BioMed Research International

Volume 2013 (2013), Article ID 410686, 9 pages

http://dx.doi.org/10.1155/2013/410686

Research Article

Enrichment, Development, and Assessment of Indian Basil Oil Based Antiseptic Cream Formulation Utilizing Hydrophilic-Lipophilic Balance Approach

Narayan Prasad Yadav,¹ Jaya Gopal Meher,¹ Neelam Pandey,¹ Suaib Luqman,² Kuldeep Singh Yadav,¹ and Debabrata Chanda²

¹Herbal Medicinal Products Department, CSIR-Central Institute of Medicinal and Aromatic Plants, PO-CIMAP, Lucknow 226015, India

²Molecular Bioprospection Department, CSIR-Central Institute of Medicinal and Aromatic Plants, PO-CIMAP, Lucknow 226015, India

Received 12 April 2013; Accepted 9 July 2013

Academic Editor: Ismail Kiran

Copyright © 2013 Narayan Prasad Yadav et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The present work was aimed to develop an antiseptic cream formulation of Indian basil oil utilizing hydrophilic-lipophilic balance approach. In order to determine the required-hydrophilic lipophilic balance (rHLB) of basil oil, emulsions of basil oil were prepared by phase inversion temperature technique using water, Tween 80, and Span 80. Formulated emulsions were assessed for creaming (BE9; 9.8, BE10; 10.2), droplet size (BE18; 3.22 ± 0.09 μm), and turbidity (BE18; 86.12 ± 2.1%). To ensure correctness of the applied methodology, rHLB of light liquid paraffin was also determined. After rHLB determination, basil oil creams were prepared with two different combinations of surfactants, namely, GMS : Tween 80 (1 : 3.45) and SLS : GMS (1 : 3.68), and evaluated for in vitro antimicrobial activity, skin irritation test, viscosity and consistency. The rHLB of basil oil and light liquid paraffin were found to be 13.36 ± 0.36 and 11.5 ± 0.35, respectively. Viscosity, and consistency parameters of cream was found to be consistent over 90 days. Cream formulations showed net zone of growth inhibition in the range of 5.0–11.3 mm against bacteria and 4.3–7.6 mm against fungi. Primary irritation index was found to be between 0.38 and1.05. Conclusively stable, consistent, non-irritant, enriched antiseptic basil oil cream formulations were developed utilizing HLB approach.

1. Introduction

Ocimum basilicum L. (family Lamiaceae), popularly known as Indian basil or sweet basil, is an illustrious plant used as kitchen herb in culinary and as an ornamental plant in traditional medicine. The anti-inflammatory [1], antimicrobial [2], insecticidal [3], hypolipidemic [4], antioxidant, and radical scavenging [5] activities of Ocimum have been ascertained in a number of published reports, and basil has been integrated in a wide variety of herbal preparations for the treatment of various ailments [6, 7]. Little or no information is available about any potential toxicity of basil oil in humans. No health hazards or side effects are known in conjunction with the proper administration of designated therapeutic dosages. But due to the high estragole content, basil oil/the herb should not be taken during pregnancy [8, 9]. No reports are available about any possible side effects on external usage of basil oil. It is a light yellow color liquid with characteristic odor, insoluble in water and soluble in vegetable oils having flash point (176°C) and specific gravity (0.905–0.955 g/cm³), and reported to possess potent broad spectrum antimicrobial activity [8–10].

Hydrophilic-lipophilic balance (HLB) value is not only an important parametric scale for the selection of surfactants but also a critical step for the development of emulsion formulation and can be employed as an utmost factor for quality control [11–13]. Hence, rHLB of each ingredient in an emulsion must be known before proceeding towards formulation and development. Till now, rHLB of very few essential oils has been reported, and it is one of the important factors to develop stable emulsion [14].

Our present investigation was aimed to determine the rHLB of basil oil employing Stokes’ law and to utilize the same in the development of antiseptic cream formulation. Droplet size analysis, creaming index, and turbidity of emulsion were selected as critical parameters in the determination of rHLB. Light liquid paraffin was chosen as a reference standard (HLB ) to ensure correctness of the applied methodology [15]. Implementing the determined rHLB of basil oil, elegant cream formulations were developed and evaluated for consistency, viscosity, antimicrobial action, and safety for topical application.

2. Materials and Methods

2.1. Materials

Basil oil was obtained from CSIR-Central Institute of Medicinal and Aromatic Plants (CSIR-CIMAP), Lucknow, India. Light liquid paraffin, Tween 80, Span 80, stearyl alcohol, cetyl alcohol, hard paraffin wax, sodium lauryl sulfate (SLS), glycerol monostearate (GMS), white petroleum jelly, and sodium chloride were procured from SD Fine Chem Limited, Mumbai. Nutrient agar, sabouraud dextrose agar, agar powder, and disposable petri dishes were purchased from HiMedia Laboratories Pvt. Ltd., Mumbai, India. All ingredients were of analytical grade and used as received. A popular (Indian) herbal antiseptic cream was procured from local market and used as reference standard for antimicrobial evaluation and skin irritation test.

2.2. Methods

2.2.1. Preparation of Emulsion

Phase inversion temperature technique was employed for the preparation of emulsions [16, 17]. For this purpose, 5% of basil oil/light liquid paraffin was taken in oil phase, blends of Tween 80 (HLB 15.0) and Span 80 (HLB 4.3) in different ratio were chosen as emulsifier at 3% concentration, and water (quantity sufficient) was taken in the aqueous phase. Emulsifier blends which could produce HLB in the range of 5–15 were prepared separately for both basil oil and light liquid paraffin in first series of preparations whereas in the second series, eight emulsions in HLB range of 11.0–14.0 were formulated. Hydrophilic-lipophilic balance spreadsheet for emulsions is depicted in Table 1.

Table 1: Hydrophilic-lipophilic balance spreadsheet of basil oil and light liquid paraffin emulsions.

Basil oil emulsions
HLB
Tween 80 (%)
Span 80 (%)
Light liquid paraffin emulsions

First series emulsions

BE1
5.0
06.54
93.46
LE1

BE2
6.0
15.88
84.12
LE2

BE3
7.0
25.23
74.77
LE3

BE4
8.0
34.57
65.43
LE4

BE5
9.0
43.92
56.08
LE5

BE6
10.0
53.27
46.73
LE6

BE7
11.0
62.61
37.39
LE7

BE8
12.0
71.96
28.04
LE8

BE9
13.0
81.30
18.70
LE9

BE10
14.0
90.65
09.35
LE10

BE11
15.0
100.00
00.00
LE11

Second series emulsions

BE12
11.0
62.61
37.39
LE12

BE13
11.4
66.35
33.65
LE13

BE14
11.8
70.09
29.91
LE14

BE15
12.2
73.83
26.17
LE15

BE16
12.6
77.83
22.43
LE16

BE17
13.0
81.30
18.70
LE17

BE18
13.4
85.04
14.96
LE18

BE19
13.8
88.78
11.22
LE19

BE: basil oil emulsion; LE: light liquid paraffin emulsion; HLB: hydrophilic-lipophilic balance.

2.2.2. Evaluation of Emulsions

Creaming Index (CI). CI was determined by taking the ratio of total height of cream () layer and total height of emulsion () in the storage container (plastic bottle with 3 cm diameter and 10 cm height). CI was determined on 5th, 10th, 30th, 45th, and 60th day using the following formula [18]:

Turbidity Evaluation. Turbidity evaluation of the formulated emulsions was performed as per previously reported method [18]. Briefly, the sample was diluted to 25 mL with double distilled water, and the percent transmission () was measured at 600 nm with the help of UV-Visible Spectrophotometer (SpectraMax, Molecular Devices, USA) keeping blank control at 100% transmission. Turbidity of the emulsions was determined on 7th and 60th day of storage. Sampling was done in triplicate, and the mean value was calculated.

Droplet Size Evaluation

Droplet Size of Uncentrifuged Emulsion. Droplet size of the uncentrifuged emulsions was determined with an optical microscope (Unilab optical microscope) fitted with X40 objective and a standardized X10 ocular micrometer scale as per the previously reported methods with minor modifications [15]. Geometric mean droplet diameter (MDD) was calculated, and the percent increase in MDD () of each emulsion formulation after 60 days was determined by the following formula:

where and are MDD of the emulsion on day 1 and day 60, respectively. Sampling was done in triplicate, and mean value was calculated.

Droplet Size of Centrifuged Emulsion. Emulsion sample of 2 mL was withdrawn into centrifuge tube and subjected to centrifugation at 10000 rpm for 10 min. Emulsions were allowed to stand for 24 h after centrifugation, and MDD was determined. Dispersion ratio (DR) of each emulsion was determined by the following formula [15, 19]:

where and GSDUCE are geometric standard deviation of droplet size of centrifuged and uncentrifuged emulsions, respectively.

2.2.3. Basil Oil Cream Formulation

Experimentally determined rHLB of basil oil was utilized in the development of cream formulation. The composition of basil oil cream is shown in Table 2. Cream formulations were prepared by the previously reported methods [17, 20]. Required blank cream formulations (placebo) were also formulated by the same method.

Table 2: Basil oil cream formulation.

Formulations/ingredients (%)
CR1
CR2
CR3
CR4
CR5
CR6
CR7
CR8

Light liquid paraffin
6.00
6.00
6.00
6.00
6.00
6.00
6.00
6.00

White petroleum jelly
2.00
2.00
2.00
2.00
2.00
2.00
2.00
2.00

Basil oil
4.00
4.00
4.00
4.00
4.00
4.00
4.00
4.00

Paraffin wax
2.00
2.00
2.00
2.00
2.00
2.00
2.00
2.00

Cetyl alcohol
3.00
3.00
3.00
3.00
3.00
3.00
3.00
3.00

Stearyl alcohol
3.00
3.00
3.00
3.00
3.00
3.00
3.00
3.00

Water
q.s.
q.s.
q.s.
q.s.
q.s.
q.s.
q.s.
q.s.

Emulsifier blend 1
Emulsifier blend 2

2%
4%
6%
8%
2%
4%
6%
8%

Tween 80
1.55
3.10
4.65
6.20
—
—
—
—

GMS
0.45
0.90
1.35
1.80
1.58
3.15
4.72
6.30

SLS
—
—
—
—
0.42
0.85
1.28
1.70

HLB of cream formulation is 12.87 (calculated).

Emulsifier blend 1: GMS : Tween 80—1 : 3.45.

Emulsifier blend 2: GMS : SLS—3.68 : 1.

GMS: glycerol monostearate; SLS: sodium lauryl sulfate; q.s.: quantity sufficient; CR: cream formulation.

2.2.4. Antimicrobial Evaluation

Agar diffusion assay was employed for the evaluation of the antimicrobial action of the basil oil and cream formulations against a broad range of microorganisms [21, 22]. For basil oil, 5 mm sterile paper disc (Whatman International Ltd., UK) soaked with 5 μL basil oil was placed in the prelawned plate, and to evaluate the cream formulations (CR4 and CR6), 150 mg was filled into the agar well. A popular marketed antiseptic herbal cream formulation and placebo BCR4 and BCR6 were also employed in the similar manner. All experiments were performed in triplicate, and the zone of growth inhibition (ZGI) was measured as millimeters in diameter.

2.2.5. Skin Irritation Studies

Skin irritation studies were performed for the cream formulations in six healthy New Zealand white rabbits ( g body weight) as per Federal Hazardous Substances Act (FHSA) guidelines [23, 24]. The experimental protocol has been approved by the Institutional Animal Ethical Committee (Registration no. 400/01/AB/CPCSEA dated 23 September, 2011) of CSIR-CIMAP, Lucknow, India. Cream formulations CR4 and CR6, respective placebo cream (BCR4, BCR6), and marketed antiseptic cream (500 mg) were applied to the previously shaved skin of rabbits on one inch square area. Normal saline (1%) was applied as positive control at opposite side of skin. Observations were made at 4, 24, 48, and 72 h to assess individual erythema and edema using the FHSA recommended Draize scoring criteria. The primary irritation index (PII) was determined using the following formula:

2.2.6. Viscosity and Consistency Evaluation

Viscosity of basil oil cream formulations (CR4 and CR6) was determined by DV-II + Pro, viscometer (Brookfield Engineering Laboratories, USA) at 20 rpm, using Spindle 4. Cream formulations (CR4 and CR6) were also evaluated for different consistency (texture) parameters, namely, cream firmness, adhesiveness, cohesiveness, consistency, spreadability, and extrudability by using CT3 Texture Analyzer (Brookfield Engineering Laboratories, USA). Test parameters were selected as per individual test requirement [25, 26]. All the graphs and data were generated using Texture Pro CT V1.3 software, and formulations were evaluated in triplicate.

2.3. Statistical Analysis

The Student’s t-test of significance between MDD of uncentrifuged and centrifuged emulsions and DR of both basil oil and light liquid paraffin emulsions was analyzed using GraphPad InStat Software (Version 5.01, GraphPad Software Inc., USA).

3. Results

3.1. Creaming Index

Percent CI of basil oil and light liquid paraffin emulsions stored at room temperature is shown in Table 3. On the 5th day the lowest CI, that is, 1.0%, was recorded for basil oil emulsions with HLB 13 (BE9) and HLB 14 (BE10) whereas BE1 (HLB 5) showed the highest CI (3.0%). On the 60th day, all emulsions except BE9 (HLB 13) and BE10 (HLB 14) showed phase separation, and CI was noted to be 9.8% and 10.2%, respectively. Similarly, for light liquid paraffin emulsions, the highest CI was recorded which is shown in Table 3.

Table 3: Creaming index of basil oil and light liquid paraffin emulsions.

Emulsions
HLB
Day 5
Day 10
Day 30
Day 45
Day 60

Basil oil emulsions

BE1
5.0
3.0
7.6
PS
PS
PS

BE2
6.0
2.8
6.6
PS
PS
PS

BE3
7.0
2.4
6.2
PS
PS
PS

BE4
8.0
2.1
5.9
PS
PS
PS

BE5
9.0
1.8
4.2
PS
PS
PS

BE6
10.0
1.6
4.0
8.2
10.8
PS

BE7
11.0
1.3
3.8
6.6
8.4
PS

BE8
12.0
1.1
3.6
6.4
8.2
PS

BE9
13.0
1.0
3.4
6.0
8.0
9.8

BE10
14.0
1.0
3.2
5.8
7.8
10.2

BE11
15.0
1.1
3.2
6.0
8.0
PS

Light liquid paraffin emulsions

LE1
5.0
2.8
5.7
PS
PS
PS

LE2
6.0
2.6
5.9
PS
PS
PS

LE3
7.0
2.4
5.8
PS
PS
PS

LE4
8.0
2.0
5.4
PS
PS
PS

LE5
9.0
1.8
4.8
8.9
10.4
PS

LE6
10.0
1.4
3.0
8.6
9.0
10.4

LE7
11.0
1.0
3.0
8.2
8.4
9.2

LE8
12.0
1.0
3.2
8.2
8.8
9.4

LE9
13.0
1.2
3.6
8.4
9.0
PS

LE10
14.0
1.3
3.6
8.6
9.2
PS

LE11
15.0
1.5
3.4
9.0
PS
PS

BE: basil oil emulsion; LE: light liquid paraffin emulsion; PS: phase separation.

3.2. Turbidity

Turbidity of basil oil emulsions and light liquid paraffin emulsions is presented in Figure 1. For basil oil emulsions, turbidity was found to be in the range of (BE18; HLB 13.4) to (BE14; HLB 11.8) whereas for light liquid paraffin emulsions, it was found to be between (LE14; HLB 11.8) and (LE18; HLB 13.4) on 7th day. Similarly, turbidity of both oils was recorded on the 60th day of storage.

Figure 1: Turbidity of basil oil emulsions and light liquid paraffin emulsions.

3.3. Droplet Size

MDD of uncentrifuged basil oil emulsions and light liquid paraffin emulsions over a period of 60 days is depicted in Figures 2(a) and 2(b), respectively. After one day of formulation, MDD of basil oil emulsions was found to be in the range of  μm (BE18) to  μm (BE12). The lowest MDD was recorded for BE18 throughout the evaluation. Similarly, for light liquid paraffin emulsions, MDD was in the range of  μm (LE13) to  μm (LE15) on day one; LE13 (HLB 11.4) showed the lowest MDD for light liquid paraffin emulsions over 60 days.

(a)

(b)

Figure 2: (a) Mean droplet diameter of basil oil emulsion, over 60 days. (b) Mean droplet diameter of light liquid paraffin emulsion, over 60 days.

Figure 3(a) shows the percent increase in MDD for both basil oil and light liquid paraffin emulsions upon centrifugation and over 60 days of storage. For basil oil emulsions, the highest and lowest percent increase in MDD was shown by BE13 (HLB 11.4) and BE17 (13.0), that is, and %, respectively, whereas light liquid paraffin emulsions exhibited the lowest % (LE13; HLB 11.4) and the highest % (LE19; HLB13.8) increase in MDD over 60 days of storage. Similar trend was seen upon centrifugation where percent increase in MDD was the highest % (BE12) and the lowest % (BE17) for basil oil emulsion and the highest % (LE19) and the lowest % (LE13) for light liquid paraffin emulsions.

(a)

(b)

Figure 3: (a) Percent increase in mean droplet diameter of basil oil emulsion and light liquid paraffin emulsion. (b) Dispersion ratio of basil oil emulsion and light liquid paraffin emulsion.

Figure 3(b) shows the DR of both basil oil and light liquid paraffin emulsions. For basil oil emulsions the lowest DR and the highest DR were 1.4 (BE18) and 3.5 (BE12) whereas for light liquid paraffin emulsions, they were 1.6 (LE13) and 4.0 (LE19), respectively.

3.4. rHLB and Cream Formulation

rHLB determined by different evaluation parameters is exhibited in Table 4. rHLB of basil oil and light liquid paraffin was experimentally determined to be and , respectively. Utilizing the determined values, the rHLB of cream formulations (Table 2) was calculated to be 12.87. To achieve rHLB 12.87, GMS : Tween 80 in the ratio of 1 : 3.45 and GMS : SLS in the ratio of 3.68 : 1 were taken as two different emulsifier blends. Four cream formulations were formulated with each emulsifier blend, incorporating 2, 4, 6, and 8% of total emulsifier blend concentration. With emulsifier blend 1, 8% (CR4) of total concentration of emulsifier could produce stable cream. Similarly with emulsifier blend 2, 4% (CR6), 6% (CR7), and 8% (CR8) of total concentration of emulsifier could produce stable cream.

Table 4: Experimentally determined hydrophilic-lipophilic balance of basil oil and light liquid paraffin.

Evaluation parameters
HLB value producing stable emulsion

Basil oil
Light liquid paraffin

Percent CI
13.0, 14.0
11.0, 12.0

MDD
13.4
11.4

Percent increase in MDD
13.0
11.4

DR
13.4
11.4

Turbidity
13.4
11.8

Mean HLBa

HLB: hydrophilic-lipophilic balance; CI: creaming index; MDD: mean droplet diameter; DR: dispersion ratio.

aMean ± SD, .

3.5. Antimicrobial Activity and Skin Irritation Studies

Zone of growth inhibition (ZGI) against tested microbes for basil oil, cream formulation (CR4 and CR6), placebo (BCR4 and BCR6), and marketed herbal antiseptic cream is shown in Table 5. Basil oil was found to be effective against a broad range of microorganisms. Smaller ZGI was recorded for cream CR4 against the tested group of microorganisms compared to basil oil whereas equivalent ZGI was measured for CR6. Marketed antiseptic cream formulation showed the highest ZGI among all the tested microbes.

Table 5: Antimicrobial activity of basil oil, developed cream formulations, and marketed herbal antiseptic cream.

Microorganisms
Net zone of inhibitiona (mm)

Basil oilb
CR4c
BCR4c
CR6c
BCR6c
Marketed antiseptic creamc

Antibacterial activity

Staphylococcus aureus (MTCC 96)

0

Staphylococcus epidermidis (MTCC 435)

Streptococcus mutans (MTCC 890)

0

Salmonella typhi (MTCC 733)

0

Yersinia enterocolitica (MTCC 861)

0

Klebsiella pneumoniae (MTCC 109)

0

Enterobacter aerogenes (MTCC 111)

0

Antifungal activity

Candida albicans (MTCC 1637)

0

Aspergillus niger (MTCC 281)

0

Microsporum gypseum (MTCC 2830)

0

Mean ± SD, .

bAgar disc diffusion method.

cAgar well diffusion method.

BCR4 and BCR6; Placebo of CR4 and CR6, respectively.

PII of CR4, CR6, BCR4, BCR6, and marketed herbal antiseptic product was determined to be 0.86, 1.05, 0.38, 0.61, and 0.80, respectively, depicting barely perceptible irritation.

3.6. Viscosity and Consistency

Viscosity of CR4 and CR6 was found to be in the range of 28000–29350 cP. The consistency and other texture parameters, namely, firmness, adhesiveness, extrudability, cohesiveness, and spreadability of the stable cream formulations CR4 and CR6 were found to be steady over the period of three months. Viscosity, consistency, and other texture parameters of basil oil cream formulations CR4 and CR6 are depicted in Table 7.

4. Discussion

The basic objective of the present work was to utilize the rHLB value of basil oil in the development of stable cream formulation. The HLB values of basil oil and light liquid paraffin were found to be and , respectively [15]. Stable cream formulations CR4 and CR6 were developed with two different emulsifier blends, namely, GMS : Tween 80 (1 : 3.45) and GMS : SLS (3.68 : 1). CR6 showed stronger antimicrobial activity against a broad range of microorganisms than CR4 which may be due to the presence of SLS. Skin irritation studies in rabbits ensured that both of the developed cream formulations were non-irritant in nature.

4.1. Creaming, Turbidity, and Droplet Size

Creaming is a natural phenomenon in emulsions, and it may be led by flocculation (reversible aggregation) and/or coalescence (irreversible aggregation) of emulsified droplets, which directly correlate with nature (HLB) and concentration of emulsifiers [27–29]. Creaming Index is a preliminary parameter indicating the stability of emulsions and the nearest range of HLB producing a stable emulsion. Based on the creaming index evaluation, basil oil and light paraffin emulsions in the HLB range of 13-14 and 10–12, respectively, were found to be stable. HLB values of these oils were hypothesized to be within the above mentioned ranges. Therefore, a second series of eight emulsions with HLB values 11.0–13.8 (Table 1) were prepared and subjected to evaluation parameters, namely, particle size and turbidity analysis to reach closer to HLB value.

Stoke’s law illustrates that the rate of creaming has a direct relationship with the droplet size, where larger droplets coalesce more rapidly than smaller droplets [30, 31]. It is also apparent that the formation of larger aggregates by coalescence and/or flocculation will accelerate creaming, leading to destabilization of emulsions. Formation of high creaming layer increases the transparency of emulsion whereas emulsions with no/low creaming layer are turbid [17]. Basil oil emulsion BE18; HLB 13.4 and light liquid paraffin emulsion LE14; HLB 11.8 were found to be highly turbid among all emulsions on 7th and 60th day; hence particle size in these emulsions was predicted to be smaller and well dispersed indicating a stable emulsion. Further, all emulsions in the second series were subjected to droplet size analysis.

Degree of dispersion (DR) is reflection of droplet size distribution and previously used in describing skewness/dispersion of a size distribution curve [19]. DR is the ratio of degree of dispersion of both centrifuged and uncentrifuged emulsions. It is obvious that centrifugation at 10000 rpm for 10 min will cause flocculation/coalescence and DR will never be 1, but a closer value indicates a stable emulsion. The Student’s t-test revealed that there were significant differences between MDD of uncentrifuged and centrifuged emulsions, MDD of centrifuged emulsions and MDD of emulsions on 60th day as well as DR of both basil and light liquid paraffin emulsions. Table 6 exhibits the calculated and critical t-values at , . However none of the emulsions cracked after centrifugation or upon storage for 60 days.

Table 6: The t-test of significance between MDD and degree of dispersion of basil oil and light liquid paraffin emulsions.

Test parameters
Basil oil emulsions
Light liquid paraffin emulsions

Calculated -valuea
value
Calculated -valuea
value

MDD (uncentrifuged versus centrifuged)
9.795

17.97

MDD (centrifuged versus MDD-60th day)
2.520

4.662

Degree of dispersion (uncentrifuged versus centrifuged)
4.228

6.080

; MDD: mean droplet diameter.

Critical -value = 2.14 at .

Table 7: Viscosity and texture profile of basil oil cream formulations.

Cream/time interval (days)
Viscosity (cP)
Texture parametersa

Consistency (mJ)
Firmness (g)
Spreadability (mJ)
Adhesiveness (g)
Cohesiveness

Extrudability (mJ)

CR4

    0

    30

    60

    90

CR6

    0

    30

    60

    90

Mean ± SD, .

Emulsions with the lowest MDD and stumpy percent increase in MDD indicate stable emulsion, which point out the required HLB of the oil.

4.2. Antimicrobial and Skin Irritation Studies

Qualitative and quantitative contents of excipients (except emulsifiers) as well as basil oil were the same in both the cream formulation CR4 and CR6; still difference in their antimicrobial activity was observed (Table 5). Further, corresponding placebo formulations BCR4 and BCR6 were assayed, where BCR4 showed activity only against Staphylococcus epidermidis (ZGI;  mm), and BCR6 was active against all the tested microorganisms (ZGI;  mm). Based on the findings, it was clear that emulsifier blend 2 (GMS : SLS) in cream CR6 had its own antimicrobial activity; hence, an additive effect was seen. The literature reveals that SLS has its own antimicrobial activity whereas Tweens (nonionic surfactants) reduce antimicrobial activity of phenolic compounds as a result of micellization [6, 32, 33]. Recent findings in the literature reveal that antimicrobial activity of basil oil is not attributable to any specific mechanism as the chemical constituent present in the oil exhibits different precise mode of action [34]. A number of possible mechanisms have been proposed for essential oils, which include degradation of the cell wall, damage to the cytoplasmic membrane, damage to membrane proteins, leakage of cell contents, coagulation of cytoplasm, and depletion of proton motive force [35]. It is therefore likely that the basil oil may act by one or more means to exert its effect. Both the cream formulations CR4 and CR6 were active against microorganisms where CR6 was found to be more promising.

According to FHSA regulations, a material with PII less than 5.0 is generally not considered as primary irritant to the skin. Basil oil cream formulations exhibited barely perceptible irritation hence considered being non-irritant to skin at the applied dose (500 mg).

4.3. Viscosity and Consistency of Cream Formulation

Stoke’s law illustrates that viscosity is inversely proportional to sedimentation/creaming; hence high viscosity is desirable in emulsions/creams, but caution must be taken to maintain optimum viscosity which would be acceptable to users. Viscosity of basil oil cream formulations CR4 and CR6 was found to be in the range of 28000–29350 cP. Despite fixed concentration of ingredients, increase in viscosity was observed in CR6, which might be attributed to the high concentration of GMS (Table 2).

Recently, technologies are developed to imitate human perception for semisolid products in terms of consistency, hardness, adhesiveness, cohesiveness, spreadability, and extrudability [25, 36] which are collectively called texture properties of formulation. Hardness of any semisolid formulation is the maximum positive force required to deform the sample with finger. CR6 was comparatively harder than CR4 which is because of the presence of higher concentration of GMS. Adhesiveness, which is defined as the maximum force required for overcoming the attractive force between any surface and sample (cream), was characterized as a measure for stickiness of the sample [25, 37]. Comparatively, CR4 required higher force ( g) than CR6 ( g) in adhesiveness test; hence CR4 was found to be more adhesive. Cohesiveness is another parameter which indicates the strength of internal bonds that is responsible for overall elegance of the cream. Both the creams exhibited similar cohesiveness.

Spreadability of semisolid formulations is one of the important texture parameters which settle on users’ preference towards a specific product. Technically, certain amount of work is done to spread the sample (cream) over a surface, and the energy (mJ) required for this purpose defines the spreadability of the formulation [38, 39]. CR4 was comparatively more spreadable than CR6, which is in agreement with the findings that CR6 is harder than CR4. A good formulation with poor extrudability (pattern in which product comes out of container) may not be acceptable as it is an important issue for overall acceptance of formulation by end users [39]. It also indicates any degradation (variation in consistency) or incompatibility of formulation and container. Extrusion of cream was smooth and continuous for both CR4 and CR6 up to three months of study. The values determined for different texture parameters were reproducible over three months and can be utilized as formulation finger print to ensure consistent quality of the developed cream formulation.

5. Conclusion

Stable, consistent, non-irritant, enriched antiseptic basil oil cream formulations have been developed utilizing experimentally determined rHLB of basil oil (). By this novel approach, two different combinations of emulsifiers, that is, GMS : Tween 80 (1 : 3.45) and GMS : SLS (3.68 : 1), could be employed to develop stable antiseptic cream formulation with promising antimicrobial action (net zone of growth inhibition 5.0–11.3 mm against bacteria and 4.3–7.6 mm against fungi).

The novelty of this work is to exploit the lucid science of HLB, which facilitates using a variety of desired emulsifiers/surfactants (as per need or regulatory requirement) to develop a stable antiseptic cream formulation of basil oil. This approach will be of extreme interest for academics R&D as well as pharmaceutical industries involved in the research of biphasic dosage forms.

Conflict of Interests

The authors have no conflict of interests to disclose.

Acknowledgments

The authors are highly obliged to the Council of Scientific and Industrial Research (CSIR), New Delhi, and the Director of CSIR-Central Institute of Medicinal and Aromatic Plants, Lucknow, India, for providing financial support and infrastructure facilities under CSIR Network Project ChemBio (BSC 0203) to complete the research work.

References

S. Singh, “Mechanism of action of antiinflammatory effect of fixed oil of Ocimum basilicum Linn,” Indian Journal of Experimental Biology, vol. 37, no. 3, pp. 248–252, 1999.

I. H. N. Bassolé, A. Lamien-Meda, B. Bayala et al., “Composition and antimicrobial activities of Lippia multiflora Moldenke, Mentha x piperita L. and Ocimum basilicum L. essential oils and their major monoterpene alcohols alone and in combination,” Molecules, vol. 15, no. 11, pp. 7825–7839, 2010.

S. M. Kéita, C. Vincent, J.-P. Schmit, J. T. Arnason, and A. Bélanger, “Efficacy of essential oil of Ocimum basilicum L. and O. gratissimum L. applied as an insecticidal fumigant and powder to control Callosobruchus maculatus (Fab.),” Journal of Stored Products Research, vol. 37, no. 4, pp. 339–349, 2001.

S. Amrani, H. Harnafi, N. E. H. Bouanani et al., “Hypolipidaemic activity of aqueous Ocimum basilicum extract in acute hyperlipidaemia induced by triton WR-1339 in rats and its antioxidant property,” Phytotherapy Research, vol. 20, no. 12, pp. 1040–1045, 2006.

H. J. D. Dorman and R. Hiltunen, “Ocimum basilicum L.: phenolic profile and antioxidant-related activity,” Natural Product Communications, vol. 5, no. 1, pp. 65–72, 2010.

L. O. Orafidiya, A. O. Oyedele, A. O. Shittu, and A. A. Elujoba, “The formulation of an effective topical antibacterial product containing Ocimum gratissimum leaf essential oil,” International Journal of Pharmaceutics, vol. 224, no. 1-2, pp. 177–183, 2001.

A. Rasul and N. Akhtar, “Formulation and in vivo evaluation for anti-aging effects of an emulsion containing basil extract using non-invasive biophysical techniques,” DARU, vol. 19, no. 5, pp. 344–350, 2011.

Directorate-General, S.C.o.F. Opinion of the Scientific Committee on Food on Estragole (1-Allyl-4-methoxybenzene). SCF/CS/FLAV/FLAVOUR/6 ADD2 FINAL, pp. 1–10, 2001

Basil. 2013, http://www.evitamins.com/encyclopedia/assets/nutritional-supplement/basil/side-effects

R. W. Bussmann, G. Malca-García, A. Glenn et al., “Minimum inhibitory concentrations of medicinal plants used in Northern Peru as antibacterial remedies,” Journal of Ethnopharmacology, vol. 132, no. 1, pp. 101–108, 2010.

T. Schmidts, D. Dobler, P. Schlupp, C. Nissing, H. Garn, and F. Runkel, “Development of multiple W/O/W emulsions as dermal carrier system for oligonucleotides: effect of additives on emulsion stability,” International Journal of Pharmaceutics, vol. 398, no. 1-2, pp. 107–113, 2010.

W. C. Griffin, “Classification of surface-active agents by ‘HLB’,” Journal of the Society of Cosmetic Chemists, vol. 1, p. 311, 1949.

W. C. Griffin, “Calculation of HLB values of non-ionic surfactants,” Journal of the Society of Cosmetic Chemists, vol. 5, no. 249, 1954.

C. P. Fernandes, M. P. Mascarenhas, F. M. Zibetti, et al., “HLB value, an important parameter for the development of essential oil phytopharmaceuticals,” Revista Brasileira de Farmacognosia, vol. 23, pp. 108–114, 2013.

L. O. Orafidiya and F. A. Oladimeji, “Determination of the required HLB values of some essential oils,” International Journal of Pharmaceutics, vol. 237, no. 1-2, pp. 241–249, 2002.

F. R. Formiga, I. A. A. Fonseca, K. B. Souza et al., “Influence of a lipophilic drug on the stability of emulsions: an important approach on the development of lipidic carriers,” International Journal of Pharmaceutics, vol. 344, no. 1-2, pp. 158–160, 2007.

L. Lachman, H. A. Lieberman, and J. L. Kanig, The Theory and Practice of Industrial Pharmacy, Varghese Publishing House, Bombay, India, 3rd edition, 1987.

M. R. A. Ferreira, R. R. Santiago, T. P. De Souza, E. S. T. Egito, E. E. Oliveira, and L. A. L. Soares, “Development and evaluation of emulsions from Carapa guianensis (Andiroba) oil,” AAPS PharmSciTech, vol. 11, no. 3, pp. 1383–1390, 2010.

J. E. Smith and M. L. Jordan, “Mathematical and graphical interpretation of the log-normal law for particle size distribution analysis,” Journal of Colloid Science, vol. 19, no. 6, pp. 549–559, 1964.

A. Gupta and P. B. Myrdal, “Development of a perillyl alcohol topical cream formulation,” International Journal of Pharmaceutics, vol. 269, no. 2, pp. 373–383, 2004.

H. Zhang, Y. Cui, S. Zhu, F. Feng, and X. Zheng, “Characterization and antimicrobial activity of a pharmaceutical microemulsion,” International Journal of Pharmaceutics, vol. 395, no. 1-2, pp. 154–160, 2010.

K. Carović-Stanko, S. Orlić, O. Politeo et al., “Composition and antibacterial activities of essential oils of seven Ocimum taxa,” Food Chemistry, vol. 119, no. 1, pp. 196–201, 2010.

N. Aroonrerk and N. Kamkaen, “Anti-inflammatory activity of Quercus infectoria, Glycyrrhiza uralensis, Kaempferia galanga and Coptis chinensis, the main components of thai herbal remedies for aphthous ulcer,” Journal of Health Research, vol. 23, no. 1, pp. 17–22, 2009.

N. Babul, A. Singh, H. Kao, and A. Bajaj, “Skin irritation potential of topical mepivacaine gel and cream dosage forms,” The Journal of Pain, vol. 13, no. 4, supplement, p. S87, 2012.

Brookfield, CT3 Texture Analyzer Operating Instructions Manual No. M/08-371A0708, Brookfield Engineering Laboratories Ltd., Middleborough, Mass, USA, 2011.

V. Lemaitre-Aghazarian, P. Piccerelle, J. P. Reynier, J. Joachim, R. Phan-Tan-Luu, and M. Sergent, “Texture optimization of water-in-oil emulsions,” Pharmaceutical Development and Technology, vol. 9, no. 2, pp. 125–134, 2004.

M. E. Gillian, Emulsions and Microemulsions, in Encyclopedia of Pharmaceutical Technology, Informa Healthcare, 3rd edition, 2006.

G. Urbina-Villalba, A. Forgiarini, K. Rahn, and A. Lozsán, “Influence of flocculation and coalescence on the evolution of the average radius of an O/W emulsion. Is a linear slope of R3vs. t an unmistakable signature of Ostwald ripening?” Physical Chemistry Chemical Physics, vol. 11, no. 47, pp. 11184–11195, 2009.

J. S. Nambam and J. Philip, “Competitive adsorption of polymer and surfactant at a liquid droplet interface and its effect on flocculation of emulsion,” Journal of Colloid and Interface Science, vol. 366, no. 1, pp. 88–95, 2012.

F. Wang, Y. Liu, Y. Zhang, and S. Hu, “Experimental study on the stability of asphalt emulsion for CA mortar by laser diffraction technique,” Construction and Building Materials, vol. 28, no. 1, pp. 117–121, 2012.

H. Mirhosseini, C. P. Tan, N. S. A. Hamid, and S. Yusof, “Optimization of the contents of Arabic gum, xanthan gum and orange oil affecting turbidity, average particle size, polydispersity index and density in orange beverage emulsion,” Food Hydrocolloids, vol. 22, no. 7, pp. 1212–1223, 2008.

M. Aoki, A. Kamata, I. Yoshioka, and T. Matsuzaki, “Application of surface active agents to pharmaceutical preparations I: effect of Tween 20 upon the antifungal activities of p-hydroxybenzoic acid esters in solubilized preparations,” Journal of the Pharmaceutical Society of Japan, vol. 76, pp. 939–943, 1956.

N. Patel and H. B. Kostenbauder, “Interaction of preservatives with macromolecules I: binding of parahydroxybenzoic acid esters by polyoxyethylene 20 sorbitan monooleate (Tween 80),” Journal of the American Pharmacists Association, vol. 47, pp. 289–293, 1958.

P. Rattanachaikunsopon and P. Phumkhachorn, “Antimicrobial activity of basil (Ocimum basilicum) oil against Salmonella enteritidis in Vitro and in food,” Bioscience, Biotechnology and Biochemistry, vol. 74, no. 6, pp. 1200–1204, 2010.

S. Luqman, G. R. Dwivedi, M. P. Darokar, A. Kalra, and S. P. S. Khanuja, “Potential of Rosemary oil to be used in drug-resistant infections,” Alternative Therapies in Health and Medicine, vol. 13, no. 5, pp. 54–59, 2007.

D. B. Aime, S. D. Arntfield, L. J. Malcolmson, and D. Ryland, “Textural analysis of fat reduced vanilla ice cream products,” Food Research International, vol. 34, no. 2-3, pp. 237–246, 2001.

Y. Inoue, K. Furuya, M. Matumoto, I. Murata, M. Kimura, and I. Kanamoto, “A comparison of the physicochemical properties and a sensory test of Acyclovir creams,” International Journal of Pharmaceutics, vol. 436, no. 1-2, pp. 265–271, 2012.

M. D. Contreras and R. Sanchez, “Application of a factorial design to the study of the flow behavior, spreadability and transparency of a Carbopol ETD 2020 gel. Part II,” International Journal of Pharmaceutics, vol. 234, no. 1-2, pp. 149–157, 2002.

N. P. Mahalik and A. N. Nambiar, “Trends in food packaging and manufacturing systems and technology,” Trends in Food Science and Technology, vol. 21, no. 3, pp. 117–128, 2010.