BioMed Research International

Volume 2013 (2013), Article ID 515712, 10 pages

http://dx.doi.org/10.1155/2013/515712

Research Article

Genotypically Different Clones of Staphylococcus aureus Are Diverse in the Antimicrobial Susceptibility Patterns and Biofilm Formations

Salman Sahab Atshan,1,2 Mariana Nor Shamsudin,1,3 Leslie Than Thian Lung,¹ Zamberi Sekawi,¹ Chong Pei Pei,⁴ Arunkumar Karunanidhi,¹ Jayakayatri Jeevajothi Nathan,¹ Alreshidi Mateg Ali,⁵ Ehsanollah Ghaznavi-Rad,⁶ Salwa A. Abduljaleel,² and Rukman Awang Hamat¹

¹Laboratory of Medical Microbiology and Parasitology, Faculty of Medicine and Health Science, Universiti Putra Malaysia, 43400 Serdang, Selangor, Malaysia

²Department of Medical Microbiology, Basrah University, Basrah, Iraq

³Laboratory of Marine Science and Aquaculture, Institute of Bioscience, Universiti Putra Malaysia, 43400 Serdang, Selangor, Malaysia

⁴Department of Biomedical Sciences, Faculty of Medicine and Health Science, Universiti Putra Malaysia, 43400 Serdang, Selangor, Malaysia

⁵Department of Biomedical Sciences, Faculty of Medicine and Health Science, Al Bukacyriyah, Saudi Arabia

⁶Department of Microbiology and Immunology, Arak University of Medical Sciences, Arak, Iran

Received 30 April 2013; Accepted 4 October 2013

Academic Editor: Javeed Iqbal

Copyright © 2013 Salman Sahab Atshan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This study evaluated whether genotypically different clinical isolates of S. aureus have similar susceptibilities to individual antibiotics. It further aims to check the impact of biofilm on the in vitro activity of vancomycin, daptomycin, linezolid, and tigecycline against S. aureus clones. The study used a total of 60 different clinical MSSA and MRSA isolates. Susceptibilities were performed in planktonic cultures by macrobroth dilution and epsilon-test (E test) system. Biofilm production was determined using an adherent plate assay. The efficacy of antimicrobial activities against biofilms formation was checked using confocal laser scanning microscopy (CLSM). The study found that similar and different spa, MLST, and SCCmec types displayed high variation in their susceptibilities to antibiotics with tigecycline and daptomycin being the most effective. The biofilms were found resistant to high concentrations of most antibiotics tested with daptomycin being the most effective drug used in adhesive biofilms. A considerable difference exists among similar and various clone types against antibiotics tested. This variation could have contributed to the degree of virulence even within the same clonal genotype and enhanced heterogeneity in the infection potential. Thus, the development of a rapid and precise identification profile for each clone in human infections is important.

1. Introduction

Staphylococcus aureus is an important nosocomial and community-acquired pathogen for which few existing antibiotics are efficacious [1]. Modern MRSA has evolved from several successful clonal lineages of MSSA strains via acquisition of a mobile genetic element called staphylococcal cassette chromosome mec (SCCmec) [2]. Both methicillin—sensitive and—resistant S. aureus (MSSA and MRSA) are considered to have different genetic characteristics and the predominant genotypes differ geographically [3]. In the United States, ST36 and ST30 strains were epidemic in hospital and community settings [4]. After 2000, the USA300 clone (carrying the SCCmec IV and PVL loci) was dominant, emerging worldwide [5]. In Malaysia, most of the hospital-acquired MRSA strains were of MLST sequence type ST239, belonging to clonal cluster 8 (CC8) [6]. Whereas the most common MSSA clones circulating in Malaysia were 98 different spa types identified, corresponding to 8 different spa clonal clusters (spa-CCs) and majority of these isolates are multidrug resistant strains [7]. However, recent studies on antimicrobial susceptibilities have reported that even a small increase in MICs below the susceptibility range could also change the clinical efficacy of the certain drugs [8]. Standard conventional microdilution and disc diffusion methods are insufficient in identifying strains with decreased susceptibilities to drugs from those that are susceptible [9]. Therefore, the aim of the present study was to assess the in vitro antimicrobial susceptibilities against genetically diverse staphylococcal clones in Malaysia. The minimum biofilm reduction concentrations (MBRCs) of various antibiotics were also measured for the certain of strong biofilm positive MRSA isolates. The objectives outlined in the present study are to provide quantitative data for clinicians to improve the management of treated for the patients infected with these clones.

2. Materials and Methods

2.1. Bacterial Strains

A total of 60 clinical isolates of S. aureus which included 30 MRSA isolates associated with six major sequence types and 30 MSSA isolates associated with 20 sequence types were selected for this study (Table 1). The isolates were collected from Hospital Kuala Lumpur, the largest Malaysian public hospital during 2009-2010. Detailed molecular characteristics of these isolates as different clones using staphylococcal cassette chromosome mec (SCCmec) typing, staphylococcal surface protein A (spa) typing, and multilocus sequence typing (MLST) were previously confirmed from our laboratory by Ghaznavi-Rad et al. [6] and Ghasemzadeh-Moghaddama et al. [7]. Isolates received from lab members in the form of stock cultures were stored at −80°C in Luria-Bertani broth supplemented with 20% glycerol and thawed whenever required during the experiment. MSSA ATCC 25923 (susceptibility control) and MRSA ATCC 43300 (mecA positive control) were used as quality controls in present study.

Table 1: Characteristics of isolates used in this study.

MLST

sequence type
SCCmec

type
No. of

isolates
Source of isolates

ST 239-CC8
IIIA
13-MRSA
Pus (4), sputum (3), wound (3), blood (1), abscess (1), bC.S.F (1)

ST22-CC22
IVh
5-MRSA
Blood (4), pus (1)

ST188-CC1
V
3-MRSA
Pus (2), wound (1)

ST1-CC1
V
3-MRSA
Pus (2), wound (1)

ST1283-CC8
IIIA
3-MRSA
Medical devices (1), blood (1), wound (1)

ST7-CC7
V
3-MRSA
Pus (2), blood (1)

ST5-CC5
—
4-MSSA
Tracheal aspirate (1), cswab (1), urine (1), tissue (1)

ST121-CC121
—
4-MSSA
Swab (3), abscess (1)

ST88-CC88
—
2-MSSA
Swab (2)

ST45-CC45
—
2-MSSA
Swab (2)

ST8-CC8
—
2-MSSA
Swab (2)

ST15-CC15
—
2-MSSA
C.S.F (1), urine (1)

aDifferent ST types
—
14-MSSA
Swab (7), tissue (2), pus (2), abscess (1), C.S.F (1), tracheal aspirate (1)

Major STs of MSSA recovered as single isolates including ST188-singleton, ST152-CC8, ST80-CC80, ST1-CC1, ST12-CC12, ST20-singleton, ST361-singleton, ST1153-singleton, ST769-CC1, ST508-CC45, ST833-singleton, ST9-CC97, ST1050-CC25, and ST15-CC5. bC.S.F: cerebrospinal fluid. cSwab: specimen collected from haematoma, eyes, axilla, skin, breast, face, foot, and ear.

2.2. Planktonic Susceptibility Testing

2.2.1. MICs Determination

The MIC is defined as the lowest concentration (maximum dilution) of antimicrobial that will inhibit the visible growth of microorganisms after overnight incubation [10]. The MICs of the five antimicrobial agents (vancomycin, amoxicillin/clavulanic acid, daptomycin, linezolid, and tigecycline) were determined simultaneously using E test strips (BioMérieux SA, France) according to manufacturer’s recommendations included in the packaging inserts. The system comprise a predefined antibiotic gradient ranging from 0.016 to 256 μg/mL and bacterial inoculum equivalent to a turbidity of a 0.5 McFarland standard was inoculated onto Mueller-Hinton agar plates (Merck) by lawn culture. Appropriate E test strips were carefully placed at the center of the MHA plates and incubated at 35°C for 24 h in an incubator. Isolates were categorized based on their breakpoints for resistance according to the recommendations by Clinical and Laboratory Standards Institute (CLSI) [11].

2.2.2. MBCs Determination

The MBCs were determined for each different clone types in duplicates by a macrodilution technique with Mueller-Hinton broth for vancomycin, amoxicillin/clavulanic acid, linezolid, and tigecycline according to Clinical and Laboratory Standards Institute guidelines for broth microdilution susceptibility testing [11]. Mueller-Hinton broth supplemented with calcium at 75 mg/liter (physiological ionized Ca²⁺ concentration) and magnesium at 12.5 mg/liter (SMHB-PCA) was always used for macrodilution susceptibility testing of daptomycin. The MBC was defined by previously published method [12]. Briefly, in wells where there was no visible growth (no turbidity) after overnight incubation, 100 μL was subcultured to MHA and the agar plates were incubated at 35°C for colony count. MBC was defined as the highest dilution showing ≥ 99.9% kill after 24 h of incubation. Five antistaphylococcal antibiotics were purchased commercially from (BIORON, Malaysia), representing agents from the glycopeptide, β-lactam, lipopeptide, oxazolidinones, and glycylcycline classes. Stock solutions of this antibiotic were kept frozen at −20°C.

2.3. Biofilm Susceptibility Testing

In this study, 6 distinct MRSA clones were selected from our previous study and well known for their ability to form stable biofilms (Table 2) [13]. The minimum biofilm reduction concentrations (MBRCs) were determined using an adaptation of a biofilm susceptibility testing method with minor modifications [12, 14]. Briefly, isolates grown for 18 h were resuspended and diluted 1 : 100 in BHI broth (supplemented 1% glucose), and 1 mL aliquots were placed into each row of a 6-well flat-bottom microtiter plate (Nunclon; Nunc), covered with a lid, and incubated for 48 h. To remove nonadherent cells, biofilms were washed 3 times with sterile ddH₂O and exposed to fresh serial dilution of antibiotic concentrations. Antibiotics were prepared from stock depending on the concentration to be used and prepared separately on a new flat-bottom plate containing MHB to start serial dilutions of antibiotics in 1 mL of MHB per well making the range of antibiotic concentrations start with 1 : 1 per milliliter. The concentration ranges for tested antibiotic agents were as follows: vancomycin, 8–512 μg/mL; daptomycin, 2–256 μg/mL; linezolid, 4–512 μg/mL, and tigecycline, 2–256 μg/mL. One ml of media containing the antibiotic dilutions was transferred to biofilm grown in the well of a 6-microtiter plate and incubated for next 24 h at 35°C. After incubation, the lid was removed and the wells were examined for evidence of turbidity. MBRCs were determined as the last well showing no turbidity after incubation.

Table 2: The biofilm positive MRSA isolates used in this study.

Isolates
spa types
MLST
SCCmec
Biofilm forming
PCR

icaABCD
MBC (μg/mL)

ST
CC
Vanc.
Lin.
Tig.
Dap.

1 (MRSA)/527
t037
ST-239
CC8
IIIA
++++
+
4
2
1
2

2 (MRSA)/524
t037
ST-239
CC8
IIIA
++++
+
2
2
1
4

3 (MRSA)/5
t421
ST-239
CC8
IIIA
++++
+
4
2
0.5
1

4 (MRSA)/526
t421
ST-239
CC8
IIIA
++++
+
4
4
2
2

5 (MRSA)/418
t127
ST-1
CC1
V
++++
+
8
4
4
1

6 (MRSA)/404
t127
ST-1
CC1
V
++++
+
4
4
0.5
0.5

Vanc: vancomycin, Lin: linezolid, Tig: tigecycline, Dap: daptomycin.

2.4. Visualization of Antibacterial Activity

For confocal laser scanning microscopy (CLSM), the cells were grown until the stage of biofilm maturation (48 h incubation) and were directly treated with the 4 antibiotics. The following antibiotic concentrations were used for the biofilm experiments based on 2x MBRCs: 512 μg/mL vancomycin, 128 μg/mL daptomycin, 1024 linezolid, and 256 μg/mL tigecycline. After change of new culture plate containing antibiotics, the plates were incubated at 35°C for 24 h. The Live/Dead Baclight Bacterial Viability kit (Invitrogen, Paisley, UK) was adapted system according to the manufacturer’s instructions. Biofilm was stained for 5 min with 1 : 1000 dilution solutions (in 0.9% NaCl) of SYTO9 for live organisms and with propidium iodide for dead organisms. The microscopic observation and image acquisitions were performed with LSMFV1000 (Olympus, Japan). The images sizes were seen with 320 × 320 (pixel) and 100x/1.4 objective lens. The total number of organisms in a biofilm was calculated by determining the ratio of killed cells to the total cells with the mean value on 3 images and standard deviation. The images were obtained using the “FLUOVIEW FV1000” software package version 3.1.2.2 (Olympus, Japan).

2.5. Interpretation of Data

Results for antibiotic susceptibilities were expressed in terms of MIC₅₀ and MIC₉₀ (MIC for 50% and 90% of the planktonic bacteria), MBC₅₀ and MBC₉₀ (MBC for 50% and 90% of the planktonic bacteria), and MBEC₅₀ and MBEC₉₀ (MIC for 50% and 90% of the biofilm bacteria). The Chi-square test was used to evaluate the statistical significance of differences in the results. A value of <0.05 was considered statistically significant.

3. Results

3.1. Planktonic Susceptibility Testing

3.1.1. MICs Determination

All different clones examined were susceptible to 5 antibiotics, except 26.66 and 63.33% of MRSA that is nonsusceptible to tigecycline and amoxicillin/clavulanic acid, respectively. Although a considerable significant difference in MIC values exists among similar and various clone types of S. aureus, tigecycline had the lowest MIC₉₀ values compared to all agents tested (Table 3). However, the MIC ranges for majority of the MRSA isolates were found to be significantly higher () compared to the MICs for MSSA isolates (see Figure 1 and Figures , A, B, C, D, and E available online at http://dx.doi.org/10.1155/2013/515712).

Table 3: In vitro MICs comparing activities of five antimicrobial agents against 30 MSSA and 30 MRSA different isolates isolated from a clinical setting in largest Malaysian public hospital.

Organism tested (no. of isolates) and antibiotic agent
MIC (μg/mL)
% Susceptibility

Range
50%
90%
S
R

MSSA (30)

    Vancomycin
0.31–1.75
0.62
0.87
100
0

    Linezolid
0.62–1.25
0.87
0.87
100
0

    Tigecycline
0.07-0.07
0.07
0.07
100
0

    Daptomycin
0.10–0.87
0.22
0.44
100
0

    Amox./clav.
0.03–1.25
0.62
1.25
100
0

MRSA (30)

    Vancomycin
0.44–1.75
0.87
1.25
100
0

    Linezolid
0.22–1.75
0.87
0.87
100
0

    Tigecycline
0.07–1.25
0.22
0.22
73.33
26.66

    Daptomycin
0.15–0.87
0.31
0.87
100
0

    Amox./clav.
0.44–16
12
12
36.66
63.33

Amox./clav: amoxicillin/clavulanic acid; S: sensitive; R: resistant; MIC: minimum inhibition concentration; MSSA: methicillin-susceptible S. aureus; MRSA: methicillin-resistant S. aureus.

(a)

(b)

(c)

(d)

(e)

Figure 1: Comparing the ranges of MIC values of vancomycin, daptomycin, linezolid, tigecycline, and amoxicillin/clavulanic acid against 30 MRSA and 30 MSSA isolates.

The majority of resistant clones to the amoxicillin/clavulanic acid were found to belong to MRSA ST239-CC8 and ST22-CC22 compared to other MRSA STs (), whereas, the majority of the tigecycline resistant clones belonged to ST239-CC8-t421, ST188-CC1-t189, ST1-CC1-t127, ST1283-CC8-t037, and ST7-CC7-t091. Vancomycin sensitive MRSA isolates were found belonged to ST188-CC1 with very low MICs ( value < 0.05), while MRSA ST1283-CC8 showed the highest MIC for vancomycin compared to other STs. Twenty STs of MSSA clones were found to be susceptible to all antibiotics tested at different MIC values, with tigecycline being the highest degree of similarity in MIC values (see Figures A and B). The MICs of control strains were found within the expected ranges (Figures A, B, C, D, and E).

3.1.2. MBCs Determination

The in vitro MBCs activities range, MBC50 and MBC90 (µg/mL), against various antibiotics tested were found different among clone types of S. aureus (Table 4). Tigecycline had the lowest MBCs among the antibiotics tested, followed by daptomycin. However, the linezolid had the highest MBCs among the antibiotics tested against MSSA clones, followed by vancomycin and amoxicillin/clavulanic acid. While, amoxicillin/clavulanic acid had the highest MBCs among the antibiotics tested against MRSA clones followed by vancomycin and linezolid. The MBCs means and range values of MRSA clones were more often increased in most groups of antimicrobial agents, compared to MBCs range values of MSSA clones with positive correlation, but were statistically significant () as illustrated in Figure 2 and Figures A, B, C, D, and E.

Table 4: In vitro MBCs comparing activities of 5 antimicrobial agents against 30 MSSA and 30 MRSA different isolates isolated from a clinical setting in largest Malaysian public hospital.

Organism tested (no. of isolates) and antibiotic agent
MBC (μg/mL)

Range
50%
90%

MSSA (30)

    Vancomycin
2–8
4
4

    Linezolid
2–8
4
4

    Tigecycline
0.25–1
0.25
0.5

    Daptomycin
0.25–2
2
2

    Amox./clav.
0.25–8
2
4

MRSA (30)

    Vancomycin
2–8
4
4

    Linezolid
0.5–4
4
4

    Tigecycline
0.5–4
0.5
1

    Daptomycin
0.125–4
1
2

    Amox./clav.
2–32
4
24

(a)  

(b)

(c)

(d)

(e)

Figure 2: Comparing the ranges of MBC values of vancomycin, daptomycin, linezolid, tigecycline, and amoxicillin/clavulanic acid against 30 MRSA and 30 MSSA isolates.

3.2. Biofilm Susceptibility Testing

The MBRCs after in vitro biofilm formation for 6 MRSA clones were determined and are listed in Table 5. The MBRCs for vancomycin, daptomycin, linezolid, and tigecycline were overall greater than the CLSI-defined planktonic MIC breakpoint for resistance. Daptomycin and tigecycline all exhibited broad MBRC ranges. The daptomycin MBRC ranges (16–64 μg/mL) and tigecycline MBRC ranges (32–128 μg/mL) of 6 isolates were overall much lower than other MBRC ranges.

Table 5: Minimal biofilm reduction concentrations of different antimicrobials on six strong biofilm-forming MRSA isolates.

Isolates number
MBEC (μg/mL)

Vancomycin
Daptomycin
Linezolid
Tigecycline

1 (MRSA)/527
128
32
256
64

2 (MRSA)/524
256
64
512
128

3 (MRSA)/5
256
64
128
128

4 (MRSA)/526
256
64
512
128

5 (MRSA)/418
64
64
512
32

6 (MRSA)/404
256
16
512
128

MBEC50
256
64
512
128

MBEC90
256
64
512
128

Range
64–256
16–64
128–512
32–128

3.3. Efficacies of Antibiotics on Adherent Biofilms

As shown in Figures 3(a), 3(b), 3(c), and 3(d), the remaining adherent biofilms populations differed between the 4 antibiotics. Most cells were alive following linezolid, vancomycin, tigecycline, and daptomycin treatment. Linezolid, vancomycin, and tigecycline killed 16.6 ± 2.1%, 28.5 ± 2.4%, and 55.5 ± 3.4% of the cells in mature S. aureus biofilms, respectively. Live/Dead staining revealed that daptomycin was the most efficient in reducing the number of biofilms, as 93 ± 2.8% of the cells were killed.

(a)

(b)

(c)

(d)

Figure 3: Efficacy of antibiotic treatments against biofilm cells. The cells on mature biofilms (48 h incubation) were treated with 512 μg/mL vancomycin, 128 μg/mL daptomycin, 1024 linezolid, and 256 μg/mL tigecycline. After 24 h of the antibiotic treatments, the cells were stained with Live/Dead kit. 1 indicates the histograms of frequency and intensity of live and dead cells. 2 indicates the acquired 2D view images obtained at 1.4 objective and magnification of ×100; (a) linezolid, (b) vancomycin, (c) tigecycline, (d) daptomycin.

4. Discussion

Due to the clonal variations, there is a drastic change in the antibiotic susceptibility patterns among microbial populations. The rate of resistance varies geographically within countries depending on antibiotic policies and enforcements by infection control boards and under various clone types reporting. It is important to conduct regular antibiogram studies on frequently encountered superbugs like S. aureus clones, which are prone to acquire multidrug resistance. Although the number of antibiotics selected in the present study is less, the antibiograms obtained will update changes in susceptibility patterns and treatment options. The study also utilized a limited number of clones (60 clone types); however, it is the total number of nonduplicate the isolates obtained from a tertiary hospital over a one year period. Several surveillance studies on the increased prevalence of MRSA have been reported earlier [15, 16]. Very high prevalence rates of MRSA have been documented in developed countries, especially in Western Pacific regions, both in community-acquired and hospital infections [15]. According to the surveys conducted in Malaysian hospitals, the prevalence of MRSA increased from the range of 10–25% in 1985-1986 to more than 40% in 1996 [17, 18]. Of the 30 MRSA clones tested, 26.6% clones were resistant to tigecycline and 63.3% were found to be amoxicillin/clavulanic acid resistant. However, all clones of MSSA were sensitive to all the antibiotics tested (Table 3). It is not surprising as majority of the MRSA clones were resistant to amoxicillin/clavulanic acid making it ineffective against MRSA even in vitro, but this antibiotic showed excellent activity against MSSA clones. It is conceivable that the changes mediating reduced susceptibility to beta-lactamantibiotics in MRSA are most likely caused by an intrinsic resistance mechanism of mecA gene, which encodes penicillin-binding protein 2′ (PBP2′) with significantly reduced affinity for β-lactams [19]. Although, amoxicillin/clavulanic acid exhibits in vitro activity against certain MRSA clones, it is not clinically effective and MRSA clones should therefore be considered resistant. Among the six major sequence types of MRSA utilized in this study, ST22-CC22 and ST239-CC8 were found to be the highly resistant clones towards amoxicillin/clavulanic acid. Previously Ghaznavi-Rad et al. [20] utilized antibiogram and MICs of selected antibiotics, including oxacillin by E test for the same strain of MRSA used in this study and showed the isolates belonged to clonal complex 8 (CC8) and CC22 (ST-22) had high-level resistance to oxacillin (MIC 8–256 mg/L), while other STs showed low-level resistance to oxacillin (MIC 4–8 mg/L). However, ST22-CC22 and ST239-CC8 STs of MRSA have increased MIC values to daptomycin compared to other STs associated with low-level resistance (Figure , B). Ghaznavi-Rad et al. [6] also have documented that the ST22-CC22 of SCCmec type IVh would have recently emerged in Malaysia and the element of this clone is small in comparison to elements of other STs such as SCCmec type IIIA of ST239-CC8, the small size enables easier spread among S. aureus populations, and acquired the resistance [21, 22]. In addition, the presence of the ACME arcA gene in all ST-239 SCCmec type III MRSA clones tested in the present study has been previously confirmed by Ghaznavi-Rad et al. [6]. This ACME arcA contributes to the growth and survival by encoding resistance and virulence determinants that enhance clearer discrimination of predominant MRSA t037-ST239 as well as their resistantce to various classes of antibiotics [23, 24]. This may possibly reflect the prevalence of ST239-CC8 in Malaysia and in neighbouring Asian countries in recent years, which are highly resistant clones in general. Tigecycline showed excellent activity against all the 30 MSSA tested with acceptable ranges of MIC₅₀ (0.07 μg/mL) and MIC₉₀ (0.07 μg/mL). However, the MICs of tigecycline for the MRSA clones tested were found to be slightly higher than that for MSSA clones (less correlation) but statistically significant (; ) (Figure 1 and Figure (E)). These results are similar to the observations by Fluit et al. [25]. An interesting aspect of this study is the remarkable difference in resistance against tigecycline among the 6 MRSA STs tested (Figure , B). Of all the MRSA STs, ST22-CC22 was found to be highly susceptible to tigecycline, whereas other MRSA STs showed varying susceptibilities towards tigecycline. This discrepancy requires further investigations into the underlying the mechanisms of varying susceptibilities and resistance. Vancomycin remains the choice of therapy for serious MRSA infections, but its efficacy is inferior to that of antistaphylococcal penicillins against MSSA [26]. The MICs of vancomycin for MRSA clones observed in the present study appear to be slightly higher than those for MSSA clones, although the correlation is relatively strong and statistically significant (; ) (Figure 1 and Figure (A)). This slight increase in MICs with MRSA clones are a worrying finding. An increase in vancomycin MIC, even within the susceptible range, has raised the risk of treatment failure in cases of MRSA infection [27]. All the 60 clone types were susceptible to daptomycin and linezolid antibiotics and this is similar to the observations by Perry et al. [28]. High proportion of MRSA clones had a little variation in MICs for daptomycin and linezolid, which is not observed in MSSA clones (Figure 1 and Figures (C) and (D)). This slight increase in daptomycin MICs for MRSA might be due to the thickening of cell wall and not because of the intrinsic resistance mechanism [29]. Based on the results of the current study, the most effective therapeutic options for MRSA infections identified are daptomycin and tigecycline for MSSA infections.

We also analyzed the bactericidal activities of various antimicrobial agents against different clone types of MRSA and MSSA based on the eradication of cells in planktonic. Bactericidal activity appears to be necessary for clinical efficacy in certain circumstances, for example, endocarditis, meningitis, osteomyelitis, and severe infections involving neutropenic patients [30]. In the present study, although the MBC values in some cases exceeded the highest drug concentration tested, daptomycin and tigecycline had the lowest MBC90 values compared to all agents tested with MBC ranges being slightly different between MSSA and MRSA clones (Table 4). The MBC ranges of vancomycin and daptomycin were slightly similar for all clones of MSSA and MRSA, while the MBC ranges and means of linezolid, tigecycline, and amoxicillin/clavulanic acid had significant different bactericidal activities in both MSSA and MRSA clones (Figure 2 and Figures A, B, C, D and E). A recent study revealed that daptomycin showed noninferiority, as compared with the standard regimens, for treating both MSSA and MRSA bacteraemia and endocarditis [31]. Our results showed that daptomycin and tigecycline had the most potent in vitro activity among the agents studied; therefore it has been suggested to be used for S. aureus clone types infections.

The ability of S. aureus to form biofilms contributes to antibiotic resistance, and frequently more MRSA strains are causing biofilm-associated infections [32, 33]. Further, biofilm susceptibility testing gives quantitative data, which are not obtainable with the Kirby-Bauer method. These quantitative data are useful in predicting the levels of antibiotics that must be attained to assure inhibition or killing of biofilm. Few studies have investigated the abilities of different MRSA clones in hospitals and communities to form biofilms. In Malaysian MRSA clones, there was no data available to provide biofilm information on antibiotic selection in infected patients. During in vitro biofilms, all clones induced biofilms were resistant to drug concentrations 16 to 512 times greater than the planktonic susceptibility breakpoints, with daptomycin and tigecycline being the most effective drugs used in adhesive biofilms. Based on microscopy studies confirming that daptomycin may be the treatment of choice to prevent biofilm regrowth at lower concentrations than could the other drugs (Figure 3); this was in agreement with another study [34], which cited that the daptomycin and tigecycline activities in biofilms were better than those of the other antibiotics used.

5. Conclusion

The present study shows a considerable difference exists among similar and various clone types of S. aureus with significant variation in antibiotic susceptibility being observed. Thus, the development of a rapid and precise identification profile for each clone in human infections is important in order to prescribe the correct antibiotic and reduce empirical treatment. In addition, clones of S. aureus that are positive for biofilms were increased in resistance to most of antibiotics with daptomycin and tigecycline being lower overall compared to those of other antibiotics in planktonic and attached biofilms. These in vitro data against various clones could provide a basis for the use of antibiotics in the treatment of biofilm staphylococcal infections.

Conflict of Interests

The authors declare no conflict of interests exist.

Acknowledgments

The authors are indebted to the Medical Microbiology Laboratory, Faculty of Medicine and Health Science, Universiti Putra Malaysia, for providing research facilities. This work was supported by the Ministry of Science, Technology and Innovation, Malaysia (MOSTI, Putrajaya, Malaysia) Grant 5524112 to UPM.

References

S. E. Cosgrove, G. Sakoulas, E. N. Perencevich, M. J. Schwaber, A. W. Karchmer, and Y. Carmeli, “Comparison of mortality associated with methicillin-resistant and methicillin-susceptible Staphylococcus aureus bacteremia: a meta-analysis,” Clinical Infectious Diseases, vol. 36, no. 1, pp. 53–59, 2003.

Y. S. Seo, D. Y. Lee, N. Rayamahji, M. L. Kang, and H. S. Yoo, “Biofilm-forming associated genotypic and phenotypic characteristics of Staphylococcus spp. isolated from animals and air,” Research in Veterinary Science, vol. 85, no. 3, pp. 433–438, 2008.

T. S. Naimi, K. H. LeDell, K. Como-Sabetti et al., “Comparison of community- and health care—associated methicillin-resistant Staphylococcus aureus infection,” The Journal of the American Medical Association, vol. 290, no. 22, pp. 2976–2984, 2003.

I. A. Binswanger, A. H. Kral, R. N. Bluthenthal, D. J. Rybold, and B. R. Edlin, “High prevalence of abscesses and cellulitis among community-recruited injection drug users in San Francisco,” Clinical Infectious Diseases, vol. 30, no. 3, pp. 579–581, 2000.

L. G. Miller and B. A. Diep, “Colonization, fomites, and virulence: rethinking the pathogenesis of community-associated methicillin-resistant Staphylococcus aureus infection,” Clinical Infectious Diseases, vol. 46, no. 5, pp. 752–760, 2008.

E. Ghaznavi-Rad, M. N. Shamsudin, Z. Sekawi et al., “Predominance and emergence of clones of hospital-acquired methicillin-resistant Staphylococcus aureus in Malaysia,” Journal of Clinical Microbiology, vol. 48, no. 3, pp. 867–872, 2010.

H. Ghasemzadeh-Moghaddama, E. Ghaznavi-Rada, Z. Sekawia et al., “Methicillin-susceptible Staphylococcus aureus from clinical and community sources are genetically diverse,” International Journal of Medical Microbiology, vol. 301, no. 4, pp. 347–353, 2011.

I. M. Gould, “Clinical relevance of increasing glycopeptide MICs against Staphylococcus aureus,” International Journal of Antimicrobial Agents, vol. 31, no. 2, pp. 1–9, 2008.

V. Lorian, Antibiotics in Laboratory Medicine, Williams & Wilkins, Philadelphia, Pa, USA, 5th edition, 2005.

J. M. Andrews, “Determination of minimum inhibitory concentrations,” Journal of Antimicrobial Chemotherapy, vol. 48, no. 1, pp. 5–16, 2001.

National Committee for Clinical Laboratory Standards, Performance Standards for Antimicrobial Susceptibility Testing, Approved Standard M100-S16, National Committee for Clinical Laboratory Standards, Wayne, Pa, USA, 2006.

R. Saginur, M. St. Denis, W. Ferris et al., “Multiple combination bactericidal testing of staphylococcal biofilms from implant-associated infections,” Antimicrobial Agents and Chemotherapy, vol. 50, no. 1, pp. 55–61, 2006.

S. S. Atshan, M. N. Shamsudin, L. T. T. Lung, Z. Sekawi, E. Ghaznavi-Rad, and C. Pei Pei, “Comparative characterisation of genotypically different clones of MRSA in the production of biofilms,” Journal of Biomedicine and Biotechnology, vol. 2012, Article ID 417247, 7 pages, 2012.

S. M. Moskowitz, J. M. Foster, J. Emerson, and J. L. Burns, “Clinically feasible biofilm susceptibility assay for isolates of Pseudomonas aeruginosa from patients with cystic fibrosis,” Journal of Clinical Microbiology, vol. 42, no. 5, pp. 1915–1922, 2004.

D. J. Diekema, M. A. Pfaller, F. J. Schmitz et al., “Survey of infections due to Staphylococcus species: frequency of occurrence and antimicrobial susceptibility of isolates collected in the United States, Canada, Latin America, Europe, and the Western Pacific region for the SENTRY antimicrobial surveillance program, 1997–1999,” Clinical Infectious Diseases, vol. 32, no. 10, pp. S114–S132, 2001.

M. E. Jones, J. A. Karlowsky, D. C. Draghi, C. Thornsberry, D. F. Sahm, and D. Nathwani, “Epidemiology and antibiotic susceptibility of bacteria causing skin and soft tissue infections in the USA and Europe: a guide to appropriate antimicrobial therapy,” International Journal of Antimicrobial Agents, vol. 22, no. 4, pp. 406–419, 2003.

V. K. E. Lim, “Staphylococcal infection in Malaysian hospitals,” Journal of Hospital Infection, vol. 11, pp. S103–S108, 1988.

M. Y. Rohani, A. Raudzah, M. G. Lau et al., “Susceptibility pattern of Staphylococcus aureus isolated in Malaysian hospitals,” International Journal of Antimicrobial Agents, vol. 13, no. 3, pp. 209–213, 2000.

D. A. Robinson and M. C. Enright, “Evolutionary models of the emergence of methicillin-resistant Staphylococcus aureus,” Antimicrobial Agents and Chemotherapy, vol. 47, no. 12, pp. 3926–3934, 2003.

E. Ghaznavi-Rad, V. Neela, M. Nor Shamsudin et al., “Diversity in the antimicrobial susceptibility patterns of methicillin-resistant Staphylococcus aureus clones,” European Journal of Clinical Microbiology and Infectious Diseases, vol. 31, no. 12, pp. 3317–3321, 2012.

L. Y. Hsu, T. H. Koh, K. Singh, M. L. Kang, A. Kurup, and B. H. Tan, “Dissemination of multisusceptible methicillin-resistant Staphylococcus aureus in Singapore,” Journal of Clinical Microbiology, vol. 43, no. 6, pp. 2923–2925, 2005.

C. Schlichting, C. Branger, J. M. Fournier et al., “Typing of Staphylococcus aureus by pulsed-field gel electrophoresis, zymotyping, capsular typing, and phage typing: resolution of clonal relationships,” Journal of Clinical Microbiology, vol. 31, no. 2, pp. 227–232, 1993.

S. J. Campbell, H. S. Deshmukh, C. L. Nelson et al., “Genotypic characteristics of Staphylococcus aureus isolates from a multinational trial of complicated skin and skin structure infections,” Journal of Clinical Microbiology, vol. 46, no. 2, pp. 678–684, 2008.

B. A. Diep, S. R. Gill, R. F. Chang et al., “Complete genome sequence of USA300, an epidemic clone of community-acquired meticillin-resistant Staphylococcus aureus,” The Lancet, vol. 367, no. 9512, pp. 731–739, 2006.

A. C. Fluit, A. Florijn, J. Verhoef, and D. Milatovic, “Presence of tetracycline resistance determinants and susceptibility to tigecycline and minocycline,” Antimicrobial Agents and Chemotherapy, vol. 49, no. 4, pp. 1636–1638, 2005.

A. W. Karchmer, “Staphylococcus aureus and vancomycin: the sequel,” Annals of Internal Medicine, vol. 115, no. 9, pp. 739–741, 1991.

G. Sakoulas, P. A. Moise-Broder, J. Schentag, A. Forrest, R. C. Moellering Jr., and G. M. Eliopoulos, “Relationship of MIC and bactericidal activity to efficacy of vancomycin for treatment of methicillin-resistant Staphylococcus aureus bacteremia,” Journal of Clinical Microbiology, vol. 42, no. 6, pp. 2398–2402, 2004.

J. D. Perry, A. L. Jones, and F. K. Gould, “Glycopeptide tolerance in bacteria causing endocarditis,” Journal of Antimicrobial Chemotherapy, vol. 44, no. 1, pp. 121–124, 1999.

J. B. Patel, L. A. Jevitt, J. Hageman, L. C. McDonald, and F. C. Tenover, “An association between reduced susceptibility to daptomycin and reduced susceptibility to vancomycin in Staphylococcus aureus,” Clinical Infectious Diseases, vol. 42, no. 11, pp. 1652–1653, 2006.

G. A. Pankey and L. D. Sabath, “Clinical relevance of bacteriostatic versus bactericidal mechanisms of action in the treatment of gram-positive bacterial infections,” Clinical Infectious Diseases, vol. 38, no. 6, pp. 864–870, 2004.

V. G. Fowler Jr., H. W. Boucher, G. R. Corey et al., “Daptomycin versus standard therapy for bacteremia and endocarditis caused by Staphylococcus aureus,” The New England Journal of Medicine, vol. 355, no. 7, pp. 653–665, 2006.

E. Paintsil, “Pediatric community-acquired methicillin-resistant Staphylococcus aureus infection and colonization: trends and management,” Current Opinion in Pediatrics, vol. 19, no. 1, pp. 75–82, 2007.

A. S. Kwon, G. C. Park, S. Y. Ryu et al., “Higher biofilm formation in multidrug-resistant clinical isolates of Staphylococcus aureus,” International Journal of Antimicrobial Agents, vol. 32, no. 1, pp. 68–72, 2008.

A. L. S. Antunes, D. S. Trentin, J. W. Bonfanti et al., “Application of a feasible method for determination of biofilm antimicrobial susceptibility in staphylococci,” Acta Pathologica, et Microbiologica Scandinavica, vol. 118, no. 11, pp. 873–877, 2010.