unusual allele also designated as in some literatures—is formed by the deletion of a portion of the 5′ flanking region of the Hp gene (5170 bp upstream of the exon 1 of Hp) to intron 4 of the Hpr (haptoglobin-related protein) gene [13, 20]. It is usually found in East and Southeast Asia with allele frequencies of 0.011–0.044 and not yet been reported in other races [13, 18, 21–24]. This allele is responsible for anhaptoglobinemia, which results from homozygosity for the allele. A schematic diagram of the , , and alleles is presented in Figure 1.

Figure 1: A schematic diagram of the genetic structure of the , , and alleles. The allele has 5 exons compared to 7 exons of the allele. Exons 5 and 6 of the allele are the result of an internal duplication of exon 3 and exon 4 of the allele. A deletion spanning from the upstream region of exon 1 of the Hp gene to intron 4 of the Hpr gene makes the allele. The black box and the shaded box represent exons of the Hp gene and the Hpr gene, respectively. The number above each box designates the number of the corresponding exon (see text for details). Hp: haptoglobin gene; Hpr: haptoglobin-related protein.

Some rare variants of the haptoglobin gene have also been reported with considerable ethnic differences [1]. Most of these variants have been designated on the basis of phenotypic methods, and their genetic mechanisms have not been fully studied. Some of the variants arise from genetic variations in the promoter regions, such as Hp 2-1M [25]. The variant Hp Johnson, also referred to as , is thought to result from an additional internal duplication of the allele [26]. Although these alleles are of interest to researchers, their clinical significance has not been sufficiently evaluated. Thus, we will not discuss them in this paper.

Researchers wishing to conduct or design a haptoglobin-genotyping strategy should consider the presence of the Hpr gene. The Hpr gene is located near the Hp gene and contains sequences similar to those of the Hp gene. It is thought to originate from duplication and divergence [20, 27]. Primers and/or probes for the Hp gene should be carefully constructed to prevent them from binding to similar sequences in the Hpr gene.

3. Haptoglobin Phenotyping

As mentioned earlier, haptoglobin types influence the chemical structure of the products of the gene. Individuals homozygous for the allele (Hp 1-1 phenotype) have only Hp 1 dimers in their serum, and individuals harboring 2 alleles (Hp 2-2 phenotype) bear Hp 2 polymers with various sizes. Heterozygotes with both and alleles have Hp 1 dimers and Hp 2-1 polymers as well [17]. These proteins can be separated by gel electrophoresis, isoelectric focusing, chromatography, or ELISA [28–31]. A typical diagram of electrophoresis results is shown in Figure 2. Although these phenotyping methods have been used for a relatively long time and many studies have been conducted based on these methods, they require special equipment and experienced personnel to interpret the results. Furthermore, these techniques are not designed to detect patients harboring the allele that is, they cannot discriminate true anhaptoglobinemia from conditions of acquired undetectable haptoglobin levels.

Figure 2: Typical electrophoresis patterns of haptoglobin proteins according to their genotypes. Hp 1-1 shows a fast migrating band corresponding to the small Hp 1 dimer, and Hp 2-2 displays multiple slow migrating bands representing polymers consisting of Hp 2 proteins. Hp 2-1 has a fast migrating band and several slow migrating bands.

4. Haptoglobin Genotyping

4.1. Southern Blotting

As the genetic structures of   and alleles were revealed, many researchers have tried to determine haptoglobin genotypes using molecular genetic techniques. Using various restriction enzymes and probes, Southern blotting has been effectively used to determine haptoglobin genotypes [16, 20]. However, this approach is not free from the limitations inherent to the method itself—requirement of a large amount of genomic DNA labor and time consumption and risk of radiation hazards. As more convenient and safe genotyping methods are being developed, the utility of Southern blotting has been steadily decreasing.

4.2. Conventional PCR

Koda et al. used conventional PCR for detecting allele [13]. They targeted the junction region of the allele to produce an amplicon of 315 bp. Exon 1 of the Hp gene was also amplified as a control (476 bp). The combination of these 2 products can identify individuals homozygous for (315 bp only), heterozygous for (315 and 476 bp), and without (476 bp only). However, this strategy cannot distinguish between the and alleles.

Genotyping methods using conventional strategies for determining the and alleles were suggested by 2 groups. Koch et al. designed 4 primers to distinguish the from the alleles [14]. They suggested 3 protocols for genotyping, each yielding different patterns of PCR products. In the simplest protocols, which used just 1 set of primers, the allele and the allele were amplified to generate bands of 1757 bp and 3481 bp, respectively (protocol 1). In some instances where a band of the allele might not be easily detected due to its large size, another set of primers was applied to create an -specific small amplicon of 349 bp (protocol 2). Koch et al. also tried to use all the 4 primers simultaneously to yield an -specific band (1757 bp), 3 -specific bands (349 bp, 1910 bp, and 1923 bp), and 2 nonspecific products (195 bp and 196 bp) (protocol 3). In the last protocol, an additional unknown band of about 450 bp was observed, which was suspected to be specific for the allele. An approach designed by Carter et al. used a similar scheme to produce a larger amplicon for the allele (4370 bp) and a smaller amplicon for the allele (3000 bp) [15]. However, these protocols could not detect the allele. It is difficult to infer the presence of the allele in the heterozygous state, and, since no amplification controls were used in both methods, it is impossible to discriminate the homozygous state for the from amplification failure.

Park et al. used the strategies explained earlier to determine the haptoglobin genotypes in a Korean population [18]. Appropriate combinations of the methods can successfully detect the various combinations of the Hp alleles, such as , , , , , and . However, genotyping strategies using conventional PCR require keeping multiple sets of primers and performing tedious postamplification processes, such as electrophoresis. In addition, it is difficult to detect relatively large products over 3 kb, especially in poor amplification conditions. Typical patterns of a conventional PCR corresponding to specific haptoglobin genotypes are shown in Figure 3.

(a)

(b)

Figure 3: A schematic representation of conventional PCR results for Hp genotyping. (a) Gel electrophoresis to distinguish the allele from other alleles [13]. A band of 315 bp size is specific for the allele, and a larger band (476 bp) represents the presence of alleles other than ( or alleles). (b) A representative image of PCR products to determine the and genotypes [14, 15]. The amplification of the allele results in a large-sized amplicon (3481 or 4370 bp according to the primer design), and the   allele is amplified to produce a relatively smaller band (1757 or 3000 bp). The larger band (>3.0 kb) is very weak and sometimes not detected, especially in the presence of a smaller band (see text for details).

4.3. Real-Time PCR

To overcome the drawbacks of conventional PCR, Soejima et al. have developed a haptoglobin genotyping strategy using real-time PCR [32–34]. According to the typing purpose, two types of detection techniques were used.

In the first protocol using TaqMan probes [32, 33], they designed 3 sets of primers and probes to target the breakpoint specific for   , the breakpoint of the duplication region specific for (HP2), and 5′ region of exon 1 as an internal control (HP5′). Each genotype produced appropriate signals as expected. Subjects who are homozygous for and those harboring and could be discriminated on the basis of the HP2/Hp5′ ratio calculated from the ΔΔCt values. This method could reliably determine the genotypes of the subjects in less than an hour through a single reaction. However, the approach cannot determine some rare variants such as Hp Johnson or Hp 2-1M [26, 32]. Nakamura et al. have applied this real-time PCR method for the genotyping of a Mongolian population [36]. More than 99% (943 of 946) of the subjects could be accurately typed by real-time PCR. In contrast, the haptoglobin genotypes of 3 individuals were misidentified, who were later revealed as having the rare Hp variant, Hp Johnson.

Another method proposed by the same group is a SYBR Green I-based method to detect allele [34]. This method easily detected allele via melting curve analysis without using expensive TaqMan probes. But it only discriminated the allele and the alleles without the deletion, as the and alleles produce the same signals.

They applied both methods to mass screening for pretransfusion testing [34]. Over 2000 patients were examined, and signals from some samples were too weak and cannot be detected, especially in the TaqMan-based method (data not given in the literature). This might be due to the fact that they used diluted blood samples as templates, and duplicate analysis might solve the problem.

4.4. Other Nucleic Acid Amplification Test

Another genetic analysis technique called loop-mediated isothermal amplification (LAMP) was recently developed and applied in many fields [37, 38]. This method can amplify nucleic acids with high degree of sensitivity and specificity in isothermal condition, requiring only a simple heating block or water bath. And a positive reaction can be detected by a simple visual inspection of turbidity. Soejima et al. have developed LAMP method for detection of allele [35]. This method can efficiently analyze few samples without a sophisticated thermal cycler and detection apparatus. But two reaction tubes are required, and it cannot distinguish and alleles.

The principles and characteristics of various typing methods discussed earlier are summarized in Table 1.

Table 1: Characteristics of haptoglobin typing methods.

Method
Typing principle
Advantages
Disadvantages

Phenotyping

[28–31]
Structure and size

variations in proteins
Used for a long time

Large amount of data accumulated

Detects rare and/or new variants
Cannot detect genotype

Requires special equipment and trained

personnel

Southern blotting

[16, 20]
Restriction size variation
Detects allele

May recognize new alleles
Labor and timeconsuming

Requires large amount of DNA

Risk of radiation hazard

Conventional PCR

[13–15, 18]
Size variation of amplified

products
Distinguishes between , ,

and alleles

under appropriate combinations
Need to keep multiple primer sets

Tedious postamplification process

Difficult to amplify and detect

large-sized products

Real-time PCR using TaqMan probe [32, 33]
Signals from probes

reacting to amplified

regions and their ratios
Discriminates between , ,

and alleles in a single reaction

Cannot detect rare variants

Multiple sets of primers and probes

Reaction failure in a large scale study

Real-time PCR using SYBR Green I [34]
Melting curve analysis
Detect allele effectively
Cannot distinguish between and  

Reaction failure in a large scale study

Loop-mediated isothermal amplification

[35]
Turbidity measurement
Detect allele effectively

No need for a thermal cycler
Cannot distinguish between and  

Multiple sets of primers and 2 reaction tubes needed

Not thoroughly evaluated

5. Conclusions

Simple and reliable genotyping of haptoglobin is crucial in 4 aspects. (a) Phenotyping is laborious and cannot discriminate between patients with acute hemolytic conditions and those with . (b) Haptoglobin levels should be interpreted according to the different reference intervals determined by genotypes. (c) Anaphylactic reaction to blood products can be fatal to transfusion recipients with anhaptoglobinemia. (d) Rapid and robust genotyping methods can establish a definite association between a haptoglobin genotype and a disease state.

We have discussed several haptoglobin typing methods. Phenotyping methods have been used for a long time, and a large body of data has been accumulated. Although certain rare and/or newly discovered variants may be identified via phenotyping, this approach does not detect anhaptoglobinemia. Southern blotting is easy to design and intuitive but requires tedious manual work and has the risk of radiation exposure. Conventional PCR can determine haptoglobin genotyping fairly well when appropriately designed. However, multiple primers and reactions are required to distinguish between the  , , and   alleles. Genotyping strategy using real-time PCR using TaqMan probes has been suggested, and it can distinguish 3 alleles in a single reaction. From a perspective of transfusion reaction, to distinguish the allele from others is important. SYBR Green I-based real-time PCR and LAMP assay have been proposed for this purpose.

To prevent anaphylactic transfusion reactions, distinguishing the allele from the nondeficient allele is most important. However, discrimination between the and alleles may also be meaningful because they affect the reference interval of haptoglobin and may cause confusion in interpreting haptoglobin levels. Moreover, Muta et al. report a transfusion reaction caused by an anti-haptoglobin antibody in a non-haptoglobin-deficient patient, which suggests the possibility of developing a subtype-specific anti-haptoglobin antibody [9]. Thus, a genotyping method capable of distinguishing between the , , and alleles is preferable. Real-time PCR using TaqMan probes developed by Soejima et al. seems to be desirable due to its simplicity and discriminative power, but reaction failure occurs in some samples for unknown reasons.

After reviewing various methods for haptoglobin typing, we conclude that no single method is sufficiently simple and efficient to discriminate between the various alleles of haptoglobin. The need for haptoglobin genotyping, however, is on the rise, and more simple and powerful methods are likely to be developed in the future. In the absence of an ideal method, researchers and/or laboratory physicians should fully comprehend the characteristics and limitations of various approaches used for haptoglobin genotyping and carefully choose 1 or more methods appropriate for their purpose.

References

K. Carter and M. Worwood, “Haptoglobin: a review of the major allele frequencies worldwide and their association with diseases,” International Journal of Laboratory Hematology, vol. 29, no. 2, pp. 92–110, 2007.

M. Kristiansen, J. H. Graversen, C. Jacobsen et al., “Identification of the haemoglobin scavenger receptor,” Nature, vol. 409, no. 6817, pp. 198–201, 2001.

H. Van Vlierberghe, M. Langlois, and J. Delanghe, “Haptoglobin polymorphisms and iron homeostasis in health and in disease,” Clinica Chimica Acta, vol. 345, no. 1-2, pp. 35–42, 2004.

M. Simpson, J. K. Snell-Bergeon, G. L. Kinney et al., “Haptoglobin genotype predicts development of coronary artery calcification in a prospective cohort of patients with type 1 diabetes,” Cardiovascular Diabetology, vol. 10, p. 99, 2011.

K. Morishita, E. Shimada, Y. Watanabe, and H. Kimura, “Anaphylactic transfusion reactions associated with anti-haptoglobin in a patient with ahaptoglobinemia,” Transfusion, vol. 40, no. 1, pp. 120–121, 2000.

E. Shimada, K. Tadokoro, Y. Watanabe et al., “Anaphylactic transfusion reactions in haptoglobin-deficient patients with IgE and IgG haptoglobin antibodies,” Transfusion, vol. 42, no. 6, pp. 766–773, 2002.

N. Shimode, H. Yasuoka, M. Kinoshita et al., “Severe anaphylaxis after albumin infusion in a patient with ahaptoglobinemia,” Anesthesiology, vol. 105, no. 2, pp. 425–426, 2006.

H. Kim, J. Choi, K. U. Park et al., “Anaphylactic transfusion reaction in a patient with anhaptoglobinemia: the first case in Korea,” Annals of Laboratory Medicine, vol. 32, no. 4, pp. 304–306, 2012.

T. Muta, M. Ozaki, T. Tokuyama et al., “Anti-haptoglobin antibody detection after febrile non-hemolytic transfusion reactions in a non-haptoglobin-deficient patient,” Transfusion and Apheresis Science, vol. 41, no. 3, pp. 171–173, 2009.

A. Rougemont, M. Quilici, J. Delmont, and J. P. Ardissone, “Is the HpO phenomenon in tropical populations really genetic?” Human Heredity, vol. 30, no. 4, pp. 201–203, 1980.

J. Delanghe, M. Langlois, and M. De Buyzere, “Congenital anhaptoglobinemia versus acquired hypohaptoglobinemia,” Blood, vol. 91, no. 9, p. 3524, 1998.

K. Suzuki, K. Yagi, R. Oka et al., “Relationships of serum haptoglobin concentration with HbA1c and glycated albumin concentrations in Japanese type 2 diabetic patients,” Clinical Chemistry and Laboratory Medicine, vol. 47, no. 1, pp. 70–74, 2009.

Y. Koda, Y. Watanabe, M. Soejima et al., “Simple PCR detection of haptoglobin gene deletion in anhaptoglobinemic patients with antihaptoglobin antibody that causes anaphylactic transfusion reactions,” Blood, vol. 95, no. 4, pp. 1138–1143, 2000.

W. Koch, W. Latz, M. Eichinger et al., “Genotyping of the common haptoglobin Hp 1/2 polymorphism based on PCR,” Clinical Chemistry, vol. 48, no. 9, pp. 1377–1382, 2002.

K. Carter, D. J. Bowen, C. A. M, and M. Worwood, “Haptoglobin type neither influences iron accumulation in normal subjects nor predicts clinical presentation in HFE C282Y haemochromatosis: phenotype and genotype analysis,” British Journal of Haematology, vol. 122, no. 2, pp. 326–332, 2003.

N. Maeda, F. Yang, D. R. Barnett, B. H. Bowman, and O. Smithies, “Duplication within the haptoglobin Hp2 gene,” Nature, vol. 309, no. 5964, pp. 131–135, 1984.

M. R. Langlois and J. R. Delanghe, “Biological and clinical significance of haptoglobin polymorphism in humans,” Clinical Chemistry, vol. 42, no. 10, pp. 1589–1600, 1996.

K. U. Park, J. Song, and J. Q. Kim, “Haptoglobin genotypic distribution (including Hp0 allele) and associated serum haptoglobin concentrations in Koreans,” Journal of Clinical Pathology, vol. 57, no. 10, pp. 1094–1095, 2004.

I. Kasvosve, Z. A. R. Gomo, I. T. Gangaidzo et al., “Reference range of serum haptoglobin is haptoglobin phenotype-dependent in blacks,” Clinica Chimica Acta, vol. 296, no. 1-2, pp. 163–170, 2000.

Y. Koda, M. Soejima, N. Yoshioka, and H. Kimura, “The haptoglobin-gene deletion responsible for anhaptoglobinemia,” American Journal of Human Genetics, vol. 62, no. 2, pp. 245–252, 1998.

M. Soejima, Y. Koda, J. Fujihara, and H. Takeshita, “The distribution of haptoglobin-gene deletion (Hpdel) is restricted to East Asians,” Transfusion, vol. 47, no. 10, pp. 1948–1950, 2007.

K. Teye, I. K. E. Quaye, Y. Koda et al., “A-61C and C-101G Hp gene promoter polymorphisms are, respectively, associated with ahaptoglobinaemia and hypohaptoglobinaemia in Ghana,” Clinical Genetics, vol. 64, no. 5, pp. 439–443, 2003.

S. E. Cox, C. Doherty, S. H. Atkinson et al., “Haplotype association between haptoglobin (Hp2) and Hp promoter SNP (A-61C) may explain previous controversy of haptoglobin and malaria protection,” PLoS ONE, vol. 2, no. 4, article e362, 2007.

E. Shimada, M. Odagiri, K. Chaiwong et al., “Detection of Hpdel among Thais, a deleted allele of the haptoglobin gene that causes congenital haptoglobin deficiency,” Transfusion, vol. 47, no. 12, pp. 2315–2321, 2007.

N. Maeda, “DNA polymorphisms in the controlling region of the human haptoglobin genes: a molecular explanation for the haptoglobin 2-1 modified phenotype,” American Journal of Human Genetics, vol. 49, no. 1, pp. 158–166, 1991.

S. Oliviero, M. DeMarchi, and A. O. Carbonara, “Molecular evidence of triplication in the haptoglobin Johnson variant gene,” Human Genetics, vol. 71, no. 1, pp. 49–52, 1985.

N. Maeda, “Nucleotide sequence of the haptoglobin and haptoglobin-related gene pair,” Journal of Biological Chemistry, vol. 260, no. 11, pp. 6698–6709, 1985.

O. Smithies, “Zone electrophoresis in starch gels: group variations in the serum proteins of normal human adults.,” The Biochemical Journal, vol. 61, no. 4, pp. 629–641, 1955.

A. Alonso, G. Visedo, M. Sancho, and J. Fernandez-Piqueras, “Haptoglobin subtyping by isoelectric focusing in miniaturized polyacrylamide gels rehydrated in presence of 2-mercaptoethanol,” Electrophoresis, vol. 11, no. 4, pp. 321–324, 1990.

J. Delanghe, K. Allcock, M. Langlois, L. Claeys, and M. De Buyzere, “Fast determination of haptoglobin phenotype and calculation of hemoglobin binding capacity using high pressure gel permeation chromatography,” Clinica Chimica Acta, vol. 291, no. 1, pp. 43–51, 2000.

N. S. Levy and A. P. Levy, “ELISA for determination of the haptoglobin phenotype,” Clinical Chemistry, vol. 50, no. 11, pp. 2148–2150, 2004.

M. Soejima and Y. Koda, “TaqMan-based real-time PCR for genotyping common polymorphisms of haptoglobin (HP1 and HP2),” Clinical Chemistry, vol. 54, no. 11, pp. 1908–1913, 2008.

M. Soejima and Y. Koda, “Rapid real-time PCR detection of HPdel directly from diluted blood samples,” Clinical Chemistry, vol. 54, no. 6, pp. 1095–1096, 2008.

M. Soejima, Y. Tsuchiya, K. Egashira, H. Kawano, K. Sagawa, and Y. Koda, “Development and validation of a SYBR Green I-based real-time polymerase chain reaction method for detection of haptoglobin gene deletion in clinical materials,” Transfusion, vol. 50, no. 6, pp. 1322–1327, 2010.

M. Soejima, K. Egashira, H. Kawano, A. Kawaguchi, K. Sagawa, and Y. Koda, “Rapid detection of haptoglobin gene deletion in alkaline-denatured blood by loop-mediated isothermal amplification reaction,” Journal of Molecular Diagnostics, vol. 13, no. 3, pp. 334–339, 2011.

H. Nakamura, M. Soejima, L. Munkhtulga, S. Iwamoto, and Y. Koda, “Haptoglobin polymorphism in Mongolian population: comparison of the two genotyping methods,” Clinica Chimica Acta, vol. 408, no. 1-2, pp. 110–113, 2009.

T. Notomi, H. Okayama, H. Masubuchi et al., “Loop-mediated isothermal amplification of DNA,” Nucleic Acids Research, vol. 28, no. 12, p. E63, 2000.

Y. Mori and T. Notomi, “Loop-mediated isothermal amplification (LAMP): a rapid, accurate, and cost-effective diagnostic method for infectious diseases,” Journal of Infection and Chemotherapy, vol. 15, no. 2, pp. 62–69, 2009.